المحتويات

المقدمة

المتطلبات الأساسية

المتطلبات

المكونات المستخدمة

التكوين

التحقق من الصحة

المقدمة

يصف هذا المستند التكوين المشفر الآمن جزء التحكم في اتصال إرسال الإشارات (SCCP) على بوابة VG224 التناظرية.

المتطلبات الأساسية

المتطلبات

توصي Cisco بأن تكون لديك معرفة بالمواضيع التالية:

- SCCP

- VG224

- برنامج Cisco Unified Communications Manager (CUCM)

المكونات المستخدمة

تستند المعلومات الواردة في هذا المستند إلى إصدارات البرامج التالية:

- VG224

تم إنشاء المعلومات الواردة في هذا المستند من الأجهزة الموجودة في بيئة معملية خاصة. بدأت جميع الأجهزة المُستخدمة في هذا المستند بتكوين ممسوح (افتراضي). إذا كانت شبكتك قيد التشغيل، فتأكد من فهمك للتأثير المحتمل لأي أمر.

التكوين

الخطوة 1. انسخ شهادة callManager.pem إلى VG224 (المشار إليها كنقطة ثقة آمنة في التكوين التالي)

الخطوة 2. قم بإنشاء شهادة موقعة ذاتيا على VG224 باستخدام عنوان MAC الخاص ب FastEthernet0/0 (واجهة الربط) مع آخر 10 أرقام فقط على أنها اسم الموضوع.

الخطوة 3. انسخ شهادة VG إلى CUCM كثقة مدير المكالمات وأعد تشغيل CUCM.

يتم توفير المعلومات لتكوين الشهادات المطلوبة ل VG224.

Router(config)#crypto key generate rsa general-keys label vg modulus 1024

Router(config)#crypto pki trustpoint vg

Router(ca-trustpoint)#enrollment selfsigned

serial-number none

fqdn none

ip-address none

subject-name cn=1A:E2:85:7B:E2  <----- Last 10 DIGITS ONLY of the SCCP bind interface. Formatting EXACTLY as shown with colons.

rsakeypair vg

crypto pki enroll vg

Router(config)#crypto pki export vg_cert pem terminal

تلميح: دليل مرجع الأوامر

ملاحظة: لن ترى أيقونة قفل عند الاتصال من هاتف تناظري VG224 آمن إلى هاتف IP آمن بسبب تحذير CSCti0882

التحقق من الصحة

هذه المعلومات للتصويب من أجل التسجيل الكامل الناجح ل VG224

Router#show sccp

SCCP Admin State: UP

Gateway Local Interface: FastEthernet0/0

IPv4 Address: 14.1.97.95

Port Number: 2000

IP Precedence: 5

User Masked Codec list: None

Call Manager: 172.18.172.204, Port Number: 2000

Priority: N/A, Version: 7.0, Identifier: 1

Trustpoint: N/A

Call Manager: 172.18.172.205, Port Number: 2000

Priority: N/A, Version: 7.0, Identifier: 2

Trustpoint: N/A

Call Manager: 172.18.172.206, Port Number: 2000

Priority: N/A, Version: 7.0, Identifier: 3

Trustpoint: N/A

AutoCfg_Virtual_Endpoint Oper State: ACTIVE - Cause Code: NONE

Active Call Manager: 172.18.172.204, Port Number: 2000

TCP Link Status: CONNECTED, Device Name: AN1AE2857BE2FFF

Reported Max Streams: 0, Reported Max OOS Streams: 0

Supported Codec: g711ulaw, Maximum Packetization Period: 20

Alg_Phone Oper State: ACTIVE - Cause Code: NONE

Active Call Manager: 172.18.172.204, Port Number: 2443

TCP Link Status: CONNECTED, Device Name: AN1AE2857BE2400

Security

Signaling Security: ENCRYPTED TLS

Media Security: SRTP

Supported crypto suites :AES_CM_128_HMAC_SHA1_32

Reported Max Streams: 1, Reported Max OOS Streams: 0

Supported Codec: rfc2833 dtmf, Maximum Packetization Period: 30

Supported Codec: g711ulaw, Maximum Packetization Period: 20

Supported Codec: g711alaw, Maximum Packetization Period: 20

Supported Codec: g729r8, Maximum Packetization Period: 220

Supported Codec: g729ar8, Maximum Packetization Period: 220

Supported Codec: g729br8, Maximum Packetization Period: 220

Supported Codec: g729r8, Maximum Packetization Period: 220

Supported Codec: ilbc, Maximum Packetization Period: 120

TLS : ENABLED

هذا يوضح أن يأمن VG224 يستعمل SCCP ios تشكيل.

Building configuration...

Current configuration : 5258 bytes

!

version 15.1

no service pad

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname Router

!

boot-start-marker

boot system slot0:vg224-i6k9s-mz.151-4.M3

boot-end-marker

!

!

enable secret 5 $1$f99B$PWPClPrUNzgsUZEO8aBYG.

!

no aaa new-model

crypto pki token default removal timeout 0

!

crypto pki trustpoint SECURE

enrollment terminal

revocation-check crl

!

crypto pki trustpoint vg

enrollment selfsigned

serial-number none

fqdn none

ip-address none

subject-name cn=1A:E2:85:7B:E24       ( instead of this command,  we can use hiddle command "mac-address Fast Ethernet0/0 as well )

revocation-check crl

rsakeypair AN1AE2857BE2400

!

!

crypto pki certificate chain SECURE

certificate ca 588C9B7C2D4B37F03930E8C926D02A18

<truncated>

crypto pki certificate chain vg

certificate self-signed 03

<truncated>

ip source-route

!

ip cef

ip name-server 172.18.108.43

ip name-server 172.18.108.34

!

!

no ipv6 cef

!

stcapp ccm-group 1

stcapp security trustpoint vg

stcapp security mode encrypted

stcapp

!

stcapp feature access-code

!

stcapp feature speed-dial

!

!

!

stcapp supplementary-services

port 2/0

fallback-dn 862224

!

!

!

!

!

!

!

!

!

voice-card 0

!

!

!

!

!

!

!

!

!

!

interface FastEthernet0/0

ip address dhcp

duplex auto

speed auto

!

interface FastEthernet0/1

no ip address

duplex auto

speed auto

!

ip forward-protocol nd

!

ip http server

no ip http secure-server

ip route 0.0.0.0 0.0.0.0 14.1.97.1 254

ip route 0.0.0.0 0.0.0.0 14.1.97.1 254

!

!

!

control-plane

!

!

voice-port 2/0

timeouts initial 60

timeouts interdigit 60

timeouts ringing infinity

!

voice-port 2/1

!

<truncated>

!

voice-port 2/23

!

ccm-manager config server 172.18.172.204

ccm-manager config

ccm-manager sccp local FastEthernet0/0

ccm-manager sccp

!

!

mgcp profile default

!

sccp local FastEthernet0/0

sccp ccm 172.18.172.204 identifier 1 version 7.0

sccp ccm 172.18.172.205 identifier 2 version 7.0

sccp ccm 172.18.172.206 identifier 3 version 7.0

sccp

!

sccp ccm group 1

associate ccm 1 priority 1

associate ccm 2 priority 2

associate ccm 3 priority 3

!

dial-peer voice 999200 pots

service stcapp

securiy mode encrypted   =====> Required command

port 2/0

!

dial-peer voice 99920 pots

! service stcapp

securiy mode encrypted   =====> Required command

port 2/1

!

!(configure all ports in same secure mode)

!

line con 0

line aux 0

line vty 0 4

password ww

login

transport input all

!

ntp server 172.18.108.15

end