المحتويات

المقدمة

المتطلبات الأساسية

المتطلبات

المكونات المستخدمة

الاصطلاحات

النظرية الأساسية

بروتوكول التحكم في تجميع الارتباطات (LACP) وبروتوكول تجميع المنافذ (PAgP)

حزم المحولات و EtherChannel

إرشادات التكوين

التكوين

الرسم التخطيطي للشبكة

التكوينات

التحقق من الصحة

استكشاف الأخطاء وإصلاحها

معلومات ذات صلة

المقدمة

يزود هذا وثيقة عينة تشكيل ل التشكيل من cross-stack EtherChannel على cisco مادة حفازة 3750 مفتاح أن يركض cisco IOS® نظام برمجية. يمكن أن يسمى EtherChannel سريع EtherChannel أو gigabit EtherChannel. هذا يعتمد على سرعة القارن أو ميناء أن يكون استعملت أن يشكل الكومة المشتركة EtherChannel.

المتطلبات الأساسية

المتطلبات

لا توجد متطلبات خاصة لهذا المستند.

المكونات المستخدمة

أسست المعلومة في هذا وثيقة على المادة حفازة 3750 مفتاح أن يركض cisco ios برمجية إطلاق 12.2(25)sec.

تم إنشاء المعلومات الواردة في هذا المستند من الأجهزة الموجودة في بيئة معملية خاصة. بدأت جميع الأجهزة المُستخدمة في هذا المستند بتكوين ممسوح (افتراضي). إذا كانت شبكتك مباشرة، فتأكد من فهمك للتأثير المحتمل لأي أمر.

الاصطلاحات

راجع اصطلاحات تلميحات Cisco التقنية للحصول على مزيد من المعلومات حول اصطلاحات المستندات.

النظرية الأساسية

في هذا وثيقة، حزمت هذا قارن ل الكومة المشتركة EtherChannel:

- واجهتان Gigabit Ethernet لأحد المحولات من السلسلة Catalyst 3750 switches

- واجهة جيجابت إيثرنت لمحول آخر من Catalyst 3750 switch من المكدس نفسه

- ثلاث واجهات Gigabit Ethernet على محول Catalyst 3750 من مكدس مختلف

تم تصميم تقنية Cisco StackWise للاتصال البيني باستخدام مسارين للتدوير على نحو عكسي بسعة 16 جيجابايت لكل منهما. من أجل موازنة حركة مرور البيانات بكفاءة، يتم تخصيص الحزم بين هذين المسارين العقاريين للتدوير العكسي، والتي تقوم بإنشاء اتصال بيني 32 جيجابايت. هناك ممر مزدوج من أي ميناء إلى أي آخر ميناء ضمن المادة حفازة 3750 كومة. لذلك، ضمنت الحد الأقصى لوقت العمل لأن هناك دائما مسار بديل متاح إذا حدث فشل في أي من المسارين. المادة حفازة 3750 يساند:

- EtherChannel عبر المكدس

- وصلة عبر مجموعة الصفيفات (مع تجاوز الفشل في الثانية الفرعية)

- مسارات متساوية التكلفة عبر المكدس عبر محولات مختلفة في المكدس

بروتوكول التحكم في تجميع الارتباطات (LACP) وبروتوكول تجميع المنافذ (PAgP)

يتلقى EtherChannels تشكيل آلي مع إما ميناء تراكم بروتوكول (PAgP) أو خطوة تراكم تحكم بروتوكول (LACP). PAgP هو بروتوكول خاص من Cisco يمكنك تشغيله فقط على محولات Cisco وعلى تلك المحولات التي يرخص لها البائعون بدعم PAgP. يحدد IEEE 802. 3ad بروتوكول التحكم في تجميع الارتباطات (LACP). يسمح بروتوكول التحكم في تجميع الارتباطات (LACP) لمحولات Cisco بإدارة قنوات الإيثرنت بين المحولات التي تطابق بروتوكول 802.3ad.

لا يمكن تمكين PAgP على EtherChannels للمكدس المشترك بينما يتم دعم LACP على EtherChannels للمكدس المشترك من برنامج Cisco IOS الإصدار 12.2(25)SEC والإصدارات الأحدث. تبديل واجهات حزم LACP فقط مع واجهات الشركاء مع تكوين الوضع النشط أو السلبي. يمكنك تكوين ما يصل إلى 16 منفذا لتكوين قناة. ثمانية من المنافذ في الوضع النشط، الثمانية الأخرى في وضع الاستعداد. عندما يفشل أي واحد من الميناء نشط، إستعداد ميناء يصبح نشط. الواجهات مع تكوين الوضع فوق لا تتبادل حزم PAgP أو LACP.

يتم دعم أوضاع EtherChannel هذه على EtherChannel للمكدس التبادلي:

- active-يضع الواجهة في حالة التفاوض النشط، حيث تبدأ الواجهة المفاوضات مع الواجهات الأخرى بإرسال حزم LACP.

- passive—يضع واجهة في حالة تفاوض سلبي، حيث تستجيب الواجهة لحزم LACP التي تتلقاها الواجهة، ولكنها لا تبدأ تفاوض حزمة LACP. يقلل هذا الإعداد من نقل حزم LACP إلى الحد الأدنى.

- in—يفرض الواجهة داخل EtherChannel بدون PAgP أو LACP. مع ال فوق أسلوب، EtherChannel usable يتواجد فقط عندما قارن مجموعة في ال فوق أسلوب يتلقى توصيل إلى آخر قارن مجموعة في ال فوق أسلوب.

حزم المحولات و EtherChannel

إذا فشل عضو المكدس الذي يحتوي على منافذ مشاركة في EtherChannel أو ترك المكدس، فإن مدير المكدس يزيل منافذ عضو المكدس الفاشلة من EtherChannel. بقية ميناء من EtherChannel، إن أي، يستمر أن يزود موصولية.

عندما تتم إضافة محول إلى مكدس حالي، يستقبل المحول الجديد التكوين الجاري تشغيله من مدير المكدس ويحدث نفسه مع تكوين المكدس المرتبط ب EtherChannel. يستلم عضو المكدس أيضا معلومات التشغيل (قائمة المنافذ التي تكون قيد التشغيل أعضاء في قناة ما).

عندما يندمج حزمان لديهما EtherChannels مكونة بينهما، ينتج منافذ تكرار ذاتي. تقوم الشجرة المتفرعة باكتشاف هذا الشرط وتعمل وفقا لذلك. لا يتأثر أي تكوين PAgP أو LACP على مكدس محول رابح، ولكن يتم فقد تكوين PAgP أو LACP على مكدس المحولات الخاسرة بعد إعادة تمهيد المكدس.

باستخدام PAgP، إذا فشل مدير المكدس أو ترك المكدس، يتم إختيار مدير مكدس جديد. لا يتم تشغيل إعادة تقارب الشجرة المتفرعة ما لم يكن هناك تغيير في النطاق الترددي EtherChannel. يقوم مدير المكدس الجديد بمزامنة تكوين أعضاء المكدس مع تكوين مدير المكدس. لا يتأثر تكوين PAgP بعد تغيير مدير مكدس ما لم يكن ل EtherChannel منافذ قائمة على مدير المكدس القديم.

باستخدام LACP، يستخدم معرف النظام عنوان MAC للمكدس من مدير المكدس، وإذا تغير مدير المكدس، يمكن تغيير معرف نظام LACP. إذا تغير LACP System-id، فستقوم EtherChannel بالكامل برفرفة، وسيكون هناك إعادة تقارب STP. أستخدم أمر المؤقت stack-mac الدائم للتحكم في ما إذا كان عنوان MAC للمكدس يتغير أم لا أثناء تجاوز فشل أساسي.

إرشادات التكوين

اتبع الإرشادات الخاصة ب EtherChannel عبر المكدس:

- ل cross-stack EtherChannel تشكيل، ضمنت أن كل ميناء مستهدف ل EtherChannel إما شكلت ل LACP أو شكلت يدويا أن يكون في مجموعة القناة. أستخدم وضع channel-group channel-group-number على أمر تكوين الواجهة لتكوين المنافذ يدويا لتكون في مجموعة القنوات. لا يساند ال PAgP بروتوكول على cross-stack EtherChannels.

- إذا تم تكوين EtherChannel عبر المكدس وقطاعات مكدس المحولات، يمكن أن تحدث حلقات ومشكلات إعادة التوجيه.

- قم بتكوين EtherChannel عبر المكدس بما يصل إلى منفذي وحدة إيثرنت بسرعة 10 جيجابت.

أحلت EtherChannel تشكيل guidelines ل قائمة كاملة من guidelines المتعلقة ب EtherChannel تشكيل.

التكوين

في هذا القسم، تُقدّم لك معلومات تكوين الميزات الموضحة في هذا المستند.

ملاحظة: أستخدم أداة بحث الأوامر (للعملاء المسجلين فقط) للحصول على مزيد من المعلومات حول الأوامر المستخدمة في هذا القسم.

الرسم التخطيطي للشبكة

يستخدم هذا المستند إعداد الشبكة التالي:

في الرسم التخطيطي للشبكة هذا، هناك حزمتا محول Catalyst 3750، المكدس A و Stack B. للمكدس A ثلاثة أعضاء من المحول، والمكدس B به عضو محول واحد فقط. يتم تكوين EtherChannel مع منفذين على المحول 1 ومنفذ واحد على المحول 3 من المكدس A. تتصل هذه المنافذ بالمنافذ الثلاثة في المكدس B.

يتم إستخدام إعداد الشبكة لتكوين المنافذ كمنافذ خطوط اتصال.

التكوينات

يستخدم هذا المستند التكوينات التالية:

- شكلت عبر كومة EtherChannel دون PAgP أو LACP

- تكوين EtherChannel عبر المكدس باستخدام LACP

شكلت عبر كومة EtherChannel دون PAgP أو LACP

يزود هذا تشكيل مثال ال cross-stack EtherChannel تشكيل إن أنت إيقاف PAgP أو LACP:

المحول Catalyst 3750 Switch Stack A

3750switchstackA(config)#interface range gigabitethernet 1/0/4 - 5

3750switchstackA(config-if-range)#channel-group 1 mode on

!--- This command creates the port channel 1 interface. Because the mode !--- is configured ON, both the PAgP and LACP are disabled on these ports. !--- Issue the channel-group command first, before you enter any other commands on these !--- interfaces. Any commands that you issue on these interfaces after you issue the !--- channel-group command are added to the port channel interface automatically. !--- If you configure the port with all the commands and you issue the channel-group !--- command last, the port channel interface is created but does not have any !--- configurations. You must then add the other commands to the port channel interface !--- manually.

3750switchstackA(config-if-range)#switchport trunk encapsulation dot1q

3750switchstackA(config-if-range)#switchport mode trunk

3750switchstackA(config)#interface gigabitethernet 3/0/3

3750switchstackA(config-if)#channel-group 1 mode on

3750switchstackA(config-if)#switchport trunk encapsulation dot1q

3750switchstackA(config-if)#switchport mode trunk

حزمة المحول B Catalyst 3750

3750switchstackB(config)#interface range gigabitethernet 1/0/2 - 4

3750switchst(config-if-range)#channel-group 1 mode on

3750switchst(config-if-range)#switchport

3750switchst(config-if-range)#switchport trunk encapsulation dot1q

3750switchst(config-if-range)#switchport mode trunk

أنت يستطيع دققت EtherChannel وضع بهذه الطريقة:

3750switchstackA#show interfaces port-channel 1

Port-channel1 is up, line protocol is up (connected)

Hardware is EtherChannel, address is 0015.c6c1.3003 (bia 0015.c6c1.3003)

MTU 1500 bytes, BW 300000 Kbit, DLY 100 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, loopback not set

Full-duplex, 100Mb/s, link type is auto, media type is unknown

input flow-control is off, output flow-control is unsupported

Members in this channel: Gi1/0/4 Gi1/0/5 Gi2/0/3

ARP type: ARPA, ARP Timeout 04:00:00

Last input 00:00:01, output 00:07:06, output hang never

Last clearing of "show interface" counters never

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue: 0/40 (size/max)

5 minute input rate 1000 bits/sec, 2 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

2080 packets input, 191872 bytes, 0 no buffer

Received 1638 broadcasts (0 multicast)

0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored

0 watchdog, 1616 multicast, 0 pause input

0 input packets with dribble condition detected

3242 packets output, 261916 bytes, 0 underruns

0 output errors, 0 collisions, 7 interface resets

0 babbles, 0 late collision, 0 deferred

0 lost carrier, 0 no carrier, 0 PAUSE output

0 output buffer failures, 0 output buffers swapped out

3750switchstackA#show etherchannel summary

Flags:  D - down        P - in port-channel

I - stand-alone s - suspended

H - Hot-standby (LACP only)

R - Layer3      S - Layer2

U - in use      f - failed to allocate aggregator

u - unsuitable for bundling

w - waiting to be aggregated

d - default port

Number of channel-groups in use: 1

Number of aggregators:           1

Group  Port-channel  Protocol    Ports

------+-------------+-----------+-----------------------------------------------

1      Po1(SU)          -        Gi1/0/4(P)  Gi1/0/5(P)  Gi2/0/3(P)

ملاحظة: يبدي هذا مثال الخطأ رسالة أن يعرض عندما يحاول أنت أن يشكل EtherChannel مع PAgP:

المحول Catalyst 3750 Switch Stack A

3750switchstackA(config)#interface range gigabitethernet 1/0/4 - 5

3750switchstackA(config-if-range)#channel-group 1 mode desirable

3750switchstackA(config-if-range)#switchport trunk encapsulation dot1q

3750switchstackA(config-if-range)#switchport mode trunk

3750switchstackA(config)#interface gigabitethernet 3/0/3

3750switchstackA(config-if)#channel-group 1 mode desirable

%With PAgP enabled, all ports in the Channel should belong to the same switch

Command rejected (Port-channel1, Gi2/0/3): Invalid etherchnl mode

تكوين EtherChannel عبر المكدس باستخدام LACP

يبدي هذا مثال التشكيل من EtherChannel عندما أنت يمكن LACP. أدنى إصدار من IOS يدعم LACP في cross-stack EtherChannel هو cisco ios برمجية إطلاق 12.2(25)sec. يستعمل هذا مثال ال نشط أسلوب LACP تشكيل:

المحول Catalyst 3750 Switch Stack A

3750switchstackA(config)#interface range gigabitethernet 1/0/4 - 5

3750switchstackA(config-if-range)#channel-group 1 mode active

!--- This creates port channel 1 and configures it with LACP.

3750switchstackA(config-if-range)#switchport trunk encapsulation dot1q

3750switchstackA(config-if-range)#switchport mode trunk

3750switchstackA(config)#interface gigabitethernet 3/0/3

3750switchstackA(config-if)#channel-group 1 mode active

3750switchstackA(config-if)#switchport trunk encapsulation dot1q

3750switchstackA(config-if)#switchport mode trunk

حزمة المحول B Catalyst 3750

3750switchstackB(config)#interface range gigabitethernet 1/0/2 - 4

3750switchst(config-if-range)#channel-group 1 mode active

3750switchst(config-if-range)#switchport trunk encapsulation dot1q

3750switchst(config-if-range)#switchport mode trunk

أنت يستطيع دققت EtherChannel وضع بهذه الطريقة:

3750switchstackA#show interfaces port-channel 1

Port-channel1 is up, line protocol is up (connected)

Hardware is EtherChannel, address is 0015.c6c1.3003 (bia 0015.c6c1.3003)

MTU 1500 bytes, BW 300000 Kbit, DLY 100 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, loopback not set

Full-duplex, 100Mb/s, link type is auto, media type is unknown

input flow-control is off, output flow-control is unsupported

Members in this channel: Gi1/0/4 Gi1/0/5 Gi2/0/3

ARP type: ARPA, ARP Timeout 04:00:00

Last input 00:00:01, output 00:01:09, output hang never

Last clearing of "show interface" counters never

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue: 0/40 (size/max)

5 minute input rate 1000 bits/sec, 1 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

2628 packets input, 236478 bytes, 0 no buffer

Received 2112 broadcasts (0 multicast)

0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored

0 watchdog, 2090 multicast, 0 pause input

0 input packets with dribble condition detected

3398 packets output, 280241 bytes, 0 underruns

0 output errors, 0 collisions, 7 interface resets

0 babbles, 0 late collision, 0 deferred

0 lost carrier, 0 no carrier, 0 PAUSE output

0 output buffer failures, 0 output buffers swapped out

3750switchstackA#show etherchannel 1 summary

Flags:  D - down        P - in port-channel

I - stand-alone s - suspended

H - Hot-standby (LACP only)

R - Layer3      S - Layer2

U - in use      f - failed to allocate aggregator

u - unsuitable for bundling

w - waiting to be aggregated

d - default port

Number of channel-groups in use: 1

Number of aggregators:           1

Group  Port-channel  Protocol    Ports

------+-------------+-----------+-----------------------------------------------

1      Po1(SU)         LACP      Gi1/0/4(P)  Gi1/0/5(P)  Gi2/0/3(P)

يوضح هذا المثال تكوين LACP للوضع الخامل-النشط:

المحول Catalyst 3750 Switch Stack A

3750switchstackA(config)#interface range gigabitethernet 1/0/4 - 5

3750switchstackA(config-if-range)#channel-group 1 mode passive

3750switchstackA(config-if-range)#switchport trunk encapsulation dot1q

3750switchstackA(config-if-range)#switchport mode trunk

3750switchstackA(config)#interface gigabitethernet 3/0/3

3750switchstackA(config-if)#channel-group 1 mode passive

3750switchstackA(config-if)#switchport trunk encapsulation dot1q

3750switchstackA(config-if)#switchport mode trunk

حزمة المحول B Catalyst 3750

3750switchstackB(config)#interface range gigabitethernet 1/0/2 - 4

3750switchst(config-if-range)#channel-group 1 mode active

3750switchst(config-if-range)#switchport trunk encapsulation dot1q

3750switchst(config-if-range)#switchport mode trunk

أنت يستطيع دققت EtherChannel وضع بهذه الطريقة:

3750switchstackA#show interfaces port-channel 1

Port-channel1 is up, line protocol is up (connected)

Hardware is EtherChannel, address is 0015.63f6.b704 (bia 0015.63f6.b704)

MTU 1500 bytes, BW 300000 Kbit, DLY 100 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, loopback not set

Full-duplex, 100Mb/s, link type is auto, media type is unknown

input flow-control is off, output flow-control is unsupported

Members in this channel: Gi1/0/4 Gi1/0/5 Gi2/0/3

ARP type: ARPA, ARP Timeout 04:00:00

Last input 00:00:00, output 00:07:33, output hang never

Last clearing of "show interface" counters never

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue: 0/40 (size/max)

5 minute input rate 1000 bits/sec, 2 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

3436 packets input, 302216 bytes, 0 no buffer

Received 2807 broadcasts (0 multicast)

0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored

0 watchdog, 2785 multicast, 0 pause input

0 input packets with dribble condition detected

3632 packets output, 306875 bytes, 0 underruns

0 output errors, 0 collisions, 7 interface resets

0 babbles, 0 late collision, 0 deferred

0 lost carrier, 0 no carrier, 0 PAUSE output

0 output buffer failures, 0 output buffers swapped out

3750switchstackA#show etherchannel 1 summary

Flags:  D - down        P - in port-channel

I - stand-alone s - suspended

H - Hot-standby (LACP only)

R - Layer3      S - Layer2

U - in use      f - failed to allocate aggregator

u - unsuitable for bundling

w - waiting to be aggregated

d - default port

Number of channel-groups in use: 1

Number of aggregators:           1

Group  Port-channel  Protocol    Ports

------+-------------+-----------+-----------------------------------------------

1      Po1(SU)         LACP      Gi1/0/4(P)  Gi1/0/5(P)  Gi2/0/3(P)

التحقق من الصحة

استخدم هذا القسم لتأكيد عمل التكوين بشكل صحيح.

تدعم أداة مترجم الإخراج (للعملاءالمسجلين فقط) بعض أوامر show. استخدم أداة مترجم الإخراج (OIT) لعرض تحليل مُخرَج الأمر show .

أصدرت هذا أمر in order to دققت الميناء قناة في مادة حفازة 3750 مفتاح أن يركض cisco ios نظام برمجية:

- أبديت قارن ميناء-channel [channel-group-number]

- ملخص عرض EtherChannel [channel-group-number]

استكشاف الأخطاء وإصلاحها

لا تتوفر حاليًا معلومات محددة لاستكشاف الأخطاء وإصلاحها لهذا التكوين.

معلومات ذات صلة

- يعجز أن يخلق أكثر من إثني عشر قناة على المادة حفازة 3750 كومة يستعمل cisco شبكة مساعد ().

- عينة تشكيل: EtherChannel بين مادة حفازة مفتاح يركض CatOS و cisco ios برمجية

- EtherChannel بين مادة حفازة 3550/3560/3750 sery مفتاح ومادة حفازة يركض cisco ios نظام برمجية تشكيل مثال

- عينة تشكيل: EtherChannel بين مادة حفازة مفتاح يركض CatOS

- يشكل EtherChannel بين مادة حفازة 2900xl/3500xl مفتاح و CatOS مفتاح

- دعم منتجات المحولات

- دعم تقنية تحويل شبكات LAN

- الدعم التقني والمستندات - Cisco Systems