المحتويات

المقدمة

المتطلبات الأساسية

المتطلبات

المكونات المستخدمة

معلومات أساسية

إجراء إسترداد كلمة المرور خطوة بخطوة

معلومات ذات صلة

المقدمة

يوضح هذا المستند كيفية إستعادة كلمة مرور "إخراج إدخال إدارة المشرف" (MIO) لأجهزة سلسلة FirePOWER 9300/4100.

المتطلبات الأساسية

المتطلبات

لا توجد متطلبات خاصة لهذا المستند.

المكونات المستخدمة

تستند المعلومات الواردة في هذا المستند إلى إصدارات المكونات المادية التالية:

· أجهزة Cisco Firepower 4100 Series و 9300.

تم إنشاء المعلومات الواردة في هذا المستند من الأجهزة الموجودة في بيئة معملية خاصة. بدأت جميع الأجهزة المُستخدمة في هذا المستند بتكوين ممسوح (افتراضي). إذا كانت شبكتك مباشرة، فتأكد من فهمك للتأثير المحتمل لأي أمر.

معلومات أساسية

يتم تنفيذ إجراء إسترداد كلمة المرور عندما ينسى المستخدم كلمة مرور Supervisor MIO. لتحقيق ذلك، تتم إعادة ضبط جميع ملفات قاعدة البيانات وتكويناتها على إعداد إعدادات المصنع الافتراضية أثناء إجراء إسترداد كلمة المرور.

ملاحظة: يجب عدم إستخدام هذا الإجراء لإعادة ضبط كلمة المرور المعروفة بالفعل.

إجراء إسترداد كلمة المرور خطوة بخطوة

لاسترداد كلمات المرور الخاصة ب المشرف MIO، قم بإجراء الخطوات التالية:

الخطوة 1. قم بتوصيل جهاز كمبيوتر بمنفذ وحدة التحكم باستخدام كبل وحدة التحكم المزود، ثم اتصل بوحدة التحكم باستخدام مجموعة محاكي طرفي ل 9600 باود، و 8 وحدات بت بيانات، بدون تماثل، وحدة بت إيقاف واحدة، بدون التحكم في التدفق. تحقق من دليل تثبيت أجهزة Cisco Firepower 9300 للحصول على مزيد من المعلومات حول كبل وحدة التحكم.

ملاحظة: يحتاج إسترداد كلمة المرور إلى وصول وحدة التحكم إلى مشرف FXOS.

الخطوة 2. قم بإيقاف تشغيل النظام، ثم قم بتشغيله.

الخطوة 3. أثناء التمهيد، اضغط على مفتاح ESC أو CTRL + L عند مطالبتك بإدخال وضع ROMmon.

!!  Rommon image verified successfully  !!

Cisco System ROMMON, Version 1.0.09, RELEASE SOFTWARE

Copyright (c) 1994-2015  by Cisco Systems, Inc.

Compiled Thu 05/28/2015 17:21:39.46 by gilchen

Current image running: Boot ROM0

Last reset cause: ResetRequest

DIMM Slot 0 : Present

DIMM Slot 1 : Present

No USB drive !!

BIOS has been locked !!

Platform FPR9K-SUP with 16384 Mbytes of main memory

MAC Address: b0:aa:77:2f:93:74

find the string ! boot bootflash:/installables/switch/fxos-k9-kickstart.5.0.3.N2.3.14.69.SPA bootflash:/installables/switch/fxos-k9-system.5.0.3.N2.3.14.69.SPA

Use BREAK, ESC or CTRL+L to interrupt boot.

Use SPACE to begin boot immediately.

Boot interrupted.

rommon 1 >

الخطوة 4.   قم بتدوين صورة Kickstart وصورة النظام الموضحة أعلاه.

bootflash:/installables/switch/fxos-k9-kickstart.5.0.3.N2.3.14.69.SPA

bootflash:/installables/switch/fxos-k9-system.5.0.3.N2.3.14.69.SPA

الخطوة 5. تحميل صورة kickstart وأنت تدخل الأمر boot (kickstart image name) في موجه ROMMON.

rommon 1 > boot bootflash:/installables/switch/fxos-k9-kickstart.5.0.3.N2.3.14.69.SPA

!! Kickstart Image verified successfully !!

Linux version: 2.6.27.47 (security@cisco.com) #1 SMP Tue Nov 24 12:10:28 PST 2015

[ 0.000000] Fastboot Memory at 0c100000 of size 201326592

Usage: init 0123456SsQqAaBbCcUu

INIT: POST INIT Starts at Wed Jun 1 13:46:33 UTC 2016

can't create lock file /var/lock/mtab~302: No such file or directory (use -n flag to override)

S10mount-ramfs.supnuovaca Mounting /isan 3000m

Mounted /isan

TAC support: http://www.cisco.com/tac

Copyright (c) 2002-2015, Cisco Systems, Inc. All rights reserved.

The copyrights to certain works contained in this software are

owned by other third parties and used and distributed under

license. Certain components of this software are licensed under

the GNU General Public License (GPL) version 2.0 or the GNU

Lesser General Public License (LGPL) Version 2.1. A copy of each

such license is available at

http://www.opensource.org/licenses/gpl-2.0.php and

http://www.opensource.org/licenses/lgpl-2.1.php

switch(boot)#

الخطوة 6. في موجه الأمر switch(boot)#، أدخل الأمر config terminal للتنقل إلى وضع التكوين وما بعد ذلك، أدخل الأمر admin-password erase لإعادة ضبط كلمة المرور. يتم مطالبة المستخدم لاحقا بالتأكيد.

تحذير: إذا قمت بتحديد Y في هذه المطالبة، فإنها تمحو كل التكوين وترجع النظام إلى تكوين إعدادات المصنع الافتراضية.

switch(boot)#

switch(boot)# config terminal

Enter configuration commands, one per line.  End with CNTL/Z.

switch(boot)(config)# admin-password erase

Your password and configuration will be erased!

Do you want to continue? (y/n)  [n] y

الخطوة 7. الخروج إلى switch(boot)#prompt  وتحميل صورة النظام المحفوظة مسبقا لإكمال الإجراء.

switch(boot)(config)# exit

switch(boot)# load bootflash:/installables/switch/fxos-k9-system.5.0.3.N2.3.14.69.SPA

Uncompressing system image: bootflash:/installables/switch/fxos-k9-system.5.0.3.N2.3.14.69.SPA

<lines ommitted>

---- Basic System Configuration Dialog ----

This setup utility will guide you through the basic configuration of

the system. Only minimal configuration including IP connectivity to

the Fabric interconnect and its clustering mode is performed through these steps.

Type Ctrl-C at any time to abort configuration and reboot system.

To back track or make modifications to already entered values,

complete input till end of section and answer no when prompted

to apply configuration.

You have chosen to setup a new Security Appliance. Continue? (y/n): y

Enforce strong password? (y/n) [y]: n

Enter the password for "admin":

Confirm the password for "admin":

Enter the system name: FF09-FPR9300-1

Physical Switch Mgmt0 IP address : 192.168.10.10

Physical Switch Mgmt0 IPv4 netmask : 255.255.255.0

IPv4 address of the default gateway : 192.168.10.1

Configure the DNS Server IP address? (yes/no) [n]: n

Configure the default domain name? (yes/no) [n]: n

Following configurations will be applied:

Switch Fabric=A

System Name=FF09-FPR9300-1

Enforced Strong Password=no

Physical Switch Mgmt0 IP Address=192.168.10.1

Physical Switch Mgmt0 IP Netmask=255.255.255.0

Default Gateway=192.168.10.1

Ipv6 value=0

Apply and save the configuration (select 'no' if you want to re-enter)? (yes/no): yes

Applying configuration. Please wait.

Configuration file - Ok

Cisco FPR Series Security Appliance

FF09-FPR9300-1 login:

معلومات ذات صلة

- تصفح وثائق Cisco FXOS

- دليل البدء السريع Cisco ASA ل FirePOWER 9300

- الدعم التقني والمستندات - Cisco Systems