المحتويات

المقدمة

المتطلبات الأساسية

المتطلبات

المكونات المستخدمة

الاصطلاحات

نظرة عامة على إستخدام الذاكرة

التحقق من إستخدام الذاكرة

التحقق من إستخدام الذاكرة داخل IOSd

التحقق من إستخدام الذاكرة على IOS XE

التحقق من إستخدام الذاكرة على QFP

معلومات ذات صلة

المقدمة

يقدم هذا المستند معلومات حول كيفية صيانة حجم ذاكرة النظام والتحقق منه على موجهات خدمات التجميع (ASR) من السلسلة Cisco ASR 1000 Series. ينطبق هذا المستند على جميع إصدارات برنامج Cisco IOS XE التي تدعم سلسلة موجهات خدمات التجميع طراز ASR 1000 من Cisco.

المتطلبات الأساسية

المتطلبات

لا توجد متطلبات خاصة لهذا المستند.

المكونات المستخدمة

تستند المعلومات الواردة في هذا المستند إلى إصدارات البرامج والمكونات المادية التالية:

- جميع موجهات خدمات التجميع من السلسلة ASR 1000 من Cisco، والتي تتضمن موجهات 1002 و 1004 و 1006.

- جميع إصدارات برنامج Cisco IOS XE التي تدعم موجهات خدمات التجميع من السلسلة Cisco ASR 1000 Series.

تم إنشاء المعلومات الواردة في هذا المستند من الأجهزة الموجودة في بيئة معملية خاصة. بدأت جميع الأجهزة المُستخدمة في هذا المستند بتكوين ممسوح (افتراضي). إذا كانت شبكتك مباشرة، فتأكد من فهمك للتأثير المحتمل لأي أمر.

الاصطلاحات

راجع اصطلاحات تلميحات Cisco التقنية للحصول على مزيد من المعلومات حول اصطلاحات المستندات.

نظرة عامة على إستخدام الذاكرة

يحتوي معالج التوجيه (RP) الخاص بموجه خدمات التجميع من السلسلة Cisco ASR 1000 Series Aggregation Services Router على ذاكرة وصول عشوائي (RAM) ديناميكية متزامنة (SDRAM)، والتي توفر التخزين للتعليمات البرمجية والبيانات والحزم. يوفر بروتوكول RP إمكانية تطوير الذاكرة لما يصل إلى 4 جيجابايت لكل من ASR1000-RP1 و 16 جيجابايت ل ASR1000-RP2.

تقدم موجهات خدمات التجميع طراز ASR 1000 من Cisco برنامج Cisco IOS XE Software كبنية برامج خاصة بها. استنادا إلى برنامج Cisco IOS Software، فإن برنامج Cisco IOS XE هو نظام تشغيل قابل لإضافة وحدات أخرى تم تصميمه على نواة Linux على معالج التوجيه. يعمل برنامج IOS Daemon (IOSd) كعملية قياسية على مستوى المستخدم تحت نظام التشغيل Linux ويوفر مجموعة ميزات Cisco IOS، والتي تتضمن بروتوكولات التوجيه. عند بدء التشغيل، يتم منح برنامج IOS الوصول إلى مقدار ثابت من الذاكرة الفعلية على بروتوكول RP، وعادة ما يتم منح هذا الطراز إمكانية الوصول إلى نسبة 50 بالمائة أو 1 جيجابايت على الأنظمة التي تبلغ سعتها 2 جيجابايت و 2 جيجابايت على الأنظمة التي تبلغ سعتها 4 جيجابايت. التشغيل المزدوج IOS مع هيكل مكون من وحدتين/4RU مع سعة تبلغ 4 جيجابايت من الذاكرة الرئيسية لتوفير معدل تكرار للبرامج تستهلك كل منها 1 جيجابايت.

لعرض معلومات حول حجم الذاكرة والبرامج والأجهزة وواجهة الويب، أستخدم الأمر show version.

Router#show version

Cisco IOS Software, IOS-XE Software (PPC_LINUX_IOSD-ADVIPSERVICESK9-M),

Version 12.2(33)XNB, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2008 by Cisco Systems, Inc.

Compiled Fri 05-Sep-08 08:56 by mcpre

Cisco IOS-XE software, Copyright (c) 1986-2008 by Cisco Systems, Inc.

All rights reserved.  Certain components of Cisco IOS-XE software are

licensed under the GNU General Public License ("GPL") Version 2.0.  The

software code licensed under GPL Version 2.0 is free software that comes

with ABSOLUTELY NO WARRANTY.  You can redistribute and/or modify such

GPL code under the terms of GPL Version 2.0.  For more details, see the

documentation or "License Notice" file accompanying the IOS-XE software,

or the applicable URL provided on the flyer accompanying the IOS-XE

software.

ROM: IOS-XE ROMMON

ASR1006b uptime is 6 days, 21 hours, 49 minutes

Uptime for this control processor is 6 days, 21 hours, 51 minutes

System returned to ROM by reload at 15:35:57 JST Thu Feb 5 2009

System restarted at 15:40:15 JST Thu Feb 5 2009

System image file is "bootflash:packages.conf"

Last reload reason: Reload command

This product contains cryptographic features and is subject to United

States and local country laws governing import, export, transfer and

use. Delivery of Cisco cryptographic products does not imply

third-party authority to import, export, distribute or use encryption.

Importers, exporters, distributors and users are responsible for

compliance with U.S. and local country laws. By using this product you

agree to comply with applicable laws and regulations. If you are unable

to comply with U.S. and local laws, return this product immediately.

A summary of U.S. laws governing Cisco cryptographic products may be found at:

http://www.cisco.com/wwl/export/crypto/tool/stqrg.html

If you require further assistance please contact us by sending email to

export@cisco.com.

cisco ASR1006 (RP1) processor with 1779130K/6147K bytes of memory.

!--- total memory allocated to IOSd.

16 Gigabit Ethernet interfaces

21 Gigabit Ethernet interfaces

2 Ten Gigabit Ethernet interfaces

32768K bytes of non-volatile configuration memory.

4194304K bytes of physical memory.

!--- IOS-XE total memory size.

955063K bytes of eUSB flash at bootflash:.

39004543K bytes of SATA hard disk at harddisk:.

Configuration register is 0x2102

التحقق من إستخدام الذاكرة

التحقق من إستخدام الذاكرة داخل IOSd

يعرض الأمر show process معلومات حول العمليات النشطة. قم بإصدار عرض عمليات الذاكرة لإظهار مقدار الذاكرة المستخدمة داخل IOSd.

Router#show processes memory

Processor Pool Total: 1821391588 Used:  218319000 Free: 1603072588

lsmpi_io Pool Total:    6295088 Used:    6294116 Free:        972

PID TTY  Allocated      Freed    Holding    Getbufs    Retbufs Process

0   0  174405308    8586260  134742552        811     137870 *Init*

0   0      65688     393404        152          0          0 *Sched*

0   0   21603272   48285960     274932          3          1 *Dead*

0   0          0          0     406304          0          0 *MallocLite*

1   0     431576          0     448716          0          0 Chunk Manager

2   0        236        236      11140          0          0 Load Meter

3   0    2785880    2782996      32092          0          0 Exec

4   0          0          0      17140          0          0 Retransmission o

5   0      34360          0      17140          0          0 IPC ISSU Dispatc

6   0       3336        236      20240          0          0 Check heaps

7   0      32780      32780      17140         45          0 Pool Manager

8   0        236        236      17140          0          0 Timers

9   0  206550924  206496084      71980    9326586    9326586 ARP Input

10   0      24356      24356      17140        111        111 ARP Background

11   0        236        236      17140          0          0 ATM Idle Timer

12   0          0          0      17140          0          0 ATM ASYNC PROC

13   0          0          0      17140          0          0 AAA_SERVER_DEADT

14   0          0          0      29140          0          0 Policy Manager

15   0      59092        692      74972        172        172 Entity MIB API

التحقق من إستخدام الذاكرة على IOS XE

لعرض إستخدام ذاكرة النظام الحالي على Cisco IOS XE، أستخدم الأمر show platform software status control-processor brief.

Router#show platform software status control-processor brief

Load Average

Slot  Status  1-Min  5-Min 15-Min

RP0 Healthy   0.20   0.23   0.19

RP1 Healthy   0.19   0.19   0.12

ESP0 Healthy   0.65   0.54   0.47

SIP1 Healthy   0.17   0.07   0.01

SIP2 Healthy   0.02   0.06   0.01

Memory (kB)

Slot  Status    Total     Used (Pct)     Free (Pct) Committed (Pct)

RP0 Healthy  3919872  2710788 (65%)  1209084 (29%)   2327484 (56%)

RP1 Healthy  3919872  2377136 (57%)  1542736 (37%)   2320964 (56%)

ESP0 Healthy  2030444  1112344 (53%)   918100 (43%)   3409068 (162%)

SIP1 Healthy   484452   293408 (55%)   191044 (36%)    244180 (46%)

SIP2 Healthy   484452   293408 (55%)   191044 (36%)    244020 (46%)

CPU Utilization

Slot  CPU   User System   Nice   Idle    IRQ   SIRQ Iowait

RP0    0  10.91   1.88   0.00  86.67   0.38   0.13   0.00

RP1    0   8.06   1.22   0.00  90.11   0.00   0.03   0.55

ESP0    0   5.78   3.61   0.00  90.51   0.02   0.05   0.00

SIP1    0   4.32   0.45   0.00  95.20   0.00   0.01   0.00

SIP2    0   3.95   0.44   0.00  95.57   0.00   0.01   0.00

لعرض إستخدام الذاكرة لكل عملية يتم تشغيلها على برنامج Cisco IOS XE، أستخدم عملية برنامج نظام المراقبة الأساسي {fp|rp} {active|standby}. بعد أن تظهر الشاشة، يمكنك كتابة "shift + M" لفرز العمليات المعروضة باستخدام الذاكرة.

يشير RES إلى الذاكرة الفعلية غير المتبادلة التي تستخدمها العملية ويشير SHR إلى مقدار الذاكرة المشتركة التي تستخدمها العملية. RES + SHR هو المقدار الإجمالي للعملية، وتشير ٪MEM إلى الحصة المستخدمة حاليا من الذاكرة الفعلية المتوفرة للعمليات.

Router#monitor platform software process rp active

top - 05:18:46 up 14 days, 17:33,  0 users,  load average: 0.00, 0.01, 0.00

Tasks: 119 total,   1 running, 118 sleeping,   0 stopped,   0 zombie

Cpu(s):  0.4% us,  0.4% sy,  0.0% ni, 99.1% id,  0.0% wa,  0.0% hi,  0.0% si

Mem:   3714760k total,  1454344k used,  2260416k free,    97952k buffers

Swap:        0k total,        0k used,        0k free,   875376k cached

PID USER      PR  NI  VIRT  RES  SHR S %CPU %MEM    TIME+  COMMAND

17385 root      20   0 1874m 338m  75m S  0.2  9.3  65:59.18 ppc_linux_iosd-

18098 root      20   0 71880  59m 6324 S  0.2  1.6  10:48.84 smand

16521 root      20   0 87868  51m  47m S  0.0  1.4   0:02.80 fman_rp

16903 root      20   0 27788  16m  14m S  0.0  0.5  15:41.61 imand

15957 root      20   0 24776 9696 6880 S  0.2  0.3  12:49.67 cmand

17697 root      20   0 19504 6160 4544 S  0.0  0.2   0:00.95 psd

16316 root      20   0 18232 5972 3736 S  0.0  0.2  12:43.32 emd

16732 root      20   0 16184 5556 3900 S  0.4  0.1  21:22.61 hman

17237 root      20   0 15892 5456 3088 S  0.0  0.1   0:00.99 plogd

15166 root      20   0  4056 2396 1248 S  0.0  0.1   0:00.72 pvp.sh

16937 root       9 -11  3992 2308 1232 S  0.0  0.1   0:00.13 pman.sh

15559 root       9 -11  3992 2304 1228 S  0.0  0.1   0:00.13 pman.sh

17978 root       9 -11  3992 2304 1228 S  0.0  0.1   0:00.13 pman.sh

في حالة ظهور هذه الرسالة عند إصدار الأمر monitor platform software process على وحدة التحكم، يلزمك تعيين نوع وحدة طرفية باستخدام الأمر terminal-type من أجل ملاءمة وحدة تحكم، مثل VT100.

Router#monitor  platform software process rp active

Terminal type 'network' unsupported for command

Change the terminal type with the 'terminal terminal-type' command.

Router#terminal terminal-type VT100

التحقق من إستخدام الذاكرة على QFP

لعرض معلومات حول إستخدام الذاكرة ل QFP، أستخدم الأمر show platform hardware qfp active infrastructure statistics. تحتوي EXMEM على الذاكرة ذات الصلة IRAM و DRAM و SRAM و BQS.

Router#show platform hardware qfp active infrastructure exmem statistics

QFP exmem statistics

Type: Name: IRAM, CPP: 0

Total: 134217728

InUse: 5372928

Free: 127926272

Free protected: 918528

Free unprotected: 0

Lowest free water mark: 128844800

Largest free block: 99505152

Type: Name: DRAM, CPP: 0

Total: 402653184

InUse: 124705792

Free: 275775488

Free protected: 1041408

Free unprotected: 1130496

Lowest free water mark: 275587072

Largest free block: 273415168

لعرض إستخدام الذاكرة لكل مستخدم، أضف خيارات المستخدم، كما هو موضح.

Router#show platform hardware qfp active infrastructure exmem statistics user

Type: Name: IRAM, CPP: 0

Allocations  Bytes-Alloc  Bytes-Total  User-Name

-------------------------------------------------------------------------------

1            115200       115712       CPP_FIA

Type: Name: DRAM, CPP: 0

Allocations  Bytes-Alloc  Bytes-Total  User-Name

-------------------------------------------------------------------------------

4            1248         4096         P/I

22           11567884     11585536     SBC

9            270600       276480       CEF

1            1138256      1138688      QM RM

3            528          3072         CFM

4            262144       262144       Qm 16

34           8405116      8436736      ING_EGR_UIDB

1            655360       655360       ING EGR INPUT CHUNK_Config_0

لعرض إستخدام TCAM ل QFP، أستخدم أمر إستخدام show platform hardware qfp active tcam resource-manager.

Router#show platform hardware qfp active tcam resource-manager usage

QFP TCAM Usage Information

80 Bit Region Information

--------------------------

Name                                : Leaf Region #0

Number of cells per entry           : 1

Current 80 bit entries used         : 0

Current used cell entries           : 0

Current free cell entries           : 0

:

:

Total TCAM Cell Usage Information

----------------------------------

Name                                : TCAM #0 on CPP #0

Total number of regions             : 3

Total tcam used cell entries        : 0

Total tcam free cell entries        : 131072

Threshold status                    : below critical limit

معلومات ذات صلة

- أستكشاف أخطاء موجهات خدمات التجميع طراز ASR 1000 من Cisco وإصلاحها

- صفحة دعم موجهات خدمات التجميع طراز ASR 1000 من Cisco

- الدعم التقني والمستندات - Cisco Systems