المحتويات

المقدمة

المتطلبات الأساسية

المتطلبات

المكونات المستخدمة

معلومات أساسية

التكوين

الرسم التخطيطي للشبكة

الهدف

التحقق الأولي

التكوينات

التحقق من الصحة

ملخص

معلومات ذات صلة

المقدمة

يصف هذا وثيقة الإجراء أن يشكل حد مدخل بروتوكول (BGP) مسحاج تخديد على Nexus 9000 sery.

المتطلبات الأساسية

المتطلبات

توصي Cisco بأن تكون لديك معرفة بالمواضيع التالية:

- المحولات Nexus

- BGP

المكونات المستخدمة

لا يقتصر هذا المستند على إصدارات برامج ومكونات مادية معينة.

تم إنشاء المعلومات الواردة في هذا المستند من الأجهزة الموجودة في بيئة معملية خاصة. بدأت جميع الأجهزة المُستخدمة في هذا المستند بتكوين ممسوح (افتراضي). إذا كانت شبكتك قيد الإنتاج، فتأكد من فهمك للتأثير المحتمل لأي أمر تخطط لتطبيقه.

معلومات أساسية

يتم إستخدام الآلية BGP لتجنب حلقات التوجيه عن طريق إضافة رقم النظام الذاتي الخاص به (ASN) إلى سمة مسار AS. بالنسبة لمخطط IBGP، لا تقوم التحديثات بتعديل سمة AS-PATH لأنها تنتمي إلى نفس ASN، والتي يمكن أن تتسبب في حدوث تكرار حلقي للتوجيه.

إذا تم تلقي بادئة BGP من نظير IBGP، فلا يمكن الإعلان عن هذه البادئة إلى جار IBGP آخر. يستخدم BGP قاعدة تقسيم الأفق الخاصة به لمنع حلقات التكرار ضمن ASN نفسه.

تجبرك هذه القاعدة على أن يكون لديك مخطط شبكة كاملة لتبادل البادئات مع كل جار ل IBGP. بالنسبة للشبكات الكبيرة التي يكون لها سيناريو متكامل، لا يمكن تحجيمه لأنه يستخدم موارد مفرطة لإنشاء شبكات نظير.

فيما يلي بدائل مخطط كامل السلسلة ل iBGP:

- انعكاس المسار

- إتحادات قارية

يركز هذا المستند على إستخدام عاكس مسار BGP فقط.

إستخدام عاكس المسار يتجاوز حدود الشبكة الكاملة. عاكس المسار هو جهاز معين ضمن AS (النظام الذاتي) يعكس بادئات iBGP إلى موجهات أخرى في نفس الوقت.

التكوين

للتحقق من دليل تكوين عاكس مسار BGP، راجع تكوين BGP المتقدم

الرسم التخطيطي للشبكة

وفي هذا الشكل، تنشئ Nexus R2 و Nexus R3 و Nexus 4 و Nexus R5 و Nexus R6 منطقة جوار لبروتوكول بوابة الحدود الإلكترونية. كما يعمل كل من Nexus R1 و Nexus R5 على إنشاء منطقة جوار عبر بروتوكول eBGP.

الهدف

تبادل الشبكات التي تم إنشاؤها بواسطة Nexus R1 إلى جميع Nexus ضمن نفس ASN 65000.

التحقق الأولي

يقوم Nexus R1 بالإعلان عن البادئات:

R1# show ip bgp

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 78, Local Router ID is 192.168.1.1

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-i

njected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - b

est2

Network            Next Hop            Metric     LocPrf     Weight Path

*>r192.168.1.0/30     0.0.0.0                  0        100      32768 ?

*>r192.168.2.0/30     0.0.0.0                  0        100      32768 ?

*>r192.168.3.0/30     0.0.0.0                  0        100      32768 ?

*>r192.168.4.0/30     0.0.0.0                  0        100      32768 ?

*>r192.168.5.0/30     0.0.0.0                  0        100      32768 ?

R1#

يتلقى Nexus R5 الإعلان من Nexus R1 وهو جلسة عمل eBGP.

Nexus R5

R5# show ip bgp

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 123, Local Router ID is 172.16.1.2

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-injected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - best2

Network            Next Hop            Metric     LocPrf     Weight Path

*>r10.1.1.4/30        0.0.0.0                  0        100      32768 ?

*>r10.1.1.8/30        0.0.0.0                  0        100      32768 ?

*>r172.16.1.0/30      0.0.0.0                  0        100      32768 ?

*>e192.168.1.0/30     172.16.1.1               0                     0 64512 ?

*>e192.168.2.0/30     172.16.1.1               0                     0 64512 ?

*>e192.168.3.0/30     172.16.1.1               0                     0 64512 ?

*>e192.168.4.0/30     172.16.1.1               0                     0 64512 ?

*>e192.168.5.0/30     172.16.1.1               0                     0 64512 ?

R5#

يعلن Nexus R5 عن البادئات إلى نظاريه iBGP Nexus R2 و R6.

R2# show ip bgp

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 33, Local Router ID is 10.1.1.6

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-i

njected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - b

est2

Network            Next Hop            Metric     LocPrf     Weight Path

*>i10.1.1.4/30        10.1.1.5                 0        100          0 ?

*>i10.1.1.8/30        10.1.1.5                 0        100          0 ?

*>i172.16.1.0/30      10.1.1.5                 0        100          0 ?

*>i192.168.1.0/30     172.16.1.1               0        100          0 64512 ?

*>i192.168.2.0/30     172.16.1.1               0        100          0 64512 ?

*>i192.168.3.0/30     172.16.1.1               0        100          0 64512 ?

*>i192.168.4.0/30     172.16.1.1               0        100          0 64512 ?

*>i192.168.5.0/30     172.16.1.1               0        100          0 64512 ?

R2#

R6# show ip bgp

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 33, Local Router ID is 10.1.1.10

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-injected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - best2

Network            Next Hop            Metric     LocPrf     Weight Path

*>i10.1.1.4/30        10.1.1.9                 0        100          0 ?

*>i10.1.1.8/30        10.1.1.9                 0        100          0 ?

*>i172.16.1.0/30      10.1.1.9                 0        100          0 ?

*>i192.168.1.0/30     172.16.1.1               0        100          0 64512 ?

*>i192.168.2.0/30     172.16.1.1               0        100          0 64512 ?

*>i192.168.3.0/30     172.16.1.1               0        100          0 64512 ?

*>i192.168.4.0/30     172.16.1.1               0        100          0 64512 ?

*>i192.168.5.0/30     172.16.1.1               0        100          0 64512 ?

R6#

بواسطة قاعدة تجنب التكرار، لا يعلن BGP عن أي بادئة تم التعرف عليها من قبل نظير iBGP إلى أقران iBGP الآخرين.

R2# show ip bgp neighbors 10.1.2.2 advertised-routes

Peer 10.1.2.2 routes for address family IPv4 Unicast:

BGP table version is 88, Local Router ID is 10.150.0.1

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-i

njected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - b

est2

Network            Next Hop            Metric     LocPrf     Weight Path

*>r10.1.1.4/30        0.0.0.0                  0        100      32768 ?

*>r10.1.2.0/30        0.0.0.0                  0        100      32768 ?

*>r10.1.2.4/30        0.0.0.0                  0        100      32768 ?

*>r10.1.2.8/30        0.0.0.0                  0        100      32768 ?

*>r10.150.0.0/30      0.0.0.0                  0        100      32768 ?

R2#

لا يتلقى Nexus R3 و Nexus R4 البادئات التي تم إنشاؤها بواسطة Nexus R1.

R3# show ip bgp

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 28, Local Router ID is 10.100.100.1

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-injected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - best2

Network            Next Hop            Metric     LocPrf     Weight Path

*>l10.100.100.0/24    0.0.0.0                           100      32768 i

R4# show ip bgp

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 6, Local Router ID is 10.200.200.1

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-injected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - best2

Network            Next Hop            Metric     LocPrf     Weight Path

*>l10.200.200.0/24    0.0.0.0                           100      32768 i

R4#

التكوينات

بالنسبة للمخطط الوارد أعلاه، فإن الأجهزة المحددة التي سيتم تحويلها إلى عاكس مسار هي Nexus R2 و Nexus R6 لأن هذه الأجهزة لها اتصال بجميع أقران iBGP داخل نفس ASN.

ملاحظة: يتسبب تكوين عاكس المسار في إعادة التعيين إلى كل نظير BGP تم تعديله. يجب إجراء هذا التكوين ضمن إطار الصيانة.

ملاحظة: من خلال تصميم المخطط، يتم إنشاء عاكس المسار ل ASN 65000 من Nexus R2 و R6.

Nexus R1

R1# show run bgp

!Command: show running-config bgp

!Running configuration last done at: Wed Jan 31 02:43:31 2024

!Time: Wed Jan 31 23:24:28 2024

version 10.2(5) Bios:version 05.47

feature bgp

router bgp 64512

address-family ipv4 unicast

redistribute direct route-map REDISTRIBUTE_LOCAL

neighbor 172.16.1.2

remote-as 65000

address-family ipv4 unicast

R1#

Nexus R2

R2# show run bgp

!Command: show running-config bgp

!Running configuration last done at: Wed Jan 31 03:10:49 2024

!Time: Wed Jan 31 23:24:15 2024

version 10.2(5) Bios:version 05.47

feature bgp

router bgp 65000

cluster-id 10.150.0.1

address-family ipv4 unicast

redistribute direct route-map ALLOW

neighbor 10.1.1.5

remote-as 65000

address-family ipv4 unicast

route-reflector-client

neighbor 10.1.2.2

remote-as 65000

address-family ipv4 unicast

route-reflector-client

neighbor 10.1.2.6

remote-as 65000

address-family ipv4 unicast

route-reflector-client

neighbor 10.1.2.10

remote-as 65000

address-family ipv4 unicast

route-reflector-client

R2#

Nexus R3

R3# show run bgp

!Command: show running-config bgp

!Running configuration last done at: Wed Jan 31 02:49:05 2024

!Time: Wed Jan 31 23:10:07 2024

version 10.2(5) Bios:version 05.47

feature bgp

router bgp 65000

address-family ipv4 unicast

network 10.100.100.0/24

neighbor 10.1.2.5

remote-as 65000

address-family ipv4 unicast

neighbor 10.1.3.5

remote-as 65000

address-family ipv4 unicast

R3#

Nexus R4

R4# show run bgp

!Command: show running-config bgp

!Running configuration last done at: Wed Jan 31 02:56:11 2024

!Time: Wed Jan 31 23:00:44 2024

version 10.2(5) Bios:version 05.47

feature bgp

router bgp 65000

address-family ipv4 unicast

network 10.200.200.0/24

neighbor 10.1.2.1

remote-as 65000

address-family ipv4 unicast

neighbor 10.1.3.1

remote-as 65000

address-family ipv4 unicast

R4#

Nexus R5

R5# show run bgp

!Command: show running-config bgp

!Running configuration last done at: Wed Jan 31 02:48:38 2024

!Time: Wed Jan 31 23:24:15 2024

version 10.2(5) Bios:version 05.47

feature bgp

router bgp 65000

address-family ipv4 unicast

redistribute direct route-map ALLOW

neighbor 10.1.1.6

remote-as 65000

address-family ipv4 unicast

neighbor 10.1.1.10

remote-as 65000

address-family ipv4 unicast

neighbor 172.16.1.1

remote-as 64512

address-family ipv4 unicast

R5#

Nexus R6

R6# show run bgp

!Command: show running-config bgp

!Running configuration last done at: Wed Jan 31 03:12:40 2024

!Time: Wed Jan 31 23:24:18 2024

version 10.2(5) Bios:version 05.47

feature bgp

router bgp 65000

cluster-id 10.160.0.1

address-family ipv4 unicast

redistribute direct route-map ALLOW

neighbor 10.1.1.9

remote-as 65000

address-family ipv4 unicast

route-reflector-client

neighbor 10.1.2.9

remote-as 65000

address-family ipv4 unicast

route-reflector-client

neighbor 10.1.3.2

remote-as 65000

address-family ipv4 unicast

route-reflector-client

neighbor 10.1.3.6

remote-as 65000

address-family ipv4 unicast

route-reflector-client

R6#

التحقق من الصحة

بعد تشغيل Nexus R2 و Nexus R6 كعاكس للمسار، يتم الإعلان عن البادئات لنظراء iBGP.  .

R2# show ip bgp neighbors 10.1.2.2 advertised-routes

Peer 10.1.2.2 routes for address family IPv4 Unicast:

BGP table version is 22, Local Router ID is 10.150.0.1

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-i

njected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - b

est2

Network            Next Hop            Metric     LocPrf     Weight Path

*>r10.1.1.4/30        0.0.0.0                  0        100      32768 ?

*>i10.1.1.8/30        10.1.1.5                 0        100          0 ?

*>r10.1.2.0/30        0.0.0.0                  0        100      32768 ?

*>r10.1.2.4/30        0.0.0.0                  0        100      32768 ?

*>r10.1.2.8/30        0.0.0.0                  0        100      32768 ?

*>i10.100.100.0/24    10.1.2.6                          100          0 i

*>r10.150.0.0/30      0.0.0.0                  0        100      32768 ?

*>i172.16.1.0/30      10.1.1.5                 0        100          0 ?

*>i192.168.1.0/30     172.16.1.1               0        100          0 64512 ?

*>i192.168.2.0/30     172.16.1.1               0        100          0 64512 ?

*>i192.168.3.0/30     172.16.1.1               0        100          0 64512 ?

*>i192.168.4.0/30     172.16.1.1               0        100          0 64512 ?

*>i192.168.5.0/30     172.16.1.1               0        100          0 64512 ?

R2#

يتلقى Nexus R3 و Nexus R4 البادئات التي تم إنشاؤها بواسطة Nexus R1.

R3# show ip bgp

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 108, Local Router ID is 10.100.100.1

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-injected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - best2

Network            Next Hop            Metric     LocPrf     Weight Path

* i10.1.1.4/30        10.1.2.9                 0        100          0 ?

*>i                   10.1.2.5                 0        100          0 ?

*>i10.1.1.8/30        10.1.3.5                 0        100          0 ?

* i                   10.1.2.10                0        100          0 ?

* i10.1.2.0/30        10.1.2.9                 0        100          0 ?

*>i                   10.1.2.5                 0        100          0 ?

* i10.1.2.4/30        10.1.2.9                 0        100          0 ?

*>i                   10.1.2.5                 0        100          0 ?

* i10.1.2.8/30        10.1.3.5                 0        100          0 ?

*>i                   10.1.2.5                 0        100          0 ?

* i10.1.3.0/30        10.1.2.10                0        100          0 ?

*>i                   10.1.3.5                 0        100          0 ?

* i10.1.3.4/30        10.1.2.10                0        100          0 ?

*>i                   10.1.3.5                 0        100          0 ?

*>l10.100.100.0/24    0.0.0.0                           100      32768 i

* i10.150.0.0/30      10.1.2.9                 0        100          0 ?

*>i                   10.1.2.5                 0        100          0 ?

* i10.160.0.0/30      10.1.2.10                0        100          0 ?

*>i                   10.1.3.5                 0        100          0 ?

* i10.200.200.0/24    10.1.3.2                          100          0 i

*>i                   10.1.2.2                          100          0 i

* i172.16.1.0/30      10.1.1.9                 0        100          0 ?

*>i                   10.1.1.5                 0        100          0 ?

* i192.168.1.0/30     172.16.1.1               0        100          0 64512 ?

*>i                   172.16.1.1               0        100          0 64512 ?

* i192.168.2.0/30     172.16.1.1               0        100          0 64512 ?

*>i                   172.16.1.1               0        100          0 64512 ?

* i192.168.3.0/30     172.16.1.1               0        100          0 64512 ?

*>i                   172.16.1.1               0        100          0 64512 ?

* i192.168.4.0/30     172.16.1.1               0        100          0 64512 ?

*>i                   172.16.1.1               0        100          0 64512 ?

* i192.168.5.0/30     172.16.1.1               0        100          0 64512 ?

*>i                   172.16.1.1               0        100          0 64512 ?

R3#

R4# show ip bgp

BGP routing table information for VRF default, address family IPv4 Unicast

BGP table version is 78, Local Router ID is 10.200.200.1

Status: s-suppressed, x-deleted, S-stale, d-dampened, h-history, *-valid, >-best

Path type: i-internal, e-external, c-confed, l-local, a-aggregate, r-redist, I-injected

Origin codes: i - IGP, e - EGP, ? - incomplete, | - multipath, & - backup, 2 - best2

Network            Next Hop            Metric     LocPrf     Weight Path

* i10.1.1.4/30        10.1.2.9                 0        100          0 ?

*>i                   10.1.2.1                 0        100          0 ?

*>i10.1.1.8/30        10.1.3.1                 0        100          0 ?

* i                   10.1.2.10                0        100          0 ?

* i10.1.2.0/30        10.1.2.9                 0        100          0 ?

*>i                   10.1.2.1                 0        100          0 ?

* i10.1.2.4/30        10.1.2.9                 0        100          0 ?

*>i                   10.1.2.1                 0        100          0 ?

* i10.1.2.8/30        10.1.3.1                 0        100          0 ?

*>i                   10.1.2.1                 0        100          0 ?

* i10.1.3.0/30        10.1.2.10                0        100          0 ?

*>i                   10.1.3.1                 0        100          0 ?

* i10.1.3.4/30        10.1.2.10                0        100          0 ?

*>i                   10.1.3.1                 0        100          0 ?

* i10.100.100.0/24    10.1.3.6                          100          0 i

*>i                   10.1.2.6                          100          0 i

* i10.150.0.0/30      10.1.2.9                 0        100          0 ?

*>i                   10.1.2.1                 0        100          0 ?

* i10.160.0.0/30      10.1.2.10                0        100          0 ?

*>i                   10.1.3.1                 0        100          0 ?

*>l10.200.200.0/24    0.0.0.0                           100      32768 i

* i172.16.1.0/30      10.1.1.9                 0        100          0 ?

*>i                   10.1.1.5                 0        100          0 ?

* i192.168.1.0/30     172.16.1.1               0        100          0 64512 ?

*>i                   172.16.1.1               0        100          0 64512 ?

* i192.168.2.0/30     172.16.1.1               0        100          0 64512 ?

*>i                   172.16.1.1               0        100          0 64512 ?

* i192.168.3.0/30     172.16.1.1               0        100          0 64512 ?

*>i                   172.16.1.1               0        100          0 64512 ?

* i192.168.4.0/30     172.16.1.1               0        100          0 64512 ?

*>i                   172.16.1.1               0        100          0 64512 ?

* i192.168.5.0/30     172.16.1.1               0        100          0 64512 ?

*>i                   172.16.1.1               0        100          0 64512 ?

R4#

تعرض البادئات التي تم التعرف عليها من قبل عاكس المسار عنوان IP لنظير BGP ومعرف نظام المجموعة.

R4# show ip bgp 192.168.2.0

BGP routing table information for VRF default, address family IPv4 Unicast

BGP routing table entry for 192.168.2.0/30, version 63

Paths: (2 available, best #2)

Flags: (0x8000001a) (high32 00000000) on xmit-list, is in urib, is best urib route, is in HW

Path type: internal, path is valid, not best reason: Neighbor Address, no labeled nexthop

AS-Path: 64512 , path sourced external to AS

172.16.1.1 (metric 0) from 10.1.3.1 (10.160.0.1)      >>>>>>> Peer IP (Cluster ID)

Origin incomplete, MED 0, localpref 100, weight 0

Originator: 172.16.1.2 Cluster list: 10.160.0.1

Advertised path-id 1

Path type: internal, path is valid, is best path, no labeled nexthop, in rib

AS-Path: 64512 , path sourced external to AS

172.16.1.1 (metric 0) from 10.1.2.1 (10.150.0.1)

Origin incomplete, MED 0, localpref 100, weight 0

Originator: 172.16.1.2 Cluster list: 10.150.0.1

Path-id 1 not advertised to any peer

R4#

ملاحظة: لا يتم الإعلان عن الموجهات التي يتلقاها Nexus R3 و Nexus R4 بواسطة عاكس المسار إلى نظير iBGP الآخر كجزء من قاعدة تجنب التكرار.

ملخص

لا يتطلب تكوين عاكس المسار تكوين معقد لعكس المسارات إلى عملاء iBGP الخاصة بهم، وما عليك سوى إضافة الكلمة الأساسية "route-reflector-client" ضمن عائلة العناوين، وهذا يخطر النظام بالعمل كعاكس مسار لذلك الجار.

ملاحظة: لمراجعة إتحادات BGP في Nexus، راجع تكوين إتحادات BGP على Nexus 9000

معلومات ذات صلة

- الدعم الفني والتنزيلات من Cisco