المحتويات

المقدمة

المتطلبات الأساسية

المتطلبات

المكونات المستخدمة

الاصطلاحات

التكوين

الرسم التخطيطي للشبكة

التكوينات

كيف تعمل؟

الظروف العادية (قبل تجاوز الفشل)

بعد تجاوز فشل HSRP و IPSec

بعد إسترداد الموجه الأساسي HSRP الأصلي من انقطاع

معلومات ذات صلة

المقدمة

يصف هذا المستند الميزات الجديدة عالية التوفر لشبكات VPN IPSec من موقع إلى موقع. غالبا ما يتم إستخدام بروتوكول الموجه الاحتياطي الفعال (HSRP) لتعقب حالة واجهة الموجهات لتحقيق تجاوز الفشل بين الموجهات. ومع ذلك، نظرا لعدم وجود إرتباط داخلي بين IPSec و HSRP، لا يتعقب HSRP حالة اقترانات أمان IPSec (SAs) ويتطلب IPSec مخططات للمزامنة مع تجاوز فشل HSRP عند حدوثه. هذه بعض الميزات البارزة للخطط المستخدمة لتوفير اقتران أوثق بين IPSec و HSRP:

- يتم إستخدام Keepalive لتبادل مفتاح الإنترنت (IKE) للسماح ل IPSec باكتشاف تجاوز فشل HSRP في الوقت المناسب.

- يتم ربط خريطة التشفير المطبقة على واجهة موجه معينة بمجموعة HSRP التي تم تكوينها بالفعل على تلك الواجهة لتوعية IPSec بإعداد HSRP. وهذا يسمح أيضا IPSec باستخدام عنوان IP الظاهري HSRP كهوية بروتوكول إدارة المفاتيح وارتباط أمان الإنترنت (ISAKMP) لموجهات HSRP.

- يتم إستخدام ميزة إدخال المسار العكسي (RRI) للسماح بتحديثات معلومات التوجيه الديناميكية أثناء تجاوز فشل HSRP و IPSec.

ملاحظة: يوضح هذا المستند كيفية إستخدام بروتوكول الموجه الاحتياطي الفعال (HSRP) مع VPN. يتم إستخدام HSRP أيضا لتعقب إرتباطات ISP الفاشلة. راجع تحليل مستويات خدمة IP باستخدام عملية صدى ICMP من أجل تكوين إرتباطات ISP المكررة على الموجهات. هنا المصدر أداة المسحاج تخديد والغاية أداة ال isp.

المتطلبات الأساسية

المتطلبات

لا توجد متطلبات أساسية خاصة لهذا المستند.

المكونات المستخدمة

تستند المعلومات الواردة في هذا المستند إلى إصدارات البرامج والمكونات المادية التالية:

- الموجّهات من السلسلة 7200 من Cisco

- برنامج IOS® الإصدار 12.3(7)T1، c7200-a3jk9s-mz.123-7.T1 من Cisco

تم إنشاء المعلومات المُقدمة في هذا المستند من الأجهزة الموجودة في بيئة معملية خاصة. بدأت جميع الأجهزة المُستخدمة في هذا المستند بتكوين ممسوح (افتراضي). إذا كنت تعمل في شبكة مباشرة، فتأكد من فهمك للتأثير المحتمل لأي أمر قبل استخدامه.

الاصطلاحات

راجع اصطلاحات تلميحات Cisco التقنية للحصول على مزيد من المعلومات حول اصطلاحات المستندات.

التكوين

في هذا القسم، تُقدّم لك معلومات تكوين الميزات الموضحة في هذا المستند.

ملاحظة: أستخدم أداة بحث الأوامر (للعملاء المسجلين فقط) للحصول على مزيد من المعلومات حول الأوامر المستخدمة في هذا القسم.

الرسم التخطيطي للشبكة

يستخدم هذا المستند إعداد الشبكة التالي:

التكوينات

يستخدم هذا المستند التكوينات التالية:

- تكوين Cisco VPN 7200

- التكوين 7204VXR-1 من Cisco

- التكوين 7204VXR-2 من Cisco

- التكوين 7206-1 من Cisco

تكوين Cisco VPN 7200

vpn7200#show run

Building configuration...

Current configuration : 1854 bytes

!

version 12.2

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname vpn7200

!

!

ip subnet-zero

ip cef

!--- Defines ISAKMP policy and IKE pre-shared key for !--- IKE authentication. Note that 172.16.172.53 is the !--- HSRP virtual IP address of the remote HSRP routers.

crypto isakmp policy 1

hash md5

authentication pre-share

crypto isakmp key cisco123 address 172.16.172.53

!--- IKE keepalive to detect the IPSec liveness of the remote !--- VPN router. When HSRP failover happens, IKE keepalive !--- will detect the HSRP router switchover.

crypto isakmp keepalive 10

!

!

crypto ipsec transform-set myset esp-des esp-md5-hmac

!--- Defines crypto map. Note that the peer address is the !--- HSRP virtual IP address of the remote HSRP routers.

crypto map vpn 10 ipsec-isakmp

set peer 172.16.172.53

set transform-set myset

match address 101

!

interface Loopback0

ip address 20.1.1.1 255.255.255.255

!

interface FastEthernet0/0

ip address 10.48.66.66 255.255.254.0

duplex full

speed 100

!

interface FastEthernet0/1

ip address 172.16.172.69 255.255.255.240

duplex full

speed 100

crypto map vpn

!

ip classless

ip route 10.1.1.0 255.255.255.0 172.16.172.65

ip route 99.99.99.99 255.255.255.255 172.16.172.65

ip route 172.16.172.48 255.255.255.240 172.16.172.65

no ip http server

!

access-list 101 permit ip 20.1.1.0 0.0.0.255 10.1.1.0 0.0.0.255

access-list 101 permit ip 20.1.1.0 0.0.0.255 host 99.99.99.99

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

login

!

end

التكوين 7204VXR-1 من Cisco

7204VXR-1#show run

Building configuration...

Current configuration : 1754 bytes

!

version 12.3

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname 7204VXR-1

!

boot-start-marker

boot-end-marker

!

!

no aaa new-model

ip subnet-zero

!

!

no ip domain lookup

!

!

ip cef!

!--- Defines ISAKMP policy.

crypto isakmp policy 1

hash md5

authentication pre-share

crypto isakmp key cisco123 address 172.16.172.69

crypto isakmp keepalive 10

!

!

crypto ipsec transform-set myset esp-des esp-md5-hmac

!--- Defines crypto map. Note that "reverse-route" !--- turns on the RRI feature.

crypto map vpn 10 ipsec-isakmp

set peer 172.16.172.69

set transform-set myset

match address 101

reverse-route

!

!

!--- Define HSRP under the interface. HSRP will track the !--- internal interface as well. HSRP group name must be !--- defined here and will be used for IPSec configuration. !--- The "redundancy" keyword in the crypto map command !--- specifies the HSRP group to which IPSec will couple. !--- In normal circumstances, this router will be the HSRP !--- primary router since it has higher priority than the !--- other HSRP router.

interface FastEthernet0/0

ip address 172.16.172.52 255.255.255.240

duplex full

speed 100

standby 1 ip 172.16.172.53

standby 1 priority 200

standby 1 preempt

standby 1 name VPNHA

standby 1 track FastEthernet0/1 150

crypto map vpn redundancy VPNHA

!

interface FastEthernet0/1

ip address 10.1.1.1 255.255.255.0

duplex full

speed 100

!

interface ATM1/0

no ip address

shutdown

no atm ilmi-keepalive

!

interface FastEthernet3/0

no ip address

shutdown

duplex half

!

interface ATM6/0

no ip address

shutdown

no atm ilmi-keepalive

!--- Define dynamic routing protocol and re-distribute static !--- route. This enables dynamic routing information update !--- during the HSRP/IPSec failover. All the "VPN routes" !--- that are injected in the routing table by RRI as static !--- routes will be redistributed to internal networks.

!

router ospf 1

log-adjacency-changes

redistribute static subnets

network 10.1.1.0 0.0.0.255 area 0

!

ip classless

ip route 172.16.172.64 255.255.255.240 172.16.172.49

no ip http server

no ip http secure-server

!

!

!--- Defines VPN traffic. The destination IP subnet will be !--- injected into the routing table as static routes by RRI.

access-list 101 permit ip 10.1.1.0 0.0.0.255 20.1.1.0 0.0.0.255

access-list 101 permit ip host 99.99.99.99 20.1.1.0 0.0.0.255

!

line con 0

exec-timeout 0 0

stopbits 1

line aux 0

stopbits 1

line vty 0 4

!

!

!

end

التكوين 7204VXR-2 من Cisco

7204VXR-2#show run

Building configuration...

Current configuration : 2493 bytes

!

version 12.3

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname 7204VXR-2

!

boot-start-marker

boot system flash disk1:c7200-a3jk9s-mz.123-7.T1

boot-end-marker

!

no aaa new-model

ip subnet-zero

!

!

no ip domain lookup

ip host rund 10.48.92.61

!

!

ip cef

!

crypto isakmp policy 1

hash md5

authentication pre-share

crypto isakmp key cisco123 address 172.16.172.69

crypto isakmp keepalive 10

!

!

crypto ipsec transform-set myset esp-des esp-md5-hmac

!

crypto map vpn 10 ipsec-isakmp

set peer 172.16.172.69

set transform-set myset

match address 101

reverse-route

!

!--- During normal operational conditions this router !--- will be the standby router.

interface FastEthernet0/0

ip address 172.16.172.54 255.255.255.240

ip directed-broadcast

duplex full

standby 1 ip 172.16.172.53

standby 1 preempt

standby 1 name VPNHA

standby 1 track FastEthernet1/0

crypto map vpn redundancy VPNHA

!

interface FastEthernet1/0

ip address 10.1.1.2 255.255.255.0

ip directed-broadcast

duplex full

!

interface FastEthernet3/0

ip address 10.48.67.182 255.255.254.0

ip directed-broadcast

shutdown

duplex full

!

router ospf 1

log-adjacency-changes

redistribute static subnets

network 10.1.1.0 0.0.0.255 area 0

!

ip classless

ip route 172.16.172.64 255.255.255.240 172.16.172.49

no ip http server

no ip http secure-server

!

!

!

access-list 101 permit ip 10.1.1.0 0.0.0.255 20.1.1.0 0.0.0.255

access-list 101 permit ip host 99.99.99.99 20.1.1.0 0.0.0.255

!

line con 0

exec-timeout 0 0

transport preferred all

transport output all

stopbits 1

line aux 0

transport preferred all

transport output all

stopbits 1

line vty 0 4

login

transport preferred all

transport input all

transport output all

!

!

!

end

التكوين 7206-1 من Cisco

7206-1#show run

Building configuration...

Current configuration : 1551 bytes

!

version 12.2

no service pad

service timestamps debug datetime msec localtime

service timestamps log datetime msec localtime

no service password-encryption

!

hostname 7206-1

!

ip subnet-zero

no ip source-route

ip cef

!

interface Loopback0

ip address 99.99.99.99 255.255.255.255

!

interface FastEthernet0/0

shutdown

duplex full

speed 100

!

!--- Define dynamic routing protocol. All the "VPN routes" !--- will be learned and updated dynamically from upstream HSRP !--- routers using the dynamic routing protocols.

interface FastEthernet0/1

ip address 10.1.1.3 255.255.255.0

duplex full

speed 100

!

router ospf 1

log-adjacency-changes

passive-interface Loopback0

network 10.1.1.0 0.0.0.255 area 0

network 99.99.99.99 0.0.0.0 area 0

!

ip classless

no ip http server

!

!

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

login

!

end

كيف تعمل؟

يوضح هذا المثال كيفية عمل التغلب على أعطال HSRP و IPSec معا باستخدام عمليتي الإعداد والتكوين المذكورتين أعلاه. تبرز دراسة الحالة هذه ثلاثة جوانب:

- تجاوز فشل HSRP بسبب فشل الواجهة.

- كيف يحدث تجاوز فشل IPSec بعد تجاوز فشل HSRP. كما يمكن ملاحظته، سيكون تجاوز فشل بروتوكول IPSec هنا عبارة عن تجاوز فشل "عديم الحالة".

- كيف يتم تحديث تغييرات معلومات التوجيه التي يتسبب فيها تجاوز الفشل بشكل ديناميكي ونشرها على الشبكات الداخلية.

ملاحظة: حركة مرور الاختبار هنا هي حزم بروتوكول رسائل التحكم في الإنترنت (ICMP) بين عنوان IP للاسترجاع الخاص ب Cisco 7206-1 (99.99.99.99) وعنوان IP للاسترجاع الخاص ب Cisco VPN 7200 (20.1.1.1) ويحاكي حركة مرور VPN بين الموقعين.

الظروف العادية (قبل تجاوز الفشل)

قبل تجاوز الفشل، يكون Cisco 7204VXR-1 هو موجه HSRP الرئيسي ويمتلك Cisco VPN 7200 IPSec SAs مع Cisco 7204VXR-1.

عندما يتم تكوين خريطة التشفير على الواجهة، تقوم ميزة RRI باحتواء مسار VPN لمطابقة قائمة التحكم في الوصول (ACL) التي تم تكوينها إلى IPSec وبيان أمر تعيين النظير في خريطة التشفير. تتم إضافة هذا المسار إلى جدول توجيه الموجه 7204VXR-1 الأساسي من HSRP.

يشير إخراج الأمر debug crypto ipSec إلى إضافة مسار VPN 20.1.1/24 إلى قاعدة معلومات التوجيه (RIB).

IPSEC(rte_mgr): VPN Route Added 20.1.1.0 255.255.255.0

via 172.16.172.69 in IP DEFAULT TABLE

ينتج جدول التوجيه على موجه HSRP الأساسي مسار ثابت إلى 20.1.1/24، والذي يتم إعادة توزيعه من خلال فتح أقصر مسار أولا (OSPF) إلى الموجه HSRP الثانوي، 7204VXR-2، وإلى الموجه الداخلي، 7206-1.

الخطوة التالية لمسار VPN 20.1.1/24 التي تم حقنها كمسار ساكن إستاتيكي إلى نقطة الوصول (RIB) للموجه 7204VXR-1 هي عنوان IP الخاص بنظير التشفير البعيد. في هذه الحالة، ال التالي ل ال VPN ممر 20.1.1/24 هو 172.16.172.69. يتم حل عنوان IP الخاص بالخطوة التالية من مسار VPN عبر بحث مسار متكرر كما هو موضح في جدول إعادة التوجيه السريع هذا من Cisco:

7204VXR-1#show ip route

Codes: C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF,

IA - OSPF inter area, N1 - OSPF NSSA external type 1,

N2 - OSPF NSSA external type 2, E1 - OSPF external type 1,

E2 - OSPF external type 2, i - IS-IS, su - IS-IS summary,

L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area,

* - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route

Gateway of last resort is not set

99.0.0.0/32 is subnetted, 1 subnets

O     99.99.99.99 [110/2] via 10.1.1.3, 00:11:21, FastEthernet0/1

20.0.0.0/24 is subnetted, 1 subnets

S     20.1.1.0 [1/0] via 172.16.172.69

172.16.0.0/28 is subnetted, 2 subnets

C     172.16.172.48 is directly connected, FastEthernet0/0

S      172.16.172.64 [1/0] via 172.16.172.49

10.0.0.0/8 is variably subnetted, 2 subnets, 2 masks

C     10.1.1.0/24 is directly connected, FastEthernet0/1

S      10.48.66.0/23 [1/0] via 10.1.1.2

7204VXR-1#show ip cef 20.1.1.0 detail

20.1.1.0/24, version 66, epoch 0, cached adjacency 172.16.172.49

0 packets, 0 bytes

via 172.16.172.69, 0 dependencies, recursive

next hop 172.16.172.49, FastEthernet0/0 via 172.16.172.64/28

valid cached adjacency

يتعلم الموجه الثانوي HSRP والموجه الداخلي 7206-1 مسار شبكة VPN هذا عبر OSPF/. لا يحتاج مسؤولو الشبكة إلى إدخال المسار الثابت يدويا. والأهم من ذلك، يتم تحديث تغييرات التوجيه التي يتسبب فيها تجاوز الفشل بشكل ديناميكي.

7204VXR-2#show ip route

Codes: C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF,

IA - OSPF inter area, N1 - OSPF NSSA external type 1,

N2 - OSPF NSSA external type 2, E1 - OSPF external type 1,

E2 - OSPF external type 2, i - IS-IS, su - IS-IS summary,

L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area,

* - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route

Gateway of last resort is 10.48.66.1 to network 0.0.0.0

99.0.0.0/32 is subnetted, 1 subnets

O     99.99.99.99 [110/2] via 10.1.1.3, 00:29:31, FastEthernet1/0

20.0.0.0/24 is subnetted, 1 subnets

O E2     20.1.1.0 [110/20] via 10.1.1.1, 00:11:06, FastEthernet1/0

172.16.0.0/28 is subnetted, 2 subnets

C     172.16.172.48 is directly connected, FastEthernet0/0

S      172.16.172.64 [1/0] via 172.16.172.49

10.0.0.0/8 is variably subnetted, 2 subnets, 2 masks

C      10.1.1.0/24 is directly connected, FastEthernet1/0

C      10.48.66.0/23 is directly connected, FastEthernet3/0

S*     0.0.0.0/0 [1/0] via 10.48.66.1

7206-1#show ip route

Codes: C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF,

IA - OSPF inter area, N1 - OSPF NSSA external type 1,

N2 - OSPF NSSA external type 2, E1 - OSPF external type 1,

E2 - OSPF external type 2, i - IS-IS, su - IS-IS summary,

L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area,

* - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route

Gateway of last resort is not set

99.0.0.0/32 is subnetted, 1 subnets

C     99.99.99.99 is directly connected, Loopback0

20.0.0.0/24 is subnetted, 1 subnets

O E2     20.1.1.0 [110/20] via 10.1.1.1, 00:14:01, FastEthernet0/1

172.16.0.0/28 is subnetted, 1 subnets

O E2     172.16.172.64 [110/20] via 10.1.1.1, 00:32:21, FastEthernet0/1

[110/20] via 10.1.1.2, 00:32:21, FastEthernet0/1

10.0.0.0/8 is variably subnetted, 2 subnets, 2 masks

C     10.1.1.0/24 is directly connected, FastEthernet0/1

O E2     10.48.66.0/23 [110/20] via 10.1.1.2, 00:32:22, FastEthernet0/1

الموجه 7204VXR-1 هو موجه HSRP الأساسي الذي يتتبع الواجهة الداخلية Fa0/1.

7204VXR-1#show standby

FastEthernet0/0 - Group 1

State is Active

2 state changes, last state change 03:21:20

Virtual IP address is 172.16.172.53

Active virtual MAC address is 0000.0c07.ac01

Local virtual MAC address is 0000.0c07.ac01 (v1 default)

Hello time 3 sec, hold time 10 sec

Next hello sent in 0.172 secs

Preemption enabled

Active router is local

Standby router is 172.16.172.54,

priority 100 (expires in 7.220 sec)

Priority 200 (configured 200)

Track interface FastEthernet0/1 state Up decrement 150

IP redundancy name is "VPNHA" (cfgd)

يمكنك إستخدام الأمر show track لعرض قائمة بكافة الكائنات التي تم تعقبها بواسطة HSRP.

7204VXR-1#show track

Track 1 (via HSRP)

Interface FastEthernet0/1 line-protocol

Line protocol is Up

1 change, last change 03:18:22

Tracked by:

HSRP FastEthernet0/0 1

الموجه 7204VXR-2 هو الموجه HSRP الاحتياطي. في ظروف التشغيل العادية، يتتبع هذا الجهاز الواجهة الداخلية Fa1/0.

7204VXR-2#show standby

FastEthernet0/0 - Group 1

State is Standby

1 state change, last state change 02:22:30

Virtual IP address is 172.16.172.53

Active virtual MAC address is 0000.0c07.ac01

Local virtual MAC address is 0000.0c07.ac01 (v1 default)

Hello time 3 sec, hold time 10 sec

Next hello sent in 0.096 secs

Preemption enabled

Active router is 172.16.172.52,

priority 200 (expires in 7.040 sec)

Standby router is local

Priority 100 (default 100)

Track interface FastEthernet1/0 state Up decrement 10

IP redundancy name is "VPNHA" (cfgd)

تقوم أوامر العرض هذه المتعلقة بIPSec بالإخراج على الموجه Cisco VPN 7200 Router الذي يوضح شبكات ISAKMP و IPSec بين Cisco VPN 7200 وموجه HSRP الأساسي، Cisco 7204VXR-1.

7204VXR-1#show crypto isakmp sa detail

Codes: C - IKE configuration mode, D - Dead Peer Detection

K - Keepalives, N - NAT-traversal

X - IKE Extended Authentication

psk - Preshared key, rsig - RSA signature

renc - RSA encryption

C-id       Local       Remote     I-VRF  Encr  Hash  Auth  DH  Lifetime  Cap.

1    172.16.172.53  172.16.172.69         des   md5   psk   1  23:49:52   K

Connection-id:Engine-id = 1:1(software)

7204VXR-1#show crypto ipsec sa

interface: FastEthernet0/0

Crypto map tag: vpn, local addr. 172.16.172.53

protected vrf:

local ident (addr/mask/prot/port): (99.99.99.99/255.255.255.255/0/0)

remote ident (addr/mask/prot/port): (20.1.1.0/255.255.255.0/0/0)

current_peer: 172.16.172.69:500

PERMIT, flags={origin_is_acl,}

#pkts encaps: 5, #pkts encrypt: 5, #pkts digest: 5

#pkts decaps: 5, #pkts decrypt: 5, #pkts verify: 5

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed: 0, #pkts compr. failed: 0

#pkts not decompressed: 0, #pkts decompress failed: 0

#send errors 0, #recv errors 0

local crypto endpt.: 172.16.172.53, remote crypto endpt.: 172.16.172.69

path mtu 1500, media mtu 1500

current outbound spi: 44E0B22B

inbound esp sas:

spi: 0x5B23F22E(1529082414)

transform: esp-des esp-md5-hmac ,

in use settings ={Tunnel, }

slot: 0, conn id: 2000, flow_id: 1, crypto map: vpn

crypto engine type: Software, engine_id: 1

sa timing: remaining key lifetime (k/sec): (4504144/2949)

ike_cookies: B57A9DC9 FA2D627B F70FEDF6 FAAF9E34

IV size: 8 bytes

replay detection support: Y

inbound ah sas:

inbound pcp sas:

outbound esp sas:

spi: 0x44E0B22B(1155576363)

transform: esp-des esp-md5-hmac ,

in use settings ={Tunnel, }

slot: 0, conn id: 2001, flow_id: 2, crypto map: vpn

crypto engine type: Software, engine_id: 1

sa timing: remaining key lifetime (k/sec): (4504145/2949)

ike_cookies: B57A9DC9 FA2D627B F70FEDF6 FAAF9E34

IV size: 8 bytes

replay detection support: Y

outbound ah sas:

outbound pcp sas:

vpn7200#show crypto isakmp sa

dst            src             state     conn-id    slot

172.16.172.53  172.16.172.69   QM_IDLE   1          0

7204VXR-2#show crypto ipsec sa

interface: FastEthernet0/1

Crypto map tag: vpn, local addr. 172.16.172.69

local ident (addr/mask/prot/port): (20.1.1.0/255.255.255.0/0/0)

remote ident (addr/mask/prot/port): (99.99.99.99/255.255.255.255/0/0)

current_peer: 172.16.172.53

PERMIT, flags={origin_is_acl,}

#pkts encaps: 10, #pkts encrypt: 10, #pkts digest 10

#pkts decaps: 10, #pkts decrypt: 10, #pkts verify 10

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed: 0, #pkts compr. failed: 0, #pkts decompress failed: 0

#send errors 5, #recv errors 0

local crypto endpt.: 172.16.172.69, remote crypto endpt.: 172.16.172.53

path mtu 1500, ip mtu 1500

current outbound spi: 5B23F22E

inbound esp sas:

spi: 0x44E0B22B(1155576363)

transform: esp-des esp-md5-hmac ,

in use settings ={Tunnel, }

slot: 0, conn id: 2029, flow_id: 1, crypto map: vpn

sa timing: remaining key lifetime (k/sec): (4607997/2824)

IV size: 8 bytes

replay detection support: Y

inbound ah sas:

inbound pcp sas:

outbound esp sas:

spi: 0x5B23F22E(1529082414)

transform: esp-des esp-md5-hmac ,

in use settings ={Tunnel, }

slot: 0, conn id: 2030, flow_id: 2, crypto map: vpn

sa timing: remaining key lifetime (k/sec): (4607998/2824)

IV size: 8 bytes

replay detection support: Y

outbound ah sas:

outbound pcp sas:

بعد تجاوز فشل HSRP و IPSec

تم تشغيل تجاوز الفشل بإيقاف تشغيل Fa0/0 على Cisco 7204VXR-1. سترى سلوكا مماثلا إذا كانت الواجهة الأخرى، Fa0/1، معطلة لأن HSRP يتعقب أيضا حالة هذه الواجهة.

عندما لا يستقبل Cisco VPN 7200 أي إستجابة لحزم IKE keepalive المرسلة إلى موجه HSRP الأساسي، يقوم الموجه بفك تشفير IPSec SAs.

يعرض إخراج أمر debug crypto isakmp هذا كيفية اكتشاف IKE keepalive لانقطاع اتصال الموجه الرئيسي:

ISAKMP (0:1): received packet from 172.16.172.53 (I) QM_IDLE

ISAKMP (0:1): processing HASH payload. message ID = 1585108592

ISAKMP (0:1): processing NOTIFY ITS_ALIVE protocol 1

spi 0, message ID = 1585108592, sa = 61C3E754

ISAKMP (0:1): sending packet to 172.16.172.53 (I) QM_IDLE

ISAKMP (0:1): purging node -1484552386

ISAKMP (0:1): deleting node 1585108592 error FALSE

reason "informational (in) state 1"

ISAKMP (0:1): purging node 642343711

ISAKMP (0:1): sending packet to 172.16.172.53 (I) QM_IDLE

ISAKMP (0:1): purging node -523181212

ISAKMP (0:1): purging node -2089541867

ISAKMP (0:1): incrementing error counter on sa: PEERS_ALIVE_TIMER

ISAKMP (0:1): sending packet to 172.16.172.53 (I) QM_IDLE

ISAKMP (0:1): purging node 1671177686

ISAKMP (0:1): incrementing error counter on sa: PEERS_ALIVE_TIMER

ISAKMP (0:1): sending packet to 172.16.172.53 (I) QM_IDLE

ISAKMP (0:1): purging node 1706520344

ISAKMP (0:1): incrementing error counter on sa: PEERS_ALIVE_TIMER

ISAKMP (0:1): sending packet to 172.16.172.53 (I) QM_IDLE

ISAKMP (0:1): purging node 503375209

ISAKMP (0:1): incrementing error counter on sa: PEERS_ALIVE_TIMER

ISAKMP (0:1): sending packet to 172.16.172.53 (I) QM_IDLE

ISAKMP (0:1): purging node 1272270610

ISAKMP (0:1): incrementing error counter on sa: PEERS_ALIVE_TIMER

ISAKMP (0:1): peer not responding!

ISAKMP (0:1): peer does paranoid keepalives.

ISAKMP (0:1): phase 1 going away; let's be paranoid.

ISAKMP (0:1): Bring down phase 2's

ISAKMP (0:1): That phase 1 was the last one of its kind.

Taking phase 2's with us.

ISAKMP (0:1): peer does paranoid keepalives.

ISAKMP (0:1): deleting SA reason "P1 errcounter exceeded

(PEERS_ALIVE_TIMER)" state (I)

QM_IDLE (peer 172.16.172.53) input queue 0

IPSEC(key_engine): got a queue event...

IPSEC(key_engine_delete_sas): rec'd delete notify from ISAKMP

IPSEC(key_engine_delete_sas): delete all SAs shared with 172.16.172.53

IPSEC(delete_sa): deleting SA,

(sa) sa_dest= 172.16.172.69, sa_prot= 50,

sa_spi= 0x44E0B22B(1155576363),

sa_trans= esp-des esp-md5-hmac , sa_conn_id= 2029

IPSEC(delete_sa): deleting SA,

(sa) sa_dest= 172.16.172.53, sa_prot= 50,

sa_spi= 0x5B23F22E(1529082414),

sa_trans= esp-des esp-md5-hmac , sa_conn_id= 2030

ISAKMP (0:1): sending packet to 172.16.172.53 (I) MM_NO_STATE

ISAKMP (0:1): purging node -248155233

ISAKMP (0:1): peer does paranoid keepalives.

IPSEC(key_engine): got a queue event...

IPSEC(key_engine_delete_sas): rec'd delete notify from ISAKMP

IPSEC(key_engine_delete_sas): delete all SAs shared with 172.16.172.53

ISAKMP (0:1): purging node 958118275

عندما يحدث تجاوز الفشل على موجه HSRP الأساسي Cisco 7204VXR-1، يصبح الجهاز موجه إستعداد. تم تدمير شبكات ISAKMP و IPSec الحالية. يصبح الموجه Cisco 7204VXR-2 Secondary HSRP نشطا وينشئ شبكات IPSec جديدة باستخدام Cisco VPN 7200.

يعرض إخراج الأمر debug standby events الأحداث المتعلقة ب HSRP.

HSRP: Fa0/0 API Software interface going down

HSRP: Fa0/0 API Software interface going down

HSRP: Fa0/0 Interface down

HSRP: Fa0/0 Grp 1 Active: b/HSRP disabled

HSRP: Fa0/0 Grp 1 Active router is unknown, was local

HSRP: Fa0/0 Grp 1 Standby router is unknown, was 172.16.172.54

HSRP: Fa0/0 Grp 1 Active -> Init

%HSRP-6-STATECHANGE: FastEthernet0/0 Grp 1 state Active -> Init

HSRP: Fa0/0 Grp 1 Redundancy "VPNHA" state Active -> Init

%CRYPTO-5-SESSION_STATUS: Crypto tunnel is DOWN.

Peer 172.16.172.69:500 Id: 172.16.172.69

HSRP: Fa0/0 Grp 1 Redundancy enquiry for VPNHA succeeded

HSRP: Fa0/0 API Add active HSRP addresses to ARP table

%LINK-5-CHANGED: Interface FastEthernet0/0,

changed state to administratively down

HSRP: API Hardware state change

%LINEPROTO-5-UPDOWN: Line protocol on Interface FastEthernet0/0,

changed state to down

نظرا لإيقاف تشغيل الواجهة، تتغير حالة HSRP إلى "Init".

paal#show standby

FastEthernet0/0 - Group 1

State is Init (interface down)

3 state changes, last state change 00:07:29

Virtual IP address is 172.16.172.53

Active virtual MAC address is unknown

Local virtual MAC address is 0000.0c07.ac01 (v1 default)

Hello time 3 sec, hold time 10 sec

Preemption enabled

Active router is unknown

Standby router is unknown

Priority 200 (configured 200)

Track interface FastEthernet0/1 state Up decrement 150

IP redundancy name is "VPNHA" (cfgd)

يصبح Cisco 7204VXR-2 هو موجه HSRP النشط ويغير حالته إلى "نشط".

HSRP: Fa0/0 Grp 1 Standby: c/Active timer expired (172.16.172.52)

HSRP: Fa0/0 Grp 1 Active router is local, was 172.16.172.52

HSRP: Fa0/0 Grp 1 Standby router is unknown, was local

HSRP: Fa0/0 Grp 1 Standby -> Active (active 0->1, passive 2->1)

%HSRP-6-STATECHANGE: FastEthernet0/0 Grp 1 state Standby -> Active

HSRP: Fa0/0 Grp 1 Redundancy "VPNHA" state Standby -> Active

!--- VPN route 20.1.1.0/24 is added to the routing table.

IPSEC(rte_mgr): VPN Route Added 20.1.1.0 255.255.255.0

via 172.16.172.69 in IP DEFAULT TABLE

7204VXR-2#show standby

FastEthernet0/0 - Group 1

State is Active

2 state changes, last state change 00:10:38

Virtual IP address is 172.16.172.53

Active virtual MAC address is 0000.0c07.ac01

Local virtual MAC address is 0000.0c07.ac01 (v1 default)

Hello time 3 sec, hold time 10 sec

Next hello sent in 0.116 secs

Preemption enabled

Active router is local

Standby router is unknown

Priority 100 (default 100)

Track interface FastEthernet1/0 state Up decrement 10

IP redundancy name is "VPNHA" (cfgd)

مع تمكين تقنية RRI، يتم تحديث مسارات الشبكات الخاصة الظاهرية (VPN) بشكل ديناميكي أثناء تجاوز الفشل. تتم إزالة المسار الثابت 20.1.1.0/24، ويتعلم الموجه Cisco 7204VXR-1 المسار من الموجه Cisco 7204VXR-2.

يوضح الإخراج من الأمر show ip route هذا التحديث الديناميكي.

7204VXR-1#show ip route

Codes: C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF,

IA - OSPF inter area, N1 - OSPF NSSA external type 1,

N2 - OSPF NSSA external type 2, E1 - OSPF external type 1,

E2 - OSPF external type 2, i - IS-IS, su - IS-IS summary,

L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area,

* - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route

Gateway of last resort is not set

99.0.0.0/32 is subnetted, 1 subnets

O   99.99.99.99 [110/2] via 10.1.1.3, 02:46:16, FastEthernet0/1

20.0.0.0/24 is subnetted, 1 subnets

O E2   20.1.1.0 [110/20] via 10.1.1.2, 00:08:35, FastEthernet0/1

172.16.0.0/28 is subnetted, 1 subnets

O E2   172.16.172.64 [110/20] via 10.1.1.2, 00:07:56, FastEthernet0/1

10.0.0.0/8 is variably subnetted, 2 subnets, 2 masks

C  10.1.1.0/24 is directly connected, FastEthernet0/1

S   10.48.66.0/23 [1/0] via 10.1.1.2

يتم حقن مسار الشبكة الخاصة الظاهرية (VPN) الثابتة في جدول التوجيه على الموجه Cisco 7204VXR-2.

7204VXR-2#show ip route

Codes: C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF,

IA - OSPF inter area, N1 - OSPF NSSA external type 1,

N2 - OSPF NSSA external type 2, E1 - OSPF external type 1,

E2 - OSPF external type 2, i - IS-IS, su - IS-IS summary,

L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area,

* - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route

Gateway of last resort is not set

99.0.0.0/32 is subnetted, 1 subnets

O   99.99.99.99 [110/2] via 10.1.1.3, 03:04:18, FastEthernet1/0

20.0.0.0/24 is subnetted, 1 subnets

S   20.1.1.0 [1/0] via 172.16.172.69

172.16.0.0/28 is subnetted, 2 subnets

C   172.16.172.48 is directly connected, FastEthernet0/0

S   172.16.172.64 [1/0] via 172.16.172.49

10.0.0.0/24 is subnetted, 1 subnets

C   10.1.1.0 is directly connected, FastEthernet1/0

يعلم الموجه الداخلي 7206-1 المسار 20.1.1/24 إلى نظير شبكة VPN البعيد من الموجه المجاور OSPF الخاص به، 7204VXR-2. تحدث تغييرات التوجيه هذه بشكل ديناميكي من خلال الجمع بين HSRP/RRI و OSPF.

7206-1#show ip route

Codes: C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF,

IA - OSPF inter area, N1 - OSPF NSSA external type 1,

N2 - OSPF NSSA external type 2, E1 - OSPF external type 1,

E2 - OSPF external type 2, i - IS-IS, su - IS-IS summary,

L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area,

* - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route

Gateway of last resort is not set

99.0.0.0/32 is subnetted, 1 subnets

C     99.99.99.99 is directly connected, Loopback0

20.0.0.0/24 is subnetted, 1 subnets

O E2     20.1.1.0 [110/20] via 10.1.1.2, 00:13:55, FastEthernet0/1

172.16.0.0/28 is subnetted, 1 subnets

O E2     172.16.172.64 [110/20] via 10.1.1.2, 00:13:17, FastEthernet0/1

10.0.0.0/8 is variably subnetted, 2 subnets, 2 masks

C     10.1.1.0/24 is directly connected, FastEthernet0/1

O E2     10.48.66.0/23 [110/20] via 10.1.1.2, 03:06:08, FastEthernet0/1

بعد أن يصبح Cisco 7204VXR-2 الموجه النشط أثناء تجاوز فشل HSRP، تجلب حركة مرور بيانات VPN بين Cisco 7204VXR-2 وموجه Cisco VPN 7200 وكيل Isakmp و IPSec SAs.

يتم عرض إخراج الأمر show crypto isakmp sa وshow crypto ipSec على الموجه VPN 7200 هنا:

7204VXR-2#show crypto isakmp sa detail

Codes: C - IKE configuration mode, D - Dead Peer Detection

K - Keepalives, N - NAT-traversal

X - IKE Extended Authentication

psk - Preshared key, rsig - RSA signature

renc - RSA encryption

C-id  Local         Remote       I-VRF  Encr Hash Auth DH Lifetime Cap.

1    172.16.172.53  172.16.172.69        des  md5   psk  1  23:53:47 K

Connection-id:Engine-id = 1:1(software)

7204VXR-2#show crypto ipsec sa

interface: FastEthernet0/0

Crypto map tag: vpn, local addr. 172.16.172.53

protected vrf:

local ident (addr/mask/prot/port): (99.99.99.99/255.255.255.255/0/0)

remote ident (addr/mask/prot/port): (20.1.1.0/255.255.255.0/0/0)

current_peer: 172.16.172.69:500

PERMIT, flags={origin_is_acl,}

#pkts encaps: 9, #pkts encrypt: 9, #pkts digest: 9

#pkts decaps: 9, #pkts decrypt: 9, #pkts verify: 9

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed: 0, #pkts compr. failed: 0

#pkts not decompressed: 0, #pkts decompress failed: 0

#send errors 0, #recv errors 0

local crypto endpt.: 172.16.172.53, remote crypto endpt.: 172.16.172.69

path mtu 1500, media mtu 1500

current outbound spi: 83827275

inbound esp sas:

spi: 0x8D70E8A3(2372987043)

transform: esp-des esp-md5-hmac ,

in use settings ={Tunnel, }

slot: 0, conn id: 2000, flow_id: 1, crypto map: vpn

crypto engine type: Software, engine_id: 1

sa timing: remaining key lifetime (k/sec): (4453897/3162)

ike_cookies: 95074F89 3FF73F2B F70FEDF6 5998090C

IV size: 8 bytes

replay detection support: Y

inbound ah sas:

inbound pcp sas:

outbound esp sas:

spi: 0x83827275(2206364277)

transform: esp-des esp-md5-hmac ,

in use settings ={Tunnel, }

slot: 0, conn id: 2001, flow_id: 2, crypto map: vpn

crypto engine type: Software, engine_id: 1

sa timing: remaining key lifetime (k/sec): (4453898/3162)

ike_cookies: 95074F89 3FF73F2B F70FEDF6 5998090C

IV size: 8 bytes

replay detection support: Y

outbound ah sas:

outbound pcp sas: vpn7200#show crypto isa sa

dst  src  state  conn-id slot

172.16.172.53   172.16.172.69   QM_IDLE 1       0

vpn7200#show crypto ipsec sa

interface: FastEthernet0/1

Crypto map tag: vpn, local addr. 172.16.172.69

local ident (addr/mask/prot/port): (20.1.1.0/255.255.255.0/0/0)

remote ident (addr/mask/prot/port): (99.99.99.99/255.255.255.255/0/0)

current_peer: 172.16.172.53

PERMIT, flags={origin_is_acl,}

#pkts encaps: 19, #pkts encrypt: 19, #pkts digest 19

#pkts decaps: 19, #pkts decrypt: 19, #pkts verify 19

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed: 0, #pkts compr. failed: 0, #pkts decompress failed: 0

#send errors 6, #recv errors 0

local crypto endpt.: 172.16.172.69, remote crypto endpt.: 172.16.172.53

path mtu 1500, ip mtu 1500

current outbound spi: 8D70E8A3

inbound esp sas:

spi: 0x83827275(2206364277)

transform: esp-des esp-md5-hmac ,

in use settings ={Tunnel, }

slot: 0, conn id: 2029, flow_id: 1, crypto map: vpn

sa timing: remaining key lifetime (k/sec): (4607997/3070)

IV size: 8 bytes

replay detection support: Y

inbound ah sas:

inbound pcp sas:

outbound esp sas:

spi: 0x8D70E8A3(2372987043)

transform: esp-des esp-md5-hmac ,

in use settings ={Tunnel, }

slot: 0, conn id: 2030, flow_id: 2, crypto map: vpn

sa timing: remaining key lifetime (k/sec): (4607998/3070)

IV size: 8 bytes

replay detection support: Y

outbound ah sas:

outbound pcp sas:

بعد إسترداد الموجه الأساسي HSRP الأصلي من انقطاع

بعد إسترداد الخدمة على الموجه الأساسي HSRP الأصلي 7204VXR-1 من Cisco، يستأنف الجهاز وضعه كموجه نشط لأنه يتمتع بأولوية أعلى ولأنه تم تكوين استباق HSRP.

يعرض إخراج الأمر show وdebug من موجهات مختلفة محول آخر من HSRP و IPSec. تتم إعادة إنشاء شبكات ISAKMP و IPSec تلقائيا، ويتم تحديث تغييرات معلومات التوجيه بشكل ديناميكي.

يوضح إخراج النموذج هذا أن الموجه 7204VXR-1 يقوم بتغيير حالته إلى "نشط".

HSRP: Fa0/0 API 172.16.172.52 is not an HSRP address

HSRP: Fa0/0 API MAC address update

HSRP: Fa0/0 API Software interface coming up

%LINK-3-UPDOWN: Interface FastEthernet0/0, changed state to up

HSRP: API Hardware state change

HSRP: Fa0/0 API Software interface coming up

%LINEPROTO-5-UPDOWN: Line protocol on Interface FastEthernet0/0,

changed state to up

HSRP: Fa0/0 Interface up

HSRP: Fa0/0 Starting minimum interface delay (1 secs)

HSRP: Fa0/0 Interface min delay expired

HSRP: Fa0/0 Grp 1 Init: a/HSRP enabled

HSRP: Fa0/0 Grp 1 Init -> Listen

HSRP: Fa0/0 Grp 1 Redundancy "VPNHA" state Init -> Backup

HSRP: Fa0/0 Grp 1 Listen: c/Active timer expired (unknown)

HSRP: Fa0/0 Grp 1 Listen -> Speak

HSRP: Fa0/0 Grp 1 Redundancy "VPNHA" state Backup -> Speak

HSRP: Fa0/0 Grp 1 Speak: d/Standby timer expired (unknown)

HSRP: Fa0/0 Grp 1 Standby router is local

HSRP: Fa0/0 Grp 1 Speak -> Standby

HSRP: Fa0/0 Grp 1 Redundancy "VPNHA" state Speak -> Standby

HSRP: Fa0/0 Grp 1 Redundancy enquiry for VPNHA succeeded

HSRP: Fa0/0 Grp 1 Standby: c/Active timer expired (unknown)

HSRP: Fa0/0 Grp 1 Active router is local

HSRP: Fa0/0 Grp 1 Standby router is unknown, was local

HSRP: Fa0/0 Grp 1 Standby -> Active

%HSRP-6-STATECHANGE: FastEthernet0/0 Grp 1 state Standby -> Active

HSRP: Fa0/0 Grp 1 Redundancy "VPNHA" state Standby -> Active

HSRP: Fa0/0 Grp 1 Active: i/Resign rcvd (100/172.16.172.54)

HSRP: Fa0/0 Grp 1 Redundancy group VPNHA state Active -> Active

HSRP: Fa0/0 Grp 1 Redundancy group VPNHA state Active -> Active

HSRP: Fa0/0 Grp 1 Standby router is 172.16.172.54

يغير الموجه 7204VXR-2 حالته إلى "وضع الاستعداد". تتم إزالة مسار شبكة VPN من جدول التوجيه.

HSRP: Fa0/0 Grp 1 Standby router is 172.16.172.52

HSRP: Fa0/0 Grp 1 Hello in 172.16.172.52 Active pri 200 vIP 172.16.172.53

hel 3000 hol 10000 id 0000.0c07.ac01

HSRP: Fa0/0 Grp 1 Active router is 172.16.172.52, was local

HSRP: Fa0/0 Grp 1 Standby router is unknown, was 172.16.172.52

HSRP: Fa0/0 Grp 1 Active: g/Hello rcvd from

higher pri Active router (200/172.16.172.52)

HSRP: Fa0/0 Grp 1 Active -> Speak (active 1->0, passive 0->1)

%HSRP-6-STATECHANGE: FastEthernet0/0 Grp 1 state Active -> Speak

HSRP: Fa0/0 Grp 1 Redundancy "VPNHA" state Active -> Speak

HSRP: Fa0/0 Grp 1 Speak: d/Standby timer expired (unknown)

HSRP: Fa0/0 Grp 1 Standby router is local

HSRP: Fa0/0 Grp 1 Speak -> Standby (active 0, passive 1)

HSRP: Fa0/0 Grp 1 Redundancy "VPNHA" state Speak -> Standby

HSRP: Fa0/0 Grp 1 Redundancy enquiry for VPNHA succeeded

addr 172.16.172.53 name VPNHA state Speak

active 172.16.172.52 standby 172.16.172.54

!--- The VPN route is removed.

IPSEC(rte_mgr): VPN Route Removed 20.1.1.0 255.255.255.0

via 172.16.172.69 in IP DEFAULT TABLE

معلومات ذات صلة

- صفحة دعم مفاوضة IPSec/بروتوكولات IKE

- الدعم التقني والمستندات - Cisco Systems