المحتويات

المقدمة

المتطلبات الأساسية

المتطلبات

المكونات المستخدمة

المشكلة

أستكشاف الأخطاء وإصلاحها والتحقق من الصحة

الحل

مناقشات مجتمع دعم Cisco ذات الصلة

المقدمة

يتم إستخدام حزمة EtherChannel لتوفير منافذ ربط النطاق الترددي العالي. يناقش هذا مادة تحديد يطبق على cisco EtherChannels على مادة حفازة 6500 مفتاح يركض مشرف 720 مع PFC3A، PFC3B أو PFC3BXL أن يستطيع سببت تجاوز أن يزيد على EtherChannel عضو قارن. ويرتبط هذا التحديد بمحرك إعادة توجيه الطبقة 2 وبالتالي يطبق فقط على EtherChannels الطبقة 2.

المتطلبات الأساسية

المتطلبات

لا توجد متطلبات خاصة لهذا المستند.

المكونات المستخدمة

أسست المعلومة في هذا وثيقة على cisco مادة حفازة 6500 sery مفتاح أن يركض مشرف محرك 720. تم إستخدام WS-X6704-10GE في إعداد هذا المختبر.WS-X6704-10GE هو وحدة Catalyst 6500 مع عدم الإفراط في الاشتراك وبها إتصالين بقنوات ليفية بسرعة 20 جيجابت في الثانية لكل منهما.

تم إنشاء المعلومات الواردة في هذا المستند من الأجهزة الموجودة في بيئة معملية خاصة. بدأت جميع الأجهزة المُستخدمة في هذا المستند بتكوين ممسوح (افتراضي). إذا كانت شبكتك مباشرة، فتأكد من فهمك للتأثير المحتمل لأي أمر.

المشكلة

مادة حفازة 6500 أمكن خبرت قارن overrun عندما طبقة 2 يوزع EtherChannel (DEC) شكلت. DEC هو EtherChannel عبر وحدتين أو أكثر من وحدات بطاقة إعادة التوجيه الموزعة (DFC). لا يعتبر EtherChannel مع 2 عضو قارن يربط على ال نفسه linecard غير أن على قناة بناء مختلفة.

تجاوز عدد الحسابات العكسية لمرات تعذر فيها على جهاز المستقبل تسليم البيانات المستلمة إلى مخزن مؤقت للجهاز. وبمعنى آخر، تجاوز معدل الإدخال لحركة المرور قدرة المستقبل على معالجة البيانات.

في حالات معينة، توفر DFC إمكانية إعادة حساب الحزم. يمكن إستخدام إعادة الحساب لإجراء عمليات بحث إضافية في قائمة التحكم في الوصول (ACL) أو ذاكرة الوصول إلى المحتوى الثانوي لجودة الخدمة (TCAM) أو جدول NetFlow أو جدول TCAM لقاعدة معلومات إعادة التوجيه (FIB). تحدث إعادة حساب الحزمة فقط على تدفق حزمة معين؛ ولا تتأثر تدفقات الحزم الأخرى. تحدث إعادة كتابة الحزمة على الوحدات النمطية، ثم تتم إعادة توجيه الحزم مرة أخرى إلى بطاقة ميزة السياسة (PFC) لمزيد من المعالجة.

عند إستخدام طبقة 2 DEC، يلزم إعادة حساب الحزمة في وحدة المدخل النمطية أثناء إعادة توجيه الحزم.  يتطلب أيضا إعادة تركيب ل multi-module L2 EtherChannel إن يتم تشغيل Catalyst 6500 في وضع التدفق-through مع وضع PFC 3B/3BXL.

يتوفر هنا المزيد من المعلومات حول وضع التدفق عبر.

يمكن أن يبدأ عداد التجاوز في الزيادة عندما يصل إستخدام البنية إلى حوالي 50٪.

أستكشاف الأخطاء وإصلاحها والتحقق من الصحة

1) اكتشف العضو قارن في EtherChannel يواجه زيادة تجاوز.

6500#show etherchannel summary

Flags:  D - down        P - bundled in port-channel

I - stand-alone s - suspended

H - Hot-standby (LACP only)

R - Layer3      S - Layer2

U - in use      N - not in use, no aggregation

f - failed to allocate aggregator

M - not in use, no aggregation due to minimum links not met

m - not in use, port not aggregated due to minimum links not met

u - unsuitable for bundling

d - default port

w - waiting to be aggregated

Number of channel-groups in use: 2

Number of aggregators:           2

Group  Port-channel  Protocol    Ports

------+-------------+-----------+-----------------------------------------------

10     Po10(SU)         -        Te2/1(P)       Te3/1(P)

20     Po20(SU)         -        Te2/2(P)       Te3/2(P)

2) التحقق من معدل الإدخال وعدادات التجاوز على واجهات الأعضاء.

6500#show interfaces tenGigabitEthernet 2/1

TenGigabitEthernet2/1 is up, line protocol is up (connected)

Hardware is C6k 10000Mb 802.3, address is 0002.fcc1.21ac (bia 0002.fcc1.21ac)

MTU 1500 bytes, BW 10000000 Kbit, DLY 10 usec,

reliability 255/255, txload 1/255, rxload 251/255

Encapsulation ARPA, loopback not set

Keepalive set (10 sec)

Full-duplex, 10Gb/s, media type is 10Gbase-SR

input flow-control is on, output flow-control is off

ARP type: ARPA, ARP Timeout 04:00:00

Last input never, output 00:00:51, output hang never

Last clearing of "show interface" counters 00:00:13

Input queue: 0/2000/5597178/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue: 0/40 (size/max)

30 second input rate 9868906000 bits/sec, 822409 packets/sec

30 second output rate 3000 bits/sec, 5 packets/sec

10968368 packets input, 16452552000 bytes, 0 no buffer

Received 0 broadcasts (0 multicasts)

0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 5597195 overrun, 0 ignored

0 watchdog, 0 multicast, 0 pause input

0 input packets with dribble condition detected

79 packets output, 5596 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 babbles, 0 late collision, 0 deferred

0 lost carrier, 0 no carrier, 0 PAUSE output

0 output buffer failures, 0 output buffers swapped out

6500#show interfaces tenGigabitEthernet 2/2

TenGigabitEthernet2/2 is up, line protocol is up (connected)

Hardware is C6k 10000Mb 802.3, address is 0002.fcc1.21ad (bia 0002.fcc1.21ad)

MTU 1500 bytes, BW 10000000 Kbit, DLY 10 usec,

reliability 255/255, txload 1/255, rxload 251/255

Encapsulation ARPA, loopback not set

Keepalive set (10 sec)

Full-duplex, 10Gb/s, media type is 10Gbase-SR

input flow-control is on, output flow-control is off

ARP type: ARPA, ARP Timeout 04:00:00

Last input never, output 00:00:26, output hang never

Last clearing of "show interface" counters 00:00:03

Input queue: 0/2000/45043/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue: 0/40 (size/max)

30 second input rate 9868149000 bits/sec, 822345 packets/sec

30 second output rate 2000 bits/sec, 4 packets/sec

8823464 packets input, 13233496000 bytes, 0 no buffer

Received 0 broadcasts (0 multicasts)

0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 4575029 overrun, 0 ignored

0 watchdog, 0 multicast, 0 pause input

0 input packets with dribble condition detected

0 packets output, 0 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 babbles, 0 late collision, 0 deferred

0 lost carrier, 0 no carrier, 0 PAUSE output

0 output buffer failures, 0 output buffers swapped out

3) التعرف على الوحدات النمطية التي توجد عليها هذه الواجهات.

6500#show module

Mod Ports Card Type                              Model              Serial No.

--- ----- -------------------------------------- ------------------ -----------

2    4  CEF720 4 port 10-Gigabit Ethernet      WS-X6704-10GE      SAD07430301

3    4  CEF720 4 port 10-Gigabit Ethernet      WS-X6704-10GE      SAL1316NJD4

5    2  Supervisor Engine 720 (Active)         WS-SUP720-3B       JAF1224BFSQ

Mod MAC addresses                       Hw    Fw           Sw           Status

--- ---------------------------------- ------ ------------ ------------ -------

2  0002.fcc1.21ac to 0002.fcc1.21af   1.2   12.2(14r)S5  12.2(33)SXI5 Ok

3  0024.c4f5.b2f4 to 0024.c4f5.b2f7   2.9   12.2(14r)S5  12.2(33)SXI5 Ok

5  001e.be6e.99b4 to 001e.be6e.99b7   5.6   8.5(4)       12.2(33)SXI5 Ok

Mod  Sub-Module                  Model              Serial       Hw     Status

---- --------------------------- ------------------ ----------- ------- -------

2  Centralized Forwarding Card WS-F6700-CFC       SAD0743039A  1.1    Ok

3  Distributed Forwarding Card WS-F6700-DFC3B     SAL1408BP0Y  4.8    Ok

5  Policy Feature Card 3       WS-F6K-PFC3B       JAF1223BAPB  2.3    Ok

5  MSFC3 Daughterboard         WS-SUP720          JAF1223BACM  3.1    Ok

Mod  Online Diag Status

---- -------------------

2  Pass

3  Pass

5  Pass

4) اكتشف إستخدام واجهة الهيكل المطابقة لهذه الوحدات.

6500#show fabric utilization

slot    channel      speed    Ingress %     Egress %

2          0        20G            0            0

2          1        20G           49            0

3          0        20G            0            0

3          1        20G            0           50

5          0        20G            0            0

5) كما هو موضح أعلاه، تعمل الواجهات GigabitEthernet 2/1 و GigabitEthernet 2/2 بمعدل الخط، ولكن يتم تجاوز (عمليات إسقاط) التشغيل عند الدخول بسبب التحكم في تدفق الدخول. للتحقق من ما إذا كان المحول يواجه التحكم في التدفق وأنه يسري إلى الحدود الموضحة أعلاه، أستخدم الأوامر أدناه.

6500#show platform hardware capacity rewrite-engine performance slot 2

slot channel perf_id description          packets              total overruns

----+-------+-------+--------------------+--------------------+--------------+

2    0       0x235   FAB RX 0             41083                0

2    0       0x237   FAB RX 1             0                    0

2    0       0x27B   FAB TX 0             1904                 0

2    0       0x27F   FAB TX 1             0                    0

2    0       0x350   REPLICATION ML3      0                    0

2    0       0x351   REPLICATION ML2      0                    0

2    0       0x352   RECIRC L2            0                    0

2    0       0x353   RECIRC L3            0                    0

2    0       0x34C   SPAN TX 0            0                    0

2    0       0x34D   SPAN TX 1            0                    0

2    0       0x34E   SPAN RX 0            0                    0

2    0       0x34F   SPAN RX 1            0                    0

2    0       0x354   SPAN TERMINATION     0                    0

2    1       0x235   FAB RX 0             759500888            0

2    1       0x237   FAB RX 1             0                    0

2    1       0x27B   FAB TX 0             4545890286           0

2    1       0x27F   FAB TX 1             0                    0

2    1       0x350   REPLICATION ML3      0                    0

2    1       0x351   REPLICATION ML2      0                    0

2    1       0x352   RECIRC L2            68615145             1047 <<< L2 Recirculation

2    1       0x353   RECIRC L3            0                    0

2    1       0x34C   SPAN TX 0            0                    0

2    1       0x34D   SPAN TX 1            0                    0

2    1       0x34E   SPAN RX 0            0                    0

2    1       0x34F   SPAN RX 1            0                    0

2    1       0x354   SPAN TERMINATION     0                    0

يشير الإخراج أعلاه إلى أن محرك النسخ المتماثل للمدخل يقوم بإعادة حساب L2 نظرا لوجود L2 DEC. بسبب إعادة الحساب، تصل الحزم إلى محرك النسخ المتماثل ضعف الوقت الذي يستهلك ضعف النطاق الترددي. وبمعنى آخر، يتم خفض أداء قناة البنية المفردة إلى النصف لأن كل قناة  كل حزمة شوهد مرتين داخليا.

الحل

1) شكلت EtherChannel غير موزع أي لا يتأثر بهذا التحديد.

للتحقق من هذه النظرية، شكلت EtherChannel على قارن على ال نفسه وحدة نمطية (غير DEC) ولاحظوا أن في نفس معدل ربط كما هو أعلاه، قارن لم يرى أي تجاوز يتزايد. قد يكون هذا حلا بديل لتجاوز هذه المشكلة.

6500#show fabric utilization

slot    channel      speed    Ingress %     Egress %

2          0        20G            0            0

2          1        20G           99            0

3          0        20G            0            0

3          1        20G            0           99

5          0        20G            0            0

TenGigabitEthernet2/1 is up, line protocol is up (connected)

Hardware is C6k 10000Mb 802.3, address is 0002.fcc1.21ac (bia 0002.fcc1.21ac)

MTU 1500 bytes, BW 10000000 Kbit, DLY 10 usec,

reliability 255/255, txload 1/255, rxload 251/255

Encapsulation ARPA, loopback not set

Keepalive set (10 sec)

Full-duplex, 10Gb/s, media type is 10Gbase-SR

input flow-control is on, output flow-control is off

ARP type: ARPA, ARP Timeout 04:00:00

Last input never, output 00:00:06, output hang never

Last clearing of "show interface" counters 00:36:12

Input queue: 0/2000/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue: 0/40 (size/max)

30 second input rate 9868487000 bits/sec, 822374 packets/sec

30 second output rate 3000 bits/sec, 6 packets/sec

1783710310 packets input, 2675565466500 bytes, 0 no buffer

Received 0 broadcasts (0 multicasts)

0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored

0 watchdog, 0 multicast, 0 pause input

0 input packets with dribble condition detected

13115 packets output, 946206 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 babbles, 0 late collision, 0 deferred

0 lost carrier, 0 no carrier, 0 PAUSE output

0 output buffer failures, 0 output buffers swapped out

TenGigabitEthernet2/2 is up, line protocol is up (connected)

Hardware is C6k 10000Mb 802.3, address is 0002.fcc1.21ad (bia 0002.fcc1.21ad)

MTU 1500 bytes, BW 10000000 Kbit, DLY 10 usec,

reliability 255/255, txload 1/255, rxload 251/255

Encapsulation ARPA, loopback not set

Keepalive set (10 sec)

Full-duplex, 10Gb/s, media type is 10Gbase-SR

input flow-control is on, output flow-control is off

ARP type: ARPA, ARP Timeout 04:00:00

Last input never, output 00:00:11, output hang never

Last clearing of "show interface" counters 00:37:31

Input queue: 0/2000/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue: 0/40 (size/max)

30 second input rate 9868462000 bits/sec, 822371 packets/sec

30 second output rate 3000 bits/sec, 6 packets/sec

1849499775 packets input, 2774249662500 bytes, 0 no buffer

Received 0 broadcasts (0 multicasts)

0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored

0 watchdog, 0 multicast, 0 pause input

0 input packets with dribble condition detected

13599 packets output, 980928 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 babbles, 0 late collision, 0 deferred

0 lost carrier, 0 no carrier, 0 PAUSE output

0 output buffer failures, 0 output buffers swapped out

2) أستخدم المحول Catalyst 6500 switch في وضع PFC 3c/3CXL في حال كان L2 DEC مطلوبا.

ملاحظة: ستكون هناك حاجة إلى ترقية أجهزة DFC في حالة تشغيل الوحدات الموجودة DFC3A/ DFC3B/ DFC3BXL.

3) ترقية إصدار IOS إذا كان التصميم والتكوين الخاصين بك ينطبقان على الشروط الواردة في CSCti23324.

يقوم إصلاح الخطأ هذا باسترجاع متطلبات إعادة الحساب ل L2 DEC أو EtherChannel متعددة الوحدات لمحولات Catalyst 6500 switches مع وحدات 67xx النمطية فقط. تم حل هذا الخطأ في الإصدار 12.2(33)SXJ1 من Cisco IOS والإصدارات الأحدث. كن على دراية بالنقاط التالية التي تنطبق على هذا الخطأ.

أ) يقوم إصلاح الخطأ باسترجاع متطلبات إعادة الحساب ل L2 DEC أو متعددة الوحدات النمطية EC للوحدات النمطية Catalyst 6500 Switches 67xx فقط. في حالة أن المادة حفازة 6500 يتلقى مفتاح على الأقل نقطة وصول من المستوى الثاني عبر أي وحدة DFC قديمة (على سبيل المثال، 6516/6816) أو مزيج من 67xx وسيتم فرض إعادة الحساب على الوحدة النمطية 6516/6818 لكافة وحدات DEC من المستوى الثاني التي تم تكوينها في النظام. في حال كان المحول Catalyst 6500 switch يحتوي على أي وحدة نمطية قديمة وتم تكوينه مع L2 DEC على وحدات 67xx فقط، لن يتم فرض إعادة الحساب.

ب) وجود جميع بطاقات الخط 67xx غير كاف لإزالة متطلبات إعادة الحساب الخاصة ببروتوكولات DEC. على سبيل المثال، إذا كان لديك DEC عبر 2704 DFCs وقناة أخرى مكونة على 6748 CFC، سيقوم النظام بفحص محرك إعادة التوجيه الخاص بالمشرف (لوحدة CFC) وبدء إستخدام إعادة الحساب.

ج) بالنسبة ل VS-SUP720-10G، لا يعمل إصلاح الخطأ هذا في السيناريوهات التي يكون فيها منفذ واحد على الأقل من المستوى الثاني DEC على بطاقة خط الكلوروفلوروكربون / المشرف. في هذا السيناريو لا تزال إعادة الحساب تحدث. بالإضافة إلى ذلك، لا تتم ترقية التجاور ولا تزال إعادة الحساب في مكانها حتى إذا قمت بإزالة المنفذ الذي تم تمكين المشرف/CFC عليه من قناة المنفذ. في مثل هذا السيناريو، يلزم إعادة التحميل لإعادة برمجة الأجهزة وإزالة إعادة تكوين قناة المنفذ / التحويل الاحتياطي / إزالة شبكة VLAN من المستوى الثاني وإعادة تكوينها، وما إلى ذلك لا يساعد على ذلك.