المحتويات

المقدمة

المتطلبات الأساسية

المتطلبات

المكونات المستخدمة

معلومات أساسية

التكوين

جودة خدمة UCS بمجرد إخراج الجهاز من عبوته

تكوين جودة الخدمة الافتراضي

أمر واجهة show queuing

ميناء المنظمة الدولية للهجرة

show interface priority-flow-control

ماذا لو تم تمكين الفضة؟

ماذا لو صنعت الفضة؟

ماذا لو لم تكن الفضة قطرة؟

Nexus 5000 للتدفق

show running-config ipqos

إظهار واجهة قوائم الانتظار

show interface priority-flow-control

إضافة FCoE إلى التكوين

show interface priority-flow-control

PFC

لماذا لا تتفاوض PFC؟

يجب أن تتطابق سياسة جودة الخدمة No-Drop مع كل جانب.

يجب أن تتطابق جودة خدمة النظام على كل جانب

NetApp

ذهب

جودة الخدمة غير المتماثلة

جودة الخدمة (QoS) غير المعرفة

جودة خدمة بيئة الحوسبة الظاهرية (VCE)

المخازن المؤقتة الضحلة

المخازن المؤقتة الأكبر

9216 MTU مقابل 9000 MTU

PFC و PPP

استكشاف الأخطاء وإصلاحها

معلومات ذات صلة

المقدمة

يصف هذا المستند تكوين جودة الخدمة (QoS) داخل نظام الحوسبة الموحدة (UCS) وأجهزة Nexus.

المتطلبات الأساسية

المتطلبات

لا توجد متطلبات خاصة لهذا المستند.

المكونات المستخدمة

تستند المعلومات الواردة في هذا المستند إلى إصدارات البرامج والمكونات المادية التالية:

- الموصلات البينية الليفية UCS (Fi) 6100 و 6200

- Nexus 5000 و 5500

تم إنشاء المعلومات الواردة في هذا المستند من الأجهزة الموجودة في بيئة معملية خاصة. بدأت جميع الأجهزة المُستخدمة في هذا المستند بتكوين ممسوح (افتراضي). إذا كانت شبكتك قيد التشغيل، فتأكد من فهمك للتأثير المحتمل لأي أمر.

معلومات أساسية

يدور هذا المستند حول جودة خدمة UCS(6100 و 6200 Fabric Interconnect) و Nexus(5000 و 5500) المتعلقة تحديدا بتقنية FlexPod و vBlock.

المصطلحات المستخدمة في هذه الوثائق المتعلقة بجودة الخدمة.

CoS = فئة الخدمة = 802.1p = 3 وحدات بت في رأس .1q على كل حزمة لإخبار المحول بكيفية التصنيف.

QoS = جودة الخدمة = كيفية معالجة المحول لكل فئة من فئات الخدمة.

MTU = الحد الأقصى لوحدة الإرسال = الحد الأقصى لحجم الإطار/الحزمة المسموح بها على المحول. أكثر الأمور شيوعا وافتراضيا (عادي هو ما تبينه لقطة شاشة UCS أدناه) وهو 1500.

التكوين

جودة خدمة UCS بمجرد إخراج الجهاز من عبوته

إعدادات جودة خدمة UCS للمرجع (UCSM / LAN / فئة نظام جودة الخدمة):

ملاحظة: يتم تصنيف أفضل جهد وقناة ليفية إلى أجزاء ويتعذر تعطيلها داخل UCS.

تكوين جودة الخدمة الافتراضي

P10-UCS-A(nxos)# show running-config ipqos

logging level ipqosmgr 2

class-map type qos class-fcoe

class-map type queuing class-fcoe

match qos-group 1

class-map type queuing class-all-flood

match qos-group 2

class-map type queuing class-ip-multicast

match qos-group 2

policy-map type qos system_qos_policy

class class-fcoe

set qos-group 1

class class-default

policy-map type queuing system_q_in_policy

class type queuing class-fcoe

bandwidth percent 50

class type queuing class-default

bandwidth percent 50

policy-map type queuing system_q_out_policy

class type queuing class-fcoe

bandwidth percent 50

class type queuing class-default

bandwidth percent 50

class-map type network-qos class-fcoe

match qos-group 1

class-map type network-qos class-all-flood

match qos-group 2

class-map type network-qos class-ip-multicast

match qos-group 2

policy-map type network-qos system_nq_policy

class type network-qos class-fcoe

pause no-drop

mtu 2158

class type network-qos class-default

system qos

service-policy type qos input system_qos_policy

service-policy type queuing input system_q_in_policy

service-policy type queuing output system_q_out_policy

service-policy type network-qos system_nq_policy

معلومات ذات صلة:

- QoS-Group هي كيفية معالجة المحول داخليا CoS معينة. يمكنك إعتبار مجموعة جودة الخدمة (QoS) بمثابة دلو أو ممر تدخل فيه كل حزمة.

- أفضل جهد لا يحصل على مجموعة جودة خدمة صريحة، وبالتالي فإنه يكون افتراضيا على qos-group 0

- تتضمن القناة الليفية عبر شبكة إيثرنت (FCoE) CoS 3 ويتم وضعها في مجموعة جودة الخدمة (QoS) 1

ورقة الغش الخاصة بمجموعة جودة الخدمة <=>

CoS

مجموعة جودة الخدمة

بلاتينيوم

5

2

ذهب

4

3

فضة

2

4

برونز

1

5

بذل قصارى الجهود

أي

0

قناة ليفية

3

1

يمكن تغيير CoS إلى CoS 6 على UCS. CoS 7 محجوز للاتصالات الداخلية UCS.

أمر واجهة show queuing

P10-UCS-A(nxos)# show queuing interface

Ethernet1/1 queuing information:

TX Queuing

qos-group  sched-type  oper-bandwidth

0       WRR             50

1       WRR             50

RX Queuing

qos-group 0

q-size: 360640, HW MTU: 1500 (1500 configured)

drop-type: drop, xon: 0, xoff: 360640

Statistics:

Pkts received over the port             : 27957

Ucast pkts sent to the cross-bar        : 0

Mcast pkts sent to the cross-bar        : 27957

Ucast pkts received from the cross-bar  : 0

Pkts sent to the port                   : 347

Pkts discarded on ingress               : 0

Per-priority-pause status               : Rx (Inactive), Tx (Inactive)

qos-group 1

q-size: 79360, HW MTU: 2158 (2158 configured)

drop-type: no-drop, xon: 20480, xoff: 40320

Statistics:

Pkts received over the port             : 0

Ucast pkts sent to the cross-bar        : 0

Mcast pkts sent to the cross-bar        : 0

Ucast pkts received from the cross-bar  : 0

Pkts sent to the port                   : 0

Pkts discarded on ingress               : 0

Per-priority-pause status               : Rx (Inactive), Tx (Inactive)

Total Multicast crossbar statistics:

Mcast pkts received from the cross-bar      : 347

يبدي هذا إنتاج كيف هذا قارن يضع كل فئة في قائمة الانتظار.

معلومات حول Switchport Ethernet 1/1:

- يحصل أفضل الجهود على جودة الخدمة (QoS) المجموعة 0 وحجم Q (360640 بايت من المخازن المؤقتة ووحدة الحد الأقصى للنقل (MTU) تبلغ 1500.

- قام هذا المنفذ باستقبال/إستقبال 27957 حزمة من أفضل الجهود وتجاوز/إرسال 347 حزمة.

- "PKTS التي تم تجاهلها عند الدخول" هي عدد الحزم التي تم استقبالها ولكن خلال تلك اللحظة كان المخزن المؤقت (حجم Q) ممتلئا وقرر المحول تجاهل، وهذا يعرف أيضا بإسقاط الذيل.

ميناء المنظمة الدولية للهجرة

أبديت قائمة انتظار قارن لمنافذ وحدات الإدخال والإخراج النمطية (IOM) في هيكل UCS:

Ethernet1/1/1 queuing information:

Input buffer allocation:

Qos-group: 1

frh: 3

drop-type: no-drop

cos: 3

xon       xoff      buffer-size

---------+---------+-----------

8960      14080     24320

Qos-group: 0

frh: 8

drop-type: drop

cos: 0 1 2 4 5 6

xon       xoff      buffer-size

---------+---------+-----------

0         117760    126720

Queueing:

queue    qos-group    cos            priority  bandwidth mtu

--------+------------+--------------+---------+---------+----

2        0            0 1 2 4 5 6     WRR        50      1600

3        1            3               WRR        50      2240

Queue limit: 66560 bytes

Queue Statistics:

queue  rx              tx

------+---------------+---------------

2      18098           28051

3      0               0

Port Statistics:

rx drop         rx mcast drop   rx error        tx drop         mux ovflow

---------------+---------------+---------------+---------------+--------------

0               0               0               0                InActive

Priority-flow-control enabled: yes

Flow-control status:

cos     qos-group   rx pause  tx pause  masked rx pause

-------+-----------+---------+---------+---------------

0              0    xon       xon       xon

1              0    xon       xon       xon

2              0    xon       xon       xon

3              1    xon       xon       xon

4              0    xon       xon       xon

5              0    xon       xon       xon

6              0    xon       xon       xon

7            n/a    xon       xon       xon

هناك QoS-group 0 و QoS-Group 1، تحصل QoS-Group 0 على الحزم المميزة مع CoS 0 1 2 4 5 6، و QoS-Group 1 get CoS 3. حجم المخزن المؤقت على موسع الموصلات البينية (FEX)/IOMs أصغر بقليل وهو 126720 بايت فقط. يقوم نظام FEX بتغيير جودة الخدمة بشكل طفيف ويأخذ مجموعات جودة الخدمة المتعددة ويحزمها في قائمة انتظار. يمكن رؤية عدادات Rx و tx لكل قائمة انتظار.

show interface priority-flow-control

آخر مخرجات السحب هي: show interface priority-flow-control

P10-UCS-A(nxos)# show interface priority-flow-control

============================================================

Port               Mode Oper(VL bmap)  RxPPP      TxPPP

============================================================

Ethernet1/1        Auto Off           0          0

Ethernet1/2        Auto Off           0          0

Ethernet1/3        Auto Off           0          0

Ethernet1/4        Auto Off           6          0

Ethernet1/5        Auto Off           0          0

Ethernet1/6        Auto Off           0          0

Ethernet1/7        Auto Off           0          0

Ethernet1/8        Auto Off           0          0

Ethernet1/9        Auto Off           0          0

Ethernet1/10       Auto Off           2          0

..snip..

Vethernet733       Auto Off           0          0

Vethernet735       Auto Off           0          0

Vethernet737       Auto Off           0          0

Ethernet1/1/1      Auto On  (8)       0          0

Ethernet1/1/2      Auto Off           0          0

Ethernet1/1/3      Auto On  (8)       0          0

Ethernet1/1/4      Auto Off           0          0

هذا يظهر على الواجهات التي يتفاوض عليها التحكم في تدفق الأولوية (PFC) (تشغيل تلقائي) والواجهات التي لا تتفاوض PFC عليها (إيقاف التشغيل التلقائي). PFC هي طريقة لمحول ما ليطلب من محول مجاور ألا يرسل حزم من CoS معينة لفترة قصيرة من الوقت. تحدث حالات إيقاف PFC (PPP، لكل حالة توقف ذات أولوية) عندما تكون المخازن المؤقتة ممتلئة/شبه ممتلئة. يخبرنا إخراج 'show cdp neighbors' و'show fex details' أن شبكة إيثرنت هذه من الإصدار 1/1-4 قد انخفضت إلى نظام FEX/IOM الخاص بالهيكل 1 وأن شبكة إيثرنت من الإصدار 1/9-10 تصل إلى الطراز Nexus 5000. في هذا الإخراج تم إرسال 6 توقفات إلى FEX/IOM على شبكة إيثرنت 1/4 وتم إرسال توقفين عبر شبكة إيثرنت 1/10 إلى Nexus 5000 في الخادم.

- إن معادلات القوة الشرائية في حد ذاتها ليست بالأمر السيئ!

ملاحظة: نظرا لأن FEX/IOM ليست في الواقع محولات PFC لا تتفاوض فيما بينها على Ethernet1/1-4 ولكن يمكنها التفاوض إلى نقطة النهاية Ethernet1/1/1. يتم إرسال نقاط الوصول إلى PPPs المرسلة إلى FEX/IOM عبر المحول البعيد Ethernet1/1/1.

هذا ما تبدو عليه جودة خدمة UCS خارج العبوة...

ماذا لو تم تمكين الفضة؟

وينتج عن ذلك تكوين:

class-map type qos class-fcoe

class-map type qos match-all class-silver match cos 2 class-map type queuing class-silver match qos-group 4

class-map type queuing class-all-flood

match qos-group 2

class-map type queuing class-ip-multicast

match qos-group 2

policy-map type qos system_qos_policy

class class-silver set qos-group 4

policy-map type queuing system_q_in_policy

class type queuing class-silver bandwidth percent 44

class type queuing class-fcoe

bandwidth percent 29

class type queuing class-default

bandwidth percent 27

policy-map type queuing system_q_out_policy

class type queuing class-silver bandwidth percent 44

class type queuing class-fcoe

bandwidth percent 29

class type queuing class-default

bandwidth percent 27

policy-map type queuing org-root/ep-qos-Default-Qos

class type queuing class-fcoe

class type queuing class-default

bandwidth percent 50

shape 40000000 kbps 10240

class-map type network-qos class-silver match qos-group 4class-map type network-qos class-all-flood

match qos-group 2

class-map type network-qos class-ip-multicast

match qos-group 2

policy-map type network-qos system_nq_policy

class type network-qos class-silver

class type network-qos class-fcoe

pause no-drop

mtu 2158

class type network-qos class-default

system qos

service-policy type qos input system_qos_policy

service-policy type queuing input system_q_in_policy

service-policy type queuing output system_q_out_policy

service-policy type network-qos system_nq_policy

Ethernet1/1 queuing information:

TX Queuing

qos-group  sched-type  oper-bandwidth

0       WRR             27

1       WRR             29

4       WRR             44

RX Queuing

qos-group 0

q-size: 308160, HW MTU: 9216 (9216 configured)

drop-type: drop, xon: 0, xoff: 301120

Statistics:

Pkts received over the port             : 12

Ucast pkts sent to the cross-bar        : 12

Mcast pkts sent to the cross-bar        : 0

Ucast pkts received from the cross-bar  : 17

Pkts sent to the port                   : 17

Pkts discarded on ingress               : 0

Per-priority-pause status               : Rx (Inactive), Tx (Inactive)

qos-group 1

q-size: 79360, HW MTU: 2158 (2158 configured)

drop-type: no-drop, xon: 20480, xoff: 40320

Statistics:

Pkts received over the port             : 7836003

Ucast pkts sent to the cross-bar        : 7836003

Mcast pkts sent to the cross-bar        : 0

Ucast pkts received from the cross-bar  : 4551954

Pkts sent to the port                   : 4551954

Pkts discarded on ingress               : 0

Per-priority-pause status               : Rx (Inactive), Tx (Inactive)

qos-group 4 q-size: 22720, HW MTU: 1500 (1500 configured)

drop-type: drop, xon: 0, xoff: 22720

Statistics:

Pkts received over the port             : 0

Ucast pkts sent to the cross-bar        : 0

Mcast pkts sent to the cross-bar        : 0

Ucast pkts received from the cross-bar  : 0

Pkts sent to the port                   : 0

Pkts discarded on ingress               : 0

Per-priority-pause status               : Rx (Inactive), Tx (Inactive)

لاحظ أن أفضل جهد (QoS-Group 0) قد انتقل حجم q من 360640 إلى 308160 لأن Silver (Qos-Group 4) تم تخصيصها 22720 لمساحة المخازن المؤقتة.

ماذا لو صنعت الفضة؟

تعيين MTU إلى 9216.

Ethernet1/1 queuing information:

TX Queuing

qos-group  sched-type  oper-bandwidth

0       WRR             27

1       WRR             29

4       WRR             44

RX Queuing

qos-group 0

q-size: 301120, HW MTU: 9216 (9216 configured)

drop-type: drop, xon: 0, xoff: 301120

Statistics:

Pkts received over the port             : 3

Ucast pkts sent to the cross-bar        : 3

Mcast pkts sent to the cross-bar        : 0

Ucast pkts received from the cross-bar  : 0

Pkts sent to the port                   : 0

Pkts discarded on ingress               : 0

Per-priority-pause status               : Rx (Inactive), Tx (Inactive)

qos-group 1

q-size: 79360, HW MTU: 2158 (2158 configured)

drop-type: no-drop, xon: 20480, xoff: 40320

Statistics:

Pkts received over the port             : 7842224

Ucast pkts sent to the cross-bar        : 7842224

Mcast pkts sent to the cross-bar        : 0

Ucast pkts received from the cross-bar  : 4555791

Pkts sent to the port                   : 4555791

Pkts discarded on ingress               : 0

Per-priority-pause status               : Rx (Inactive), Tx (Inactive)

qos-group 4

q-size: 29760, HW MTU: 9216 (9216 configured)

drop-type: drop, xon: 0, xoff: 29760

Statistics:

Pkts received over the port             : 0

Ucast pkts sent to the cross-bar        : 0

Mcast pkts sent to the cross-bar        : 0

Ucast pkts received from the cross-bar  : 0

Pkts sent to the port                   : 0

Pkts discarded on ingress               : 0

Per-priority-pause status               : Rx (Inactive), Tx (Inactive)

وتحصل تقنية Silver(QoS-Group 4) الآن على حجم يبلغ 29760 q، بزيادة عن عام 22720.

ماذا لو لم تكن الفضة قطرة؟

هل تريد إلغاء تحديد إعداد إسقاط الحزمة؟

Ethernet1/1 queuing information:

TX Queuing

qos-group  sched-type  oper-bandwidth

0       WRR             27

1       WRR             29

4       WRR             44

RX Queuing

qos-group 0

q-size: 240640, HW MTU: 9216 (9216 configured)

drop-type: drop, xon: 0, xoff: 240640

Statistics:

Pkts received over the port             : 20

Ucast pkts sent to the cross-bar        : 20

Mcast pkts sent to the cross-bar        : 0

Ucast pkts received from the cross-bar  : 1

Pkts sent to the port                   : 1

Pkts discarded on ingress               : 0

Per-priority-pause status               : Rx (Inactive), Tx (Inactive)

qos-group 1

q-size: 79360, HW MTU: 2158 (2158 configured)

drop-type: no-drop, xon: 20480, xoff: 40320

Statistics:

Pkts received over the port             : 7837323

Ucast pkts sent to the cross-bar        : 7837323

Mcast pkts sent to the cross-bar        : 0

Ucast pkts received from the cross-bar  : 4552726

Pkts sent to the port                   : 4552726

Pkts discarded on ingress               : 0

Per-priority-pause status               : Rx (Inactive), Tx (Inactive)

qos-group 4 q-size: 90240, HW MTU: 9216 (9216 configured)

drop-type: no-drop, xon: 17280, xoff: 37120

Statistics:

Pkts received over the port             : 0

Ucast pkts sent to the cross-bar        : 0

Mcast pkts sent to the cross-bar        : 0

Ucast pkts received from the cross-bar  : 0

Pkts sent to the port                   : 0

Pkts discarded on ingress               : 0

Per-priority-pause status               : Rx (Inactive), Tx (Inactive)

لاحظ زيادة الحجم الفضي (QoS-Group 4) إلى 90240 وتغييرات نوع الإسقاط إلى عدم الإسقاط، ويتم تقليل أفضل جهد QoS-Group 0 إلى 240640.

يتم إعادة تخصيص مساحة المخزن المؤقت ل QoS-Group 0 التي تتطلب أفضل جهد لفئات جودة الخدمة الأخرى.

Nexus 5000 للتدفق

تكوينات جودة الخدمة الافتراضية من Nexus 5000 متشابهة ولكنها غير دقيقة.

show running-config ipqos

P10-5k-a# show running-config ipqos

policy-map type network-qos jumbo

class type network-qos class-fcoe

pause no-drop

mtu 2158

class type network-qos class-default

mtu 9216

multicast-optimize

system qos

service-policy type network-qos jumbo

يخفي Nexus 5000 الخيارات الافتراضية، لذلك يلزم show running-config ipqos بالكامل للاطلاع على التكوين الكامل.

إظهار واجهة قوائم الانتظار

P10-5k-a# show queuing interface

Ethernet1/1 queuing information:

TX Queuing

qos-group  sched-type  oper-bandwidth

0       WRR            100

1       WRR              0

RX Queuing

qos-group 0

q-size: 360640, HW MTU: 9216 (9216 configured)

drop-type: drop, xon: 0, xoff: 360640

Statistics:

Pkts received over the port             : 16

Ucast pkts sent to the cross-bar        : 16

Mcast pkts sent to the cross-bar        : 0

Ucast pkts received from the cross-bar  : 0

Pkts sent to the port                   : 0

Pkts discarded on ingress               : 0

Per-priority-pause status               : Rx (Inactive), Tx (Inactive)

qos-group 1

q-size: 79360, HW MTU: 2158 (2158 configured)

drop-type: no-drop, xon: 20480, xoff: 40320

Statistics:

Pkts received over the port             : 0

Ucast pkts sent to the cross-bar        : 0

Mcast pkts sent to the cross-bar        : 0

Ucast pkts received from the cross-bar  : 0

Pkts sent to the port                   : 0

Pkts discarded on ingress               : 0

Per-priority-pause status               : Rx (Inactive), Tx (Inactive)

show interface priority-flow-control

تتضمن المنافذ الموجودة أسفل إلى UCS (Ethernet1/1 - 2) إيقاف تشغيل PFC (إيقاف التشغيل التلقائي).

P10-5k-a(config-if-range)# show interface priority-flow-control

============================================================

Port               Mode Oper(VL bmap)  RxPPP      TxPPP

============================================================

Ethernet1/1        Auto Off           0          0

Ethernet1/2        Auto Off           0          0

Ethernet1/3        Auto Off           0          0

Ethernet1/4        Auto Off           0          0

Ethernet1/5        Auto Off           0          0

Ethernet1/6        Auto Off           0          0

Ethernet1/7        Auto Off           0          0

Ethernet1/8        Auto Off           0          0

Ethernet1/9        Auto Off           0          0

Ethernet1/10       Auto On  (0)       0          0

Ethernet1/11       Auto On  (0)       0          0

Ethernet1/12       Auto On  (0)       0          0

Ethernet1/13       Auto On  (0)       0          0

..snip..

إضافة FCoE إلى التكوين

هذه السياسات موجودة بشكل افتراضي على Nexus 5000 ولكنها غير ممكنة، لذلك عليك إستخدامها فقط.

system qos

service-policy type queuing input fcoe-default-in-policy

service-policy type queuing output fcoe-default-out-policy

service-policy type qos input fcoe-default-in-policy

show interface priority-flow-control

تتضمن المنافذ الواقعة أسفل إلى UCS (Ethernet1/1 - 2) تشغيل PFC (تشغيل تلقائي).

P10-5k-a(config-sys-qos)# sh int priority-flow-control

============================================================

Port               Mode Oper(VL bmap)  RxPPP      TxPPP

============================================================

Ethernet1/1        Auto On  (8)       0          0

Ethernet1/2        Auto On  (8)       0          0

Ethernet1/3        Auto Off           0          0

Ethernet1/4        Auto Off           0          0

..snip..

PFC

PFC(802.1Qbb) هي الطريقة التي تنشئ بها أجهزة Nexus/UCS بنية دون فقدان كجزء من تقنية التوصيل بين مراكز البيانات (dCBX). تتطلب تقنية القنوات الليفية عبر شبكة إيثرنت (FCoE) بنية بدون فقدان، كما أن تقنية القنوات الليفية عبر شبكة إيثرنت (FCoE) متعددة الخطوات عرضة بشكل خاص لمشكلة التكوين هذه. يجب أن يطابق محول الخادم، عادة Nexus 5000، إعدادات جودة الخدمة التي تم تكوينها على UCS.

وكما ذكر سابقا PFC هي طريقة لأن تقوم المحولات بإعلام المحولات المجاورة بالتوقف لإرسال إطارات إضافية. فكر في هذا في السياق الخاص ببيئة شبكة محول متعدد مع حركة مرور تنتقل إلى العديد من الاتجاهات في وقت واحد، ولا يقوم هذا بإضافة مخازن مؤقتة للمسار 1(source1/destination1) هذا هو ضرب المخازن المؤقتة لأن المحول المجاور على الأرجح لديه حركة مرور تقوم بإدخال منافذ متعددة (مخازن متعددة). على الرغم من أن خيار PFC غير مطلوب عند إستخدام تخزين IP، إلا أنه غالبا ما يساعد على تحسين الأداء بشكل كبير بسبب تأثير مضاعفة المخزن المؤقت هذا الذي يمنع فقدان الحزم بشكل غير ضروري.

نظرة عامة ممتازة على PFC/DCBX.

لماذا لا تتفاوض PFC؟

يجب أن تتطابق سياسة جودة الخدمة No-Drop مع كل جانب.

إذا تم تعريف فئة جودة الخدمة على محول واحد على أنه لا إسقاط وليس على أنه لا إسقاط على الآخر، فإن PFC لا تتفاوض. ونظرا لأن UCS يقوم بتكوين البلاتين على أنه لا إسقاط ولكنه معطل خارج المربع، فإن هذا يحدث غالبا عند تمكين البلاتين.

يجب أن تتطابق جودة خدمة النظام على كل جانب

في حالة عدم تطابق إدخال قائمة الانتظار وإخراج قائمة الانتظار وإدخال جودة الخدمة، لا تتفاوض PFC.

NetApp

ذهب

تقوم عوامل تصفية NetApp بشكل افتراضي بإرسال حركة مرور تخزين IP التي هي شبكات VLAN التي تم وضع علامة عليها بواسطة NetApp في CoS 4(Gold). بما أن وحدات بت CoS موجودة في رأس .1q عندما يكون NetApp متصلا بحركة مرور NetApp لمنفذ وصول يتم وضعها في أفضل جهد.

جودة الخدمة غير المتماثلة

من أخطاء التكوين الشائعة إختيار لون COs آخر (فضي) لوضع حركة مرور NFS لنظام ملفات الشبكة من UCS في حركة مرور NFS وإعادتها من NetApp الذي تم وضعه في Gold. وبالتالي حركة المرور هي شيء من هذا القبيل:

الخادم

UCS

Nexus 5k

NetApp

إرسال

فضة >

فضة >

بذل قصارى الجهود

نستلم

< الذهب

< الذهب

< الذهب

إذا تم تكوين UCS ليكون Jumbo من Silver وليس من Gold، فإن ذلك قد يتسبب في حدوث مشاكل.

جودة الخدمة (QoS) غير المعرفة

عند عدم تمكين فئة جودة الخدمة (البلاتين/الذهب/الفضة/البرونز)، تتعامل UCS وأجهزة Nexus مع هذه الحزم كأفضل جهد وتضعها في مجموعة جودة الخدمة 0.

الخادم

UCS

Nexus 5k

NetApp

إرسال

فضة >

أفضل الجهود >

بذل قصارى الجهود

نستلم

< الذهب

< بذل قصارى الجهود

< الذهب

ملاحظة: لا يتم تغيير/وضع علامة على وحدات بت لبروتوكول التحكم في الوصول (CoS) على الحزمة، ولكن تتم معالجة الحزم بشكل مختلف.

جودة خدمة بيئة الحوسبة الظاهرية (VCE)

تصميم جودة خدمة VCE أقل من مثالي.

Nexus 1k

UCS

Nexus 5k

BE / CoS 0

1500

1500

1600

FC / CoS 1

-

2158(بدون إسقاط)

-

CoS 6

mgmt

-

-

البلاتين / CoS 5

-

1500(بدون إسقاط)

1500

الذهب / CoS 4

زفير

1500

1500

فضي / CoS 2

NFS

-

9216(لا إسقاط)

إذا كان لديك فئات من ضابط الصف معرفة في مستوى واحد، لكن تجاهلها في مستوى آخر معقد ويمكن أن تجعل الأشياء لا تعمل بالطريقة التي كانت مقصودة. على سبيل المثال، VCE يستخدم فضة لبروتوكول NFS، ولكن إذا لم يكن UCS يحتوي على علامة فضية محددة، يتم وضع حركة المرور هذه في قائمة انتظار "أفضل الجهود" التي ليست Jumbo ويمكن أن تتسبب في إسقاط حركة مرور NFS أو تجزئتها. لا يتم التفاوض على PFC بسبب عدم التطابقات في سياسات عدم الإسقاط، ولكن من الواضح أن هذا موافق لأن PFC غير مطلوب لشبكة إيثرنت.

المخازن المؤقتة الضحلة

تكون بروتوكولات التخزين المستندة إلى بروتوكول الإنترنت (IP) عبارة عن بروتوكولات قابلة للتشغيل للغاية ويتم تكوينها غالبا باستخدام 9000 MTU. وعلى هذا النحو، يكون أداؤها سيئا في مستوى البلاتين/الذهب/الفضة/البرونز بسبب حجم الشاشة الذي يبلغ 29760 Q / 9000 MTU حيث يسمح فقط بإدخال 3 حزم في المخزن المؤقت قبل حدوث السقوط من الذيل.

المخازن المؤقتة الأكبر

تسمح سياسة إيثرنت UCS بزيادة وحدات التخزين المؤقت لبطاقة واجهة الشبكة (NIC) (حجم الحلقة). الإعداد الافتراضي هو 512 والحد الأقصى هو 4096. إذا قمت بتغيير هذه القيمة إلى الحد الأقصى، فسيزداد زمن انتقال المخزن المؤقت الكامل(##kb / 10Gbps) من 0.4 مللي ثانية إلى 3.2 مللي ثانية. وبالتالي فإن التغييرات في هذا المخزن المؤقت تسمح بقدر أقل من حالات السقوط، ولكن على حساب زمن الوصول المتزايد.

9216 MTU مقابل 9000 MTU

النقطة من تكوين إطارات Jumbo هي السماح لجهاز نقطة نهاية بالتحدث إلى جهاز نقطة نهاية آخر باستخدام حزم 9000 بايت من الطبقة 3. عند إستخدام تقنيات التضمين من الطبقة 2، يلزم أن تكون المحولات والموجهات بين أجهزة نقاط النهاية قادرة على معالجة إطارات أكبر قليلا من الطبقة 2 من حزم 9000 MTU من الطبقة 3 لحساب مصروفات التضمين. عندما يكون هناك شك في السماح بوجود 9216 وحدة الحد الأقصى للنقل (MTU) على المحولات.

PFC و PPP

مع وضع الحزم الجديدة في قائمة الانتظار، يقوم المخزن المؤقت بتعبئة.

عندما يصل المخزن المؤقت إلى 20 ألف، يستمر المخزن المؤقت في التعبئة.

عندما يصل المخزن المؤقت إلى سرعة 40 كيلو، يرسل المحول إيقاف PPP مؤقتا إذا كانت قائمة الانتظار هذه هي no-drop، بينما يشير إلى المحول البعيد أن يتوقف لإرسال حركة مرور البيانات.

ومن الناحية المثالية، يتوقف الجانب البعيد سريعا لإرسال حركة المرور، فيما يحتفظ الجزء المتبقي من المخزن المؤقت (79360-40320) بالحزم الواردة أثناء الطيران.

"PKTS التي تم تجاهلها عند الدخول" تزداد عند امتلاء المخزن المؤقت.

تعد FC و FCoE بروتوكولا بدون فقدان في وضع مثالي حيث يتوقف المحول عن بعد لإرسال حركة مرور البيانات ومستويات المخزن المؤقت في نهاية المطاف إلى انخفاض وبسرعة تبلغ 20 آلاف لفة في الدقيقة. يرسل المحول أداة PPP أخرى لإلغاء الإيقاف المؤقت لقائمة الانتظار هذه التي لا تسقط والتي تخبر المحول البعيد ببدء إرسال حركة مرور البيانات مرة أخرى.

استكشاف الأخطاء وإصلاحها

هناك حاليا ما من خاص أستكشاف الأخطاء وإصلاحها معلومة يتوفر ل هذا تشكيل.

معلومات ذات صلة

- دليل إدارة شبكة UCS Manager، الإصدار 4.0

- دليل تكوين جودة الخدمة ل Nexus 5000 Series

- UCS مع ESXi من VMware كمثال شامل لتكوين وحدة الحد الأقصى للنقل (MTU)

- الدعم التقني والمستندات - Cisco Systems