المحتويات

المقدمة

المتطلبات الأساسية

المتطلبات

المكونات المستخدمة

معلومات أساسية لوحدة التحكم اللاسلكية Unified Access CT5760

معلومات أساسية للمحولات Unified Access Catalyst 3850 switches

التكوين الأولي ل 5760 WLC

التكوين

برنامج الإعداد النصي

التكوين المطلوب لنقاط الوصول للانضمام

التحقق من الصحة

استكشاف الأخطاء وإصلاحها

التكوين الأولي للمحول 3850

التكوين

برنامج الإعداد النصي

التكوين المطلوب لنقاط الوصول للانضمام

التحقق من الصحة

استكشاف الأخطاء وإصلاحها

المقدمة

يوضح هذا المستند الخطوات اللازمة لتثبيت الخدمات اللاسلكية وتحضيرها على وحدة التحكم في الشبكة المحلية اللاسلكية (WLC) 5760 والمحول 3850. يغطي هذا المستند التكوين الأولي وعملية انضمام نقطة الوصول (AP) لكلا النظامين الأساسيين.

المتطلبات الأساسية

المتطلبات

لا توجد متطلبات خاصة لهذا المستند.

المكونات المستخدمة

تستند المعلومات الواردة في هذا المستند إلى إصدارات البرامج والمكونات المادية التالية:

- وحدة التحكم اللاسلكية Unified Access CT5760 - الإصدار 3.02.02SE

- المحول Unified Access Catalyst 3850 Switch - الإصدار 3.02.02SE

تم إنشاء المعلومات الواردة في هذا المستند من الأجهزة الموجودة في بيئة معملية خاصة. بدأت جميع الأجهزة المُستخدمة في هذا المستند بتكوين ممسوح (افتراضي). إذا كانت شبكتك مباشرة، فتأكد من فهمك للتأثير المحتمل لأي أمر.

معلومات أساسية لوحدة التحكم اللاسلكية Unified Access CT5760

تعد وحدة التحكم CT5760 WLC أول وحدة تحكم قائمة على برامج Cisco IOS-XE® التي تم تصميمها باستخدام وحدة تحكم ASIC الذكية المخطط نشرها كوحدة تحكم مركزية في الجيل التالي من البنية اللاسلكية الموحدة. كما يدعم النظام الأساسي وظيفة التنقل الجديدة مع محولات Converged Access 3850 Series.

وعادة ما يتم نشر وحدات التحكم CT5760 بالقرب من المركز. يمكن تكوين منافذ الوصلة المتصلة بالمحول الأساسي كمنافذ خط اتصال EtherChannel لضمان تكرار المنفذ. تعد وحدة التحكم الجديدة هذه وحدة تحكم لاسلكية فائقة الأداء وقابلة للتوسع، يمكنها التطوير حتى 1000 نقطة وصول و 12000 عميل. تحتوي وحدة التحكم على ستة منافذ بيانات بسرعة 10 جيجابت في الثانية لتوفير سعة إجمالية تبلغ 60 جيجابت في الثانية.

تعمل السلسلة 5760 بالاقتران مع نقاط الوصول Cisco Aironet APs، و Cisco Prime Infrastructure، و Cisco Mobility Services Engine لدعم تطبيقات خدمات البيانات اللاسلكية المهمة للشركات والصوت والفيديو والموقع.

معلومات أساسية للمحولات Unified Access Catalyst 3850 switches

سلسلة Cisco Catalyst 3850 هي الجيل التالي من محولات طبقة الوصول القابلة للتكديس من فئة المؤسسات التي توفر التقارب الكامل بين الشبكات السلكية واللاسلكية على نظام أساسي واحد. يتم دعم الخدمة اللاسلكية التي يتم تشغيلها بواسطة برنامج IOS-XE من خلال بروتوكول نقاط الوصول اللاسلكية (CAPWAP) والتحكم فيها وإمدادها. تعمل تقنية ASIC لمستوى بيانات الوصول الموحد (UADP) الجديد من Cisco على تزويد المحول بالطاقة وتمكين تنفيذ السياسات السلكية-اللاسلكية بشكل موحد وإمكانية رؤية التطبيقات والمرونة وتحسين التطبيقات. يتم بناء هذا التقارب على مرونة الطراز StackWise-480 الجديد والمحسن من Cisco. تدعم المحولات Cisco Catalyst 3850 series series كامل IEEE 802.3at التزويد بالطاقة عبر شبكة إيثرنت (+PoE)، ووحدات شبكة قابلة لإضافة وحدات أخرى وقابلة للاستبدال في الموقع، ومراوح إحتياطية، ومصادر طاقة.

التكوين الأولي ل 5760 WLC

يوضح هذا القسم الخطوات اللازمة لتكوين عنصر التحكم في الشبكة المحلية اللاسلكية (WLC) طراز 5760 بنجاح من أجل إستضافة الخدمات اللاسلكية.

التكوين

برنامج الإعداد النصي

--- System Configuration Dialog ---

Enable secret warning

----------------------------------

In order to access the device manager, an enable secret is required

If you enter the initial configuration dialog, you will be prompted for the

enable secret

If you choose not to enter the intial configuration dialog, or if you exit setup

without setting the enable secret,

please set an enable secret using the following CLI in configuration mode-

enable secret 0 <cleartext password>

----------------------------------

Would you like to enter the initial configuration dialog? [yes/no]: yes

At any point you may enter a question mark '?' for help.

Use ctrl-c to abort configuration dialog at any prompt.

Default settings are in square brackets '[]'.

Basic management setup configures only enough connectivity

for management of the system, extended setup will ask you

to configure each interface on the system

Would you like to enter basic management setup? [yes/no]: yes

Configuring global parameters:

Enter host name [Controller]: w-5760-1

The enable secret is a password used to protect access to

privileged EXEC and configuration modes. This password, after

entered, becomes encrypted in the configuration.

Enter enable secret: cisco

The enable password is used when you do not specify an

enable secret password, with some older software versions, and

some boot images.

Enter enable password: cisco

The virtual terminal password is used to protect

access to the router over a network interface.

Enter virtual terminal password: cisco

Configure a NTP server now? [yes]:

Enter ntp server address : 192.168.1.200

Enter a polling interval between 16 and 131072 secs which is power of 2:16

Do you want to configure wireless network? [no]: no

Setup account for accessing HTTP server? [yes]: yes

Username  [admin]: admin

Password  [cisco]: cisco

Password is UNENCRYPTED.

Configure SNMP Network Management? [no]: no

Current interface summary

Any interface listed with OK? value "NO" does not have a valid configuration

Interface             IP-Address      OK?   Method    Status     Protocol

Vlan1                  unassigned     NO    unset     up         up

GigabitEthernet0/0    unassigned      YES   unset     up         up

Te1/0/1               unassigned      YES   unset     up         up

Te1/0/2               unassigned      YES   unset     down       down

Te1/0/3               unassigned      YES   unset     down       down

Te1/0/4               unassigned      YES   unset     down       down

Te1/0/5               unassigned      YES   unset     down       down

Te1/0/6               unassigned      YES   unset     down       down

Enter interface name used to connect to the

management network from the above interface summary: vlan1

Configuring interface Vlan1:

Configure IP on this interface? [yes]: yes

IP address for this interface: 192.168.1.20

Subnet mask for this interface [255.255.255.0] : 255.255.255.0

Class C network is 192.168.1.0, 24 subnet bits; mask is /24

Wireless management interface needs to be configured at startup

It needs to be mapped to an SVI that's not Vlan 1 (default)

Enter VLAN No for wireless management interface:  120

Enter IP address :192.168.120.94

Enter IP address mask:  255.255.255.0

تم إنشاء البرنامج النصي لأمر التكوين التالي:

w-5760-1

enable secret 4 tnhtc92DXBhelxjYk8LWJrPV36S2i4ntXrpb4RFmfqY^Q

enable password cisco

line vty 0 15

password cisco

ntp server 192.168.1.200 maxpoll 4 minpoll 4

username admin privilege 15 password cisco

no snmp-server

!

no ip routing

!

interface Vlan1

no shutdown

ip address 192.168.1.20 255.255.255.0

!

interface GigabitEthernet0/0

shutdown

no ip address

!

interface TenGigabitEthernet1/0/1

!

interface TenGigabitEthernet1/0/2

!

interface TenGigabitEthernet1/0/3

!

interface TenGigabitEthernet1/0/4

!

interface TenGigabitEthernet1/0/5

!

interface TenGigabitEthernet1/0/6

vlan 120

interface vlan 120

ip addr  192.168.120.94 255.255.255.0

exit

wireless management interface Vlan120

!

end

[0] Go to the IOS command prompt without saving this config.

[1] Return back to the setup without saving this config.

[2] Save this configuration to nvram and exit.

Enter your selection [2]: 2

Building configuration...

Compressed configuration from 2729 bytes to 1613 bytes[OK]

Use the enabled mode 'configure' command to modify this configuration.

Press RETURN to get started!

التكوين المطلوب لنقاط الوصول للانضمام

ملاحظة: هام - تأكد من أن المحول يحتوي على أمر التمهيد الصحيح تحت التكوين العام. إن يتلقى يكون استخرجت هو يكون على البرق، بعد ذلك ال w-5760-1(config)#boot نظام flash:packages.conf جزمة أمر يتطلب.

1. تكوين اتصال الشبكة.
قم بتكوين واجهة TenGig المتصلة بالشبكة الأساسية حيث تتدفق حركة مرور CAPWAP داخل/خارج. في هذا المثال، تكون الواجهة المستخدمة هي TenGigabitEthernet1/0/1. VLAN 1 و VLAN 120 مسموح بهما.

interface TenGigabitEthernet1/0/1

switchport trunk allowed vlan 1,120

switchport mode trunk

ip dhcp relay information trusted

ip dhcp snooping trust

تكوين المسار الافتراضي الصادر:

ip route 0.0.0.0 0.0.0.0 192.168.1.1

2. تكوين الوصول إلى الويب.
يمكن الوصول إلى واجهة المستخدم الرسومية (GUI) عبر موقع الويب https://<ipaddress>/لاسلكي

تم تعريف بيانات اعتماد تسجيل الدخول بالفعل في مربع حوار التكوين الأولي.

username admin privilege 15 password cisco

3. تأكد من تكوين واجهة الإدارة اللاسلكية بشكل صحيح.
wireless management interface Vlan120

w-5760-1#sh run int vlan 120

Building configuration...

Current configuration : 62 bytes

!

interface Vlan120

ip address 192.168.120.94 255.255.255.0

end

w-5760-1#sh ip int br

Interface               IP-Address      OK?    Method   Status      Protocol

Vlan1                   192.168.1.20    YES    manual    up          up

Vlan120                 192.168.120.94  YES    manual    up          up

GigabitEthernet0/0      unassigned      YES    unset     down        down

Te1/0/1                 unassigned      YES    unset     up          up

Te1/0/2                 unassigned      YES    unset     down        down

Te1/0/3                 unassigned      YES    unset     down        down

Te1/0/4                 unassigned      YES    unset     down        down

Te1/0/5                 unassigned      YES    unset     down        down

Te1/0/6                 unassigned      YES    unset     down        down

Capwap2                 unassigned      YES    unset     up          up

w-5760-1#

4. تأكد من تمكين ترخيص نشط مع عدد نقاط الوصول (AP) الصحيح.
ملاحظة: 1) لا يحتوي الطراز 5760 على مستويات ترخيص نشطة، فالصورة هي بالفعل IPSERVICES. 2) يمكن أن يدعم الطراز 5760 الذي يعمل كوحدة تحكم في التنقل (MC) ما يصل إلى 1000 نقطة وصول (AP).

w-5760-1#license right-to-use activate apcount <count> slot 1 acceptEULA

5. تأكد من تكوين رمز البلد الصحيح على عنصر التحكم في الشبكة المحلية اللاسلكية (WLC) بما يتوافق مع المجال التنظيمي للدولة التي يتم نشر نقاط الوصول فيها.
w-5760-1#show wireless country configured

Configured Country.............................: US  - United States

Configured Country Codes

US  - United States : 802.11a Indoor,Outdoor/ 802.11b / 802.11g

دخلت in order to عدلت الدولة رمز، هذا أمر:

w-5760-1(config)#ap dot11 24ghz shutdown

w-5760-1(config)#ap dot11 5ghz shutdown

w-5760-1(config)#ap country BE

Changing country code could reset channel and RRM grouping configuration.

If running in RRM One-Time mode, reassign channels after this command.

Check customized APs for valid channel values after this command.

Are you sure you want to continue? (y/n)[y]: y

w-5760-1(config)#no ap dot11 24ghz shut

w-5760-1(config)#no ap dot11 5ghz shut

w-5760-1(config)#end

w-5760-1#wr

Building configuration...

Compressed configuration from 3564 bytes to 2064 bytes[OK]

w-5760-1#show wireless country configured

Configured Country.............................: BE  - Belgium

Configured Country Codes

BE  - Belgium : 802.11a Indoor,Outdoor/ 802.11b / 802.11g

6. ضمنت أن يكون ال APs قادر على تعلم العنوان من ال WLC ( 192.168.120.94 في هذا مثال) عن طريق DHCP خيار 43، domain name خدمات (DNS)، أو أي آخر ديكوفري آلية في CAPWAP.

التحقق من الصحة

دخلت in order to ضمنت أن ال APs قد انضم، العرض ap خلاصة أمر:

w-5760-1#show ap summary

Number of APs: 1

Global AP User Name: Not configured

Global AP Dot1x User Name: Not configured

AP Name              AP Model  Ethernet MAC    Radio MAC       State

--------------------------------------------------------------------------

APa493.4cf3.232a     1042N     a493.4cf3.232a  10bd.186d.9a40  Registered

استكشاف الأخطاء وإصلاحها

تصحيح أخطاء مفيد لاستكشاف أخطاء ربط نقطة الوصول وإصلاحها:

w-5760-1#debug capwap ap events

capwap/ap/events debugging is on

w-5760-1#debug capwap ap error

capwap/ap/error debugging is on

w-5760-1#debug dtls ap event

dtls/ap/event debugging is on

w-5760-1#debug capwap ios event

CAPWAP Event debugging is on

5760-1#debug capwap ios error

CAPWAP Error debugging is on

التكوين الأولي للمحول 3850

يتضمن هذا القسم التكوين المطلوب لاستضافة الخدمات اللاسلكية على 3850.

التكوين

برنامج الإعداد النصي

--- System Configuration Dialog ---

Enable secret warning

----------------------------------

In order to access the device manager, an enable secret is required

If you enter the initial configuration dialog, you will be prompted

for the enable secret

If you choose not to enter the intial configuration dialog, or if you

exit setup without setting the enable secret,

please set an enable secret using the following CLI in configuration mode-

enable secret 0 <cleartext password>

----------------------------------

Would you like to enter the initial configuration dialog? [yes/no]: yes

At any point you may enter a question mark '?' for help.

Use ctrl-c to abort configuration dialog at any prompt.

Default settings are in square brackets '[]'.

Basic management setup configures only enough connectivity

for management of the system, extended setup will ask you

to configure each interface on the system

Would you like to enter basic management setup? [yes/no]: yes

Configuring global parameters:

Enter host name [Switch]: sw-3850-1

The enable secret is a password used to protect access to

privileged EXEC and configuration modes. This password, after

entered, becomes encrypted in the configuration.

Enter enable secret: Cisco123

The enable password is used when you do not specify an

enable secret password, with some older software versions, and

some boot images.

Enter enable password: Cisco123

The virtual terminal password is used to protect

access to the router over a network interface.

Enter virtual terminal password: Cisco123

Do you want to configure country code? [no]: yes

Enter the country code[US]:US

Note :  Enter the country code in which you are installing this 3850 Switch and

the AP(s). If your country code is not recognized, enter one that is compliant

with the regulatory domain of your own country

Setup account for accessing HTTP server? [yes]: yes

Username  [admin]: admin

Password  [cisco]: cisco

Password is UNENCRYPTED.

Configure SNMP Network Management? [no]: no

Current interface summary

Any interface listed with OK? value "NO" does not have a valid configuration

Interface              IP-Address      OK? Method Status   Protocol

Vlan1                  unassigned      NO  unset  up       down

GigabitEthernet0/0     unassigned      YES unset  up       up

GigabitEthernet2/0/1   unassigned      YES unset  down     down

GigabitEthernet2/0/2   unassigned      YES unset  down     down

GigabitEthernet2/0/3   unassigned      YES unset  down     down

...

...

...

GigabitEthernet2/0/46  unassigned      YES unset  down     down

GigabitEthernet2/0/47  unassigned      YES unset  down     down

GigabitEthernet2/0/48  unassigned      YES unset  up       up

GigabitEthernet2/1/1   unassigned      YES unset  down     down

GigabitEthernet2/1/2   unassigned      YES unset  down     down

GigabitEthernet2/1/3   unassigned      YES unset  down     down

GigabitEthernet2/1/4   unassigned      YES unset  down     down

Te2/1/1                unassigned      YES unset  down     down

Te2/1/2                unassigned      YES unset  down     down

Te2/1/3                unassigned      YES unset  down     down

Te2/1/4                unassigned      YES unset  down     down

Enter interface name used to connect to the

management network from the above interface summary: vlan1

Configuring interface Vlan1:

Configure IP on this interface? [yes]: yes

IP address for this interface: 192.168.1.2

Subnet mask for this interface [255.255.255.0] : 255.255.255.0

Class C network is 192.168.1.0, 24 subnet bits; mask is /24

تم إنشاء البرنامج النصي لأمر التكوين هذا:

hostname sw-3850-1

enable secret 4 vwcGVdcUZcRMCyxaH2U9Y/PTujsnQWPSbt.LFG8lhTw

enable password Cisco123

line vty 0 15

password Cisco123

ap dot11 24ghz shutdown

ap dot11 5ghz shutdown

ap country US

no ap dot11 24ghz shutdown

no ap dot11 5ghz shutdown

username admin privilege 15 password 0 cisco

no snmp-server

!

no ip routing

!

interface Vlan1

no shutdown

ip address 192.168.1.2 255.255.255.0

!

interface GigabitEthernet0/0

shutdown

no ip address

!

interface GigabitEthernet2/0/1

!

interface GigabitEthernet2/0/2

!

interface GigabitEthernet2/0/3

...

...

...

interface GigabitEthernet2/0/46

!

interface GigabitEthernet2/0/47

!

interface GigabitEthernet2/0/48

!

interface GigabitEthernet2/1/1

!

interface GigabitEthernet2/1/2

!

interface GigabitEthernet2/1/3

!

interface GigabitEthernet2/1/4

!

interface TenGigabitEthernet2/1/1

!

interface TenGigabitEthernet2/1/2

!

interface TenGigabitEthernet2/1/3

!

interface TenGigabitEthernet2/1/4

!

end

[0] Go to the IOS command prompt without saving this config.

[1] Return back to the setup without saving this config.

[2] Save this configuration to nvram and exit.

Enter your selection [2]:    2

The enable password you have chosen is the same as your enable secret.

This is not recommended.  Re-enter the enable password.

Changing country code could reset channel and RRM grouping configuration.

If running in RRM One-Time mode, reassign channels after this command.

Check customized APs for valid channel values after this command.

Are you sure you want to continue? (y/n)[y]: y

% Generating 1024 bit RSA keys, keys will be non-exportable...

[OK] (elapsed time was 1 seconds)

Building configuration...

Compressed configuration from 4414 bytes to 2038 bytes[OK]

Use the enabled mode 'configure' command to modify this configuration.

Press RETURN to get started!

التكوين المطلوب لنقاط الوصول للانضمام

ملاحظة: هام - تأكد من تكوين الأمر boot الصحيح تحت التكوين العام. إن استخرجت هو يكون على البرق، بعد ذلك الجزمة نظام مفتاح all flash:packages.conf أمر يتطلب.

1. تكوين المتطلبات الأساسية اللاسلكية.
لتمكين الخدمات اللاسلكية، يجب أن يقوم الطراز 3850 بتشغيل ترخيص IPSERVICES أو iBase.

2. تمكين الاتصال اللاسلكي على المحول.
ملاحظة: يلزم توصيل نقاط الوصول بمنافذ تبديل وضع الوصول في شبكة VLAN نفسها!

- تمكين الإدارة اللاسلكية
sw-3850-1(config)#wireless management interface vlan <1-4095>

- تحديد MC
يجب تحديد وحدة التحكم في الوصول (MC) للسماح لنقاط الوصول (APs) بالانضمام.

1. إذا كان هذا 3850 هو وحدة التحكم في الشبكة اللاسلكية، فأدخل الأمر وحدة التحكم في التنقل اللاسلكي:

sw-3850-1(config)#wireless mobility controller

ملاحظة: يتطلب تغيير التكوين هذا إعادة التشغيل!

2. إذا كان هذا 3850 يعمل كعميل قابلية التنقل (MA)، فعندئذ قم بإشارته إلى عنوان IP الخاص بوحدة التحكم MC باستخدام هذا الأمر:
sw-3850-1(config)#wireless mobility controller ip a.b.c.d

دخلت على ال mc، هذا أمر:

3850MC(config)#wireless mobility controller peer-group

3850MC(config)#wireless mobility controller peer-group

member

ip w.x.y.z

3. ضمان توفر الترخيص.
تأكد من توفر تراخيص نقطة الوصول النشطة على وحدة التحكم في إدارة اللوحة الأساسية (يستخدم MA التراخيص التي يتم تنشيطها على وحدة التحكم في الإدارة (MC)):

ملاحظة: 1) يجب أن يقوم المحول 3850 بتشغيل IPSERVICES أو ترخيص IPBASE من أجل تمكين الخدمات اللاسلكية على المحول 3850. 2) يتم تطبيق تراخيص عدد نقاط الوصول (AP) في وحدة التحكم في إدارة اللوحة الأساسية (MC)، ويتم توفيرها وفرضها تلقائيا في MA. 3) ويمكن أن يدعم الطراز 3850 الذي يعمل كوحدة تحكم في الوصول (MC) ما يصل إلى 50 نقطة وصول.

sw-3850-1#show license right-to-use summary

License Name    Type        Count   Period left

-----------------------------------------------

ipservices      permanent   N/A     Lifetime

apcount         base        1       Lifetime

apcount         adder       49      Lifetime

-----------------------------------------------

License Level In Use: ipservices

License Level on Reboot: ipservices

Evaluation AP-Count: Disabled

Total AP Count Licenses: 50

AP Count Licenses In-use: 1

AP Count Licenses Remaining: 49

لتنشيط ترخيص عدد نقاط الوصول على الطراز 3850، أدخل هذا الأمر باستخدام عدد نقاط الوصول المطلوب على وحدة التحكم في الوصول (MC):

sw-3850-1#license right-to-use activate apcount

slot <#> acceptEULA

4. قم بتكوين عملية اكتشاف نقطة الوصول (AP).

in order for APs أن يتلاقى الجهاز تحكم، ال switchport تشكيل ينبغي كنت ثبتت كمنفذ وصول في ال لاسلكي إدارة vlan:

إذا تم إستخدام شبكة VLAN 100 لواجهة الإدارة اللاسلكية:

sw-3850-1(config)#interface gigabit1/0/10

sw-3850-1(config-if)#switchport mode access

sw-3850-1(config-if)#switchport access vlan 100

5. تكوين الوصول إلى الويب.

يمكن الوصول إلى واجهة المستخدم الرسومية (GUI) عبر موقع الويب https://<ipaddress>/الشبكة اللاسلكية

تم تعريف بيانات اعتماد تسجيل الدخول بالفعل في مربع حوار التكوين الأولي.

username admin privilege 15 password 0 cisco ( username for Web access)

6. تأكد من تكوين رمز البلد المناسب على المحول بما يتوافق مع المجال التنظيمي للدولة التي يتم نشر نقاط الوصول (AP) فيها.
sw-3850-1#show wireless country configured

Configured Country.............................: US  - United States

Configured Country Codes

US  - United States : 802.11a Indoor,Outdoor/ 802.11b / 802.11g

دخلت in order to عدلت الدولة رمز، هذا أمر:

sw-3850-1(config)#ap dot11 24ghz shutdown

sw-3850-1(config)#ap dot11 5ghz shutdown

sw-3850-1(config)#ap country BE

Changing country code could reset channel and RRM grouping configuration.

If running in RRM One-Time mode, reassign channels after this command.

Check customized APs for valid channel values after this command.

Are you sure you want to continue? (y/n)[y]: y

sw-3850-1(config)#no ap dot11 24ghz shut

sw-3850-1(config)#no ap dot11 5ghz shut

sw-3850-1(config)#end

sw-3850-1#wr

Building configuration...

Compressed configuration from 3564 bytes to 2064 bytes[OK]

sw-3850-1#show wireless country configured

Configured Country.............................: BE  - Belgium

Configured Country Codes

BE  - Belgium : 802.11a Indoor,Outdoor/ 802.11b / 802.11g

التحقق من الصحة

دخلت in order to ضمنت أن ال AP (نقاط الوصول) يتلقى يكون، العرض ap خلاصة أمر:

sw-3850-1#show ap summary

Number of APs: 1

Global AP User Name: Not configured

Global AP Dot1x User Name: Not configured

AP Name              AP Model  Ethernet MAC    Radio MAC           State

------------------------------------------------------------------------------

APa493.4cf3.232a     1042N     a493.4cf3.231a  10bd.186e.9a40      Registered

استكشاف الأخطاء وإصلاحها

تصحيح أخطاء مفيد لاستكشاف أخطاء ربط نقطة الوصول وإصلاحها:

sw-3850-1#debug capwap ap events

capwap/ap/events debugging is on

sw-3850-1#debug capwap ap error

capwap/ap/error debugging is on

sw-3850-1#debug dtls ap event

dtls/ap/event debugging is on

sw-3850-1#debug capwap ios event

CAPWAP Event debugging is on

sw-3850-1#debug capwap ios error

CAPWAP Error debugging is on