المحتويات

المقدمة

المتطلبات الأساسية

المتطلبات

المكونات المستخدمة

المشكلة

تم أستكشاف الأخطاء وإصلاحها

الحل

التحقق

المقدمة

يصف هذا المستند مشكلة ظهرت بعد ترقية تنفيذ وسيط التعاون المستضاف (HCM-F) بالإضافة إلى عملية أستكشاف الأخطاء وإصلاحها.

السبب الجذري للمشكلة متعلق بشهادة Tomcat منتهية الصلاحية. سيواجه العديد من العملاء الذين يخططون لترقية جهاز HCM-F الخاص بهم (للاستفادة من الميزات التي تم تقديمها حديثا) هذه المشكلة إذا انتهت صلاحية شهادة HCM-F Tomcat الموجودة لديهم ولم يتم إعادة إنشائها.

المتطلبات الأساسية

المتطلبات

توصي Cisco بأن تكون لديك معرفة بالمواضيع التالية:

- حل التعاون المستضاف (HCS) من Cisco

- تنفيذ وسيط التعاون المستضاف (HCM-F) من Cisco

المكونات المستخدمة

تستند المعلومات الواردة في هذا المستند إلى إصدارات البرامج والمكونات المادية التالية:

- HCM-F 11.5.4

تم إنشاء المعلومات الواردة في هذا المستند من الأجهزة الموجودة في بيئة معملية خاصة. بدأت جميع الأجهزة المُستخدمة في هذا المستند بتكوين ممسوح (افتراضي). إذا كانت شبكتك مباشرة، فتأكد من فهمك للتأثير المحتمل لأي أمر.

المشكلة

بعد ترقية HCM-F (11.5.1 إلى 11.5.4) وإصدار المحول، لم تعد صفحة واجهة المستخدم الرسومية (GUI) قابلة للوصول والخدمات في حالة توقف.

تم أستكشاف الأخطاء وإصلاحها

- أثناء التحقق من حالة الخدمات، يلاحظ أن خدمات واجهة مستخدم ويب (UI) والخدمات ذات الصلة ب Tomcat في حالة إيقاف:

admin:utils service list

Requesting service status, please wait...

System SSH [STARTED]

Name Service Cache [STOPPED] Service Not Activated

Entropy Monitoring Daemon [STARTED]

Cisco SCSI Watchdog [STARTED]Service Manager [STARTED]

Service Manager is running

Getting list of all services

>> Return code = 0

Cisco AMC Service[STARTED]

Cisco Audit Event Service[STARTED]

Cisco CDM Database[STARTED]

Cisco CDP[STARTED]

Cisco CDP Agent[STARTED]

Cisco Certificate Expiry Monitor[STARTED]

Cisco Configuration Manager[STARTED]

Cisco DRF Local[STARTED]

Cisco DRF Master[STARTED]

Cisco HCS Admin UI[STOPPED] Component is not running

Cisco HCS CSF UI Service[STOPPED]  Component is not running

Cisco HCS CUCDMSync Service[STARTED]

Cisco HCS ConfigMgr[STARTED]

Cisco HCS DMA-SA Service[STARTED]

Cisco HCS Data Access Manager Service[STARTED]

Cisco HCS Fulfillment Service[STARTED]

Cisco HCS IPA Service[STARTED]

Cisco HCS Intelligent Loader Service[STOPPED]  Component is not running

Cisco HCS License Manager Service[STARTED]

Cisco HCS NBI REST FF Web Service[STOPPED] Component is not running

Cisco HCS NBI REST SDR Web Service[STOPPED]  Component is not running

Cisco HCS NBI REST UCMon Web Service[STOPPED]  Component is not running

Cisco HCS North Bound Interface Web Service[STOPPED]  Component is not running

Cisco HCS Provisioning Adapter Service[STARTED]

Cisco HCS SDR Change Notification Service[STARTED]

Cisco HCS SDR UI[STOPPED]  Component is not running

Cisco HCS SI UI[STOPPED]  Component is not running

Cisco HCS SSO SP Service[STOPPED]  Component is not running

Cisco HCS Service Inventory[STOPPED]  Component is not running

Cisco HCS UCPA Service[STARTED]

Cisco HCS UCSMSync Service[STARTED]

Cisco HCS VCenterSync Service[STARTED]

Cisco JMS Broker[STARTED]

Cisco Log Partition Monitoring Tool[STARTED]

Cisco Platform Manager Service[STOPPED]  Component is not running

Cisco RIS Data Collector[STARTED]

Cisco RTMT Web Service[STOPPED]  Component is not running

Cisco Syslog Agent[STARTED]

Cisco Tomcat[STARTED]

Cisco Tomcat Stats Servlet[STOPPED]  Component is not running

Cisco Trace Collection Service[STARTED]

Cisco Trace Collection Servlet[STOPPED]  Component is not running

Host Resources Agent[STARTED]

MIB2 Agent[STARTED]

Platform Administrative Web Service[STOPPED]  Component is not running

SNMP Master Agent[STARTED]System Application Agent[STARTED]

Cisco HCS UC Monitor Service[STOPPED]  Service Not ActivatedPrimary Node =true

- في Cisco Syslog نرى بروتوكول نقل النص التشعبي (HTTP) 404 خطأ للخدمات المختلفة المتعلقة بالويب:

admin:file view activelog /syslog/CiscoSyslog

Jun 17 16:14:19 hcs862-hcm-f local7 2 : 6: hcs862-hcm-f.XXXXXXXX.net:

Jun 17 2019 14:14:19.781 UTC :  %UC_SERVICEMANAGER-2-ServiceStartFailed: %[ServiceName=Cisco RTMT Web Service][Reason=HTTP 404 Error][AppID=Cisco Service Manager][ClusterID=][NodeID=hcs862-hcm-f]: Failed to start service.

Jun 17 16:14:19 hcs862-hcm-f local7 2 : 7: hcs862-hcm-f.XXXXXXXXtest.net:

Jun 17 2019 14:14:19.781 UTC :  %UC_SERVICEMANAGER-2-ServiceFailed: %[ServiceName=Cisco RTMT Web Service][Reason=Service stopped abruptly][AppID=Cisco Service Manager][ClusterID=][NodeID=hcs862-hcm-f]: Service terminated.

Jun 17 16:14:20 hcs862-hcm-f local7 2 : 8: hcs862-hcm-f.XXXXXXXXtest.net:

Jun 17 2019 14:14:20.791 UTC :  %UC_SERVICEMANAGER-2-ServiceStartFailed: %[ServiceName=Cisco Trace Collection Servlet][Reason=HTTP 404 Error][AppID=Cisco Service Manager][ClusterID=][NodeID=hcs862-hcm-f]: Failed to start service.

Jun 17 16:14:20 hcs862-hcm-f local7 2 : 9: hcs862-hcm-f.XXXXXXXXtest.net: Jun 17 2019 14:14:20.791 UTC :  %UC_SERVICEMANAGER-2-ServiceFailed: %[ServiceName=Cisco Trace Collection Servlet][Reason=Service stopped abruptly][AppID=Cisco Service Manager][ClusterID=][NodeID=hcs862-hcm-f]: Service terminated.

Jun 17 16:14:21 hcs862-hcm-f local7 2 : 10: hcs862-hcm-f.XXXXXXXXtest.net: Jun 17 2019 14:14:21.796 UTC :  %UC_SERVICEMANAGER-2-ServiceStartFailed: %[ServiceName=Cisco Tomcat Stats Servlet][Reason=HTTP 404 Error][AppID=Cisco Service Manager][ClusterID=][NodeID=hcs862-hcm-f]: Failed to start service.

Jun 17 16:14:21 hcs862-hcm-f local7 2 : 11: hcs862-hcm-f.XXXXXXXXtest.net: Jun 17 2019 14:14:21.796 UTC :  %UC_SERVICEMANAGER-2-ServiceFailed: %[ServiceName=Cisco Tomcat Stats Servlet][Reason=Service stopped abruptly][AppID=Cisco Service Manager][ClusterID=][NodeID=hcs862-hcm-f]: Service terminated.

Jun 17 16:14:22 hcs862-hcm-f local7 6 : 12: hcs862-hcm-f.XXXXXXXXtest.net: Jun 17 2019 14:14:22.800 UTC :  %UC_GENERIC-6-ServiceStarted: %[ServiceName=Cisco CDP][ProcessID=8426][AppID=Cisco Service Manager][ClusterID=][NodeID=hcs862-hcm-f]: Service started.

Jun 17 16:14:23 hcs862-hcm-f local7 2 : 13: hcs862-hcm-f.XXXXXXXXtest.net:

Jun 17 2019 14:14:23.804 UTC :  %UC_SERVICEMANAGER-2-ServiceStartFailed: %[ServiceName=Cisco HCS Admin UI][Reason=HTTP 404 Error][AppID=Cisco Service Manager][ClusterID=][NodeID=hcs862-hcm-f]: Failed to start service.

Jun 17 16:14:23 hcs862-hcm-f local7 2 : 14: hcs862-hcm-f.XXXXXXXXtest.net:

Jun 17 2019 14:14:23.804 UTC :  %UC_SERVICEMANAGER-2-ServiceFailed: %[ServiceName=Cisco HCS Admin UI][Reason=Service stopped abruptly][AppID=Cisco Service Manager][ClusterID=][NodeID=hcs862-hcm-f]: Service terminated.

Jun 17 16:14:24 hcs862-hcm-f local7 2 : 15: hcs862-hcm-f.XXXXXXXXtest.net:

Jun 17 2019 14:14:24.808 UTC :  %UC_SERVICEMANAGER-2-ServiceStartFailed: %[ServiceName=Cisco HCS SDR UI][Reason=HTTP 404 Error][AppID=Cisco Service Manager][ClusterID=][NodeID=hcs862-hcm-f]: Failed to start service.

Jun 17 16:14:24 hcs862-hcm-f local7 2 : 16: hcs862-hcm-f.XXXXXXXXtest.net: Jun 17 2019 14:14:24.808 UTC :  %UC_SERVICEMANAGER-2-ServiceFailed: %[ServiceName=Cisco HCS SDR UI][Reason=Service stopped abruptly][AppID=Cisco Service Manager][ClusterID=][NodeID=hcs862-hcm-f]: Service terminated.

Jun 17 16:14:25 hcs862-hcm-f local7 6 : 17: hcs862-hcm-f.XXXXXXXXtest.net: Jun 17 2019 14:14:25.812 UTC :  %UC_GENERIC-6-ServiceStarted: %[ServiceName=Cisco Certificate Expiry Monitor][ProcessID=8774][AppID=Cisco Service Manager][ClusterID=][NodeID=hcs862-hcm-f]: Service started.

Jun 17 16:14:25 hcs862-hcm-f local7 2 : 18: hcs862-hcm-f.XXXXXXXXtest.net:

Jun 17 2019 14:14:25.813 UTC :  %UC_SERVICEMANAGER-2-ServiceStartFailed: %[ServiceName=Cisco HCS NBI REST SDR Web Service][Reason=HTTP 404 Error][AppID=Cisco Service Manager][ClusterID=][NodeID=hcs862-hcm-f]: Failed to start service.

Jun 17 16:14:25 hcs862-hcm-f local7 2 : 19: hcs862-hcm-f.XXXXXXXXtest.net:

Jun 17 2019 14:14:25.813 UTC :  %UC_SERVICEMANAGER-2-ServiceFailed: %[ServiceName=Cisco HCS NBI REST SDR Web Service][Reason=Service stopped abruptly][AppID=Cisco Service Manager][ClusterID=][NodeID=hcs862-hcm-f]: Service terminated.

- Tomcat في كاتالينا.out تقارير CCMTrustCerts قضية السياق:

SEVERE: Context [/CCMTrustCerts] startup failed due to previous errors

Jun 18, 2019 2:59:49 PM org.apache.catalina.startup.HostConfig deployDirectoryINFO: Deployment of web application directory /common/log/taos-log-a/tomcat/webapps/CCMTrustCerts has finished in 8,042 ms end of the file reachedoptions: q=quit, n=next, p=prev, b=begin, e=end (lines 1221 - 1223 of 1223) :INFO: Deploying web application directory /common/log/taos-log-a/tomcat/webapps/manager

Jun 18, 2019 2:59:33 PM org.apache.catalina.startup.SetContextPropertiesRule beginWARNING: [SetContextPropertiesRule]{Context} Setting property 'debug' to '0' did not find a matching property.

Jun 18, 2019 2:59:33 PM org.apache.tomcat.util.digester.SetPropertiesRule beginWARNING: [SetPropertiesRule]{Context/Realm} Setting property 'resourceName' to 'TomcatUsersDatabase' did not find a matching property.

Jun 18, 2019 2:59:41 PM org.apache.catalina.startup.TldConfig executeINFO: At least one JAR was scanned for TLDs yet contained no TLDs. Enable debug logging for this logger for a complete list of JARs that were scanned but no TLDs were found in them. Skipping unneeded JARs during scanning can improve startup time and JSP compilation time.

Jun 18, 2019 2:59:41 PM org.apache.catalina.core.StandardContext startInternalSEVERE: One or more Filters failed to start. Full details will be found in the appropriate container log file

Jun 18, 2019 2:59:41 PM org.apache.catalina.core.StandardContext startInternalSEVERE: Context [/manager] startup failed due to previous errors

Jun 18, 2019 2:59:41 PM org.apache.catalina.startup.HostConfig deployDirectoryINFO: Deployment of web application directory /common/log/taos-log-a/tomcat/webapps/manager has finished in 7,483 ms

Jun 18, 2019 2:59:41 PM org.apache.catalina.startup.HostConfig deployDirectoryINFO: Deploying web application directory /common/log/taos-log-a/tomcat/webapps/CCMTrustCerts

Jun 18, 2019 2:59:49 PM org.apache.catalina.startup.TldConfig executeINFO: At least one JAR was scanned for TLDs yet contained no TLDs. Enable debug logging for this logger for a complete list of JARs that were scanned but no TLDs were found in them. Skipping unneeded JARs during scanning can improve startup time and JSP compilation time.

Jun 18, 2019 2:59:49 PM org.apache.catalina.core.StandardContext startInternalSEVERE: One or more Filters failed to start. Full details will be found in the appropriate container log file

Jun 18, 2019 2:59:49 PM org.apache.catalina.core.StandardContext startInternal options: SEVERE: Context [/CCMTrustCerts] startup failed due to previous errors

Jun 18, 2019 2:59:49 PM org.apache.catalina.startup.HostConfig deployDirectoryINFO: Deployment of web application directory /common/log/taos-log-a/tomcat/webapps/CCMTrustCerts has finished in 8,042 ms

- يعرض تشغيل "إختبار تشخيص النظام" من واجهة سطر الأوامر (CLI) خطأ في الوحدة النمطية tomcat_connectors، مما يشير إلى أن الاتصالات الداخلية ب Tomcat لا تعمل:

test - tomcat_connectors   : Failed - The HTTP and HTTPS ports are not responding to local requests.

Please collect all of the Tomcat logs for root cause analysis: file get activelog tomcat/logs/*

- انتهت صلاحية شهادة Tomcat في 26 مارس/آذار. وعلى الرغم من ذلك، لم تلاحظ مشاكل أثناء (أو قبل) رفع مستوى سداسي كلور حلقي الهكسان - واو:

Jun 19 12:00:00 hcs862-hcm-f local99 0 : 42: hcs862-hcm-f.XXXXXXXXtest.net:

Jun 19 2019 10:00:00.19 UTC :  %UC_CERT-0-CertExpired: %[Message=Certificate expiration Notification. Certificate name:tomcat.der Unit:tomcat Type:own-cert Expiration:Sun Mar 26 12:30:59:000 CES][AppID=Cisco Certificate Monitor][ClusterID=][NodeID=hcs862-hcm-f]: Certificate has Expired and needs to be changed at the earliest

Jun 19 12:00:00 hcs862-hcm-f local99 0 : 43: hcs862-hcm-f.XXXXXXXXtest.net:

Jun 19 2019 10:00:00.21 UTC :  %UC_CERT-0-CertExpired: %[Message=Certificate expiration Notification. Certificate name:ipsec.der Unit:ipsec Type:own-cert Expiration:Sun Mar 26 12:30:57:000 CEST ][AppID=Cisco Certificate Monitor][ClusterID=][NodeID=hcs862-hcm-f]: Certificate has Expired and needs to be changed at the earliest

الحل

1. إعادة إنشاء شهادة Tomcat :

admin:set cert regen tomcat

WARNING: This operation will overwrite any CA signed certificate previously imported for  tomcat

Proceed with regeneration (yes|no)? yes

Successfully Regenerated Certificate for tomcat.

You must restart services related to tomcat for the regenerated certificates to become active.

2.  إعادة تشغيل خادم HCM-F:

admin:utils system restart

Do you really want to restart ?Enter (yes/no)? yes

التحقق

- التحقق من حالة الخدمة:

admin:utils service list

Requesting service status, please wait...

System SSH [STARTED]

Name Service Cache [STOPPED] Service Not Activated

Entropy Monitoring Daemon [STARTED]

Cisco SCSI Watchdog [STARTED]

Service Manager [STARTED]Service Manager is running

Getting list of all services

>> Return code = 0

Cisco AMC Service[STARTED]

Cisco Audit Event Service[STARTED]

Cisco CDM Database[STARTED]

Cisco CDP[STARTED]

Cisco CDP Agent[STARTED]

Cisco Certificate Expiry Monitor[STARTED]

Cisco Configuration Manager[STARTED]

Cisco DRF Local[STARTED]

Cisco DRF Master[STARTED]

Cisco HCS Admin UI[STARTED]

Cisco HCS CSF UI Service[STARTED]

Cisco HCS CUCDMSync Service[STARTED]

Cisco HCS ConfigMgr[STARTED]

Cisco HCS DMA-SA Service[STARTED]

Cisco HCS Data Access Manager Service[STARTED]

Cisco HCS Fulfillment Service[STARTED]

Cisco HCS IPA Service[STARTED]

Cisco HCS Intelligent Loader Service[STARTED]

Cisco HCS License Manager Service[STARTED]

Cisco HCS NBI REST FF Web Service[STARTED]

Cisco HCS NBI REST SDR Web Service[STARTED]

Cisco HCS NBI REST UCMon Web Service[STARTED]

Cisco HCS North Bound Interface Web Service[STARTED]

Cisco HCS Provisioning Adapter Service[STARTED]

Cisco HCS SDR Change Notification Service[STARTED]

Cisco HCS SDR UI[STARTED]

Cisco HCS SI UI[STARTED]

Cisco HCS SSO SP Service[STARTED]

Cisco HCS Service Inventory[STARTED]

Cisco HCS UCPA Service[STARTED]

Cisco HCS UCSMSync Service[STARTED]

Cisco HCS VCenterSync Service[STARTED]

Cisco JMS Broker[STARTED]

Cisco Log Partition Monitoring Tool[STARTED]

Cisco Platform Manager Service[STARTED]

Cisco RIS Data Collector[STARTED]

Cisco RTMT Web Service[STARTED]

Cisco Syslog Agent[STARTED]

Cisco Tomcat[STARTED]

Cisco Tomcat Stats Servlet[STARTED]

Cisco Trace Collection Service[STARTED]

Cisco Trace Collection Servlet[STARTED]

Host Resources Agent[STARTED]MIB2 Agent[STARTED]

Platform Administrative Web Service[STARTED]

SNMP Master Agent[STARTED]

System Application Agent[STARTED]

Cisco HCS UC Monitor Service[STOPPED]

Service Not ActivatedPrimary Node =true