المحتويات

المقدمة

المشكلة

الحل

التحقق

المقدمة

يصف هذا المستند توقعات زمن الوصول الخاصة ب ping أو traceroute "إلى" أو "من" IP لمحول Nexus. الاستجابة المتأخرة من المحول هي سلوك متوقع.

المشكلة

يتم ملاحظة زمن الوصول عند إختبار الاتصال من محول Nexus أو تبديل IP عليه.

Nexus-1# ping6 fc00::2

64 bytes from fc00::2: icmp_seq=47 time=12.067 ms

64 bytes from fc00::2: icmp_seq=48 time=12.452 ms

64 bytes from fc00::2: icmp_seq=49 time=12.575 ms

64 bytes from fc00::2: icmp_seq=50 time=12.903 ms

64 bytes from fc00::2: icmp_seq=51 time=14.532 ms

64 bytes from fc00::2: icmp_seq=52 time=15.029 ms

64 bytes from fc00::2: icmp_seq=53 time=15.188 ms

64 bytes from fc00::2: icmp_seq=54 time=15.447 ms

64 bytes from fc00::2: icmp_seq=55 time=15.788 ms

64 bytes from fc00::2: icmp_seq=56 time=16.136 ms

64 bytes from fc00::2: icmp_seq=57 time=16.29 ms

----------------------------------------------------------------------------

Nexus-1# ping 10.1.1.1

64 bytes from 10.1.1.1: icmp_seq=21 ttl=254 time=17.397 ms

64 bytes from 10.1.1.1: icmp_seq=22 ttl=254 time=17.977 ms

64 bytes from 10.1.1.1: icmp_seq=23 ttl=254 time=18.668 ms

64 bytes from 10.1.1.1: icmp_seq=24 ttl=254 time=19.613 ms

64 bytes from 10.1.1.1: icmp_seq=25 ttl=254 time=20.018 ms

64 bytes from 10.1.1.1: icmp_seq=26 ttl=254 time=20.539 ms

64 bytes from 10.1.1.1: icmp_seq=27 ttl=254 time=20.647 ms

64 bytes from 10.1.1.1: icmp_seq=28 ttl=254 time=21.02 ms

64 bytes from 10.1.1.1: icmp_seq=29 ttl=254 time=21.504 ms

64 bytes from 10.1.1.1: icmp_seq=30 ttl=254 time=21.622 ms

الحل

نوصي بفحص زمن الوصول من خلال إجراء إختبار الاتصال بين الأجهزة/الأجهزة المضيفة الطرفية بدلا من إجراء إختبار اتصال لتبديل IP.

- عند تلقي طلب ICMP إلى المحول، تتم معالجته بواسطة وحدة المعالجة المركزية/المشرف على المحول.

- تكون حزم ICMP ذات أولوية منخفضة أو حركة مرور غير حيوية إلى المحول.

- تحتاج وحدة المعالجة المركزية (CPU) للمحول/المشرف على المحول إلى معالجة حركة مرور البيانات الحيوية الأخرى مثل وحدات بيانات بروتوكول الجسر (BPDU) الخاصة ببروتوكول الشجرة المتفرعة (STP) و UDLD و BFD و LACP و OSFP و BGP وحركة مرور بيانات مستوى التحكم الأخرى على الأولوية.

- لذلك عندما نضغط على مفتاح IP يمكن أن يكون هناك زمن انتقال.

التحقق

- باستخدام أمر ethanalyzer، يمكننا التحقق من وجود أي حركة مرور ICMP غير عادية يتم استقبالها على المحول.

- في الإخراج أدناه، يمكننا مشاهدة طلبات ICMP التي تم تلقيها من عدة مضيفين/مصادر لتحويل IP.

NEXUS# show ip interface brief

IP Interface Status for VRF "default"(1)

Interface            IP Address      Interface Status

Vlan10               10.1.1.1        protocol-up/link-up/admin-up

NEXUS# ethanalyzer local interface inband display-filter icmp limit-c 0

Capturing on 'ps-inb'

1 2024-05-13 13:05:49.296574516    10.1.1.35 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

2 2024-05-13 13:05:49.298725978    10.1.1.51 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

3 2024-05-13 13:05:49.299935463    10.1.1.60 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

4 2024-05-13 13:05:49.303159980    10.1.1.84 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

5 2024-05-13 13:05:49.305450067   10.1.1.101 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

6 2024-05-13 13:05:49.307596053    10.1.1.17 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

7 2024-05-13 13:05:49.309881152    10.1.1.34 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

8 2024-05-13 13:05:49.313239980    10.1.1.59 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

9 2024-05-13 13:05:49.315391183    10.1.1.75 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

10 2024-05-13 13:05:49.317675859    10.1.1.92 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

11 2024-05-13 13:05:49.319960319   10.1.1.109 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

12 2024-05-13 13:05:49.323185627    10.1.1.33 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

13 2024-05-13 13:05:49.325471951    10.1.1.50 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

14 2024-05-13 13:05:49.327622826    10.1.1.66 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

15 2024-05-13 13:05:49.329906456    10.1.1.83 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

16 2024-05-13 13:05:49.332057200    10.1.1.99 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

17 2024-05-13 13:05:49.334341820    10.1.1.16 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64

18 2024-05-13 13:05:49.336626919    10.1.1.33 → 10.1.1.1     ICMP 60 Echo (ping) request  id=0x0000, seq=0/0, ttl=64