المحتويات

المقدمة

عمر الحزمة في ASIC لإعادة التوجيه

ASIC لإعادة توجيه التدفقات

IRPP (مصطلح المنفذ، المحلل)

مسار مثقب

مسار مثقب بين عقدتي وحدة المعالجة المركزية (CPU)

مسار التجميع من وحدة المعالجة المركزية (NPU) إلى وحدة المعالجة المركزية (CPU) عبر بروتوكول RP

إدخال من وحدة المعالجة المركزية RP إلى وحدة المعالجة المركزية NPU أو LC

إدخال مسار من وحدة المعالجة المركزية (CPU) الخاصة بوحدة المعالجة المركزية (LC) إلى وحدة المعالجة المركزية (NPU)

واجهة سطر الأوامر (CLI) لتصحيح الأخطاء باستخدام الحزم/المحتوى

إختبار الاتصال عن بعد

مسار الحزمة: طلب الارتداد

مسار الحزمة: رد الارتداد

إختبار الاتصال المحلي

مسار الحزمة: طلب الارتداد

مسار الحزمة: رد الارتداد

تصحيح الأخطاء المفيدة:

طوبولوجيا

أوامر للتحقق من إختبار الاتصال عن بعد

طلب الارتداد: RP المحلي: TX

طلب الارتداد: Remote LC: RX

رد الارتداد: العقدة البعيدة (LC): tx

رد الارتداد: العقدة المحلية (LC): Rx

إختبار الاتصال المحلي

المقدمة

يصف هذا المستند المسار الذي تسلكه حزم الرد على ICMP Echo/الطلب على Echo داخل مربع NCS55xx(fretta).

عمر الحزمة في ASIC لإعادة التوجيه

إيرب

يتم تلقي حزمة على واجهة وتمريرها إلى IRPP حيث يتم إستخراج أول 128 بايت ومعالجتها. ونتيجة لذلك، تم إعداد رأس النظام الداخلي مسبقا.

ITM

يتم تخزين الحزمة في DRAM/OCB

ITPP

إذا لزم الأمر قم بإعادة كتابة رأس النظام (النسخ المتماثل للبث المتعدد وانعكاس المنفذ، وما إلى ذلك)

يتم تقسيم الحزم إلى خلايا ويتم موازنة التحميل إلى البنية

إيرب

يتم تلقي الخلايا وإعادة تجميعها. يتم إستخراج أول 128 بايت وتطبيق جميع عوامل تصفية طبقة الارتباط وقوائم التحكم في الوصول للخروج والنسخ المتماثل للخروج (البث المتعدد)

ETPP/ETM

يتم تخزين الحزمة بالكامل في مخزن مؤقت حتى تتم جدولة خروج الحزمة. تمت إزالة رؤوس النظام.

ASIC لإعادة توجيه التدفقات

IRPP (مصطلح المنفذ، المحلل)

إنهاء المنفذ: الحزم المستلمة من واجهة الشبكة/وحدة المعالجة المركزية/إعادة الحساب

- حدد منفذ المصدر ووضع علامة على الحزمة معه.

- حدد البرنامج الأولي الذي سيتم إستخدامه في Parser.

- حدد مكان بدء رأس الشبكة.

المحلل: إستخراج EtherType، عناوين MAC، حدد إزاحة للمراحل التالية في التدفقات.

IRPP(طبقة الخط، متحولات VLAN)

طبقة الارتباط: التصفية على L2 ومصادقة عنوان المصدر.

VLAN ترجمة: نحن نرسم الخريطة المنطقية للحزمة.

مسار مثقب

- تتوفر فقط بعض إدخالات TCAM ل LPTS على وحدة معالجة الرسومات (NPU) نظرا لنقص موارد TCAM.

- يتم إجراء بحث LPTS الرئيسي في SW LPTS pre-IFIB على LC Netio

- حزمة LPTS المضمنة من NPU إلى RP مباشرة من خلال البحث عن TCAM في PMF:

- بروتوكول فتح أقصر مسار أولا (OSPF) وبروتوكول فتح أقصر مسار أولا (OSPFv3)، يتم توجيه حزم ISIS إلى بروتوكول rp النشط والاحتياطي بشكل مباشر

- حزمة LPTS من NPU إلى وحدة المعالجة المركزية المحلية من خلال البحث عن PMF TCAM:

- أي بروتوكول يستخدم بروتوكول TCP و UDP و ICMP و ND

- يتم تضمين حزم بروتوكول L2 في LC عبر ملائمة وحدة المعالجة المركزية (CPU) ل BRCM:

- ARP و RARP و CDP و LACP و LLDP و Ether-link OAM و MACSec

- يتم تضمين حزم الاستثناءات في LC من خلال ملائمة وحدة المعالجة المركزية ل BRCM.

- TTL0، TTL1، MTU Override، حزم الخيار

مسار مثقب بين عقدتي وحدة المعالجة المركزية (CPU)

مسار التجميع من وحدة المعالجة المركزية (NPU) إلى وحدة المعالجة المركزية (CPU) عبر بروتوكول RP

يتم نسخ حزم RX Forus على NPU. يتم إرسال أحدها إلى RP النشط وآخر إلى STBY RP

إدخال من وحدة المعالجة المركزية RP إلى وحدة المعالجة المركزية NPU أو LC

يتم حقن حزم L3 مباشرة إلى NPU إذا كانت البادئة التجاور كاملة أو كانت حزمة ما قبل المسار

يتم حقن حزم L3 بوحدة المعالجة المركزية (CPU) الخاصة بوحدة التحكم في الشبكة المحلية (LC) في حالة:

- يتم تكوين البادئة التجاور.

- حزمة ما قبل التوجيه MPLS

- يتجاوز حجم الحزمة MTU.

إدخال مسار من وحدة المعالجة المركزية (CPU) الخاصة بوحدة المعالجة المركزية (LC) إلى وحدة المعالجة المركزية (NPU)

يتم حقن هذه الحزم من وحدة المعالجة المركزية (CPU) الخاصة بوحدة المعالجة المركزية (LC) إلى وحدة المعالجة المركزية (NPU):

- ARP، nd، رد ICMP Echo، الحزم المجزأة

- CDP و LACP و LLDP وحزم Ether-Link OAM

واجهة سطر الأوامر (CLI) لتصحيح الأخطاء باستخدام الحزم/المحتوى

Show SPP node counters location <>

show netio chain

location <>

show netio drop location <>

show ipv4/ipv6 traffic location <>

show fwd statistics location <>

show lpts pifib entry brief statistics location <>

show controllers fia diagshell

"diag counters g cdsp" location <>

show interface <> location <>

إختبار الاتصال عن بعد

مسار الحزمة: طلب الارتداد

Local Node[ICMP(RP) -> IP I/O(RP) -> NetIO/Forwarder(RP) -> SPP(RP) -> NPU] -> wire -> Remote[NPU -> LPTS(HW) -> SPP(LC) -> NetIO/Forwarder(LC) -> LPTS(SW)(LC) -> IP I/O (LC) -> ICMP (LC)]

مسار الحزمة: رد الارتداد

Remote Node[IPv4/ICMP (LC) -> FWD/NetIO (LC) -> SPP (LC) -> NPU] -> wire -> Local Node[LPTS(HW) -> SPP(LC) -> NetIO/Forwarder(LC) -> NetIO(RP) -> IP I/O (RP) -> ICMP (RP)]

إختبار الاتصال المحلي

مسار الحزمة: طلب الارتداد

RP(ICMP/IPv4 IO -> netio -> SPP -> CE) -> LC(SPP -> netio -> ICMP/ipv4 IO)

مسار الحزمة: رد الارتداد

LC(IPv4 IO/ICMP -> Netio -> SPP -> CE) -> RP(SPP -> net -> ipv4 io/ICMP)

تصحيح الأخطاء المفيدة:

debug icmp ipv4 location 0/0/CPU0

debug ipv4 packet location 0/0/CPU0

debug ipv4 ping events location 0/0/CPU0

طوبولوجيا

Fretta_1(GigabitEthernet0/0/0/16 ) <---->(GigabitEthernet0/0/0/16 ) Fretta_2

RP/0/RP0/CPU0:fretta_1#  ping 1.1.16.2 count 10000

أوامر للتحقق من إختبار الاتصال عن بعد

طلب الارتداد: RP المحلي: TX

Path: ICMP(RP) -> IP I/O(RP) -> NetIO/Forwarder(RP) -> SPP(RP) -> NPU

1. إدخال/إخراج IP: تحقق مما إذا تم إنشاء طلب الارتداد:

show ipv4 traffic brief

ICMP statistics:

Sent: 0 admin unreachable, 0 network unreachable

0 host unreachable, 0 protocol unreachable

0 port unreachable, 0 fragment unreachable

0 time to live exceeded, 0 reassembly ttl exceeded

10000 echo request, 0 echo reply

0 mask request, 0 mask reply

0 parameter error, 0 redirects

10000 total

2.  NetIO

RP/0/RP0/CPU0:fretta_1#show netio clients location 0/rP0/CPU0

Counters                  Errors/Total

----------------------------------------

Output                        0/10019

Input                         0/11804

Puntback                      0/0

Jump                          0/0

Driver Output                 0/10002

Mutex Bypass Counters        Total

----------------------------------------

Egress handled               0

Egress chainwalked           10006

Egress dropped               0

Ingress handled              10000

Ingress chainwalked          0

Ingress dropped              0

ClientID         Drop/Total        Drop/Total      Cur/High/Max    Cur/High/Max

--------------------------------------------------------------------------------

ipv6_icmp           0/0               0/0             0/0/1000        0/0/1000

icmp                0/10000           0/0             0/1/1000        0/0/1000

If ping is failing then check if it is getting dropped in Netio:

RP/0/RP0/CPU0:fretta_1#show netio drops location 0/rP0/CPU0

Thu Apr 20 20:28:09.577 UTC

Drops for interfaces on node 0/RP0/CPU0

No drops

3. بروتوكول SPP

RP/0/RP0/CPU0:fretta_1#show spp node-counters

Thu Apr 20 20:29:05.785 UTC

0/0/CPU0:

fretta/classify

forwarded to spp clients:           10006

forwarded NPU packet to NetIO:           10006

dropped in classify node:              24

Fwded to CoPP sampler:               1

PUNT ARP:               1

PUNT IFIB:           10006

IFIB RAWIP4_FM:           10000

IFIB RAWIP6_FM:               6

-------------------------------

client/inject

pkts injected into spp:           10002

NetIO->NPU injected into spp:               2

NetIO->CPU injected into spp:           10000

NetIO->NPU PROTO ARP:               2

NetIO->CPU PKT LPTS:           10000

-------------------------------

socket/rx

ether raw pkts:           10031

-------------------------------

socket/tx

ce pkts:           10002

-------------------------------

client/punt

punted to client:           10007

-------------------------------

0/RP0/CPU0:

socket/rx

ether raw pkts:           10002

mgmt interface pkts:            3204

-------------------------------

socket/tx

ce pkts:           10000

mgmt interface pkts:               5

-------------------------------

fretta/classify

forwarded to spp clients:           13204

forwarded CPU packet to NetIO:           10000

forwarded Mgmt packet to NetIO:            3204

dropped in classify node:               2

-------------------------------

client/inject

pkts injected into spp:           10005

NetIO->NPU injected into spp:           10000

MGMT_IF injected into spp:               5

NetIO->NPU PROTO IPV4_PREROUTE:           10000

-------------------------------

client/punt

punted to client:           13204

-------------------------------

4. تحقق مما إذا كان طلب ECHO قد تم إرساله إلى السلك:

RP/0/RP0/CPU0:fretta_1#show controllers gigabitEthernet 0/0/0/16 stats | be Egress

Thu Apr 20 21:17:28.176 UTC

Egress:

Output total bytes          = 1140270

Output good bytes           = 1140270

Output total packets        = 10004

Output 802.1Q frames        = 0

Output pause frames         = 0

Output pkts 64 bytes        = 1

Output pkts 65-127 bytes    = 10003

Output pkts 128-255 bytes   = 0

Output pkts 256-511 bytes   = 0

Output pkts 512-1023 bytes  = 0

Output pkts 1024-1518 bytes = 0

Output pkts 1519-Max bytes  = 0

Output good pkts            = 10004

Output unicast pkts         = 10000

Output multicast pkts       = 3

Output broadcast pkts       = 1

Output drop underrun        = 0

Output drop abort           = 0

Output drop other           = 0

Output error other          = 0

طلب الارتداد: Remote LC: RX

Path: NPU -> LPTS(HW) -> SPP(LC) -> NetIO/Forwarder(LC) -> LPTS(SW)(LC) -> IP I/O (LC) -> ICMP (LC)

1. تحقق مما إذا كانت الحزمة قد تم استقبالها من سلك:

RP/0/RP0/CPU0:fretta_2#show controllers gigabitEthernet 0/0/0/16 stats

Thu Apr 20 20:44:22.115 UTC

Statistics for interface GigabitEthernet0/0/0/16 (cached values):

Ingress:

Input total bytes           = 1140270

Input good bytes            = 1140270

Input total packets         = 10004

Input 802.1Q frames         = 0

Input pause frames          = 0

Input pkts 64 bytes         = 1

Input pkts 65-127 bytes     = 10003

2. تحقق من عداد LPTS.

RP/0/RP0/CPU0:fretta_2#show lpts pifib hardware entry brief location 0/0/CPU0 | i ICMP

Thu Apr 20 20:45:54.687 UTC

DestIP               SrcIP                vrf   L4   LPort/Type   RPort  npu  Flowtype           DestNode     PuntPrio Accept Drop

0.0.0.0              0.0.0.0              0     1    ECHO         0      0    ICMP-local         Local LC     MEDIUM   10000  0

3. بروتوكول SPP

RP/0/RP0/CPU0:fretta_2#show spp node-counters location 0/0/CPU0

fretta/classify

forwarded to spp clients:           10006

forwarded NPU packet to NetIO:           10006

dropped in classify node:              22

Fwded to CoPP sampler:               2

PUNT ARP:               2

PUNT IFIB:           10006

IFIB IPv4_STACK:           10000

IFIB RAWIP6_FM:               6

-------------------------------

client/inject

pkts injected into spp:           10002

NetIO->NPU injected into spp:           10002

NetIO->NPU PROTO ARP:               2

NetIO->NPU PROTO IPV4:           10000

-------------------------------

socket/rx

ether raw pkts:           10030

-------------------------------

socket/tx

ce pkts:           10002

-------------------------------

client/punt

punted to client:           10008

-------------------------------

4 - نيتو

show netio chains gigabitEthernet 0/0/0/16 location 0/0/cpu0

<12> (ipv4)   Stats IN: 10000 pkts, 1140000 bytes; OUT: 10000 pkts, 1140000 bytes

Protocol        SAFI       Pkts In    Bytes In    Pkts Out   Bytes Out

---------------  ----------    ----------  ----------  ----------  ----------

ipv4     Unicast         10000     1140000       10000     1000000

ipv4   Multicast             0           0           0           0

ipv4   Broadcast             0           0           0           0

ipv6     Unicast             0           0           0           0

ipv6   Multicast             0           0           0           0

RP/0/RP0/CPU0:fretta_2#show netio clients location 0/0/CPU0

Thu Apr 20 20:52:26.802 UTC

Counters                  Errors/Total

----------------------------------------

Output                        0/10002

Input                         0/10008

Puntback                      0/0

Jump                          0/0

Driver Output                 0/10002

XIPC queues              Dropped/Queued    Cur/High/Max

------------------------------------------------------------

OutputL                       0/10000         0/1/6000

OutputH                       0/2             0/1/3000

Puntback                      0/0             0/0/6000

Input              Punt         XIPC InputQ      XIPC PuntQ

ClientID         Drop/Total        Drop/Total      Cur/High/Max    Cur/High/Max

--------------------------------------------------------------------------------

ipv6_icmp           0/0               0/0             0/0/1000        0/0/1000

icmp                0/10000           0/0             0/1/1000        0/0/1000

clns              L 0/0               0/0           L 0/0/1000        0/0/0

H 0/0                             H 0/0/1000

ipv6_io             0/0               0/0             0/0/1000        0/0/1000

ipv6_nd             0/0               0/0             0/0/1500        0/0/1000

l2snoop             0/0               0/0             0/0/1000        0/0/0

ether_sock          0/0               0/0

tp_oam              0/0               0/0             0/0/1000        0/0/1000

icmpv6_unreach_jump        0/0               0/0

arp                 0/2               0/0             0/1/1000        0/0/1000

mpls_io             0/0               0/0             0/0/1000        0/0/1000

ipv4                0/0               0/0             0/0/1000        0/0/1000

ipv6                0/0               0/0             0/0/1000        0/0/1000

Key:

L = queue for lower priority packets

H = queue for higher priority packets

5 - إحصاءات شعبة المرأة والتنمية

RP/0/RP0/CPU0:fretta_2#show fwd statistics all location 0/0/cpu0

Thu Apr 20 20:51:50.347 UTC

RECEIVE STATISTICS SUMMARY:

rx_pkts: 10008

punt_pkts: 10008

ingress_total_drops: 0

TRANSMIT STATISTICS SUMMARY:

inject_pkts: 10002

tx_pkts: 10002

egress_total_drops: 0

RP/0/RP0/CPU0:fretta_2#

6. IP IOS

show ipv4 traffic brief location 0/0/CPU0

Rcvd: 0 admin unreachable, 0 network unreachable

0 host unreachable, 0 protocol unreachable

0 port unreachable, 0 fragment unreachable

0 time to live exceeded, 0 reassembly ttl exceeded

10000 echo request, 0 echo reply

0 mask request, 0 mask reply

0 redirect, 0 parameter error

0 source quench, 0 timestamp, 0 timestamp reply

0 router advertisement, 0 router solicitation

10000 total, 0 checksum errors, 0 unknown

رد الارتداد: العقدة البعيدة (LC): tx

Path: IPv4/ICMP (LC) -> FWD/NetIO (LC) -> SPP (LC) -> NPU

1. إدخال/إخراج IP

RP/0/RP0/CPU0:fretta_2#show ipv4 traffic brief location 0/0/CPU0

ICMP statistics:

Sent: 0 admin unreachable, 0 network unreachable

0 host unreachable, 0 protocol unreachable

0 port unreachable, 0 fragment unreachable

0 time to live exceeded, 0 reassembly ttl exceeded

0 echo request, 10000 echo reply

0 mask request, 0 mask reply

0 parameter error, 0 redirects

10000 total

2 - نتيو

show netio chains gigabitEthernet 0/0/0/16 location 0/0/cpu0

<12> (ipv4)   Stats IN: 10000 pkts, 1140000 bytes; OUT: 10000 pkts, 1140000 bytes

Protocol        SAFI       Pkts In    Bytes In    Pkts Out   Bytes Out

---------------  ----------    ----------  ----------  ----------  ----------

ipv4     Unicast         10000     1140000       10000     1000000

ipv4   Multicast             0           0           0           0

ipv4   Broadcast             0           0           0           0

ipv6     Unicast             0           0           0           0

ipv6   Multicast             0           0           0           0

RP/0/RP0/CPU0:fretta_2#show netio clients location 0/0/CPU0

Thu Apr 20 20:52:26.802 UTC

Counters                  Errors/Total

----------------------------------------

Output                        0/10002

Input                         0/10008

Puntback                      0/0

Jump                          0/0

Driver Output                 0/10002

XIPC queues              Dropped/Queued    Cur/High/Max

------------------------------------------------------------

OutputL                       0/10000         0/1/6000

OutputH                       0/2             0/1/3000

Puntback                      0/0             0/0/6000

3 - إحصاءات شعبة تنمية المرأة

RP/0/RP0/CPU0:fretta_2#show fwd statistics all location 0/0/cpu0

Thu Apr 20 20:51:50.347 UTC

RECEIVE STATISTICS SUMMARY:

rx_pkts: 10008

punt_pkts: 10008

ingress_total_drops: 0

TRANSMIT STATISTICS SUMMARY:

inject_pkts: 10002

tx_pkts: 10002

egress_total_drops: 0

4- بروتوكول SPP

show spp node-counters location 0/0/CPU0

fretta/classify

forwarded to spp clients:           10006

forwarded NPU packet to NetIO:           10006

dropped in classify node:              22

Fwded to CoPP sampler:               2

PUNT ARP:               2

PUNT IFIB:           10006

IFIB IPv4_STACK:           10000

IFIB RAWIP6_FM:               6

-------------------------------

client/inject

pkts injected into spp:           10002

NetIO->NPU injected into spp:           10002

NetIO->NPU PROTO ARP:               2

NetIO->NPU PROTO IPV4:           10000

-------------------------------

socket/rx

ether raw pkts:           10030

-------------------------------

socket/tx

ce pkts:           10002

-------------------------------

client/punt

punted to client:           10008

-------------------------------

5. تحقق مما إذا كان قد تم إرسال الحزمة إلى السلك.

RP/0/RP0/CPU0:fretta_2#show controllers gigabitEthernet 0/0/0/16 stats

Thu Apr 20 21:20:22.593 UTC

Statistics for interface GigabitEthernet0/0/0/16 (cached values):

Egress:

Output total bytes          = 1140270

Output good bytes           = 1140270

Output total packets        = 10004

Output 802.1Q frames        = 0

Output pause frames         = 0

Output pkts 64 bytes        = 1

Output pkts 65-127 bytes    = 10003

Output pkts 128-255 bytes   = 0

Output pkts 256-511 bytes   = 0

Output pkts 512-1023 bytes  = 0

Output pkts 1024-1518 bytes = 0

Output pkts 1519-Max bytes  = 0

Output good pkts            = 10004

Output unicast pkts         = 10000

Output multicast pkts       = 3

Output broadcast pkts       = 1

Output drop underrun        = 0

Output drop abort           = 0

Output drop other           = 0

Output error other          = 0

6. حالات الواجهة

RP/0/RP0/CPU0:fretta_2#show int gigabitEthernet 0/0/0/16

Thu Apr 20 21:21:37.942 UTC

GigabitEthernet0/0/0/16 is up, line protocol is up

Interface state transitions: 1

Hardware is GigabitEthernet, address is 008a.964a.7040 (bia 008a.964a.7040)

Internet address is 1.1.16.2/24

MTU 1514 bytes, BW 1000000 Kbit (Max: 1000000 Kbit)

reliability 255/255, txload 0/255, rxload 0/255

Encapsulation ARPA,

Full-duplex, 1000Mb/s, link type is force-up

output flow control is off, input flow control is off

Carrier delay (up) is 10 msec

loopback not set,

Last link flapped 01:00:13

ARP type ARPA, ARP timeout 04:00:00

Last input 00:56:58, output 00:56:58

Last clearing of "show interface" counters never

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

10004 packets input, 1140270 bytes, 0 total input drops

3 drops for unrecognized upper-level protocol

Received 1 broadcast packets, 3 multicast packets

0 runts, 0 giants, 0 throttles, 0 parity

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

10004 packets output, 1140270 bytes, 0 total output drops

Output 1 broadcast packets, 3 multicast packets

0 output errors, 0 underruns, 0 applique, 0 resets

0 output buffer failures, 0 output buffers swapped out

0 carrier transitions

رد الارتداد: العقدة المحلية (LC): Rx

LPTS(HW) -> SPP(LC) -> NetIO/Forwarder(LC) -> LPTS PreIFIB Lookup -> SPP(LC) -> CE(LC) -> SPP(RP) -> NetIO(RP) -> IP I/O (RP) -> ICMP (RP)

1. تحقق مما إذا كانت الحزم واردة من السلك.

RP/0/RP0/CPU0:fretta_1#show controllers gigabitEthernet 0/0/0/16 stats

Thu Apr 20 21:17:28.176 UTC

Statistics for interface GigabitEthernet0/0/0/16 (cached values):

Ingress:

Input total bytes           = 1140270

Input good bytes            = 1140270

Input total packets         = 10004

Input 802.1Q frames         = 0

Input pause frames          = 0

Input pkts 64 bytes         = 1

Input pkts 65-127 bytes     = 10003

Input pkts 128-255 bytes    = 0

Input pkts 256-511 bytes    = 0

Input pkts 512-1023 bytes   = 0

Input pkts 1024-1518 bytes  = 0

Input pkts 1519-Max bytes   = 0

Input good pkts             = 10004

Input unicast pkts          = 10000

Input multicast pkts        = 3

Input broadcast pkts        = 1

Input drop overrun          = 0

Input drop abort            = 0

Input drop invalid VLAN     = 0

Input drop invalid DMAC     = 0

Input drop invalid encap    = 0

Input drop other            = 0

Input error giant           = 0

Input error runt            = 0

Input error jabbers         = 0

Input error fragments       = 0

Input error CRC             = 0

Input error collisions      = 0

Input error symbol          = 0

Input error other           = 0

Input MIB giant             = 0

Input MIB jabber            = 0

Input MIB CRC               = 0

2 - عدادات LPTS

RP/0/RP0/CPU0:fretta_1#show lpts pifib hardware entry brief locatio 0/0/CPU0

0.0.0.0              0.0.0.0              0     1    ECHOREPLY    0      0    ICMP-app-default   Local LC     LOW      10000  0

3. SPP على LC

RP/0/RP0/CPU0:fretta_1#show spp node-counters location 0/0/CPU0

Thu Apr 20 21:01:31.974 UTC

fretta/classify

forwarded to spp clients:           10006

forwarded NPU packet to NetIO:           10006

dropped in classify node:              24

Fwded to CoPP sampler:               1

PUNT ARP:               1

PUNT IFIB:           10006

IFIB RAWIP4_FM:           10000

IFIB RAWIP6_FM:               6

-------------------------------

client/inject

pkts injected into spp:           10002

NetIO->NPU injected into spp:               2

NetIO->CPU injected into spp:           10000

NetIO->NPU PROTO ARP:               2

NetIO->CPU PKT LPTS:           10000

-------------------------------

socket/rx

ether raw pkts:           10031

-------------------------------

socket/tx

ce pkts:           10002

-------------------------------

client/punt

punted to client:           10007

-------------------------------

4. Netio على LC

RP/0/RP0/CPU0:fretta_1# show netio chains gigabitEthernet 0/0/0/16 location 0/0/cpu0

<12> (ipv4)   Stats IN: 10000 pkts, 1140000 bytes; OUT: 0 pkts, 0 bytes

Protocol SAFI counts:

--------------------

Protocol        SAFI       Pkts In    Bytes In    Pkts Out   Bytes Out

---------------  ----------    ----------  ----------  ----------  ----------

ipv4     Unicast         10000     1140000           0           0

ipv4   Multicast             0           0           0           0

ipv4   Broadcast             0           0           0           0

ipv6     Unicast             0           0           0           0

ipv6   Multicast             0           0           0           0

5. إحصائيات FWD حول LC.

RP/0/RP0/CPU0:fretta_1#show fwd statistics all location 0/0/CPU0

Thu Apr 20 21:04:27.767 UTC

RECEIVE STATISTICS SUMMARY:

rx_pkts: 10007

punt_pkts: 10007

ingress_total_drops: 0

TRANSMIT STATISTICS SUMMARY:

inject_pkts: 10002

tx_pkts: 10002

egress_total_drops: 0

RP/0/RP0/CPU0:fretta_1#

5. SPP على LC لإرساله إلى SPP على RP.

RP/0/RP0/CPU0:fretta_1#show spp node-counters location 0/0/CPU0

Thu Apr 20 21:01:31.974 UTC

fretta/classify

forwarded to spp clients:           10006

forwarded NPU packet to NetIO:           10006

dropped in classify node:              24

Fwded to CoPP sampler:               1

PUNT ARP:               1

PUNT IFIB:           10006

IFIB RAWIP4_FM:           10000

IFIB RAWIP6_FM:               6

-------------------------------

client/inject

pkts injected into spp:           10002

NetIO->NPU injected into spp:               2

NetIO->CPU injected into spp:           10000

NetIO->NPU PROTO ARP:               2

NetIO->CPU PKT LPTS:           10000

-------------------------------

socket/rx

ether raw pkts:           10031

-------------------------------

socket/tx

ce pkts:           10002

-------------------------------

client/punt

punted to client:           10007

-------------------------------

6. SPP على RP

RP/0/RP0/CPU0:fretta_1#show spp node-counters location 0/rP0/CPU0

Thu Apr 20 21:06:33.045 UTC

socket/rx

ether raw pkts:           10002

mgmt interface pkts:           16651

-------------------------------

socket/tx

ce pkts:           10000

mgmt interface pkts:              14

-------------------------------

fretta/classify

forwarded to spp clients:           26651

forwarded CPU packet to NetIO:           10000

forwarded Mgmt packet to NetIO:           16651

dropped in classify node:               2

-------------------------------

client/inject

pkts injected into spp:           10014

NetIO->NPU injected into spp:           10000

MGMT_IF injected into spp:              14

NetIO->NPU PROTO IPV4_PREROUTE:           10000

-------------------------------

client/punt

punted to client:           26651

-------------------------------

7. Netio على RP.

RP/0/RP0/CPU0:fretta_1#show netio clients location 0/RP0/CPU0

Thu Apr 20 21:05:05.977 UTC

Counters                  Errors/Total

----------------------------------------

Output                        0/10031

Input                         0/25872

Puntback                      0/0

Jump                          0/0

Driver Output                 0/10014

Mutex Bypass Counters        Total

----------------------------------------

Egress handled               0

Egress chainwalked           10018

Egress dropped               0

Ingress handled              10000

Ingress chainwalked          0

Ingress dropped              0

XIPC queues              Dropped/Queued    Cur/High/Max

------------------------------------------------------------

OutputL                       0/10004         0/1/6000

OutputH                       0/14            0/1/3000

Puntback                      0/0             0/0/6000

PMutex_egressL                0/10004         0/1/6000

PMutex_egressH                0/14            0/1/1500

PMutex_ingressL               0/0             0/0/6000

PMutex_ingressH               0/0             0/0/1500

Input              Punt         XIPC InputQ      XIPC PuntQ

ClientID         Drop/Total        Drop/Total      Cur/High/Max    Cur/High/Max

--------------------------------------------------------------------------------

ipv6_icmp           0/0               0/0             0/0/1000        0/0/1000

icmp                0/10000           0/0             0/1/1000        0/0/1000

clns              L 0/0               0/0           L 0/0/1000        0/0/0

H 0/0                             H 0/0/1000

eth_mgmt            0/0               0/0

ipv6_io             0/0               0/4             0/0/1000        0/1/1000

ipv6_nd             0/4               0/0             0/1/1500        0/0/1000

l2snoop             0/0               0/0             0/0/1000        0/0/0

ether_sock          0/0               0/0

icmpv6_unreach_jump        0/0               0/0

raw               L 0/0               0/0           L 0/0/1600        0/0/0

H 0/0                             H 0/0/1600

tcp               L 0/0               0/0           L 0/0/1600        0/0/0

H 0/0                             H 0/0/1600

udp               L 0/307             0/0           L 0/1/1600        0/0/0

H 0/0                             H 0/0/1600

arp                 0/15565           0/0             0/4/1000        0/0/1000

mpls_io             0/0               0/0             0/0/1000        0/0/1000

lspv_server         0/0               0/0

ipv4                0/0               0/0             0/0/1000        0/0/1000

ipv6                0/0               0/0             0/0/1000        0/0/1000

Key:

L = queue for lower priority packets

H = queue for higher priority packets

8. إدخال/إخراج IP

RP/0/RP0/CPU0:fretta_1#

RP/0/RP0/CPU0:fretta_1#show ipv4 traffic brief

Rcvd: 0 admin unreachable, 0 network unreachable

0 host unreachable, 0 protocol unreachable

0 port unreachable, 0 fragment unreachable

0 time to live exceeded, 0 reassembly ttl exceeded

0 echo request, 10000 echo reply

0 mask request, 0 mask reply

0 redirect, 0 parameter error

0 source quench, 0 timestamp, 0 timestamp reply

0 router advertisement, 0 router solicitation

10000 total, 0 checksum errors, 0 unknown

9. حالات الواجهة:

RP/0/RP0/CPU0:fretta_1# show int gigabitEthernet 0/0/0/16

Thu Apr 20 21:22:12.822 UTC

GigabitEthernet0/0/0/16 is up, line protocol is up

Interface state transitions: 1

Hardware is GigabitEthernet, address is 008a.964b.7040 (bia 008a.964b.7040)

Internet address is 1.1.16.1/24

MTU 1514 bytes, BW 1000000 Kbit (Max: 1000000 Kbit)

reliability 255/255, txload 0/255, rxload 0/255

Encapsulation ARPA,

Full-duplex, 1000Mb/s, link type is force-up

output flow control is off, input flow control is off

Carrier delay (up) is 10 msec

loopback not set,

Last link flapped 01:01:11

ARP type ARPA, ARP timeout 04:00:00

Last input 00:58:03, output 00:58:03

Last clearing of "show interface" counters never

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

10004 packets input, 1140270 bytes, 0 total input drops

3 drops for unrecognized upper-level protocol

Received 1 broadcast packets, 3 multicast packets

0 runts, 0 giants, 0 throttles, 0 parity

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

10004 packets output, 1140270 bytes, 0 total output drops

Output 1 broadcast packets, 3 multicast packets

0 output errors, 0 underruns, 0 applique, 0 resets

0 output buffer failures, 0 output buffers swapped out

0 carrier transitions

RP/0/RP0/CPU0:fretta_1#

إختبار الاتصال المحلي

<tbd>