المحتويات

المقدمة

المتطلبات الأساسية

المتطلبات

المكونات المستخدمة

معلومات أساسية

مكونات Catalyst

النظرية الأساسية

التكوين

الرسم التخطيطي للشبكة

التكوينات

التحقق من الصحة

عينة عرض أمر إنتاج

المحول Catalyst 3560 Switch

محول Catalyst 6500

استكشاف الأخطاء وإصلاحها

معلومات ذات صلة

المقدمة

يصف هذا وثيقة الفرق من IEEE 802.1Q (dot1q) trunking بين cisco مادة حفازة مفتاح أن يركض cisco ios ®برمجية.

المتطلبات الأساسية

المتطلبات

تأكد من استيفاء المتطلبات التالية قبل أن تحاول إجراء هذا التكوين:

- معرفة توصيل IEEE 802.1Q

- معرفة تكوين محولات Catalyst 3560 و Catalyst 6500/6000 series switches باستخدام واجهة سطر الأوامر (CLI)

المكونات المستخدمة

تستند المعلومات الواردة في هذا المستند إلى إصدارات البرامج والمكونات المادية التالية:

- مادة حفازة 3560 مفتاح أن يركض cisco ios برمجية إطلاق 12.2(25)SEA

- مادة حفازة 6509 مفتاح أن يركض cisco ios برمجية إطلاق 12.1(26)E1

تم إنشاء المعلومات الواردة في هذا المستند من الأجهزة الموجودة في بيئة معملية خاصة. بدأت جميع الأجهزة المُستخدمة في هذا المستند بتكوين ممسوح (افتراضي). إذا كانت شبكتك قيد التشغيل، فتأكد من فهمك للتأثير المحتمل لأي أمر.

معلومات أساسية

يزود هذا وثيقة عينة تشكيل من IEEE 802.1Q (dot1q) trunking بين cisco مادة حفازة 3550/3560/3750 مفتاح أن يركض cisco ios ® برمجية ومادة حفازة 6500/6000 sery مفتاح أو مادة حفازة 4500/4000 sery مفتاح أن يركض cisco ios برمجية. التوصيل هو وسيلة لنقل حركة المرور من عدة شبكات محلية افتراضية (VLAN) عبر ارتباط من نقطة إلى نقطة بين الجهازين.

هناك طريقتان يمكنك بهما تنفيذ توصيل الإيثرنت:

- بروتوكول الارتباط بين المحولات (ISL)—بروتوكول Cisco خاص

- معيار معيار معيار IEEE وفقا للمعيار 802.1Q

مكونات Catalyst

المادة حفازة 3560 تشكيل في هذا وثيقة أيضا طبقت إلى مادة حفازة 3550/3750 مفتاح أن يركض cisco ios برمجية. المادة حفازة 6500/6000 تشكيل في هذا وثيقة أيضا طبقت إلى مادة حفازة 4500/4000 sery مفتاح أن يركض cisco ios برمجية.

ملاحظة: ارجع إلى هذا المستند التالي لمعرفة المزيد حول طرق التوصيل التي تدعمها محولات Catalyst المختلفة:

- متطلبات النظام لتنفيذ محولات Trunking Catalyst Switches

ملاحظة: يتضمن هذا وثيقة فقط التشكيل مبرد من المفتاح والمخرجات من العينة show أمر ذات صلة. لتفاصيل حول كيفية تكوين خط اتصال 802.1Q بين محولات Catalyst، ارجع إلى المستندات التالية:

- يشكل VLAN شنطة قسم من يشكل VLANs—مادة حفازة 3560 sery مفتاح

- يفهم VLAN trunks قسم من يشكل طبقة 2 إثرنيت قارن — مادة حفازة 4500 sery مفتاح أن يركض cisco ios برمجية

النظرية الأساسية

يستخدم IEEE 802. 1Q آلية وضع علامات داخلية. يدخل جهاز التوصيل علامة تمييز 4 بايت لتعريف شبكة VLAN التي ينتمي إليها إطار ثم يعيد حساب تسلسل التحقق من الإطارات (FCS). لمزيد من المعلومات، ارجع إلى هذه المستندات:

- تنسيق إطار InterSwitch Link و IEEE 802.1Q

- الخصائص الأساسية من 802.1Q trunking قسم من trunking بين مادة حفازة 4500/4000، 5500/5000، و 6500/6000 sery مفتاح يستعمل 802.1Q عملية كبسلة مع cisco CatOS نظام برمجية

ملاحظة: فيما يلي ملاحظات مهمة لتذكرها لهذا التكوين:

- يمكن أن تدعم أي واجهة إيثرنت على محول من السلسلة Catalyst 3550/3560/3750 series switch تضمين 802.1Q و ISL. ال إثرنيت قارن على مادة حفازة 3550 مفتاح طبقة 2 (L2) ميناء، افتراضيا.

- أي ميناء إثرنيت على مادة حفازة 6500/6000 sery مفتاح يستطيع ساندت 802.1Q و isl عملية كبسلة.

- افتراضيا، المادة حفازة 4500 sery مفتاح أن يركض cisco ios برمجية يساند على حد سواء isl و 802.1Q trunking أسلوب. يتوفر الدعم على جميع الواجهات باستثناء حظر منافذ جيجابت على وحدات WS-X4418-GB و WS-X4412-2 GB-T النمطية. لا تدعم هذه المنافذ ISL وتدعم فقط توصيل 802.1Q. تقوم المنافذ من 3 إلى 18 بحظر منافذ جيجابت على الوحدة النمطية WS-X4418-GB. تقوم المنافذ من 1 إلى 12 بحظر منافذ جيجابت على الوحدة النمطية WS-X4412-2GB-T.

ملاحظة: يكون المنفذ منفذ حظر إذا كان إتصاله باللوحة الخلفية يفوق اشتراكه.

- الفرق الرئيسي بين المادة حفازة 6500/6000 والمادة حفازة 4500 منصة التقصير قارن تشكيل. المادة حفازة 6500/6000 مفتاح أن يركض cisco ios برمجية يتلقى قارن في إيقاف عمل أسلوب أن يكون طبقة 3 (L3) يوجه ميناء افتراضيا. المادة حفازة 4500/4000 يتلقى مفتاح أن يركض cisco ios برمجية all the قارن يمكن. القارن l2 مفتاح ميناء افتراضيا.

- عندما يتم إستخدام عملية كبسلة 802.1Q على واجهة خط اتصال على محولات Catalyst 3750 switches، يمكن ملاحظة الحزم على show interface الإخراج لأن الحزم المجهزة الصالحة 802.1Q والتي تكون من 61-64 بايت والتي تتضمن البطاقة q يتم حسابها بواسطة المحول Catalyst 3750 switch كإطارات أقل من الحجم، حتى ولو تم إعادة توجيه هذه الحزم بشكل صحيح. أحلت ل كثير معلومة، cisco بق id CSCec14238 .

ملاحظة: لا يستطيع الوصول إلى أدوات Cisco والمعلومات الداخلية إلا لمستخدمي Cisco المسجلين.

التكوين

في هذا القسم، تُقدّم لك معلومات تكوين الميزات الموضحة في هذا المستند.

ملاحظة: أستخدم أداة بحث الأوامر للحصول على مزيد من المعلومات حول الأوامر المستخدمة في هذا القسم.

ملاحظة: لا يستطيع الوصول إلى أدوات Cisco والمعلومات الداخلية إلا لمستخدمي Cisco المسجلين.

الرسم التخطيطي للشبكة

يستخدم هذا المستند إعداد الشبكة التالي:

ملاحظة: واجهة جيجابت إيثرنت على Catalyst 3560 هي واجهة إيثرنت خاضعة للتفاوض بسرعة 10/100/1000 ميجابت في الثانية. لذلك، ربطت ال gigabit ميناء على المادة حفازة 3560 إلى إثرنيت سريع (100 ميجابت) ميناء على المادة حفازة 6500 في هذا شبكة رسم بياني.

الرسم التخطيطي للشبكة

التكوينات

يستخدم هذا المستند التكوينات التالية:

- المحول Catalyst 3560 Switch

- محول Catalyst 6500

المحول Catalyst 3560 Switch

!--- Notice: This example creates VLAN 1 and VLAN 2

!--- and sets the VLAN Trunk Protocol (VTP) mode to transparent. Use your

!--- network as a basis and set the VTP mode accordingly. For more details,

!--- refer to Configuring VLANs.

version 12.2

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname 3560

!

!--- This is the privileged mode password for the example.

enable password mysecret

!

ip subnet-zero

!

vtp mode transparent

!

!--- VLAN 2 is created. This is visible only when you set VTP mode

!--- to transparent.

vlan 2

!

!

!--- The Gigabit Ethernet interface on the Catalyst 3560 is a 10/100/1000 Mbps

!--- negotiated Ethernet interface. Therefore, the Gigabit port on the

!--- Catalyst 3560 is connected to a Fast Ethernet port on the Catalyst 6500.

!--- Configure the trunk on the Gigabit Ethernet 0/1 interface.

interface GigabitEthernet0/1

!--- Configure trunk encapsulation as dot1q.

!--- For details on trunking, refer to Configuring VLANs.

switchport trunk encapsulation dot1q

!--- Enable trunking on the interface.

switchport mode trunk

no ip address

snmp trap link-status

!

!

!--- Interfaces Gigabit Ethernet 0/2 through 0/5 are placed in VLAN 1.

!--- In order to configure the interface as an L2 port,

!--- refer to the Configuring Ethernet Interfaces section

!--- of Configuring Interface Characteristics. All L2 ports are placed

!--- in VLAN 1, by default.

interface GigabitEthernet0/2

switchport mode access

no ip address

snmp trap link-status

!

interface GigabitEthernet0/3

switchport mode access

no ip address

snmp trap link-status

!

!

interface GigabitEthernet0/4

switchport mode access

no ip address

snmp trap link-status

!

interface GigabitEthernet0/5

switchport mode access

no ip address

snmp trap link-status

!

!

!--- Interfaces Gigabit Ethernet 0/6 through 0/12 are placed in VLAN 2.

interface GigabitEthernet0/6

switchport access vlan 2

switchport mode access

no ip address

snmp trap link-status

!

!--- Output suppressed.

!

interface GigabitEthernet0/12

switchport access vlan 2

switchport mode access

no ip address

snmp trap link-status

!

interface Vlan1

!--- This is the IP address for management.

ip address 10.1.1.1 255.255.255.0

!

ip classless

ip http server

!

!

line con 0

transport input none

line vty 0 4

!--- This is the privileged mode password for the example.

password mysecret

login

line vty 5 15

login

!

end

محول Catalyst 6500

!--- Notice: This example creates VLAN 1 and VLAN 2 and sets

!--- the VTP mode to transparent. Use your network as a basis and set the VTP

!--- mode accordingly. For more details, refer to Configuring VLANs.

Current configuration : 4812 bytes

version 12.1

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname Cat6500

!

vtp mode transparent

ip subnet-zero

!

!

mls flow ip destination

mls flow ipx destination

!

!--- This is the privileged mode password for the example.

enable password mysecret

!

redundancy

mode rpr-plus

main-cpu

auto-sync running-config

auto-sync standard

!

!

!--- This enables VLAN 2.

vlan 2

!

!

interface GigabitEthernet1/1

no ip address

shutdown

!

interface GigabitEthernet1/2

no ip address

shutdown

!

!--- The Gigabit Ethernet interface on the Catalyst 3560 is a 10/100/1000 Mbps

!--- negotiated Ethernet interface. Therefore, the Gigabit port on the Catalyst 3560

!--- is connected to a Fast Ethernet port on the Catalyst 6500.

interface FastEthernet3/1

no ip address

!--- You must issue the switchport command once,

!--- without any keywords, in order to configure the interface as an L2 port for the

!--- Catalyst 6500 series switch that runs Cisco IOS Software.

!--- On a Catalyst 4500 series switch that runs Cisco IOS Software, all ports are L2

!--- ports by default. Therefore, if you do not change the default configuration,

!--- you do not need to issue the switchport command.

!--- For more details, refer to  Configuring Layer 2 Ethernet Interfaces

!--- for the Catalyst 4500 series switch that runs Cisco IOS Software.

switchport

!--- Configure trunk encapsulation as dot1q.

!--- For more details on trunking, refer to

!--- Configuring LAN Ports for Layer 2 Switching for the Catalyst 6500 series switch

!--- that runs Cisco IOS Software, or  Configuring Layer 2 Ethernet Interfaces

!--- for the Catalyst 4500/4000 series switch that runs Cisco IOS Software.

switchport trunk encapsulation dot1q

!--- Enable trunking on the interface.

switchport mode trunk

!

!--- Configure interfaces Fast Ethernet 3/2 through 3/24 to be in access mode.

!--- By default, all access ports are configured in VLAN 1.

!--- For more details, refer to Configuring LAN Ports for Layer 2 Switching

!--- for the Catalyst 6500 series switch that runs Cisco IOS Software, or

!--- Configuring Layer 2 Ethernet Interfaces for the Catalyst 4500/4000 series

!--- switch that runs Cisco IOS Software.

interface FastEthernet3/2

no ip address

switchport

switchport mode access

!

!--- Output suppressed.

!

interface FastEthernet3/24

no ip address

switchport

switchport mode access

!

!--- Fast Ethernet 3/25 through 3/48 are placed in VLAN 2.

!--- For more details, refer to Configuring LAN Ports for Layer 2 Switching

!--- for the Catalyst 6500 series switch that runs Cisco IOS Software,

!--- or Configuring Layer 2 Ethernet Interfaces for the Catalyst 4500/4000

!--- series switch that runs Cisco IOS Software.

interface FastEthernet3/25

no ip address

switchport

switchport access vlan 2

switchport mode access

!

!--- Output suppressed.

!

interface FastEthernet3/48

no ip address

switchport

switchport access vlan 2

switchport mode access

!

!

interface Vlan1

!--- This is the IP address for management.

ip address 10.1.1.2 255.255.255.0

!

!

ip classless

no ip http server

!

!

ip classless

ip http server

!

line con 0

exec-timeout 0 0

transport input none

line vty 0 4

!--- This is the Telnet password for the example.

password mysecret

login

!

end

ملاحظة: إن يعين أنت قارن إلى VLAN أن لا يتواجد، القارن يعطل إلى أن أنت تخلق ال VLAN في ال VLAN قاعدة معطيات. لمزيد من التفاصيل، ارجع إلى قسم إنشاء شبكة Ethernet VLAN أو تعديلها في تكوين شبكات VLAN.

التحقق من الصحة

استخدم هذا القسم لتأكيد عمل التكوين بشكل صحيح.

الإنتاج مترجم يساند أداة (OIT) مؤكد show أمر. استعملت ال OIT أن يشاهد تحليل من show أمر إنتاج.

ملاحظة: لا يستطيع الوصول إلى أدوات Cisco والمعلومات الداخلية إلا لمستخدمي Cisco المسجلين.

على مادة حفازة 3550/3560/3750/6500/4500 مفتاح، استعملت هذا أمر:

- show interfacesinterface_typmomodule/porttrunk

- show interfaceInterface_model/portswitchport

- show vlan

- أبديت vtp وضع

نموذج show لمخرجات الأمر

المحول Catalyst 3560 Switch

- show interfaces interface_type module/por trunk — يعرض هذا الأمر تكوين خط الاتصال للواجهة مع أرقام الشبكة المحلية الظاهرية (VLAN) التي يمكن نقل حركة المرور من أجلها عبر خط الاتصال.

3560# show interface gigabitethernet 0/1 trunk

Port      Mode         Encapsulation  Status        Native vlan

Gi0/1     on           802.1q         trunking      1

Port      Vlans allowed on trunk

Gi0/1     1 4094

Port      Vlans allowed and active in management domain

Gi0/1     1-2

Port      Vlans in spanning tree forwarding state and not pruned

Gi0/1     1-2

- show interfaces interface_type module/port switchport —يعرض هذا أمر تكوين منفذ المحول للواجهة.

في العرض، تحقق من وضع التشغيل وحقول تضمين التوصيل التشغيلي.

3560# show interface gigabitethernet 0/1 switchport

Name: Gi0/1

Switchport: Enabled

Administrative Mode: trunk

Operational Mode: trunk

Administrative Trunking Encapsulation: dot1q

Operational Trunking Encapsulation: dot1q

Negotiation of Trunking: On

Access Mode VLAN: 1 (default)

Trunking Native Mode VLAN: 1 (default)

Voice VLAN: none

Administrative private-vlan host-association: none

Administrative private-vlan mapping: none

Administrative private-vlan trunk native VLAN: none

Administrative private-vlan trunk encapsulation: dot1q

Administrative private-vlan trunk normal VLANs: none

Administrative private-vlan trunk private VLANs: none

Operational private-vlan: none

Trunking VLANs Enabled: ALL

Pruning VLANs Enabled: 2-1001

Capture Mode Disabled

Capture VLANs Allowed: ALL

Protected: false

Unknown unicast blocked: disabled

Unknown multicast blocked: disabled

Appliance trust : none

- show vlan— يعطي هذا أمر معلومة حول VLANs والمنافذ أن ينتسب إلى VLAN خاص.

3560# show vlan

VLAN Name                             Status    Ports

---- -------------------------------- --------- -------------------------------

1    default                          active    Gi0/2, Gi0/3, Gi0/4, Gi0/5

2    VLAN0002                         active    Gi0/6, Gi0/7, Gi0/8, Gi0/9

Gi0/10, Gi0/11, Gi0/12

1002 fddi-default                     act/unsup

1003 token-ring-default               act/unsup

1004 fddinet-default                  act/unsup

1005 trnet-default                    act/unsup

!--- Output suppressed.

ملاحظة: المنافذ التي يتم عرضها في الإخراج هي منافذ الوصول فقط. غير أن الميناء أن يكون شكلت أن يكون شنطة وأن يكون في ال 'notconnected' وضع أيضا يظهر في العرض vlan إنتاج.

- أبديت vtp وضع— يعرض هذا أمر معلومات عامة حول ال VTP إدارة مجال، وضع، وعدادات.

3560# show vtp status

VTP Version : 2

Configuration Revision : 0

Maximum VLANs supported locally : 1005

Number of existing VLANs : 6

VTP Operating Mode : Transparent

VTP Domain Name :

VTP Pruning Mode : Disabled

VTP V2 Mode : Disabled

VTP Traps Generation : Disabled

MD5 digest : 0x4A 0x55 0x17 0x84 0xDB 0x99 0x3F 0xD1

Configuration last modified by 10.1.1.1 at 0-0-00 00:00:00

3560# ping 10.1.1.2

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.2, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/1/4 ms

3560#

محول Catalyst 6500

- show interfaceInterface_type module/porttrunk— يعرض هذا الأمر تكوين خط الاتصال للواجهة مع أرقام شبكة VLAN التي يمكن نقل حركة مرور البيانات من أجلها عبر خط الاتصال.

Cat6500# show interfaces fastethernet 3/1 trunk

Port      Mode         Encapsulation  Status        Native vlan

Fa3/1     on           802.1q         trunking      1

Port      Vlans allowed on trunk

Fa3/1     1 4094

Port      Vlans allowed and active in management domain

Fa3/1     1-2

Port      Vlans in spanning tree forwarding state and not pruned

Fa3/1     1-2

- show interfaceInterface_typmomodule/portswitchport —يعرض هذا الأمر تكوين منفذ المحول للواجهة. في العرض، تحقق من وضع التشغيل وحقول تضمين التوصيل التشغيلي.

cat6500# show interface fastethernet 3/1 switchport

Name: Fa3/1

Switchport: Enabled

Administrative Mode: trunk

Operational Mode: trunk

Administrative Trunking Encapsulation: dot1q

Operational Trunking Encapsulation: dot1q

Negotiation of Trunking: On

Access Mode VLAN: 1 (default)

Trunking Native Mode VLAN: 1 (default)

Voice VLAN: none

Administrative private-vlan host-association: none

Administrative private-vlan mapping: none

Administrative private-vlan trunk native VLAN: none

Administrative private-vlan trunk encapsulation: dot1q

Administrative private-vlan trunk normal VLANs: none

Administrative private-vlan trunk private VLANs: none

Operational private-vlan: none

Trunking VLANs Enabled: ALL

Pruning VLANs Enabled: 2-1001

Capture Mode Disabled

Capture VLANs Allowed: ALL

- show vlan— يعطي هذا أمر معلومة حول VLANs والمنافذ أن ينتسب إلى VLAN خاص.

Cat6500# show vlan

VLAN Name                             Status    Ports

---- -------------------------------- --------- -------------------------------

1    default                          active    Fa3/2, Fa3/3, Fa3/4, Fa3/5

Fa3/6, Fa3/7, Fa3/8, Fa3/9

Fa3/10, Fa3/11, Fa3/12, Fa3/13

Fa3/14, Fa3/15, Fa3/16, Fa3/17

Fa3/18, Fa3/19, Fa3/20, Fa3/21

Fa3/22, Fa3/23, Fa3/24

2    VLAN0002                         active    Fa3/25, Fa3/26, Fa3/27, Fa3/28

Fa3/29, Fa3/30, Fa3/31, Fa3/32

Fa3/33, Fa3/34, Fa3/35, Fa3/36

Fa3/37, Fa3/38, Fa3/39, Fa3/40

Fa3/41, Fa3/42, Fa3/43, Fa3/44

Fa3/45, Fa3/46, Fa3/47, Fa3/48

1002 fddi-default                      act/unsup

1003 token-ring-default                act/unsup

1004 fddinet-default                   act/unsup

1005 trnet-default                     act/unsup

!--- Output suppressed.

ملاحظة: المنافذ التي يتم عرضها هي فقط المنافذ التي قمت بتكوينها كمنافذ من الطبقة 2 غير شنطة (وصول). الميناء أن يكون شكلت أن يكون شنطة وأن يكون في ال 'notconnected' وضع أيضا يظهر في العرض vlan إنتاج. أحلت للتفاصيل، ال يشكل lan قارن ل طبقة 2 تحويل قسم من يشكل lan ميناء للطبقة 2 تحويل.

- أبديت vtp وضع— يعرض هذا أمر معلومات عامة حول ال VTP إدارة مجال، وضع، وعدادات.

Cat6500# show vtp status

VTP Version                     : 2

Configuration Revision          : 0

Maximum VLANs supported locally : 1005

Number of existing VLANs        : 6

VTP Operating Mode              : Transparent

VTP Domain Name                 :

VTP Pruning Mode                : Disabled

VTP V2 Mode                     : Disabled

VTP Traps Generation            : Disabled

MD5 digest                      : 0xBF 0x86 0x94 0x45 0xFC 0xDF 0xB5 0x70

Configuration last modified by 10.1.1.2 at 0-0-00 00:00:00

- بينغ

Cat6500# ping 10.1.1.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.1, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/1/4 ms

استكشاف الأخطاء وإصلاحها

هناك حاليا ما من خاص أستكشاف الأخطاء وإصلاحها معلومة يتوفر ل هذا تشكيل. أحلت ل مشاكل المشتركة أن يرتبط إلى trunking و 802.1Q تشكيل، الخطأ المشتركة قسم من الوثيقة trunking بين مادة حفازة 4500/4000، 5500/5000، و 6500/6000 sery مفتاح يستعمل 802.1Q عملية كبسلة مع cisco CatOS نظام برمجية.

معلومات ذات صلة

- استخدام PortFast وأوامر أخرى لإصلاح تأخير اتصال بدء تشغيل محطة العمل

- أدلة تكوين المحولات من السلسلة Catalyst 3560

- أدلة تكوين المحولات من السلسلة Catalyst 4500

- أدلة تكوين المحولات من السلسلة Catalyst 6500

- الدعم الفني والتنزيلات من Cisco