المحتويات

المقدمة

تعقب كائن vPC

الرسم التخطيطي للشبكة

أوامر إظهار الخط الأساسي

المقدمة

يصف هذا المستند تعقب كائن vPC، ولماذا يتم إستخدامه، وكيف يعمل.

تعقب كائن vPC

الرسم التخطيطي للشبكة

وفيما يلي الرسم التخطيطي للشبكة المستخدم لهذا العرض التوضيحي:

يعد إرتباط نظير vPC هو Port-channel 1. تعد Ethernet 5/1 هو إرتباط نظير-keepalive الخاص ب vPC.  هناك موجهان رئيسيان يتم توصيلهما عبر L3 /30 خطوة e3/3 و e3/4 على كل صندوق N7K.  تقوم N5KA و N5KB بمحاكاة محولات L2 vPC المتصلة على VPC 100 و vPC 101. N7KA هو الجهاز الأساسي vPC.

أوامر إظهار الخط الأساسي

N7KA:

N7KA-vdc2# show run vpc

!Command: show running-config vpc

!Time: Thu Sep 26 19:51:57 2013

version 6.1(4)

feature vpc

vpc domain 102

peer-keepalive destination 1.1.1.2 source 1.1.1.1 vrf vpc-keepalive

peer-gateway

track 1

auto-recovery

interface port-channel1

vpc peer-link

interface port-channel100

vpc 100

interface port-channel101

vpc 101

N7KA-vdc2# show run track

!Command: show running-config track

!Time: Thu Sep 26 19:51:59 2013

version 6.1(4)

track 1 list boolean or

object 2

object 3

object 4

track 2 interface port-channel1 line-protocol

track 3 interface Ethernet3/3 line-protocol

track 4 interface Ethernet3/4 line-protocol

N7KA-vdc2# show vpc brief

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 102

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : peer is alive

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : primary

Number of vPCs configured         : 2

Track object                      : 1

Peer Gateway                      : Enabled

Peer gateway excluded VLANs       : -

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1    Po1    up     1

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

100  Po100  up     success     success                    1

101  Po101  up     success     success                    1

N7KA-vdc2# show track

Track 1

List  Boolean or

Boolean or is UP

2 changes, last change 23:24:08

Track List Members:

object 4 UP

object 3 UP

object 2 UP

Tracked by:

vPCM                   102

Track 2

Interface port-channel1 Line Protocol

Line Protocol is UP

1 changes, last change 23:26:59

Tracked by:

Track List  1

Track 3

Interface Ethernet3/3 Line Protocol

Line Protocol is UP

3 changes, last change 23:26:50

Tracked by:

Track List  1

Track 4

Interface Ethernet3/4 Line Protocol

Line Protocol is UP

3 changes, last change 23:26:48

Tracked by:

Track List  1

N7KA-vdc2#

N7KB:

N7KB-vdc2# show run vpc

!Command: show running-config vpc

!Time: Thu Sep 26 19:53:17 2013

version 6.1(4)

feature vpc

vpc domain 102

peer-keepalive destination 1.1.1.1 source 1.1.1.2 vrf vpc-keepalive

peer-gateway

track 1

auto-recovery

interface port-channel1

vpc peer-link

interface port-channel100

vpc 100

interface port-channel101

vpc 101

N7KB-vdc2# show run track

!Command: show running-config track

!Time: Thu Sep 26 19:53:20 2013

version 6.1(4)

track 1 list boolean or

object 2

object 3

object 4

track 2 interface port-channel1 line-protocol

track 3 interface Ethernet3/3 line-protocol

track 4 interface Ethernet3/4 line-protocol

N7KB-vdc2# show vpc brief

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 102

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : peer is alive

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : secondary

Number of vPCs configured         : 2

Track object                      : 1

Peer Gateway                      : Enabled

Peer gateway excluded VLANs       : -

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1    Po1    up     1

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

100  Po100  up     success     success                    1

101  Po101  up     success     success                    1

N7KB-vdc2# show track

Track 1

List  Boolean or

Boolean or is UP

2 changes, last change 23:25:51

Track List Members:

object 4 UP

object 3 UP

object 2 UP

Tracked by:

vPCM                   102

Track 2

Interface port-channel1 Line Protocol

Line Protocol is UP

1 changes, last change 23:29:09

Tracked by:

Track List  1

Track 3

Interface Ethernet3/3 Line Protocol

Line Protocol is UP

3 changes, last change 23:28:55

Tracked by:

Track List  1

Track 4

Interface Ethernet3/4 Line Protocol

Line Protocol is UP

3 changes, last change 23:28:56

Tracked by:

Track List  1

N7KB-vdc2#

يتم إستخدام تعقب كائن vPC في سيناريو مثل هذا.  لديك وحدة M132 واحدة تستخدم مع إرتباط نظير vPC بالإضافة إلى وصلات L3 إلى المركز.  في حالة فقد الوحدة النمطية M132 بسبب فشل الأجهزة، ستفقد إرتباط نظير vPC بالإضافة إلى وصلات L3.  إذا حدث ذلك في المربع الثانوي ل vPC (N7KB)، فلن يكون ذلك مشكلة نظرا لأن النظير الأساسي للتشغيل قد يتغلب على إيقاف قنوات منفذ vPC وواجهات VLAN في المربع الثانوي للتشغيل.  المشكلة في حالة فشل HW على الجهاز الأساسي للتشغيل (N7KA). إذا لم تستخدم تعقب الكائنات، سنعلق جميع قنوات منفذ vPC على N7KB بالإضافة إلى واجهات Vlan.  وكان إرتباط النظير أيضا سيتوقف.  لن تكون لديك طريقة لتوجيه حركة مرور البيانات الأساسية إلى شبكات VLAN الخاصة بنا في هذا السيناريو.

يتتبع الكائنات الحصول على كل ما سبق عن طريق تخفيض vPC في الأساسي للتشغيل حتى لا نصل إلى هذا السيناريو حيث يتم إسقاط واجهات VLAN وقنوات منفذ vPC في المربع الذي يحتوي على الوصلات المتبقية إلى الأساس.

هنا ترون رسائل keepalive لنظير vPC باستخدام الإيثاناليزر:

N7KA# ethanalyzer local interface inband capture-filter "host 1.1.1.1 and host 1.1.1.2" limit-captured-frames 4

Capturing on inband

2013-09-26 20:01:09.629309      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  D

estination port: 3200

2013-09-26 20:01:09.954909      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  D

estination port: 3200

2013-09-26 20:01:10.639097      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  D

estination port: 3200

2013-09-26 20:01:10.954944      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  D

estination port: 3200

4 packets captured

N7KA#

N7KB# ethanalyzer local interface inband capture-filter "host 1.1.1.1 and host 1.1.1.2" limit-captured-frames 4

Capturing on inband

2013-09-26 20:00:22.606593      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  D

estination port: 3200

2013-09-26 20:00:22.922517      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  D

estination port: 3200

2013-09-26 20:00:23.616427      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  D

estination port: 3200

2013-09-26 20:00:23.922557      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  D

estination port: 3200

4 packets captured

N7KB#

الآن تقوم بمحاكاة فشل الوحدة 3 على N7KA عن طريق إيقاف تشغيل الوحدة:

N7KA# conf t

Enter configuration commands, one per line.  End with CNTL/Z.

N7KA(config)# poweroff mod 3

N7KA(config)# end

N7KA#

2013 Sep 26 20:03:25 N7KA %PLATFORM-2-PFM_MODULE_POWER_OFF: Manual power-off of Module 3  from Command Line Interface

السجلات:

N7KA:

2013 Sep 26 20:03:28 N7KA-vdc2 %ETHPORT-5-IF_DOWN_INITIALIZING: Interface port-channel1 is down (Initializing)

2013 Sep 26 20:03:28 N7KA-vdc2 %ETHPORT-5-IF_DOWN_MODULE_REMOVED: Interface Ethernet3/3 is down (module removed)

2013 Sep 26 20:03:28 N7KA-vdc2 %ETHPORT-5-IF_DOWN_MODULE_REMOVED: Interface Ethernet3/4 is down (module removed)

2013 Sep 26 20:03:28 N7KA-vdc2 %VPC-2-TRACK_INTFS_DOWN: In domain 102, vPC tracked interfaces down, suspending all vPCs and keep-alive

2013 Sep 26 20:03:28 N7KA-vdc2 %ETHPORT-5-IF_DOWN_NONE: Interface port-channel101 is down (None)

2013 Sep 26 20:03:28 N7KA-vdc2 %ETHPORT-5-IF_DOWN_NONE: Interface port-channel100 is down (None)

2013 Sep 26 20:03:28 N7KA-vdc2 %ETH_PORT_CHANNEL-5-PORT_DOWN: port-channel101: Ethernet4/7 is down

2013 Sep 26 20:03:28 N7KA-vdc2 %ETH_PORT_CHANNEL-5-PORT_DOWN: port-channel100: Ethernet4/6 is down

2013 Sep 26 20:03:28 N7KA-vdc2 %ETH_PORT_CHANNEL-5-FOP_CHANGED: port-channel101: first operational port changed from Ethernet4/7 to none

2013 Sep 26 20:03:28 N7KA-vdc2 %ETH_PORT_CHANNEL-5-FOP_CHANGED: port-channel100: first operational port changed from Ethernet4/6 to none

2013 Sep 26 20:03:28 N7KA-vdc2 %ETH_PORT_CHANNEL-5-PORT_DOWN: port-channel1: Ethernet3/1 is down

2013 Sep 26 20:03:28 N7KA-vdc2 %ETH_PORT_CHANNEL-5-PORT_DOWN: port-channel1: Ethernet3/2 is down

2013 Sep 26 20:03:28 N7KA-vdc2 %ETH_PORT_CHANNEL-5-FOP_CHANGED: port-channel1: first operational port changed from Ethernet3/1 to none

2013 Sep 26 20:03:28 N7KA-vdc2 %ETHPORT-5-IF_DOWN_PORT_CHANNEL_MEMBERS_DOWN: Interface port-channel1 is down (No operational members)

N7KB:

2013 Sep 26 20:02:39 N7KB-vdc2 %ETH_PORT_CHANNEL-5-FOP_CHANGED: port-channel1: first operational port changed from Ethernet3/1 to none

2013 Sep 26 20:02:40 N7KB-vdc2 %ETH_PORT_CHANNEL-5-PORT_DOWN: port-channel1: Ethernet3/2 is down

2013 Sep 26 20:02:40 N7KB-vdc2 %ETHPORT-5-IF_DOWN_LINK_FAILURE: Interface Ethernet3/2 is down (Link failure)

2013 Sep 26 20:02:45 N7KB-vdc2 %VPC-2-PEER_KEEP_ALIVE_RECV_FAIL: In domain 102, VPC peer keep-alive receive has failed

2013 Sep 26 20:02:45 N7KB-vdc2 %ETHPORT-5-IF_DOWN_PORT_CHANNEL_MEMBERS_DOWN: Interface port-channel1 is down (No operational members)

2013 Sep 26 20:02:45 N7KB-vdc2 %ETH_PORT_CHANNEL-5-PORT_DOWN: port-channel1: Ethernet3/1 is down

2013 Sep 26 20:02:45 N7KB-vdc2 %ETHPORT-5-IF_DOWN_LINK_FAILURE: Interface Ethernet3/1 is down (Link failure)

2013 Sep 26 20:02:45 N7KB-vdc2 %ETHPORT-5-IF_DOWN_PORT_CHANNEL_MEMBERS_DOWN: Interface port-channel1 is down (No operational members)

هلاء صرتو ما بقى غير بالحالة.  N7KA هو النظير الأساسي vPC، ولكنه يتوقف عن إرسال رسائل keepalive لنظير vPC إلى N7KB حتى لا يتم إيقاف N7KB مؤقتا.  N7KB هو النظام الوحيد الذي يحتوي على وصلات.

ملاحظة: يتصل E3/4 على N7KB بمنفذ VDC آخر على N7KA، وهذا هو السبب الذي أدى إلى تعطل هذا المنفذ أيضا.  النقطة هي أن أنت يتلقى تتبعت قارن فوق N7KB ولا شيء على N7KA لذلك هو توقف إرسال رسائل إلى N7KB على ال peer-keepalive خطوة.

خرج الإيثاناليزر من N7KA:

(لاحظ بعد TRACK_INTFS_DOWN syslog أننا لم نعد نرسل مضعفات نظير إلى N7KB، نحن نستلمها فقط من N7KB وهو 1.1.1.2)

2013-09-26 20:03:23.684887      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:23.685766      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:24.684863      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:24.685580      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013 Sep 26 20:03:25 N7KA-vdc2 %$ VDC-2 %$ %PLATFORM-2-PFM_MODULE_POWER_OFF: Manual power-off of Module 3  from Command Line Interface

2013 Sep 26 20:03:25 N7KA %$ VDC-1 %$ %PLATFORM-2-PFM_MODULE_POWER_OFF: Manual power-off of Module 3  from Command Line Interface

2013-09-26 20:03:25.684869      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:25.685771      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:26.684835      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:26.685716      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:27.690661      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:27.691367      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013 Sep 26 20:03:28 N7KA-vdc2 %$ VDC-2 %$ %PLATFORM-2-MOD_PWRDN: Module 3 powered down (Serial number JAF1703ALTD)

2013 Sep 26 20:03:28 N7KA %$ VDC-1 %$ %PLATFORM-2-MOD_PWRDN: Module 3 powered down (Serial number JAF1703ALTD)

2013 Sep 26 20:03:28 N7KA-vdc2 %$ VDC-2 %$ %VPC-2-TRACK_INTFS_DOWN: In domain 102, vPC tracked interfaces down, suspending all vPCs and keep-alive

2013-09-26 20:03:28.700594      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:29.700538      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:30.700603      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:31.710665      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:32.720601      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:33.715295      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:34.713112      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:03:35.713177      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

خرج الإيثاناليزر من N7KB:

2013-09-26 20:02:36.651007      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:36.651534      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:37.651053      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:37.651644      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:38.650967      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:38.651579      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:39.656523      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:39.657500      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

(Here we stop receiving keepalive messages from N7KA or 1.1.1.1):

2013-09-26 20:02:40.666531      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:41.666442      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:42.666479      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:43.676461      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:44.686478      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013 Sep 26 20:02:45 N7KB-vdc2 %$ VDC-2 %$ %VPC-2-PEER_KEEP_ALIVE_RECV_FAIL: In domain 102, VPC peer keep-alive receive has failed

2013-09-26 20:02:45.681050      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:46.678911      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:47.678918      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:02:48.678961      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

N7KA:

N7KA-vdc2# sh vpc brief

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 102

Peer status                       : peer link is down

vPC keep-alive status             : peer is alive

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : primary

Number of vPCs configured         : 2

Track object                      : 1

Peer Gateway                      : Enabled

Peer gateway excluded VLANs       : -

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1    Po1    down   -

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

100  Po100  down   success     success                    -

101  Po101  down   success     success                    -

N7KA-vdc2# show track

Track 1

List  Boolean or

Boolean or is DOWN

3 changes, last change 00:20:50

Track List Members:

object 4 DOWN

object 3 DOWN

object 2 DOWN

Tracked by:

vPCM                   102

Track 2

Interface port-channel1 Line Protocol

Line Protocol is DOWN

2 changes, last change 00:20:50

Tracked by:

Track List  1

Track 3

Interface Ethernet3/3 Line Protocol

Line Protocol is DOWN

4 changes, last change 00:20:50

Tracked by:

Track List  1

Track 4

Interface Ethernet3/4 Line Protocol

Line Protocol is DOWN

4 changes, last change 00:20:50

Tracked by:

Track List  1

N7KA-vdc2#

N7KB:

N7KB-vdc2# sh vpc brief

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 102

Peer status                       : peer link is down

vPC keep-alive status             : peer is alive

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : secondary, operational primary

Number of vPCs configured         : 2

Track object                      : 1

Peer Gateway                      : Enabled

Peer gateway excluded VLANs       : -

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1    Po1    down   -

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

100  Po100  up     success     success                    1

101  Po101  up     success     success                    1

N7KB-vdc2# sh track

Track 1

List  Boolean or

Boolean or is UP

2 changes, last change 23:57:10

Track List Members:

object 4 DOWN

object 3 UP

object 2 DOWN

Tracked by:

vPCM                   102

Track 2

Interface port-channel1 Line Protocol

Line Protocol is DOWN

2 changes, last change 00:22:04

Tracked by:

Track List  1

Track 3

Interface Ethernet3/3 Line Protocol

Line Protocol is UP

3 changes, last change 1d00h

Tracked by:

Track List  1

Track 4

Interface Ethernet3/4 Line Protocol

Line Protocol is DOWN

4 changes, last change 00:22:04

Tracked by:

Track List  1

N7KB-vdc2#

الآن يمكنك إستعادة الإعداد:

N7KA# conf t

Enter configuration commands, one per line.  End with CNTL/Z.

N7KA(config)# no poweroff mod 3

N7KA(config)# end

N7KA#

2013 Sep 26 20:26:53 N7KA %PLATFORM-2-PFM_MODULE_POWER_ON: Manual power-on of Module 3  from Command Line Interface

2013 Sep 26 20:26:56 N7KA %PLATFORM-2-MOD_DETECT: Module 3 detected (Serial number JAF1703ALTD) Module-Type 10 Gbps Ethernet XL Module Model N7K-M132XP-12L

2013 Sep 26 20:26:56 N7KA %PLATFORM-2-MOD_PWRUP: Module 3 powered up (Serial number JAF1703ALTD)

2013 Sep 26 20:26:56 N7KA %PLATFORM-5-MOD_STATUS: Module 3 current-status is MOD_STATUS_POWERED_UP

N7KA:

N7KA-vdc2# sh vpc brief

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 102

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : peer is alive

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : primary, operational secondary

Number of vPCs configured         : 2

Track object                      : 1

Peer Gateway                      : Enabled

Peer gateway excluded VLANs       : -

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1    Po1    up     1

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

100  Po100  up     success     success                    1

101  Po101  up     success     success                    1

N7KA-vdc2# sh track

Track 1

List  Boolean or

Boolean or is UP

4 changes, last change 00:01:44

Track List Members:

object 4 UP

object 3 UP

object 2 UP

Tracked by:

vPCM                   102

Track 2

Interface port-channel1 Line Protocol

Line Protocol is UP

3 changes, last change 00:01:40

Tracked by:

Track List  1

Track 3

Interface Ethernet3/3 Line Protocol

Line Protocol is UP

5 changes, last change 00:01:43

Tracked by:

Track List  1

Track 4

Interface Ethernet3/4 Line Protocol

Line Protocol is UP

5 changes, last change 00:01:44

Tracked by:

Track List  1

N7KA-vdc2#

N7KB:

N7KB-vdc2# sh vpc brief

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 102

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : peer is alive

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : secondary, operational primary

Number of vPCs configured         : 2

Track object                      : 1

Peer Gateway                      : Enabled

Peer gateway excluded VLANs       : -

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1    Po1    up     1

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

100  Po100  up     success     success                    1

101  Po101  up     success     success                    1

N7KB-vdc2# sh track

Track 1

List  Boolean or

Boolean or is UP

2 changes, last change 1d00h

Track List Members:

object 4 UP

object 3 UP

object 2 UP

Tracked by:

vPCM                   102

Track 2

Interface port-channel1 Line Protocol

Line Protocol is UP

3 changes, last change 00:02:07

Tracked by:

Track List  1

Track 3

Interface Ethernet3/3 Line Protocol

Line Protocol is UP

3 changes, last change 1d00h

Tracked by:

Track List  1

Track 4

Interface Ethernet3/4 Line Protocol

Line Protocol is UP

5 changes, last change 00:02:09

Tracked by:

Track List  1

N7KB-vdc2#

تفاصيل حول فشل Peer-keepalive في أجهزة الكمبيوتر الافتراضية:

أعد تشغيل الاختبار لترى ما يحدث مع إرتباط الكتابة على الأقران.

إرسال حزم keepliaves بشكل ثنائي الإتجاه - حاليا كل شيء قيد التشغيل:

2013-09-26 20:32:12.532319      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:12.533083      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:13.532485      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:13.533147      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

قم الآن بإيقاف تشغيل الوحدة النمطية M132 3 على N7KA مرة أخرى:

2013 Sep 26 20:32:14 N7KA %$ VDC-1 %$ %PLATFORM-2-PFM_MODULE_POWER_OFF: Manual power-off of Module 3  from Command Line Interface

2013 Sep 26 20:32:14 N7KA-vdc3 %$ VDC-3 %$ %PLATFORM-2-PFM_MODULE_POWER_OFF: Manual power-off of Module 3  from Command Line Interface

2013 Sep 26 20:32:14 N7KA-vdc2 %$ VDC-2 %$ %PLATFORM-2-PFM_MODULE_POWER_OFF: Manual power-off of Module 3  from Command Line Interface

2013-09-26 20:32:14.532364      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:14.533217      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:15.532453      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:15.533158      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:16.532452      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:16.536224      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013 Sep 26 20:32:17 N7KA %$ VDC-1 %$ %PLATFORM-2-MOD_PWRDN: Module 3 powered down (Serial number JAF1703ALTD)

2013 Sep 26 20:32:17 N7KA-vdc3 %$ VDC-3 %$ %PLATFORM-2-MOD_PWRDN: Module 3 powered down (Serial number JAF1703ALTD)

2013 Sep 26 20:32:16 N7KA-vdc2 %$ VDC-2 %$ %VPC-2-TRACK_INTFS_DOWN: In domain 102, vPC tracked interfaces down, suspending all vPCs and keep-alive

2013 Sep 26 20:32:17 N7KA-vdc2 %$ VDC-2 %$ %PLATFORM-2-MOD_PWRDN: Module 3 powered down (Serial number JAF1703ALTD)

الآن أنت ترى أن N7KB فقط (1.1.1.2) يرسل رسائل keepalive إلى N7KA (1.1.1.1):

2013-09-26 20:32:17.549161      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:18.549352      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:19.549294      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:20.549358      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:21.549303      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:32:22.549991      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

هنا أنت ترى الدولة على N7KB يظهر النظير keepalive فشل:

N7KB-vdc2# sh vpc brief

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 102

Peer status                       : peer link is down

vPC keep-alive status             : peer is not reachable through peer-keepalive

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : secondary, operational primary

Number of vPCs configured         : 2

Track object                      : 1

Peer Gateway                      : Enabled

Peer gateway excluded VLANs       : -

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1    Po1    down   -

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

100  Po100  up     success     success                    1

101  Po101  up     success     success                    1

N7KB-vdc2#

تبدأ الآن في تلقي رسائل نظير-keepalive من N7KA مرة أخرى بعد فترة وجيزة (90 ثانية):

<snip>

2013-09-26 20:33:42.630255      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:43.630199      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:44.630263      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:45.640201      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:46.650262      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:47.652445      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:47.660318      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:48.652768      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:48.653347      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:49.652409      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:49.652705      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:50.652423      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:50.652773      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:51.652401      1.1.1.1 -> 1.1.1.2      UDP Source port: 3200  Destination port: 3200

2013-09-26 20:33:51.652839      1.1.1.2 -> 1.1.1.1      UDP Source port: 3200  Destination port: 3200

ثم ترى الحالة الأخيرة على N7KB (إظهار النظير حي):

N7KB-vdc2# sh vpc brief

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 102

Peer status                       : peer link is down

vPC keep-alive status             : peer is alive

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : secondary, operational primary

Number of vPCs configured         : 2

Track object                      : 1

Peer Gateway                      : Enabled

Peer gateway excluded VLANs       : -

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Enabled (timeout = 240 seconds)

vPC Peer-link status

---------------------------------------------------------------------

id   Port   Status Active vlans

--   ----   ------ --------------------------------------------------

1    Po1    down   -

vPC status

----------------------------------------------------------------------

id   Port   Status Consistency Reason                     Active vlans

--   ----   ------ ----------- ------                     ------------

100  Po100  up     success     success                    1

101  Po101  up     success     success                    1

N7KB-vdc2#