المحتويات

المقدمة

المتطلبات الأساسية

المتطلبات

المكونات المستخدمة

معلومات أساسية

عملية Cisco EM

التكوين

التحقق من الصحة

استكشاف الأخطاء وإصلاحها

تحليل السجل

في سجلات الأمان Tomcat

في سجلات خدمة EM

في سجلات EmApp

في سجلات إدارة المكالمات

العيوب الشائعة لتنقل الملحقات

رموز أخطاء Extension Mobility

الأخطاء الشائعة التي حدثت

المقدمة

يصف هذا وثيقة كيف أن يتحرى ويكون قادر أن يتم تحليل سجل ل cisco امتداد حركة.

المتطلبات الأساسية

المتطلبات

لا توجد متطلبات خاصة لهذا المستند.

المكونات المستخدمة

تستند المعلومات الواردة في هذا المستند إلى إصدارات البرامج والمكونات المادية التالية:

- CUCM الإصدار: 12.0.0.99834-4

- طراز الهاتف: CIPC 8.6.6.1

تم إنشاء المعلومات الواردة في هذا المستند من الأجهزة الموجودة في بيئة معملية خاصة. بدأت جميع الأجهزة المُستخدمة في هذا المستند بتكوين ممسوح (افتراضي). إذا كانت شبكتك قيد التشغيل، فتأكد من فهمك للتأثير المحتمل لأي أمر.

معلومات أساسية

عندما يتجول المستخدمون بين المواقع ولا يملكون هواتفهم معهم، قد يرغبون في إستخدام أي هاتف متاح في الموقع الذي سافروا إليه. معظم المشاكل الشائعة التي تظهر تتضمن أرقام الامتداد الخاطئة، امتيازات الاستدعاء، إلخ كما هو موضح في الصورة.

عملية Cisco EM

عندما يريد المستخدم تسجيل الدخول إلى هاتف، يحدث هذا التسلسل للأحداث:

1. يضغط المستخدم زر الخدمات على الهاتف ويختار خدمة Cisco EM Mobility من قائمة خدمات الهاتف المتوفرة على الهاتف

2. تتطلب خدمة Cisco EM من المستخدم تسجيل الدخول باستخدام معرف المستخدم ورمز PIN. يدخل المستخدم البيانات المطلوبة.

3. إذا كان معرف المستخدم المدخل ورقم التعريف الشخصي (PIN) صحيحين، فإن Cisco EM تختار ملف تعريف الجهاز المقترن بذلك المستخدم. إذا كان المستخدم مقترنا بتوصيفات أجهزة متعددة، فيجب على المستخدم إختيار ملف تعريف الجهاز المراد إستخدامه.

4. يقوم CUCM بتحديث تكوين الهاتف بإعدادات ملف تعريف الجهاز المختار. يتم تحديث المعلمات والخطوط وأزرار الهواتف الأخرى الخاصة بالجهاز الخاص بالمستخدم بإعدادات خاصة بالمستخدم

5. تتم إعادة تعيين هاتف IP وتحميل التكوين المحدث

يمكن للمستخدمين تسجيل الخروج من Cisco EM بالضغط على زر الخدمات واختيار تسجيل الخروج في خدمة Cisco EM. إذا لم يقم المستخدمون بتسجيل الخروج بأنفسهم، يقوم النظام تلقائيا بتسجيلهم بعد انتهاء مدة صلاحية الحد الأقصى لوقت تسجيل الدخول (إذا تم تكوين معلمة الخدمة المناسبة وفقا لذلك)

التكوين

1. قم بتنشيط خدمة Cisco Extension Mobility.

2. قم بتعيين معلمات خدمة Cisco Extension Mobility.

3. إضافة خدمة هاتف Cisco EM.

4. قم بإنشاء ملف تعريف افتراضي للجهاز لكل طرز الهواتف المستخدمة (إختياري).

5. قم بإنشاء توصيفات أجهزة واشترك فيها في خدمة هاتف Cisco EM.

6. إنشاء مستخدمين نهائيين وربطهم بملفات تعريف الأجهزة.

7. قم بتمكين Cisco EM للهواتف والاشتراك في خدمة Cisco EM.

للحصول على خطوات التكوين التفصيلية، ارجع إلى هذا الارتباط:

https://supportforums.cisco.com/t5/collaboration-voice-and-video/configuring-extension-mobility-on-cucm-10-x/ta-p/3137666

التحقق من الصحة

لا يوجد حاليًا إجراء للتحقق من صحة هذا التكوين.

استكشاف الأخطاء وإصلاحها

يوفر هذا القسم معلومات يمكنك إستخدامها لاستكشاف أخطاء التكوين وإصلاحها.

تجميع سجلات مستوى تصحيح الأخطاء هذه:

- سجلات إدارة المكالمات (مستوى تصحيح الأخطاء)

- إمكانية تنقل الملحق (مستوى تصحيح الأخطاء)

- تطبيق Extension Mobility (مستوى تصحيح الأخطاء)

- جذوع القط

- سجلات أمان Tomcat

- سجلات نظام عارض الأحداث

- سجلات تطبيق عارض الأحداث

- سجلات وحدة التحكم في الهاتف

مع هذه السجلات، دون التفاصيل كما يلي:

- عنوان MAC للهاتف الذي حدثت عليه المشكلة

- عنوان IP للهاتف الذي حدثت عليه المشكلة

- معرف المستخدم

- وقت تسجيل الدخول

تحليل السجل

Details:

User ID:EMuser

Normal DN: 7777

Device profile DN: 8888

Phone Name: test_secure (CIPC)

Time of login: 19:10

Phone IP: 192.168.0.105

PC IP on which CIPC running: 10.65.40.61

Publisher IP: 10.106.111.182

يصف هذا القسم ما يجب أن ترى كل الأحداث في الآثار المذكورة:

في سجلات الأمان Tomcat

### Login Constructor

2018-04-14 19:10:51,961 DEBUG [http-bio-8080-exec-23] authentication.AuthenticationImpl - successfully read propertyfile -

classname is com.cisco.security.ims.impl.CUCMUtil

2018-04-14 19:10:51,962 DEBUG [http-bio-8080-exec-23] authentication.AuthenticationImpl - login: Entering login

2018-04-14 19:10:51,962 DEBUG [http-bio-8080-exec-23] authentication.AuthenticationImpl - loginUtil: Authenticating against DB.

2018-04-14 19:10:51,962 DEBUG [http-bio-8080-exec-23] impl.AuthenticationDB - Constructor:

### Authenticate user

2018-04-14 19:10:51,962 DEBUG [http-bio-8080-exec-23] impl.AuthenticationDB - authenticateUser: userId=EM**** isLogin true

2018-04-14 19:10:51,962 DEBUG [http-bio-8080-exec-23] security.Log4jEncLogger - Entering HashTextSHA

### Authentication for the user is TRUE and CUCM checks that EMuser is a valid end user.

Authentication complete with result =0; 0 means successful and 1 means not successful

2018-04-14 19:10:51,992 DEBUG [http-bio-8080-exec-23] impl.AuthenticationDB - authenticateUser: Authentication Match.

2018-04-14 19:10:51,992 DEBUG [http-bio-8080-exec-23] impl.AuthenticationDB - authenticateUser:Resetting last login time and Hack count..

2018-04-14 19:10:51,992 DEBUG [http-bio-8080-exec-23] impl.AuthenticationDB - Calling combined API End user

2018-04-14 19:10:52,007 DEBUG [http-bio-8080-exec-23] impl.AuthenticationDB - Authentication Sucessful .. Returning true

2018-04-14 19:10:52,007 DEBUG [http-bio-8080-exec-23] impl.AuthenticationDB - authenticateUser: userId=EMuser is a valid END user.

2018-04-14 19:10:52,009 DEBUG [http-bio-8080-exec-23] authentication.AuthenticationImpl - loginUtil: Authentication complete with result=0

في سجلات خدمة EM

### Request for device (here name of phone is test_secure; otherwise it will be the MAC address here)

2018-04-14 19:09:45,772 INFO  [http-bio-8443-exec-23] DBRequestor               - 5:Querying device user for device test_secure

2018-04-14 19:09:45,772 INFO  [http-bio-8443-exec-23] DBRequestor               - 5:Getting device object - three params

2018-04-14 19:09:45,772 INFO  [http-bio-8443-exec-23] DBRequestor               - 5: DBRequestor.queryDeviceUser: Dev: 'test_secure' - Getting device object

2018-04-14 19:09:45,793 DEBUG [http-bio-8443-exec-23] CMDatabase                - CMDatabase:getDeviceInfo(): SELECT COUNT(pkid) as count from emccdynamic where my_lower(devicename) = my_lower(?) :: Parameter ('test_secure')

2018-04-14 19:09:45,795 DEBUG [http-bio-8443-exec-23] CMDatabase                - CMDatabase:getDeviceInfo(): SELECT device.pkid, loginduration,decode(emremotedynamic.logintime, null, extensionmobilitydynamic.logintime, emremotedynamic.logintime) logintime, allowhotelingflag,

decode(remoteuserid, null, e2.userid, remoteuserid) currentuserid, decode(lastremoteuserid, null, e1.userid, lastremoteuserid) lastuserid, extensionmobilitydynamic.tkuserlocale, fkdevicepool, tkdeviceprotocol, tkproduct, tkmodel

FROM Device left outer join extensionmobilitydynamic on device.pkid=extensionmobilitydynamic.fkdevice left outer join emremotedynamic on (extensionmobilitydynamic.fkdevice=emremotedynamic.fkdevice) left outer join enduser e1 on (extensionmobilitydynamic.fkenduser_lastlogin=e1.pkid)

left outer join enduser e2 on (extensionmobilitydynamic.fkenduser=e2.pkid) where my_lower(device.name) = my_lower(?) :: Parameter ('test_secure')

2018-04-14 19:09:45,798 INFO  [http-bio-8443-exec-23] CMDatabase                - getDeviceInfo:Result of the query: {tkproduct=30041, loginduration=, lastuserid=,

tkdeviceprotocol=11, pkid=d72b2e5f-5dd2-51fc-ec50-c9daf98aab66, tkmodel=30016, logintime=, currentuserid=, allowhotelingflag=t, fkdevicepool=1b1b9eb6-7803-11d3-bdf0-00108302ead1, tkuserlocale=}

2018-04-14 19:09:45,798 INFO  [http-bio-8443-exec-23] DBRequestor               - 5: DBRequestor.queryDeviceUser: Dev: 'test_secure' - Device object returned

2018-04-14 19:09:45,798 INFO  [http-bio-8443-exec-23] DBRequestor               - 5: QueryDeviceUser: Device Logged out

2018-04-14 19:09:45,799 INFO  [http-bio-8443-exec-23] DBRequestor               - 5:Device query info contains userid=

2018-04-14 19:09:45,799 INFO  [http-bio-8443-exec-23] DBRequestor               - 5:Device query info contains last login userid=

2018-04-14 19:09:45,800 DEBUG [http-bio-8443-exec-23] EMServiceServlet          - 5: executeQuery complete.

2018-04-14 19:09:45,800 DEBUG [http-bio-8443-exec-23] EMServiceServlet          - 5:Query completed, returning<response>

<deviceUserResults>

<device name="test_secure">

<none/>

<none/>

<emccDevice>no</emccDevice>

</device>

</deviceUserResults>

</response>

<!DOCTYPE query SYSTEM "http://10.106.111.182:8080/emservice/jsp/LoginQuery.dtd">

<query><appInfo><appID>CCMSysUser</appID><appEncryptedCertificate>*****

</appInfo><checkUser><userID>EMuser</userID><remoteIPAddr>10.65.40.61</remoteIPAddr><isViaHeaderSet>false</isViaHeaderSet></checkUser></query>

### CUCM sends that EMuser is a local user

2018-04-14 19:10:51,940 DEBUG [http-bio-8443-exec-4] CMDatabase                - Userid being passed to the query is EMuser

2018-04-14 19:10:51,941 DEBUG [http-bio-8443-exec-4] CMDatabase                - CMDatabase.isLocalUser() : SELECT islocaluser FROM EndUser WHERE my_lower(userid)= my_lower(?) : parameter ( 'EMuser' )

2018-04-14 19:10:51,947 DEBUG [http-bio-8443-exec-4] CMDatabase                -  PKID for the ROW is

2018-04-14 19:10:51,948 DEBUG [http-bio-8443-exec-4] CMDatabase                -  CMDatabase.isLocalUser() : isLocaluser : true

2018-04-14 19:10:51,949 DEBUG [http-bio-8443-exec-4] EMServiceServlet          - 6:Query completed, returning<response>

<checkUserResults>

<user id="EMuser">

<exists>EMuser</exists>

</user>

</checkUserResults>

</response>

### Login request

2018-04-14 19:10:52,061 INFO  [http-bio-8443-exec-21] EMServiceServlet          - 7:EM Service: Request type=Login/Logout

2018-04-14 19:10:52,062 INFO  [http-bio-8443-exec-21] EMServiceServlet          - 7: LoginService.processRequest: Received Request

2018-04-14 19:10:52,062 INFO  [http-bio-8443-exec-21] EMServiceServlet          - 7:Parsing Request...

2018-04-14 19:10:52,063 INFO  [http-bio-8443-exec-21] EMServiceServlet          - 7:Request-><?xml version="1.0"?>

### Login process

2018-04-14 19:10:52,095 DEBUG [http-bio-8443-exec-21] EMServiceServlet          - 7: processXMLRequest: EMuser: EM2

2018-04-14 19:10:52,095 INFO  [http-bio-8443-exec-21] EMServiceServlet          - 7:Finished Parsing XML request

2018-04-14 19:10:52,095 INFO  [http-bio-8443-exec-21] EMServiceServlet          - 7:Executing Login...

2018-04-14 19:10:52,133 INFO  [http-bio-8443-exec-21] EMServiceServlet          - 7: LoginService.executeLogin: Dev: test_secure- Sending request to DB

2018-04-14 19:10:52,133 DEBUG [http-bio-8443-exec-21] DBRequestor               - 7: LoginInfo.profile is NULL

2018-04-14 19:10:52,133 INFO  [http-bio-8443-exec-21] DBRequestor               - 7: 'DBRequestor.login': Dev: 'test_secure' - Getting device profile object

2018-04-14 19:10:52,134 INFO  [http-bio-8443-exec-21] CMDatabase                - CMDatabase:getProfileInfo: ###: SELECT pkid from Device

WHERE my_lower(name) = my_lower(?) : parameter ( 'EM2' )

2018-04-14 19:10:52,135 DEBUG [http-bio-8443-exec-21] CMDatabase                - CMDatabase:getProfileInfo:

PKID for device : 0bff3cfd-13c1-5352-1a39-9188bdd855d8

2018-04-14 19:10:52,136 INFO  [http-bio-8443-exec-21] DBRequestor               - 7: DBRequestor.login: Dev: test_secure- Device profile object returned

2018-04-14 19:10:52,136 INFO  [http-bio-8443-exec-21] DBRequestor               - 7: DBRequestor.login: Dev: test_secure-

Calling deviceLogin(d72b2e5f-5dd2-51fc-ec50-c9daf98aab66, 0bff3cfd-13c1-5352-1a39-9188bdd855d8, EMuser, 0, false, 0)

2018-04-14 19:10:52,136 INFO  [http-bio-8443-exec-21] CMDatabase                - CMDatabase:deviceLogin()

### Login successful

2018-04-14 19:10:52,137 DEBUG [http-bio-8443-exec-21] CMDatabase                - Userid being passed to the query is EMuser

2018-04-14 19:10:52,139 INFO  [http-bio-8443-exec-21] CMDatabase                - CMDatabase:deviceLogin:

execute function DeviceLogin ('d72b2e5f-5dd2-51fc-ec50-c9daf98aab66','0bff3cfd-13c1-5352-1a39-9188bdd855d8','181a09dd-9e03-2acb-c107-c1156e171e88','0','0','f')

2018-04-14 19:10:52,466 INFO  [http-bio-8443-exec-21] DBRequestor               - 7: DBRequestor.login: Dev: test_secure- deviceLogin returned

2018-04-14 19:10:52,467 INFO  [http-bio-8443-exec-21] EMServiceServlet          - 7: LoginService.executeLogin: Dev: test_secure- Login Successful

2018-04-14 19:10:52,467 INFO  [http-bio-8443-exec-21] EMServiceServlet          - 7:Request succeeded returning<?xml version="1.0"?>

<response>

<success/>

</response>

### Logout request

2018-04-14 19:11:23,919 INFO  [http-bio-8443-exec-3] EMServiceServlet          - EMService Request# ----> : 9

2018-04-14 19:11:23,920 DEBUG [http-bio-8443-exec-3] EMServiceServlet          - 9: Conn. Via Header= null

2018-04-14 19:11:23,920 DEBUG [http-bio-8443-exec-3] EMServiceServlet          - 9: osHost is localHostAddress = 10.106.111.182

2018-04-14 19:11:23,920 INFO  [http-bio-8443-exec-3] EMServiceServlet          - 9:EM Service: Request type=Login/Logout

2018-04-14 19:11:23,920 INFO  [http-bio-8443-exec-3] EMServiceServlet          - 9: LoginService.processRequest: Received Request

2018-04-14 19:11:23,920 INFO  [http-bio-8443-exec-3] EMServiceServlet          - 9:Parsing Request...

### Logout process

2018-04-14 19:11:23,925 INFO  [http-bio-8443-exec-3] EMServiceServlet          - 9:Executing Logout...

2018-04-14 19:11:23,925 INFO  [http-bio-8443-exec-3] EMServiceServlet          - 9:Executing Logout for device=test_secure

2018-04-14 19:11:23,925 INFO  [http-bio-8443-exec-3] EMServiceServlet          - 9: Executing authenticate2...

### Logout successful

2018-04-14 19:11:23,936 INFO  [http-bio-8443-exec-3] CMDatabase                - CMDatabase:deviceLogout()

2018-04-14 19:11:23,936 INFO  [http-bio-8443-exec-3] CMDatabase                - CMDatabase:deviceLogout: execute function DeviceLogout

('d72b2e5f-5dd2-51fc-ec50-c9daf98aab66')

2018-04-14 19:11:24,122 INFO  [http-bio-8443-exec-3] DBRequestor               - 9: DBRequestor.logout: Dev: test_secure- deviceLogout returned

2018-04-14 19:11:24,122 INFO  [http-bio-8443-exec-3] EMServiceServlet          - 9: LoginService.executeLogout: Dev: test_secure- Logout Successful

2018-04-14 19:11:24,122 INFO  [http-bio-8443-exec-3] EMServiceServlet          - 9:Request succeeded returning<?xml version="1.0"?>

<response>

<success/>

</response>

في سجلات EmApp

2018-04-14 19:09:45,566 INFO  [http-bio-8080-exec-10] EMAppServlet              - EMApp Request# ----->5

2018-04-14 19:09:45,567 INFO  [http-bio-8080-exec-10] EMAppServlet              - EMAppServlet: Request protocol is :http

2018-04-14 19:09:45,567 INFO  [http-bio-8080-exec-10] EMAppServlet              - EMApp Request parameters:

Logout=null Device Name=test_secure User Id=null Device Profile=null Refresh=null Remote Host IP Address = 10.65.40.61 Via Header Set = false getClusterInfo = null

Lang = en_US Charset=utf-8,iso-8859-1;q=0.8 Emcc = null LoginType = null

2018-04-14 19:09:45,568 INFO  [http-bio-8080-exec-10] CMDatabase                - CMDatabase:checkDeviceAllowsAlternateScript

2018-04-14 19:09:45,580 INFO  [http-bio-8080-exec-10] CMDatabase                - test_secure with model 30016 and locale 1 does not support alternate script

2018-04-14 19:09:45,580 INFO  [http-bio-8080-exec-10] EMAppServlet              - Alternate Script for device test_secure =

2018-04-14 19:09:45,581 DEBUG [http-bio-8080-exec-10] EMServiceCommunicator     - Posting to EM Service:<query>

<appInfo>

<appID>CCMSysUser</appID>

<appEncryptedCertificate>xxxxxxx</appEncryptedCertificate>

</appInfo>

<deviceUserQuery>

<deviceName>test_secure</deviceName>

<remoteIPAddr>10.65.40.61</remoteIPAddr>

</deviceUserQuery>

</query>

2018-04-14 19:09:45,581 INFO  [http-bio-8080-exec-10] EMServiceCommunicator     - Posting to EM Query Service:

https://localhost:8443/emservice/EMServiceServlet

2018-04-14 19:09:45,581 DEBUG [http-bio-8080-exec-10] EMServiceCommunicator     - postMsg: EMService URL is :

https://localhost:8443/emservice/EMServiceServlet

2018-04-14 19:09:45,808 INFO  [http-bio-8080-exec-10] EMAppServlet              - The login status result for :test_secure:null:null:null:no

2018-04-14 19:09:45,809 INFO  [http-bio-8080-exec-10] CMDatabase                - CMDatabase:checkDeviceAllowsAlternateScript

2018-04-14 19:09:45,811 INFO  [http-bio-8080-exec-10] CMDatabase                - test_secure with model 30016 and locale 1 does not support alternate script

2018-04-14 19:09:45,812 INFO  [http-bio-8080-exec-10] EMAppServlet              - Sent login page for device test_secure

2018-04-14 19:09:45,812 INFO  [http-bio-8080-exec-10] EMAppServlet              - findPreferredCharSet on utf-8,iso-8859-1;q=0.8

2018-04-14 19:09:45,812 INFO  [http-bio-8080-exec-10] EMAppServlet              - token1 = utf-8

2018-04-14 19:09:45,812 INFO  [http-bio-8080-exec-10] EMAppServlet              -  token2 = utf-8

2018-04-14 19:09:45,813 INFO  [http-bio-8080-exec-10] EMAppServlet              -  charset with q value is 1 utf-8

2018-04-14 19:09:45,813 INFO  [http-bio-8080-exec-10] EMAppServlet              -  returning charset as q value is 1 utf-8

2018-04-14 19:09:45,813 INFO  [http-bio-8080-exec-10] EMAppServlet              -  my charset =utf-8

2018-04-14 19:10:51,885 INFO  [http-bio-8080-exec-23] EMAppServlet              - EMApp Request# ----->6

2018-04-14 19:10:51,886 INFO  [http-bio-8080-exec-23] EMAppServlet              - EMAppServlet: Request protocol is :http

2018-04-14 19:10:51,886 INFO  [http-bio-8080-exec-23] EMAppServlet              - EMApp Request parameters: Logout=null Device Name=test_secure User Id=EMuser Device Profile=null Refresh=null

Remote Host IP Address = 10.65.40.61 Via Header Set = false getClusterInfo = null Lang = en_US Charset=utf-8,iso-8859-1;q=0.8 Emcc = null LoginType = null

2018-04-14 19:10:51,894 DEBUG [http-bio-8080-exec-23] EMAppServlet              - isUserLocal: userid = EMuser

2018-04-14 19:10:51,895 DEBUG [http-bio-8080-exec-23] EMServiceCommunicator     - Posting to EM Service:<query><appInfo><appID>CCMSysUser</appID><appEncryptedCertificate>xxxxxxx

</appEncryptedCertificate></appInfo><checkUser><userID>EMuser</userID><remoteIPAddr>10.65.40.61</remoteIPAddr><isViaHeaderSet>false</isViaHeaderSet></checkUser></query>

2018-04-14 19:10:51,895 INFO  [http-bio-8080-exec-23] EMServiceCommunicator     - Posting to EM Query Service:https://localhost:8443/emservice/EMServiceServlet

2018-04-14 19:10:51,896 DEBUG [http-bio-8080-exec-23] EMServiceCommunicator     - postMsg: EMService URL is :

https://localhost:8443/emservice/EMServiceServlet

2018-04-14 19:10:51,957 DEBUG [http-bio-8080-exec-23] XMLGenParser              - XMLUtil.getDocumentFromStream

2018-04-14 19:10:51,957 DEBUG [http-bio-8080-exec-23] XMLGenParser              - XMLUtil.getValueFromDocument

2018-04-14 19:10:51,958 INFO  [http-bio-8080-exec-23] EMAppServlet              - User 'EMuser' exists locally

2018-04-14 19:10:51,958 INFO  [http-bio-8080-exec-23] EMAppServlet              - EM Request for EMuser

2018-04-14 19:10:52,010 INFO  [http-bio-8080-exec-23] EMAppServlet              - User authentication complete for user EMuser

2018-04-14 19:10:52,011 DEBUG [http-bio-8080-exec-23] CMDatabase                - Userid being passed to the query is EMuser

2018-04-14 19:10:52,011 DEBUG [http-bio-8080-exec-23] CMDatabase                - CMDatabase.getEndUserInfo - Query is - SELECT Device.name, Device.tkDeviceProfile, EndUserDeviceMap.defaultprofile

FROM Device INNER JOIN EndUserDeviceMap ON Device.pkid = EndUserDeviceMap.fkDevice WHERE EndUserDeviceMap.fkEndUser = (SELECT pkid FROM EndUser WHERE my_lower(userid)=my_lower(?)) and device.tkDeviceProfile=1

AND EndUserDeviceMap.tkuserassociation = ? : parameter ( 'EMuser' )

2018-04-14 19:10:52,014 DEBUG [http-bio-8080-exec-23] CMDatabase                - CMDatabase.getEndUserInfo - name : EM2

2018-04-14 19:10:52,025 INFO  [http-bio-8080-exec-23] EMAppServlet              - Device profiles for user:EMuser=UserInfo:  UserID: EMuser Password:  Locale: 1 Authentication proxy rights: falseDevice Profiles:  EM2

2018-04-14 19:10:52,026 DEBUG [http-bio-8080-exec-23] EMServiceCommunicator     - Posting to EM Service:<request>

2018-04-14 19:10:52,471 INFO  [http-bio-8080-exec-23] EMAppServlet              - Successfully performed Login for user EMuser at test_secure

2018-04-14 19:10:52,472 INFO  [http-bio-8080-exec-23] EMAppServlet              - findPreferredCharSet on utf-8,iso-8859-1;q=0.8

2018-04-14 19:11:23,896 INFO  [http-bio-8080-exec-13] EMAppServlet              - EMApp Request# ----->9

2018-04-14 19:11:23,897 INFO  [http-bio-8080-exec-13] EMAppServlet              - EMAppServlet: Request protocol is :http

2018-04-14 19:11:23,897 INFO  [http-bio-8080-exec-13] EMAppServlet              - EMApp Request parameters: Logout=true Device Name=test_secure User Id=null

Device Profile=null Refresh=null Remote Host IP Address = 10.65.40.61 Via Header Set = false getClusterInfo = null Lang = en_US Charset=utf-8,iso-8859-1;q=0.8 Emcc = true LoginType = null

2018-04-14 19:11:23,899 DEBUG [http-bio-8080-exec-13] EMServiceCommunicator     - Posting to EM Service:<request>

<appInfo>

<appID>CCMSysUser</appID>

<appEncryptedCertificate>xxxxxxx</appEncryptedCertificate>

</appInfo>

<logout>

<deviceName>test_secure</deviceName>

<remoteIPAddr>10.65.40.61</remoteIPAddr>

<isViaHeaderSet>false</isViaHeaderSet>

</logout>

</request>

2018-04-14 19:11:23,900 INFO  [http-bio-8080-exec-13] EMServiceCommunicator     - postMsgToLoginService: Service URL :https://localhost:8443/emservice/EMServiceServlet

2018-04-14 19:11:23,900 DEBUG [http-bio-8080-exec-13] EMServiceCommunicator     - postMsg: EMService URL is :

https://localhost:8443/emservice/EMServiceServlet

2018-04-14 19:11:24,126 INFO  [http-bio-8080-exec-13] EMAppServlet              - Successfully performed Logout for user null at test_secure

2018-04-14 19:11:24,127 DEBUG [http-bio-8080-exec-13] EMAppServlet              - EMCC: true

في سجلات إدارة المكالمات

### The device profile DN (here 8888)

02760565.000 |19:11:08.329 |SdlSig   |CtiDeviceRegisterNotifyWithLineInfo    |wait                           |CTIRegistrar(1,100,237,1)        |SIPStationD(1,100,76,128)        |1,100,14,8722.2^10.65.40.61^test_secure  |[R:N-H:0,N:1,L:2,V:0,Z:0,D:0]  deviceName=test_secure EventContent=14 DeviceConfigInfo= Locale=1 AltScrpt= DNDOption=0 ConfigIpAddrMode=3 Hotelling=T Restricted=F OutboundRO=0 BIB=F DNDStatus=F LoginStatus=1 DeviceRegistrationInfo= TerminateMedia=5 ActiveIPAddrMode=0 IPv4=1761650880 IPv6= LoginUser=EMuser ProfilePkid=0bff3cfd-13c1-5352-1a39-9188bdd855d8 Encoding=3 CtiControllable=1 AppCapability=52 UserCapability=20Protocol=2 MultiMediaCapabilityBitMask=3 DeviceMultiMediaInfo= DeviceVideoCapability=0 TelepresenceInfo=0 ScreenCount=0 HuntLogStatus=1 TotalLines=1 LineCount=1 MoreLines=F DN = 8888 Part =  PkGpDN =  PkGpPart =  num RD = 0 StationPid(1,100,76,128) CTIHandlerId(0) LoginStatus=1

### Request for registering the phone for DN mentioned in the device profile

02760551.004 |19:11:08.219 |AppInfo  |SIPTcp - wait_SdlReadRsp: Incoming SIP TCP message from 10.65.40.61 on port 57378 index 12386 with 2203 bytes:

[101339,NET]

REGISTER sip:10.106.111.182 SIP/2.0

Via: SIP/2.0/TCP 192.168.0.105:57378;branch=z9hG4bK00007806

From: <sip:8888@10.106.111.182>;tag=005056c000010926000036cb-00003151

To: <sip:8888@10.106.111.182>

Call-ID: 005056c0-0001027b-00001cf2-00001201@192.168.0.105

Max-Forwards: 70

Date: Sat, 14 Apr 2018 13:40:19 GMT

CSeq: 2151 REGISTER

User-Agent: Cisco-SIPIPCommunicator/9.1.1

Contact: <sip:f5927b99-efa0-d1a0-8705-e11d9e2ebf0b@192.168.0.105:57378;transport=tcp>;+sip.instance="<urn:uuid:00000000-0000-0000-0000-005056c00001>";+sip.instance="<urn:uuid:00000000-0000-0000-0000-005056c00001>";+u.sip!devicename.ccm.features.cisco.com="test_secure";+u.sip!model.ccm.cisco.com="30016"

Supported: replaces,join,sdp-anat,norefersub,extended-refer,X-cisco-callinfo,X-cisco-serviceuri,X-cisco-escapecodes,X-cisco-service-control,X-cisco-srtp-fallback,X-cisco-monrec,X-cisco-config,X-cisco-sis-5.1.0,X-cisco-xsi-8.5.1

Reason: SIP;cause=200;text="cisco-alarm:14 Name=SEP005056C00001 Load=CIPC-8-6-6-1 Last=cm-closed-tcp"

Expires: 3600

Content-Type: multipart/mixed; boundary=uniqueBoundary

Mime-Version: 1.0

Content-Length: 1073

--uniqueBoundary

Content-Type: application/x-cisco-remotecc-request+xml

Content-Disposition: session;handling=optional

<?xml version="1.0" encoding="UTF-8"?>

<x-cisco-remotecc-request>

<bulkregisterreq>

<contact all="true">

<register></register>

</contact>

</bulkregisterreq>

</x-cisco-remotecc-request>

--uniqueBoundary

Content-Type: application/x-cisco-remotecc-request+xml

Content-Disposition: session;handling=optional

<?xml version="1.0" encoding="UTF-8"?>

<x-cisco-remotecc-request>

<optionsind>

<combine max="6">

<remotecc>

<status></status>

</remotecc>

<service-control></service-control>

</combine>

<dialog usage="hook status">

<unot></unot>

<sub></sub>

</dialog>

<dialog usage="shared line">

<unot></unot>

<sub></sub>

</dialog>

<presence usage="blf speed dial">

<unot></unot>

<sub></sub>

</presence>

<joinreq></joinreq>

<cfwdall-anyline>No</cfwdall-anyline>

<coaching></coaching>

<oosalarm></oosalarm>

</optionsind>

</x-cisco-remotecc-request>

### 200 OK

02760584.001 |19:11:08.334 |AppInfo  |SIPTcp - wait_SdlSPISignal: Outgoing SIP TCP message to 10.65.40.61 on port 57378 index 12386

[101341,NET]

SIP/2.0 200 OK

Via: SIP/2.0/TCP 192.168.0.105:57378;branch=z9hG4bK00007806;received=10.65.40.61

From: <sip:8888@10.106.111.182>;tag=005056c000010926000036cb-00003151

To: <sip:8888@10.106.111.182>;tag=1168208381

Date: Sat, 14 Apr 2018 13:41:08 GMT

Call-ID: 005056c0-0001027b-00001cf2-00001201@192.168.0.105

Server: Cisco-CUCM12.0

CSeq: 2151 REGISTER

Expires: 120

Contact: <sip:f5927b99-efa0-d1a0-8705-e11d9e2ebf0b@192.168.0.105:57378;transport=tcp>;+sip.instance="<urn:uuid:00000000-0000-0000-0000-005056c00001>";+sip.instance="<urn:uuid:00000000-0000-0000-0000-005056c00001>";+u.sip!devicename.ccm.features.cisco.com="test_secure";+u.sip!model.ccm.cisco.com="30016";x-cisco-newreg

Supported: X-cisco-srtp-fallback,X-cisco-sis-9.0.0

Content-Type: application/x-cisco-remotecc-response+xml

Content-Length: 367

<x-cisco-remotecc-response>

<response>

<code>200</code>

<optionsind>

<combine max="6">

<remotecc><status/></remotecc>

<service-control/>

</combine>

<dialog usage="hook status"><unot/></dialog>

<dialog usage="shared line"><unot/></dialog>

<presence usage="blf speed dial"><unot/></presence>

<joinreq></joinreq>

</optionsind>

</response>

</x-cisco-remotecc-response>

### After logout the device again registers with its normal DN (7777)

02760738.004 |19:11:36.004 |AppInfo  |SIPTcp - wait_SdlReadRsp: Incoming SIP TCP message from 10.65.40.61 on port 57417 index 12389 with 2203 bytes:

[101342,NET]

REGISTER sip:10.106.111.182 SIP/2.0

Via: SIP/2.0/TCP 192.168.0.105:57417;branch=z9hG4bK00002532

From: <sip:7777@10.106.111.182>;tag=005056c00001092900001fb0-00000fc1

To: <sip:7777@10.106.111.182>

Call-ID: 005056c0-00010285-000046e9-00006cf9@192.168.0.105

Max-Forwards: 70

Date: Sat, 14 Apr 2018 13:40:47 GMT

CSeq: 2153 REGISTER

User-Agent: Cisco-SIPIPCommunicator/9.1.1

Contact: <sip:479c83c3-cb54-18e8-1ba1-06a9d6b9e33c@192.168.0.105:57417;transport=tcp>;+sip.instance="<urn:uuid:00000000-0000-0000-0000-005056c00001>";+sip.instance="<urn:uuid:00000000-0000-0000-0000-005056c00001>";+u.sip!devicename.ccm.features.cisco.com="test_secure";+u.sip!model.ccm.cisco.com="30016"

Supported: replaces,join,sdp-anat,norefersub,extended-refer,X-cisco-callinfo,X-cisco-serviceuri,X-cisco-escapecodes,X-cisco-service-control,X-cisco-srtp-fallback,X-cisco-monrec,X-cisco-config,X-cisco-sis-5.1.0,X-cisco-xsi-8.5.1

Reason: SIP;cause=200;text="cisco-alarm:14 Name=SEP005056C00001 Load=CIPC-8-6-6-1 Last=cm-closed-tcp"

Expires: 3600

Content-Type: multipart/mixed; boundary=uniqueBoundary

Mime-Version: 1.0

Content-Length: 1073

--uniqueBoundary

Content-Type: application/x-cisco-remotecc-request+xml

Content-Disposition: session;handling=optional

<?xml version="1.0" encoding="UTF-8"?>

<x-cisco-remotecc-request>

<bulkregisterreq>

<contact all="true">

<register></register>

</contact>

</bulkregisterreq>

</x-cisco-remotecc-request>

--uniqueBoundary

Content-Type: application/x-cisco-remotecc-request+xml

Content-Disposition: session;handling=optional

<?xml version="1.0" encoding="UTF-8"?>

<x-cisco-remotecc-request>

<optionsind>

<combine max="6">

<remotecc>

<status></status>

</remotecc>

<service-control></service-control>

</combine>

<dialog usage="hook status">

<unot></unot>

<sub></sub>

</dialog>

<dialog usage="shared line">

<unot></unot>

<sub></sub>

</dialog>

<presence usage="blf speed dial">

<unot></unot>

<sub></sub>

</presence>

<joinreq></joinreq>

<cfwdall-anyline>No</cfwdall-anyline>

<coaching></coaching>

<oosalarm></oosalarm>

</optionsind>

</x-cisco-remotecc-request>

### 200 OK

02760759.001 |19:11:36.114 |AppInfo  |//SIP/SIPNormalization/trace_sip_message: Before outbound SIP Normalization msg is:

[101344,INT]

SIP/2.0 200 OK

Via: SIP/2.0/TCP 192.168.0.105:57417;branch=z9hG4bK00002532;received=10.65.40.61

From: <sip:7777@10.106.111.182>;tag=005056c00001092900001fb0-00000fc1

To: <sip:7777@10.106.111.182>;tag=983899518

Date: Sat, 14 Apr 2018 13:41:36 GMT

Call-ID: 005056c0-00010285-000046e9-00006cf9@192.168.0.105

Server: Cisco-CUCM12.0

CSeq: 2153 REGISTER

Expires: 120

Contact: <sip:479c83c3-cb54-18e8-1ba1-06a9d6b9e33c@192.168.0.105:57417;transport=tcp>;+sip.instance="<urn:uuid:00000000-0000-0000-0000-005056c00001>";+sip.instance="<urn:uuid:00000000-0000-0000-0000-005056c00001>";+u.sip!devicename.ccm.features.cisco.com="test_secure";+u.sip!model.ccm.cisco.com="30016";x-cisco-newreg

Supported: X-cisco-srtp-fallback,X-cisco-sis-9.0.0

Content-Type: application/x-cisco-remotecc-response+xml

Content-Length: 367

<x-cisco-remotecc-response>

<response>

<code>200</code>

<optionsind>

<combine max="6">

<remotecc><status/></remotecc>

<service-control/>

</combine>

<dialog usage="hook status"><unot/></dialog>

<dialog usage="shared line"><unot/></dialog>

<presence usage="blf speed dial"><unot/></presence>

<joinreq></joinreq>

</optionsind>

</response>

</x-cisco-remotecc-response>

العيوب الشائعة لتنقل الملحقات

- قام CSCuv93330: tvsGetNextThread() بإرجاع NULL

- CSCur57864: 8841/8851 Secure Extension Mobility Login يفشل بشكل متقطع

- CSCvb98664: سيظهر الطابع الزمني في UTC حتى إذا تم تكوين منطقة زمنية أخرى

- CSCuo94742: تستخدم طبقة أجهزة CCM دائما الإعدادات المحلية الإنجليزية بعد تسجيل دخول EM

- CSCuo13456: إمكانية التنقل الموسع: تقتصر الهواتف على إدخال ما يصل إلى 32 حرفا على الطرازين 78xx و 88xx

- CSCtz28748: عندما يتم تسجيل الدخول إلى الملحق، تحصل حركة الدخول على تسجيل الدخول غير ناجح وغير معروف 7

- CSCtx18810: لا يدعم CIPC EM الآمن (تسجيل دخول HTTPS ل EM)

- CSCue33973: ذاكرة / وحدة المعالجة المركزية (CPU) عالية Tomcat - تسريب AXL Throttling مما يتسبب في استعلامات كثيرة

- CSCug88643 : CME: Extension Mobility: دعم هواتف SIP في شبكات فرعية مختلفة

- CSCuo99592 : لن يتم تسجيل دخول الطراز 7841 بشكل متقطع إلى Extension Mobility

- CSCug94607: تعطي إستجابة GetDeviceProfile رمز الخطأ -1

- CSCud97811 : لم يتم حذف الإدخالات ExtensionmobileDynamic عند تسجيل خروج EM

رموز أخطاء Extension Mobility

يصف هذا وثيقة الخطأ رمز أن يكون بشكل عام:

https://www.cisco.com/c/en/us/td/docs/voice_ip_comm/cucm/trouble/8_6_1/trbl861/tbfeat.pdf

الأخطاء الشائعة التي حدثت

يصف هذا وثيقة الأخطاء المشتركة مع إصلاحها:

https://www.cisco.com/c/en/us/support/docs/unified-communications/unified-communications-manager-callmanager/18772-extension-mobility.html