المحتويات

المقدمة

المنافذ الافتراضية

جدول خدمات المنفذ العكسي

المقدمة

يصف هذا وثيقة ال TCP و UDP ميناء أن cisco CGR2010 يستعمل منصة لتطبيقات واتصالات الإنترنت.

المنافذ الافتراضية

يتلقى Cisco CGR2010 هذا ميناء يمكن افتراضيا :

Router#show control-plane host open-ports

Active internet connections (servers and established)

Prot               Local Address             Foreign Address                  Service    State

tcp                        *:23                         *:0                   Telnet   LISTEN

Router#

في حال تمكين بروتوكول SSH في الموجه، يكون المنفذ 22 مفتوحا في المحول CGR 2010:

Router#show control-plane host open-ports

Active internet connections (servers and established)

Prot               Local Address             Foreign Address                 Service    State

tcp                        *:22                         *:0              SSH-Server   LISTEN

tcp                        *:23                         *:0                  Telnet   LISTEN

أستخدم NMAP للتحقق من المنافذ التي تم تمكينها في الموجه.

C:\Program Files (x86)\Nmap>nmap -sS -p1-10000 10.31.126.137

Starting Nmap 7.70 ( https://nmap.org ) at 2018-12-06 20:05 Central Standard Time (Mexico)

Nmap scan report for 10.31.126.137

Host is up (0.0054s latency).

Not shown: 9998 closed ports

PORT STATE SERVICE

22/tcp open ssh

23/tcp open telnet

Nmap done: 1 IP address (1 host up) scanned in 14.23 seconds

C:\Program Files (x86)\Nmap>

عند تثبيت وحدة نمطية للمحول على CGR2010، يفتح الموجه المنافذ 2003 و 4003 و 6003 و 9003. ألق نظرة على الطاولة.

C:\Program Files (x86)\Nmap>nmap -sS -p1-10000 10.31.126.137

Starting Nmap 7.70 ( https://nmap.org ) at 2018-12-06 20:22 Central Standard Time (Mexico)

Nmap scan report for 10.31.126.137

Host is up (0.0067s latency).

Not shown: 9994 closed ports

PORT STATE SERVICE

22/tcp open ssh

23/tcp open telnet

2003/tcp open finger

4003/tcp open pxc-splr-ft

6003/tcp open X11:3

9003/tcp open unknown

Nmap done: 1 IP address (1 host up) scanned in 12.54 seconds

C:\Program Files (x86)\Nmap>

جدول خدمات المنفذ العكسي

اسم الخدمة

نطاق المنفذ المحجوز

برنامج Telnet العادي

2000-2xxx

بروتوكول TCP الخام

الطراز 4000-4xxx

الوضع الثنائي ل Telnet

من 6000 إلى 6xxx

عكس Xremote

من 9000 إلى 9xxx

يتم تناول هذا السلوك في هذه الأوامر: https://bst.cloudapps.cisco.com/bugsearch/bug/CSCsh95539