المحتويات

المقدمة

المتطلبات الأساسية

المتطلبات

المكونات المستخدمة

الاصطلاحات

التكوين

الرسم التخطيطي للشبكة

التكوينات

التحقق من الصحة

استكشاف الأخطاء وإصلاحها

أوامر استكشاف الأخطاء وإصلاحها

معلومات ذات صلة

المقدمة

يقدم هذا المستند نموذجا لتكوين شبكة VPN الديناميكية متعددة النقاط المتصلة بالشبكة (DMVPN) باستخدام تضمين التوجيه العام (GRE) عبر IPSec مع بروتوكول توجيه العبارة الداخلي المحسن (EIGRP) وترجمة عنوان الشبكة (NAT) والتحكم في الوصول المستند إلى السياق (CBAC).

المتطلبات الأساسية

المتطلبات

قبل إنشاء نفق GRE متعدد النقاط (mGRE) و IPSec، يجب تحديد سياسة تبادل مفتاح الإنترنت (IKE) باستخدام أمر سياسة التشفير isakmp.

ملاحظة: للعثور على معلومات إضافية حول الأوامر المستخدمة في هذا المستند، أستخدم أداة بحث الأوامر (للعملاء المسجلين فقط).

المكونات المستخدمة

تستند المعلومات الواردة في هذا المستند إلى إصدارات البرامج والمكونات المادية التالية:

- برنامج Cisco IOS® الإصدار 12.2(15)T1 على الموجه الموجه الموجه و 12.3(1.6) على الموجهات عبر الإنترنت

- الموجه Cisco 3620 كموجه محوري، موجهات Cisco 1720 وموجه Cisco 3620 واحد كموجهات يتم التحدث بها

تم إنشاء المعلومات المُقدمة في هذا المستند من الأجهزة الموجودة في بيئة معملية خاصة. بدأت جميع الأجهزة المُستخدمة في هذا المستند بتكوين ممسوح (افتراضي). إذا كنت تعمل في شبكة مباشرة، فتأكد من فهمك للتأثير المحتمل لأي أمر قبل استخدامه.

الاصطلاحات

للحصول على مزيد من المعلومات حول اصطلاحات المستندات، ارجع إلى اصطلاحات تلميحات Cisco التقنية.

التكوين

في هذا القسم، تُقدّم لك معلومات تكوين الميزات الموضحة في هذا المستند.

ملاحظة: للعثور على معلومات إضافية حول الأوامر المستخدمة في هذا المستند، أستخدم أداة بحث الأوامر (للعملاء المسجلين فقط).

الرسم التخطيطي للشبكة

يستخدم هذا المستند إعداد الشبكة الموضح في الرسم التخطيطي أدناه.

التكوينات

يستخدم هذا المستند التكوينات الموضحة أدناه.

- الموزع - 3620-B

- تحدث 1 - 3620 - ألف

- تكلم 2 - 1720-ب

- تكلم 3 - 1720 - ألف

الموزع - 3620-B

3620-B#write terminal

Building configuration...

Current configuration : 2607 bytes

!

version 12.2

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname 3620-B

!

logging queue-limit 100

!

memory-size iomem 10

ip subnet-zero

!

!

ip cef

no ip domain lookup

!

!--- This is the CBAC configuration and what to inspect. !--- This will be applied outbound on the external interface.

ip inspect name in2out rcmd

ip inspect name in2out ftp

ip inspect name in2out tftp

ip inspect name in2out tcp timeout 43200

ip inspect name in2out http

ip inspect name in2out udp

ip audit po max-events 100

!

!

!

!--- Create an Internet Security Association and Key Management !--- Protocol (ISAKMP) policy for Phase 1 negotiations.

!

crypto isakmp policy 5

authentication pre-share

group 2

!--- Add dynamic pre-shared key.

!--- Here "dmvpn" is the word that is used as the key.

crypto isakmp key dmvpnkey address 0.0.0.0 0.0.0.0

crypto isakmp nat keepalive 20

!

!

!--- Create the Phase 2 policy for actual data encryption.

crypto ipsec transform-set dmvpnset esp-3des esp-sha-hmac

!

!--- Create an IPSec profile to be applied dynamically !--- to the GRE over IPSec tunnels.

crypto ipsec profile dmvpnprof

set transform-set dmvpnset

!

!

no voice hpi capture buffer

no voice hpi capture destination

!

!

mta receive maximum-recipients 0

!

!

!--- This is the inside interface.

interface Loopback1

ip address 192.168.117.1 255.255.255.0

ip nat inside

!

!--- This is the mGRE interface for dynamic GRE tunnels.

interface Tunnel1

description MULTI-POINT GRE TUNNEL for BRANCHES

bandwidth 1000

ip address 172.16.0.1 255.255.255.0

no ip redirects

ip mtu 1400

ip nhrp authentication dmvpn

ip nhrp map multicast dynamic

ip nhrp network-id 99

ip nhrp holdtime 300

no ip split-horizon eigrp 1

no ip mroute-cache

delay 1000

tunnel source FastEthernet0/0

tunnel mode gre multipoint

tunnel key 100000

tunnel protection ipsec profile dmvpnprof

!

!--- This is the outside interface.

interface FastEthernet0/0

ip address 14.24.117.1 255.255.0.0

ip nat outside

ip access-group 100 in

ip inspect in2out out

no ip mroute-cache

duplex auto

speed auto

!

interface Serial0/0

no ip address

shutdown

clockrate 2000000

no fair-queue

!

interface FastEthernet0/1

no ip address

no ip mroute-cache

duplex auto

speed auto

!

!--- Enable a routing protocol to send/receive dynamic !--- updates about the private networks over the tunnels.

router eigrp 1

network 172.16.0.0 0.0.0.255

network 192.168.117.0

no auto-summary

!

!--- Perform NAT on local traffic !--- going directly out FastEthernet0/0.

ip nat inside source list 110 interface FastEthernet0/0 overload

ip http server

no ip http secure-server

ip classless

ip route 0.0.0.0 0.0.0.0 14.24.1.1

ip route 2.0.0.0 255.0.0.0 14.24.121.1

!

!

!

!--- Allow ISAKMP, ESP, and GRE traffic inbound. !--- CBAC will open other inbound access as needed.

access-list 100 permit udp any host 14.24.117.1 eq 500

access-list 100 permit esp any host 14.24.117.1

access-list 100 permit gre any host 14.24.117.1

access-list 100 deny ip any any

access-list 110 permit ip 192.168.117.0 0.0.0.255 any

!

!

call rsvp-sync

!

!

mgcp profile default

!

dial-peer cor custom

!

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

login

!

!

end

3620-B#

تحدث 1 - 3620 - ألف

3620-A#write terminal

Building configuration...

Current configuration : 2559 bytes

!

version 12.2

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname 3620-A

!

boot system flash slot0:c3620-ik9o3s7-mz.122-15.T1.bin

logging queue-limit 100

!

memory-size iomem 15

ip subnet-zero

!

!

ip cef

no ip domain lookup

!

!--- This is the CBAC configuration and what to inspect. !--- This will be applied outbound on the external interface.

ip inspect name in2out rcmd

ip inspect name in2out tftp

ip inspect name in2out udp

ip inspect name in2out tcp timeout 43200

ip inspect name in2out realaudio

ip inspect name in2out vdolive

ip inspect name in2out netshow

ip audit po max-events 100

!

!

!

!--- Create an ISAKMP policy for !--- Phase 1 negotiations.

crypto isakmp policy 5

authentication pre-share

group 2

!--- Add dynamic pre-shared key.

crypto isakmp key dmvpnkey address 0.0.0.0 0.0.0.0

!

!

!--- Create the Phase 2 policy for actual data encryption.

crypto ipsec transform-set dmvpnset esp-3des esp-sha-hmac

!

!--- Create an IPSec profile to be applied dynamically !--- to the GRE over IPSec tunnels.

crypto ipsec profile dmvpnprof

set transform-set dmvpnset

!

!

no voice hpi capture buffer

no voice hpi capture destination

!

!

mta receive maximum-recipients 0

!

!

!--- This is the inside interface.

interface Loopback1

ip address 192.168.118.1 255.255.255.0

ip nat inside

!

!--- This is the mGRE interface for dynamic GRE tunnels.

interface Tunnel1

description HOST DYNAMIC TUNNEL

bandwidth 1000

ip address 172.16.0.2 255.255.255.0

no ip redirects

ip mtu 1400

ip nhrp authentication dmvpn

ip nhrp map 172.16.0.1 14.24.117.1

ip nhrp map multicast 14.24.117.1

ip nhrp network-id 99

ip nhrp holdtime 300

ip nhrp nhs 172.16.0.1

no ip mroute-cache

delay 1000

tunnel source Ethernet0/0

tunnel mode gre multipoint

tunnel key 100000

tunnel protection ipsec profile dmvpnprof

!

!--- This is the outside interface.

interface Ethernet0/0

ip address 14.24.118.1 255.255.0.0

ip nat outside

ip inspect in2out out

ip access-group 100 in

no ip mroute-cache

half-duplex

!

interface Ethernet0/1

no ip address

half-duplex

!

interface Ethernet0/2

no ip address

shutdown

half-duplex

!

interface Ethernet0/3

no ip address

shutdown

half-duplex

!

!--- Enable a routing protocol to send/receive dynamic !--- updates about the private networks over the tunnel.

router eigrp 1

network 172.16.0.0 0.0.0.255

network 192.168.118.0

no auto-summary

!

!--- Perform NAT on local traffic !--- going directly out Ethernet0/0.

ip nat inside source list 110 interface Ethernet0/0 overload

ip http server

no ip http secure-server

ip classless

ip route 0.0.0.0 0.0.0.0 14.24.1.1

!

!

!--- Allow ISAKMP, ESP, and GRE traffic inbound. !--- CBAC will open inbound access as needed.

access-list 100 permit udp any host 14.24.118.1 eq 500

access-list 100 permit esp any host 14.24.118.1

access-list 100 permit gre any host 14.24.118.1

access-list 100 deny ip any any

access-list 110 permit ip 192.168.118.0 0.0.0.255 any

!

!

call rsvp-sync

!

!

mgcp profile default

!

dial-peer cor custom

!

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

login

!

!

end

3620-A#

تكلم 2 - 1720-ب

1720-b#write terminal

Building configuration...

Current configuration : 2543 bytes

!

version 12.2

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname 1720-b

!

boot system flash flash:c1700-ny-mz.122-8.YJ

logging queue-limit 100

enable password cisco

!

username 7206-B password 0 cisco

ip subnet-zero

!

!

no ip domain lookup

!

ip cef

!--- This is the CBAC configuration and what to inspect. !--- This will be applied outbound on the external interface.

ip inspect name in2out rcmd

ip inspect name in2out tftp

ip inspect name in2out udp

ip inspect name in2out tcp timeout 43200

ip inspect name in2out realaudio

ip inspect name in2out vdolive

ip inspect name in2out netshow

ip audit po max-events 100

!

!

vpdn-group 1

request-dialin

protocol pppoe

!

!

!--- Create an ISAKMP policy for !--- Phase 1 negotiations.

crypto isakmp policy 5

authentication pre-share

group 2

!--- Add dynamic pre-shared key.

crypto isakmp key dmvpnkey address 0.0.0.0 0.0.0.0

!

!

!--- Create the Phase 2 policy for actual data encryption.

crypto ipsec transform-set dmvpnset esp-3des esp-sha-hmac

!

!--- Create an IPSec profile to be applied dynamically !--- to the GRE over IPSec tunnels.

crypto ipsec profile dmvpnprof

set transform-set dmvpnset

!

!

!--- This is the inside interface.

interface Loopback1

ip address 192.168.116.1 255.255.255.0

ip nat inside

!

!--- This is the mGRE interface for dynamic GRE tunnels.

interface Tunnel1

description HOST DYNAMIC TUNNEL

bandwidth 1000

ip address 172.16.0.3 255.255.255.0

no ip redirects

ip mtu 1400

ip nhrp authentication dmvpn

ip nhrp map 172.16.0.1 14.24.117.1

ip nhrp map multicast 14.24.117.1

ip nhrp network-id 99

ip nhrp holdtime 300

ip nhrp nhs 172.16.0.1

no ip mroute-cache

delay 1000

tunnel source Dialer1

tunnel mode gre multipoint

tunnel key 100000

tunnel protection ipsec profile dmvpnprof

!

interface Ethernet0

no ip address

half-duplex

!

interface FastEthernet0

no ip address

no ip mroute-cache

speed auto

pppoe enable

pppoe-client dial-pool-number 1

!

!--- This is the outside interface.

interface Dialer1

ip address 2.2.2.10 255.255.255.0

ip inspect in2out out

ip access-group 100 in

encapsulation ppp

dialer pool 1

dialer-group 1

ppp authentication pap chap callin

!

!--- Enable a routing protocol to send/receive dynamic !--- updates about the private networks.

router eigrp 1

network 172.16.0.0 0.0.0.255

network 192.168.116.0

no auto-summary

!

!--- Perform NAT on local traffic !--- going directly out Dialer1.

ip nat inside source list 110 interface Dialer1 overload

ip classless

ip route 0.0.0.0 0.0.0.0 Dialer1

no ip http server

no ip http secure-server

!

!

!

!--- Allow ISAKMP, ESP, and GRE traffic inbound. !--- CBAC will open inbound access as needed.

access-list 100 permit udp any host 14.24.116.1 eq 500

access-list 100 permit esp any host 14.24.116.1

access-list 100 permit gre any host 14.24.116.1

access-list 100 deny ip any any

access-list 110 permit ip 192.168.116.0 0.0.0.255 any

dialer-list 1 protocol ip permit

!

!

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

login

!

no scheduler allocate

end

1720-b#

تكلم 3 - 1720 - ألف

1720-A#write terminal

Building configuration...

Current configuration : 1770 bytes

!

version 12.2

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname 1720-A

!

logging queue-limit 100

!

memory-size iomem 25

ip subnet-zero

!

!

!

ip cef

!--- This is the CBAC configuration and what to inspect. !--- This will be applied outbound on the external interface.

ip inspect name in2out rcmd

ip inspect name in2out tftp

ip inspect name in2out udp

ip inspect name in2out tcp timeout 43200

ip inspect name in2out realaudio

ip inspect name in2out vdolive

ip inspect name in2out netshow

ip audit po max-events 100

!

!

!--- Create an ISAKMP policy for !--- Phase 1 negotiations.

crypto isakmp policy 5

authentication pre-share

group 2

!--- Add dynamic pre-shared key.

crypto isakmp key dmvpnkey address 0.0.0.0 0.0.0.0

!

!

!--- Create the Phase 2 policy for actual data encryption.

crypto ipsec transform-set dmvpnset esp-3des esp-sha-hmac

!

!--- Create an IPSec profile to be applied dynamically !--- to the GRE over IPSec tunnels.

crypto ipsec profile dmvpnprof

set transform-set dmvpnset

!

!

!--- This is the inside interface.

interface Loopback1

ip address 192.168.120.1 255.255.255.0

ip nat inside

!

!--- This is the mGRE interface for dynamic GRE tunnels.

interface Tunnel1

description HOST DYNAMIC TUNNEL

bandwidth 1000

ip address 172.16.0.4 255.255.255.0

no ip redirects

ip mtu 1400

ip nhrp authentication dmvpn

ip nhrp map 172.16.0.1 14.24.117.1

ip nhrp map multicast 14.24.117.1

ip nhrp network-id 99

ip nhrp holdtime 300

ip nhrp nhs 172.16.0.1

no ip mroute-cache

delay 1000

tunnel source FastEthernet0

tunnel mode gre multipoint

tunnel key 100000

tunnel protection ipsec profile dmvpnprof

!

interface Ethernet0

no ip address

no ip mroute-cache

half-duplex

!

!--- This is the outside interface.

interface FastEthernet0

ip address 14.24.120.1 255.255.0.0

ip nat outside

ip inspect in2out out

ip access-group 100 in

no ip mroute-cache

speed auto

!

!--- Enable a routing protocol to send/receive dynamic !--- updates about the private networks.

router eigrp 1

network 172.16.0.0 0.0.0.255

network 192.168.120.0

no auto-summary

!

!--- Perform NAT on local traffic !--- going directly out FastEthernet0.

ip nat inside source list 110 interface FastEthernet0 overload

ip classless

ip route 0.0.0.0 0.0.0.0 14.24.1.1

no ip http server

no ip http secure-server

!

!

!

!--- Allow ISAKMP, ESP, and GRE traffic inbound. !--- CBAC will open inbound access as needed.

access-list 100 permit udp any host 14.24.116.1 eq 500

access-list 100 permit esp any host 14.24.116.1

access-list 100 permit gre any host 14.24.116.1

access-list 100 deny ip any any

access-list 110 permit ip 192.168.120.0 0.0.0.255 any

!

!

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

login

!

no scheduler allocate

end

1720-A#

التحقق من الصحة

يوفر هذا القسم معلومات يمكنك إستخدامها للتأكد من أن التكوين يعمل بشكل صحيح.

يتم دعم بعض أوامر العرض بواسطة أداة مترجم الإخراج (العملاء المسجلون فقط)، والتي تتيح لك عرض تحليل إخراج أمر العرض.

- show crypto isakmp sa— يعرض حالة اقتران أمان ISAKMP (SA).

- show crypto engine connections active —يعرض إجمالي التشفير/فك التشفير لكل SA.

- show crypto ipsSA— يعرض الإحصائيات على الأنفاق النشطة.

- show ip route—يعرض جدول التوجيه.

- show ip eigrp neighbor—يعرض جيران EIGRP.

- show ip nhrp—يعرض ذاكرة التخزين المؤقت لبروتوكول تحليل الخطوة التالية (NHRP) ل IP، والتي تقتصر إختياريا على إدخالات ذاكرة التخزين المؤقت الديناميكية أو الثابتة لواجهة معينة.

- show crypto socket— يعرض جدول مأخذ التشفير بين NHRP و IPSec.

استكشاف الأخطاء وإصلاحها

يوفر هذا القسم معلومات يمكنك استخدامها لاستكشاف أخطاء التكوين وإصلاحها.

أوامر استكشاف الأخطاء وإصلاحها

ملاحظة: قبل إصدار أوامر تصحيح الأخطاء، يرجى الاطلاع على المعلومات المهمة في أوامر تصحيح الأخطاء.

- debug crypto ipSec—يعرض أحداث IPSec.

- debug crypto isakmp—يعرض الرسائل المتعلقة بأحداث IKE.

- debug crypto engine—يعرض معلومات من محرك التشفير.

- debug crypto socket—يعرض معلومات حول جدول مأخذ التوصيل بين NHRP و IPSec.

- debug nhrp—يعرض معلومات حول أحداث NHRP.

- debug nhrp ربط—يعرض معلومات حول حزم NHRP.

- debug tunnel protection—يعرض معلومات حول أنفاق GRE الديناميكية.

يمكن العثور على معلومات إضافية حول أستكشاف أخطاء IPSec وإصلاحها في أستكشاف أخطاء أمان IP وإصلاحها - فهم أوامر تصحيح الأخطاء واستخدامها.

معلومات ذات صلة

- نظرة عامة على DMVPN و Cisco IOS

- صفحة دعم IPSec

- الدعم التقني والمستندات - Cisco Systems