المحتويات

المقدمة

قبل البدء

النظرية الأساسية

الاصطلاحات

المتطلبات الأساسية

المكونات المستخدمة

التكوين

الرسم التخطيطي للشبكة

التكوينات

التحقق من الصحة

استكشاف الأخطاء وإصلاحها

معلومات ذات صلة

المقدمة

يزود هذا وثيقة عينة تشكيل ل InterSwitch خطوة (ISL) و 802.1q trunking بين مادة حفازة 6500/6000 مفتاح أن يركض CatOS و cisco 7500 مسحاج تخديد أن يستطيع عملت InterVLAN تحشد. يتم عرض نتائج كل أمر عند تنفيذها. على الرغم من أن مادة حفازة 6500 استعملت مفتاح في هذا تشكيل، هو يستطيع كنت استبدلت مع مادة حفازة 4500/4000 أو 5500/5000 عائلة مفتاح أن يركض CatOS مع ما من تغير في التشكيل steps.

قبل البدء

النظرية الأساسية

توصيل

trunking طريقة لحمل حركة المرور من شبكات VLAN المتعددة عبر إرتباط من نقطة إلى نقطة من الطبقة 2 (L2). التضمين يستعمل في إثرنيت trunking:

- ISL (تضمين خط الاتصال الخاص من Cisco)

- 802.1q (تضمين خط الاتصال القياسي وفقا لمعيار IEEE)

للحصول على مزيد من المعلومات وعينة من التكوينات المتعلقة ب ISL أو توصيل 802.1Q، ارجع إلى هذا المستند:

- دعم منتجات محولات LAN

التوجيه بين شبكات VLAN

in order for أداة في VLANs مختلف أن يتصل مع بعضهم بعضا، يتطلب مسحاج تخديد أن يوجه بين VLANs. مسحاج تخديد داخلي مثل المتعدد طبقات مفتاح سمة بطاقة (MSFC) على المادة حفازة 6500/6000 يستطيع كنت استعملت لهذا الغرض. طريق مفتاح وحدة نمطية (RSM) على المادة حفازة 5500/5000 مثال آخر. إن يكون المفتاح مشرف محرك L2 قادر فقط، أو هناك ما من طبقة 3 (L3) وحدة نمطية في المفتاح، مسحاج تخديد خارجي مثل ال cisco 7500 يحتاج أن يوجه بين VLANs.

ملاحظات هامة

- تذكر أن مادة حفازة 4500/4000 sery مفتاح أن يركض CatOS لا يساند ISL trunking. تأكد من إصدار الأمر show port capabilities <mod> لتحديد عملية كبسلة trunking التي تدعمها وحدة نمطية معينة على المادة حفازة 5500/5000. تدعم جميع الوحدات النمطية في Catalyst 6500/6000 ISL و 802.1q trunking.

- تأكد من إستخدام الإرشادات لتكوين trunking استنادا إلى وثائق البرامج الخاصة بالمحول لديك. مثلا، إن يركض أنت برمجية إطلاق 5.5.x على مادة حفازة 5500/5000، أحلت البرمجية تشكيل مرشد (5.5) وفحصت بعناية أي تشكيل guidelines وقيود.

الاصطلاحات

راجع اصطلاحات تلميحات Cisco التقنية للحصول على مزيد من المعلومات حول اصطلاحات المستندات.

المتطلبات الأساسية

قبل أن تحاول إجراء هذا التكوين، فتأكد من استيفاء المتطلبات الأساسية التالية:

- مُحوّلات Catalyst 6500/6000 Series Switches:

- تدعم جميع البرامج والأجهزة كلا من ISL و 802.1Q trunking

- الموجهات من السلسلة 7000 أو 7500 من Cisco:

- سلسلة موجهات طراز 7000 من Cisco مع معالج محول التوجيه من السلسلة 7000 (RSP7000)

- واجهة الهيكل من السلسلة 7000 (RSP7000CI)

- الموجهات من السلسلة Cisco 7500 مع معالجات واجهة الإيثرنت السريع (FEIP) أو معالج الواجهة متعدد الاستخدام (VIP2) مهايئات المنفذ

- إذا كنت تستخدم مهايئ منفذ PA-2 FEISL، يجب أن يكون لديك مراجعة الأجهزة 1.2 أو أعلى. لمزيد من المعلومات، ارجع إلى توصية الاستبدال الخاصة ب 2-Port FastEthernet ISL (PA-2 FEISL).

- يتم إدخال الأمر encapsulation dot1q native في الإصدار 12.1(3) من البرنامج Cisco IOS® Software. يغير هذا الأمر التكوين. أحلت ل كثير معلومة، العينة تشكيل ينتج 802.1q تشكيل على ال cisco 7500 ل cisco ios صيغة مبكر من 12.1(3)T يتواجد في التشكيل قسم من هذا وثيقة.

- يتم تمكين إعادة التوجيه السريع من Cisco بشكل افتراضي على موجهات سلسلة 7500 من Cisco. ومع ذلك، لا يتوفر دعم إعادة التوجيه السريع من Cisco لتوجيه IP بين شبكات IEEE 802.1q المحلية الظاهرية (VLANs) حتى إصدارات Cisco IOS 12.2 و 12.2T. ما يزال من الممكن تكوين عملية كبسلة 802.1q في الإصدارات السابقة ولكن يجب عليك أولا تعطيل إعادة توجيه Cisco Express باستخدام الأمر no ip cef في وضع التكوين العام.

- يلزم توفر الإصدار 11.3(1)T من Cisco IOS (أي مجموعة ميزات إضافية) أو إصدار أحدث لدعم توصيل ISL. يلزم توفر برنامج Cisco IOS الإصدار 12.0(1)T (أي مجموعة ميزات إضافية) أو إصدار أحدث لدعم توصيل IEEE 802.1Q.

المكونات المستخدمة

تستند المعلومات الواردة في هذا المستند إلى إصدارات البرامج والمكونات المادية التالية:

- المادة حفازة 6500 يستعمل ل هذا تشكيل يركض CatOS صيغة 5.5(14)

- يقوم الموجه Cisco 7500 Series Router المستخدم لهذا التكوين بتشغيل الإصدار 12.2(7b) من Cisco IOS

التكوين

في هذا القسم، تُقدّم لك معلومات تكوين الميزات الموضحة في هذا المستند.

ملاحظة: للعثور على معلومات إضافية حول الأوامر المستخدمة في هذا المستند، أستخدم أداة بحث الأوامر (للعملاء المسجلين فقط).

في قسم التكوينات، يتم تنفيذ هذه المهام:

- شكلت إثنان منفذ ميناء على المادة حفازة 6500. واحد لمحطة العمل 1 في شبكة VLAN 1، وآخر لمحطة العمل 2 في شبكة VLAN 2.

- قم بتكوين البوابات الافتراضية المقابلة لمحطة العمل 1 ومحطة العمل 2 لتكون 10.10.10.1 /24 و 10.10.11.1/24 على Cisco 7500.

- شكلت ISL أو 802.1Q شنطة بين مادة حفازة 6500 مفتاح وال cisco 7500 مسحاج تخديد.

- قم بتكوين واجهتين فرعيتين من FastEthernet باستخدام عناوين IP للتوجيه بين شبكات VLAN.

الرسم التخطيطي للشبكة

يستخدم هذا المستند إعداد الشبكة الموضح في هذا الرسم التخطيطي:

التكوينات

يستخدم هذا المستند التكوينات التالية:

- محول Catalyst 6500

- موجّه Cisco 7500

- تكوين 802.1q على Cisco 7500 لإصدارات Cisco IOS الأقدم من 12.1(3)T

تم إنشاء المعلومات المُقدمة في هذا المستند من الأجهزة الموجودة في بيئة معملية خاصة. بدأت جميع الأجهزة المُستخدمة في هذا المستند بتكوين ممسوح (افتراضي). إذا كنت تعمل في شبكة مباشرة، فتأكد من فهمك للتأثير المحتمل لأي أمر قبل استخدامه.

محول Catalyst 6500

!-- Set the sc0 IP address and VLAN.

Catalyst6500> (enable) set int sc0 10.10.10.2 255.255.255.0

Interface sc0 IP address and netmask set.

Catalyst6500 (enable) set int sc0 1

!-- Set the default gateway.

Catalyst6500> (enable) set ip route default 10.10.10.1

Route added.

!-- Set the VLAN Trunk Protocol (VTP) mode. !-- In this example, the mode is set to transparent. !-- Depending on your network, set the VTP mode accordingly. !-- For details on VTP, refer to Understanding and Configuring !-- VLAN Trunk Protocol (VTP).

Catalyst6500> (enable) set vtp mode transparent

VTP domain modified

!-- Add VLAN 2. VLAN 1 already exists by default.

Catalyst6500> (enable) set vlan 2

VLAN 2 configuration successful

!-- Add port 3/4 to VLAN 2. Port 3/3 is already in VLAN 1 by default.

Catalyst6500> (enable) set vlan 2 3/4

VLAN 2 modified.

VLAN 1 modified.

VLAN  Mod/Ports

---- -----------------------

2     3/4

! -- Set the port speed and duplex at 100 and full. One of !-- the requirements for trunking to work is for speed and duplex to be the same on !-- both sides. To guarantee this, hardcode both speed and duplex on port 3/1. !-- You can also make the devices auto-negotiate, but make sure you correctly !-- do so on both sides.

Catalyst6500> (enable) set port speed 3/1 100

Ports 3/1 transmission speed set to 100Mbps.

Catalyst6500> (enable) set port duplex 3/1 full

Ports 3/1 set to full-duplex.

!-- Enable trunking on port 3/1. !-- Because routers do not understand Dynamic Trunking Protocol (DTP), !-- the trunking mode is set to nonegotiate, which causes ports to trunk !-- but not generate DTP frames. !-- Enter the trunking encapsulation as either ISL or as 802.1q.

Catalyst6500> (enable) set trunk 3/1 nonegotiate isl

Port(s) 3/1 trunk mode set to nonegotiate.

Port(s) 3/1 trunk type set to isl.

! -- Make sure the native VLAN (default is VLAN 1) matches across the link. ! -- For more information on the native VLAN and 802.1q trunking, refer to ! -- Trunking Between Catalyst 4500/4000, 5500/5000, and 6500/6000 Family Switches Using !-- 802.1q Encapsulation.

Catalyst6500> (enable) set trunk 3/1 nonegotiate dot1q

Port(s) 3/1 trunk mode set to nonegotiate.

Port(s) 3/1 trunk type set to dot1q.

Catalyst6500> (enable) show config

This command shows non-default configurations only.

Use 'show config all' to show both default and non-default configurations.

.........

..................

..

begin

!

# ***** NON-DEFAULT CONFIGURATION *****

!

!

#time: Thu May 2 2002, 01:26:26

!

#version 5.5(14)

!

!

#system

set system name  Catalyst6500

!

#!

#vtp

set vtp mode transparent

set vlan 1 name default type ethernet mtu 1500 said 100001 state active

set vlan 2 name VLAN0002 type ethernet mtu 1500 said 100002 state active

set vlan 1002 name fddi-default type fddi mtu 1500 said 101002 state active

set vlan 1004 name fddinet-default type fddinet mtu 1500 said 101004 state active stp ieee

set vlan 1005 name trnet-default type trbrf mtu 1500 said 101005 state active stp ibm

set vlan 1003 name token-ring-default type trcrf mtu 1500 said 101003 state active

mode srb aremaxhop 7 stemaxhop 7

backupcrf off

!

#ip

set interface sc0 1 10.10.10.2/255.255.255.0 10.10.10.255

set ip route 0.0.0.0/0.0.0.0         10.10.10.1

!

#set boot command

set boot config-register 0x2102

set boot system flash bootflash:cat6000-sup.5-5-14.bin

!

#port channel

!

# default port status is enable

!

!

#module 1 empty

!

#module 2 : 2-port 1000BaseX Supervisor

!

#module 3 : 48-port 10/100BaseTX Ethernet

set vlan 2    3/4

set port disable    3/5

set port speed      3/1  100

set port duplex     3/1  full

set trunk 3/1  nonegotiate isl 1-1005

!-- If IEEE 802.1q is configured, !-- you will see the following output instead: !-- set trunk 3/1 nonegotiate dot1q 1-1005

!

#module 4 : 24-port 100BaseFX MM Ethernet

!

#module 5 empty

!

#module 6 empty

!

#module 15 empty

!

#module 16 empty

end

موجّه Cisco 7500

7500#configure terminal

Enter configuration commands, one per line. End with CNTL/Z.

!-- Configure the FastEthernet interfaces for speed 100 depending on the port adapter. !-- Some FastEthernet port adapters can auto-negotiate speed (10 or 100) !-- and duplex (half or full). Others are only capable of 100 (half or full).

7500(config)#int fa 5/1/1

!-- Configure full-duplex to match the duplex setting on the Catalyst switch side.

7500(config-if)#full-duplex

7500(config-if)#speed 100

7500(config-if)#no shut

7500(config-if)#

01:46:09: %LINK-3-UPDOWN: Interface FastEthernet5/1/1, changed state to up

01:46:10: %LINEPROTO-5-UPDOWN: Line protocol on Interface FastEthernet5/1/1,

changed state to up

7500(config-if)#exit

!-- If you are using ISL trunking, configure two FastEthernet !-- sub-interfaces and enable ISL trunking by issuing !-- the encapsulation isl

command. !-- Configure the IP addresses for InterVLAN routing.

7500(config)#int fast 5/1/1.1

7500(config-subif)#encapsulation isl 1

7500(config-subif)#ip address 10.10.10.1 255.255.255.0

7500(config-subif)#exit

7500(config)#int fast 5/1/1.2

7500(config-subif)#encapsulation isl 2

7500(config-subif)#ip address 10.10.11.1 255.255.255.0

7500(config-subif)#exit

!-- If you are using 802.1q trunking, configure two !-- FastEthernet sub-interfaces, enable 802.1q trunking !-- by issuing the encapsulation dot1Q

(native)

command, !-- and configure the IP addresses for InterVLAN routing.

!-- Note: The encapsulation dot1Q 1 native command !-- was added in Cisco IOS version 12.1(3)T. If you are using an earlier !-- version of Cisco IOS, refer to the sample configuration output !-- 802.1q configuration for Cisco IOS Versions Earlier than 12.1(3)T !-- to configure 802.1q trunking on the router.

!-- Make sure the native VLAN (default is VLAN 1) matches across the link. !-- For more information on the native VLAN and 802.1q trunking, refer to !-- Trunking Between Catalyst 4500/4000, 5500/5000, and 6500/6000 Family Switches Using !-- 802.1q Encapsulation.

7500(config)#int fast 5/1/1.1

7500(config-subif)#encapsulation dot1Q 1 native

7500(config-subif)#ip address 10.10.10.1 255.255.255.0

7500(config-subif)#exit

7500(config)#int fast 5/1/1.2

7500(config-subif)#encapsulation dot1Q 2

7500(config-subif)#ip address 10.10.11.1 255.255.255.0

7500(config-subif)#exit

!-- Remember to save the configuration.

7500#write memory

Building configuration...

[OK]

7500#

!-- Note: In order to make this setup work, and to successfully ping !-- between Workstation 1 and Workstation 2, you need to make sure that the default !-- gateways on the workstations are setup properly. For Workstation 1, the default !-- gateway should be 10.10.10.1 and for Workstation 2, the default gateway should !-- be 10.10.11.1.

7500#show running-config

Building configuration...

Current configuration : 1593 bytes

!

version 12.2

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

no service single-slot-reload-enable

!

hostname 7500

!

boot system disk1:rsp-jsv-mz.122-7b.bin

!

ip subnet-zero

!

ip cef

call rsvp-sync

!

!

!

!

!

interface FastEthernet5/1/0

no ip address

no ip mroute-cache

speed 100

full-duplex

!

interface FastEthernet5/1/1

no ip address

no ip mroute-cache

speed 100

full-duplex

!

interface FastEthernet5/1/1.1

encapsulation isl 1

ip address 10.10.10.1 255.255.255.0

!

interface FastEthernet5/1/1.2

encapsulation isl 2

ip address 10.10.11.1 255.255.255.0

!-- If 802.1q trunking is configured, !-- you will see the following output instead: !-- interface FastEthernet5/1/1.1 !-- encapsulation dot1Q 1 native !-- ip address 10.10.10.1 255.255.255.0 !-- ! !-- interface FastEthernet5/1/1.2 !-- encapsulation dot1Q 2 !-- ip address 10.10.11.1 255.255.255.0

!

!

ip classless

no ip http server

ip pim bidir-enable

!

!

!

!

line con 0

line aux 0

line vty 0 4

login

!

end

7500#

في إصدارات Cisco IOS الأقدم من 12.1(3)T، لا يتوفر الأمر عملية كبسلة dot1Q 1 الأصلي أسفل الواجهة الفرعية. ومع ذلك، ما يزال من الضروري مطابقة شبكة VLAN الأصلية عبر الارتباط كما هو موضح.

in order to شكلت 802.1q trunking في برمجية صيغة مبكر من 12.1(3)T، العنوان ل ال VLAN أهلي طبيعي (VLAN 1 في هذا وثيقة) شكلت على ال رئيسي FastEthernet قارن بالمقارنة مع FastEthernet subinterface.

تكوين 802.1Q على Cisco 7500 لإصدارات Cisco IOS الأقدم من 12.1(3)T

7500#configure terminal

Enter configuration commands, one per line. End with CNTL/Z.

!-- Configure the FastEthernet interfaces for speed 100 !-- depending on the port adapter. Some FastEthernet port adapters can !-- auto-negotiate speed (10 or 100) and duplex (half or full). !-- Others are only capable of 100 (half or full).

7500(config)#int Fast 5/1/1

!-- Configure full-duplex to match the duplex setting !-- on the Catalyst switch side.

7500(config-if)#full-duplex

7500(config-if)#speed 100

7500(config-if)#no shut

7500(config-if)#

01:46:09: %LINK-3-UPDOWN: Interface FastEthernet5/1/1, changed state to up

01:46:10: %LINEPROTO-5-UPDOWN: Line protocol on Interface FastEthernet5/1/1,

changed state to up

7500(config-if)#exit

!-- Do not configure an interface FastEthernet5/1/1.1. !-- Instead, configure the IP address for VLAN 1 (the native VLAN).

7500(config)#int Fast 5/1/1

7500(config-if)#ip address 10.10.10.1 255.255.255.0

7500(config-if)#exit

7500(config)#

!-- It is still necessary to create a sub-interface for VLAN 2.

7500(config)#int Fast 5/1/1.2

7500(config-subif)#encapsulation dot1Q 2

7500(config-subif)#ip address 10.10.11.1 255.255.255.0

7500(config-subif)#exit

! -- Remember to save the configuration.

7500#write memory

Building configuration...

[OK]

7500#

!-- Note: Remember also that in any version of software previous !-- to Cisco IOS 12.2 or 12.2T for the 7000 or 7500 series router, you !-- have to issue the no ip cef command globally before configuring !-- 802.1q trunking on a sub-interface. Otherwise, you will see the !-- following error message: !-- 802.1q encapsulation not supported with CEF configured on the !-- interface. !-- For more information, refer to the Components Used section of !-- this document.

7500#show running-config

Building configuration...

Current configuration : 1593 bytes

!

version 12.1

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname 7500

!

!

ip subnet-zero

!

no ip cef

!

!

!

interface FastEthernet5/1/0

no ip address

no ip mroute-cache

speed 100

full-duplex

!

interface FastEthernet5/1/1

ip address 10.10.10.1 255.255.255.0

speed 100

full-duplex

hold-queue 300 in

!

interface FastEthernet5/1/1.2

encapsulation dot1Q 2

ip address 10.10.11.1 255.255.255.0

!

!

!

ip classless

no ip http server

!

!

!

line con 0

line aux 0

line vty 0 4

login

!

end

7500#

التحقق من الصحة

يوفر هذا القسم معلومات يمكنك إستخدامها للتأكد من أن التكوين يعمل بشكل صحيح.

يتم دعم بعض أوامر العرض بواسطة أداة مترجم الإخراج (العملاء المسجلون فقط)، والتي تتيح لك عرض تحليل إخراج أمر العرض.

على المادة حفازة 6500 مفتاح، أصدرت هذا أمر:

- show interface

- show ip route

- show port capabilities <mod/port>

- show port counters <mod/port>

- show port <mod>

- show vlan

- show trunk

على الموجه 7500 من Cisco، قم بإصدار هذا الأمر:

- show interfaces fastEthernet <slot/port-adapter/port>

أوامر show Catalyst 6500

العرض قارن يبدي أمر ال sc0 إدارة قارن عنوان و VLAN. في هذا مثال، التقصير VLAN استعملت، أي يكون VLAN 1.

Catalyst6500> (enable) show interface

sl0: flags=51<UP,POINTOPOINT,RUNNING>

slip 0.0.0.0 dest 0.0.0.0

sc0: flags=63

VLAN 1 inet 10.10.10.2 netmask 255.255.255.0 broadcast 10.10.10.255

Catalyst6500> (enable)

يعرض الأمر show ip route البوابة الافتراضية. في هذا المثال، 10.10.10.1 هو عنوان IP الخاص بقناة المنفذ 1 (ل 802.1q trunking)، أو قناة المنفذ 1.1 (ل ISL trunking).

Catalyst6500> (enable) show ip route

Fragmentation   Redirect   Unreachable

-------------   --------   -----------

enabled         enabled    enabled

The primary gateway: 10.10.10.1

Destination      Gateway          RouteMask    Flags   Use       Interface

---------------  ---------------  ----------   -----   --------  ---------

default          10.10.10.1       0x0          UG      0           sc0

10.10.10.0       10.10.10.2       0xffffff00   U       8           sc0

default          default          0xff000000   UH      0           sl0

Catalyst6500> (enable)

ينظر الأمر show port capabilities <mod/port>في إمكانيات أجهزة وحدات التحويل النمطية. يوضح هذا مثال أن ميناء 3/1 (نفسه ل 3/2) يكون EtherChannel قادر، أي trunking عملية كبسلة يدعمها، ومعلومات أخرى.

Catalyst6500> (enable) show port capabilities 3/1

Model                    WS-X6248-RJ-45

Port                     3/1

Type                     10/100BaseTX

Speed                    auto,10,100

Duplex                   half,full

Trunk encap type         802.1Q,ISL

Trunk mode               on,off,desirable,auto,nonegotiate

Channel                  yes

Broadcast suppression    percentage(0-100)

Flow control             receive-(off,on),send-(off)

Security                 yes

Membership               static,dynamic

Fast start               yes

QOS scheduling           rx-(1q4t),tx-(2q2t)

CoS rewrite              yes

ToS rewrite              DSCP

UDLD                     yes

Inline power             no

AuxiliaryVlan            1..1000,untagged,dot1p,none

SPAN                     source,destination

COPS port group          not supported

Catalyst6500> (enable)

يعطي الأمر <mod/port>show port counters نظرة على أخطاء المنافذ المحتملة. في هذا مثال، هذا ميناء خالي من أي خطأ. إن يمر أنت إختبار خطأ على الميناء، أحلت يتحرى مفتاح ميناء مشكلة ل كثير معلومة.

Catalyst6500> (enable) show port counters 3/1

Port  Align-Err  FCS-Err    Xmit-Err   Rcv-Err    UnderSize

----- ---------- ---------- ---------- ---------- ---------

3/1           0          0          0          0         0

Port  Single-Col Multi-Coll Late-Coll  Excess-Col Carri-Sen Runts     Giants

----- ---------- ---------- ---------- ---------- --------- --------- ---------

3/1           0          0          0          0         0         0         -

Last-Time-Cleared

--------------------------

Thu May 2 2002, 02:11:55

Catalyst6500> (enable)

يعرض الأمر show port <mod>حالة المنفذ، وشبكة VLAN، والشنطة، ومعلومات السرعة والإرسال ثنائي الإتجاه. في هذا المثال، يكون منفذ الوصول لمحطة العمل 1 هو 3/3، أي في شبكة VLAN رقم 1. منفذ الوصول لمحطة العمل 2 هو 3/4، أي يكون VLAN 2. الميناء 3/1 ال trunking ميناء.

Catalyst6500> (enable) show port 3

Port  Name                 Status     VLAN       Duplex Speed Type

----- -------------------- ---------- ---------- ------ ----- ------------

3/1                       connected  trunk        full   100 10/100BaseTX

3/2                       connected  1            full   100 10/100BaseTX

3/3                       connected  1          a-half  a-10 10/100BaseTX

3/4                       connected  2          a-full a-100 10/100BaseTX

!-- Output truncated

العرض vlan يبدي أمر الذي ميناء يكون عينت إلى VLANs خاص. لاحظت أن شنطة ميناء - 3/1 لا يظهر في هذا إنتاج، أي يكون عادي.

Catalyst6500> (enable) show vlan

VLAN Name                             Status    IfIndex Mod/Ports, Vlans

---- -------------------------------- --------- ------- ------------------------

1    default                          active    119     2/1-2

3/2-3,3/5-48

4/1-24

2    VLAN0002                         active    124     3/4

!-- Output truncated

العرض شنطة يبدي أمر ال trunking أسلوب، عملية كبسلة نوع، يسمح VLANs، و VLANs نشط. في هذا المثال، تكون شبكة VLAN 1 (مسموح بها ونشطة دائما بشكل افتراضي) وشبكة VLAN 2 هي شبكات VLAN النشطة حاليا للشنطة. لاحظت أن الشنطة ميناء في VLAN 1.

Catalyst6500> (enable) show trunk

* - indicates vtp domain mismatch

Port      Mode         Encapsulation  Status        Native vlan

--------  -----------  -------------  ------------  -----------

3/1      nonegotiate  isl            trunking      1

Port      VLANs allowed on trunk

--------  ---------------------------------------------------------------------

3/1      1-1005

Port      VLANs allowed and active in management domain

--------  ---------------------------------------------------------------------

3/1      1-2

Port      VLANs in spanning tree forwarding state and not pruned

--------  ---------------------------------------------------------------------

3/1      1-2

بالنسبة لتوصيل 802.1Q، يتغير إخراج الأمر بهذه الطريقة:

Catalyst6500> (enable) show trunk

* - indicates vtp domain mismatch

Port      Mode         Encapsulation  Status        Native VLAN

--------  -----------  -------------  ------------  -----------

3/1      nonegotiate  dot1q          trunking      1

Port      VLANs allowed on trunk

--------  ---------------------------------------------------------------------

3/1      1-1005

Port      VLANs allowed and active in management domain

--------  ---------------------------------------------------------------------

3/1      1-2

Port      VLANs in spanning tree forwarding state and not pruned

--------  ---------------------------------------------------------------------

3/1      1-2

Catalyst6500> (enable)

أوامر عرض الموجه 7500 من Cisco

هذا هو مخرج توصيل ISL:

7500#show interface FastEthernet5/1/1.1

FastEthernet5/1/1.1 is up, line protocol is up

Hardware is cyBus FastEthernet Interface, address is 0001.6490.f8a8 (bia 0001.

6490.f8a8)

Internet address is 10.10.10.1/24

MTU 1500 bytes, BW 200000 Kbit, DLY 100 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ISL Virtual LAN, Color 1.

ARP type: ARPA, ARP Timeout 04:00:00

7500#show interface FastEthernet5/1/1.2

FastEthernet5/1/1.2 is up, line protocol is up

Hardware is cyBus FastEthernet Interface, address is 0001.6490.f8a8 (bia 0001.

6490.f8a8)

Internet address is 10.10.11.1/24

MTU 1500 bytes, BW 200000 Kbit, DLY 100 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ISL Virtual LAN, Color 2.

ARP type: ARPA, ARP Timeout 04:00:00

يعرض الأمر show interfaces <slot/port-adapter/port>حالة الواجهات المادية للموجه، وما إذا كان هناك أي أخطاء على الواجهات. في هذا المثال، خالية من الأخطاء.

7500#show interface fa5/1/0

FastEthernet5/1/0 is up, line protocol is up

Hardware is cyBus FastEthernet Interface, address is 0001.6490.f8a8 (bia 0001.

6490.f8a8)

MTU 1500 bytes, BW 100000 Kbit, DLY 100 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, loopback not set

Keepalive set (10 sec)

Full-duplex, 100Mb/s, 100BaseTX/FX

ARP type: ARPA, ARP Timeout 04:00:00

Last input 1d00h, output 00:00:07, output hang never

Last clearing of "show interface" counters 1d00h

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue :0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

2929 packets input, 425318 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored

0 watchdog

0 input packets with dribble condition detected

12006 packets output, 1539768 bytes, 0 underruns

0 output errors, 0 collisions, 6 interface resets

0 babbles, 0 late collision, 0 deferred

0 lost carrier, 0 no carrier

0 output buffer failures, 0 output buffers swapped out

7500#

استكشاف الأخطاء وإصلاحها

لا تتوفر حاليًا معلومات محددة لاستكشاف الأخطاء وإصلاحها لهذا التكوين.

معلومات ذات صلة

- تكوين التوجيه بين شبكات VLAN وتوصيل ISL/802.1Q على مُحوّل Catalyst 2900XL/3500XL/2950 Switch باستخدام مُوّجه خارجي

- يشكل EtherChannel سريع و ISL/802.1q trunking بين CatOS مفتاح ومسحاج تخديد خارجي

- lan مفتاح دعم تكنولوجيا

- دعم منتجات محولات LAN

- الدعم التقني والمستندات - Cisco Systems