المحتويات

المقدمة

المتطلبات الأساسية

المكونات المستخدمة

معلومات أساسية

إجراء إسترداد كلمة المرور

المقدمة

يصف هذا وثيقة الكلمة إستعادة إجراء ل cisco مادة حفازة 4500 sery مفتاح أن يركض في الفعلي تحويل نظام (VSS) أسلوب.

المتطلبات الأساسية

المكونات المستخدمة

أسست المعلومة في هذا وثيقة على ال cisco مادة حفازة 4500 sery مفتاح أن يركض مشرف محرك 7-E.

تم إنشاء المعلومات الواردة في هذا المستند من الأجهزة الموجودة في بيئة معملية خاصة. بدأت جميع الأجهزة المُستخدمة في هذا المستند بتكوين ممسوح (افتراضي). إذا كانت شبكتك مباشرة، فتأكد من فهمك للتأثير المحتمل لأي أمر.

معلومات أساسية

كلمة إستعادة على cisco مادة حفازة 4500 sery مفتاح أن يركض VSS أسلوب يتطلب أن أنت تحول المفتاح إلى أسلوب مستقل، أي ينبغي كنت أنجزت in order to تجاوزت الذو رأسمالمجازفة تشكيل. إذا لم تقم بتحويل المحولات، فستتلقى رسالة الخطأ هذه:

********************* CAUTION ************************

*                                                    *

* Switch is booting up in VSS mode but               *

* startup-config is being ignored. Autoboot is       *

* disabled and now dropping into ROMMON.             *

*                                                    *

* Please configure the switch for not ignoring       *

* startup-config if it is needed to work in VSS Mode *

*                  OR                                *

* clear VS_SWITCH_NUMBER rommon variable to boot     *

* the switch in standalone mode.                     *

******************************************************

*Jul 29 12:25:59.403: %RF-5-RF_RELOAD: Self Reload.

Reason: Startup-config ignore not allowed in VSS mode

*Jul 29 12:25:59.568: %SYS-5-RELOAD:

Reload requested by Platform redundancy manager. Reload Reason:

Startup-config ignore not allowed in VSS mode.Please stand by while

اضغط على Ctrl-C بعد إعادة التحميل لكسر كل هيكل في ROMMON. قم بمسح متغير VS_SWITCH_NUMBER ROMMON (rommon1 > unset vs_SWITCH_NUMBER) لتمهيد المحول في الوضع المستقل.

إجراء إسترداد كلمة المرور

عقب يحول أنت المفتاح إلى أسلوب مستقل، أنت ينبغي أنجزت الكلمة إستعادة على كلا مفتاح على انفراد. يبدأ الإجراء الموضح في هذا المستند بالمحول 1 في وضع VSS، ويجب تكراره للمحول 2.

أتمت in order to أنجزت كلمة إستعادة على cisco مادة حفازة 4500 sery مفتاح أن يركض VSS أسلوب، هذا steps:

1. إذا تم نسخه إحتياطيا مسبقا، فاحتفظ ب running-config من VSS بسهولة على ملف خارجي. هذا تشكيل يستطيع كنت استعملت أن يعيد شكلت VSS بعد كلمة إستعادة كامل (خطوة 10).

2. قم بإعادة تحميل المحول عن طريق تعطيل الطاقة لكل هيكل، ثم اقتحمه إلى ROMMON:

Restarting system.

Type control-C to prevent autobooting.

. .

Autoboot cancelled......... please wait!!!

rommon 1 > [interrupt]

rommon 1 >set

PS1=rommon ! >

RommonVer=15.0(1r)SG1

BOOT=bootflash:cat4500e-universalk9.SPA.03.04.00.SG.151-2.SG.bin,12;

ConfigReg=0x2102

DiagMonitorAction=Normal

BootedFileName=bootflash:cat4500e-universalk9.SPA.03.04.00.SG.151-2.SG.bin

VS_SWITCH_NUMBER=1

ConsecPostPassedCnt=7

RET_2_RTS=12:20:28 UTC Mon Jul 29 2013

RET_2_RCALTS=1375100428

rommon 2 >

3. قم بتكوين المحول لتجاهل تكوين بدء التشغيل:
rommon 2 >confreg

Configuration Summary :

=> load rom after netboot fails

=> console baud: 9600

=> autoboot from: commands specified in 'BOOT' environment variable

do you wish to change the configuration? y/n  [n]:  y

enable  "diagnostic mode"? y/n  [n]:  n

enable  "use net in IP bcast address"? y/n  [n]:

disable "load rom after netboot fails"? y/n  [n]:

enable  "use all zero broadcast"? y/n  [n]:

enable  "break/abort has effect"? y/n  [n]:

enable  "ignore system config info"? y/n  [n]:  y

change console baud rate? y/n  [n]:

change the boot characteristics? y/n  [n]:

Configuration Summary :

=> load rom after netboot fails

=> ignore system config info

=> console baud: 9600

=> autoboot from: commands specified in 'BOOT' environment variable

do you wish to save this configuration? y/n  [n]:  y

You must reset or power cycle for new configuration to take effect

4. تحقق من تغيير config-register:
rommon 3 >set

PS1=rommon ! >

RommonVer=15.0(1r)SG1

BOOT=bootflash:cat4500e-universalk9.SPA.03.04.00.SG.151-2.SG.bin,12;

DiagMonitorAction=Normal

BootedFileName=bootflash:cat4500e-universalk9.SPA.03.04.00.SG.151-2.SG.bin

VS_SWITCH_NUMBER=1

ConsecPostPassedCnt=7

RET_2_RTS=12:20:28 UTC Mon Jul 29 2013

RET_2_RCALTS=1375100428

ConfigReg=0x2142

rommon 4 >

5. أدخل الأمر clear swnum، الذي يعمل على مسح رقم المحول الظاهري وتحويل المحول إلى الوضع المستقل:
rommon 4 >clear swnum

rommon 5 >

rommon 5 >set

PS1=rommon ! >

RommonVer=15.0(1r)SG1

BOOT=bootflash:cat4500e-universalk9.SPA.03.04.00.SG.151-2.SG.bin,12;

DiagMonitorAction=Normal

BootedFileName=bootflash:cat4500e-universalk9.SPA.03.04.00.SG.151-2.SG.bin

BootStatus=Failure

ConsecPostPassedCnt=8

ConfigReg=0x2142

RET_2_RTS=12:25:59 UTC Mon Jul 29 2013

RET_2_RCALTS=1375100759

6. قم بتمهيد المحول بالصورة المطلوبة. يتجاهل المحول تكوين بدء التشغيل، ويقوم بإنشاء تكوين فارغ:
rommon 6 >boot bootflash:cat4500e-universalk9.SPA.03.04.00.SG.151-2.SG.bin

loading image

Checking digital signature

flash1:/USER/cat4500e-universalk9.SPA.03.04.00.SG.151-2.SG.bin:

Digitally Signed Release Software with key version A

Rommon reg: 0x00004F80

Reset2Reg: 0x00000F00

Image load status: 0x00000000

#####

Snowtrooper 220 controller 0x04328B30..0x0450A0DF Size:0x0057B4C5 Program Done!

##############

Linux version 2.6.24.4.96.70.k10 (susingh@build-lnx-036)

(gcc version 4.2.1 p7 (Cisco c4.2.1-p7)) #1 SMP Wed Dec 5 03:42:58 PST 2012

Starting System Services

diagsk10-post version 5.1.4.0

اضغط على Enter للبدء.

7. شكلت كلمة جديد للمفتاح والمعلمات in order to حولت المفتاح إلى VSS أسلوب. قم بتغيير config-register لتجنب تجاوز التكوين مرة أخرى:
Switch#conf t

Enter configuration commands, one per line.  End with CNTL/Z.

Switch(config)#username xxxx password xxxx

Switch(config)#enable secret xxxx

4k_vss(config)#config-register 0x2102

4k_vss(config)#

4k_vss(config)#switch virtual domain 100

4k_vss(config-vs-domain)#switch 1

4k_vss(config-vs-domain)#end

4k_vss#wr

Building configuration...

Compressed configuration from 2988 bytes to 1385 bytes

8. يحول المفتاح إلى VSS أسلوب مرة أخرى:
4k_vss#switch convert mode virtual

******************* CAUTION ******************

* No VSL port is configured or all VSL ports *

* are put in shutdown state.                 *

* This may cause Dual-Active mode of VSS.    *

**********************************************

This command will convert all interface names

to naming convention "interface-type switch-number/slot/port",

save the running config to startup-config and

reload the switch.

Do you want to proceed? [yes/no]: yes

Converting interface names

Building configuration...

Compressed configuration from 3113 bytes to 1424 bytes[OK]

Saving converted configuration to bootflash: ...

Destination filename [startup-config.converted_vs-20130729-130331]?

Please stand by while rebooting the system...

9. كررت هذا إجراء للآخر مفتاح، وشكلت هو أن يتلاقى VSS أسلوب بما أن مفتاح 2.
ملاحظة: للحصول على معلومات إضافية حول كيفية تكوين المحولات في وضع VSS، راجع قسم تكوين VSS من دليل تكوين برنامج Catalyst 4500 Series Switch Software، إصدار IOS XE 3.4.0SG و IOS 15.1(2)SG.

10. افتح running-config الأصلي المحفوظ في الخطوة 1 في محرر نصوص، واحذف كلمة المرور القديمة من التكوين. الآن هو آمن أن يحمل هذا تشكيل معدل على المفتاح. وهذا يضمن أن كلمة المرور القديمة المفقودة لم تتم إعادة تكوينها مرة أخرى.