المحتويات

المقدمة

المتطلبات الأساسية

المتطلبات

المشكلة

الحل

المقدمة

يوضح هذا المستند كيفية النسخ الاحتياطي لقاعدة البيانات (DB) من جهاز من السلسلة Cisco M-Series إلى آخر.

المتطلبات الأساسية

المتطلبات

توصي Cisco بأن تكون لديك معرفة بالمواضيع التالية:

- AsyncOS 7.2 والإصدارات الأحدث

المشكلة

بدء النسخ الاحتياطي ل DB إلى جهاز ثانوي من الفئة M.

الحل

فيما يلي المتطلبات قبل بدء النسخ الاحتياطي لقاعدة البيانات إلى جهاز ثانوي من الفئة M.

- يجب أن يكون كلا الجهازين من الفئة M على نفس إصدار AsyncOS (الإصدار 7.2 والإصدارات الأحدث فقط)

- يجب أن يحتوي الجهاز الهدف من الفئة M على مساحة كافية على القرص للنسخ الاحتياطي. انتقل إلى إدارة النظام > إدارة الأقراص (انظر الوثائق عبر الإنترنت حول كيفية تخصيص بعض الأقراص إذا تم تركها فوق).

إذا لم تكن لديك مساحة كافية على القرص أثناء الإعداد، فقد تحصل على رسالة مماثلة لهذه:

Verifying target machine for version compatibility and disk space...

Backup cannot be scheduled. Reason: There is not enough space for Centralized

Spam Quarantine, Centralized Email Tracking, Centralized Reporting. Please

increase disk allocation for these services on the target machine.

أو

Verifying target machine for version compatibility and disk space...

Backup cannot be scheduled. Reason: There is not enough space for Centralized

Web Tracking. Please increase disk allocation for these services on the target

machine.

تحقق من الحصة النسبية للقرص كما هو مذكور مسبقا على الجهاز الهدف.

جهازا إدارة الأمان (SMA)، و M650 (مصدر نظام DB باسم m650sma.run)، و M1050 الهدف (النسخ الاحتياطي الوجهة لنظام DB باسم m1050sma.run و IP 192.168.15.1).

سجل الدخول إلى CLI على المصدر M-Series (في إختبارنا sma1.example.com) وأدخل الأوامر التالية:

sma1.example.com> backupconfig

Choose the operation you want to perform:

- VIEW - View scheduled backups

- VERIFY - Verify if backup can be scheduled to a remote machine

- SCHEDULE - Schedule backup to an appliance

- CANCEL - Cancel a scheduled backup

- STATUS - Show the status of a backup in progress.

- SETUP - Configure backup parameters.

[]> setup

Enter level of verbosity:

[0]> 0         < this can be 0 or 3 0=lowest verbosity of backup logs and 3 is the highest>

Compression is desirable on slow connections, but will only slow down backup on

fast networks. Would you like to enable compression? [N]>   <hit enter here to pick default withing the brackets [N]>

Choose the operation you want to perform:

- VIEW - View scheduled backups

- VERIFY - Verify if backup can be scheduled to a remote machine

- SCHEDULE - Schedule backup to an appliance

- CANCEL - Cancel a scheduled backup

- STATUS - Show the status of a backup in progress.

- SETUP - Configure backup parameters.

[]> verify

Enter the IP address of a machine to transfer data to.

[]> 192.168.15.1

Enter a name to identify this appliance

[]>sma2.example.com

Please enter username and password:

Username:

[]> admin

Password:

[]> <enter admin password for the target SMA>

Verifying target machine for version compatibility and disk space...

Backup can be scheduled on to 192.168.15.1.

Choose the operation you want to perform:

- VIEW - View scheduled backups

- VERIFY - Verify if backup can be scheduled to a remote machine

- SCHEDULE - Schedule backup to an appliance

- CANCEL - Cancel a scheduled backup

- STATUS - Show the status of a backup in progress.

- SETUP - Configure backup parameters.

[]> schedule

Enter the IP address of a machine to transfer data to.

[]> 192.168.15.1

Enter a name to identify this appliance

[]>sma2.example.com

Please enter username and password:

Username:

[]> admin

Password:

[]> <type the admin password on the target SMA>

Verifying target machine for version compatibility and disk space...

1. Set up a repeating backup schedule

2. Schedule a single backup

3. Start a single backup now

[1]>

1. Daily

2. Weekly

3. Monthly

[1]> 3

What day of the month would you like the backup to occur?

[1]>  <hit enter here>

What time of day would you like the backup to start?  Please enter in HH:MM

format.

[]> 02:00

Please enter a name for this backup job:

[]> weekly

Backup "weekly" has been scheduled successfully.

Choose the operation you want to perform:

- VIEW - View scheduled backups

- VERIFY - Verify if backup can be scheduled to a remote machine

- SCHEDULE - Schedule backup to an appliance

- CANCEL - Cancel a scheduled backup

- STATUS - Show the status of a backup in progress.

- SETUP - Configure backup parameters.

[]> view

Scheduled Backups:

# Name   IP              Schedule

= ====== =============== ================================

1 weekly To 192.168.15.1 on day 1 of every month at 02:00

Choose the operation you want to perform:

- VIEW - View scheduled backups

- VERIFY - Verify if backup can be scheduled to a remote machine

- SCHEDULE - Schedule backup to an appliance

- CANCEL - Cancel a scheduled backup

- STATUS - Show the status of a backup in progress.

- SETUP - Configure backup parameters.

[]> <hit enter until your back in CLI>

sma1.example.com> commit

Please enter some comments describing your changes:

[]> scheduled a weekly backup

Changes committed: Wed Mar 16 18:09:51 2011 GMT

sma1.example.com>