المحتويات

المقدمة

المتطلبات الأساسية

المتطلبات

المكونات المستخدمة

خطوات إسترداد برنامج مراقبة الأجهزة الافتراضية وصورة النظام

تنزيل صور برنامج Hypervisor وصور النظام

تسلسل تمهيد CGR ل IOS

خطوات الاسترداد

المقدمة

يصف هذا المستند خطوات الاسترداد لبرنامج Hypervisor وصورة النظام على موجه الشبكة المتصلة (CGR 1000) من السلسلة Cisco 1000 التي تعمل ببرنامج IOS. إذا كان برنامج مراقبة الأجهزة الافتراضية أو صورة النظام تالفا، فيمكن أن يساعدك هذا الإجراء في إعادة الموجه CGR 1000 إلى الإنترنت. يتم تخزين تكوين IOS في ذاكرة NVRAM. حتى في حالة إستخدام بطاقة Cisco Secure Digital (SD) أخرى، لن يتم حذف التكوين ما لم يتم تحديد running-config ليتم تخزينه في موقع آخر.

المتطلبات الأساسية

- خادم بروتوكول نقل الملفات المبسط (TFTP) المثبت على الكمبيوتر المحلي

- إعداد خادم TFTP للحصول على برنامج مراقبة الأجهزة الافتراضية وصورة النظام

المتطلبات

توصي Cisco بأن تكون لديك معرفة بالمواضيع التالية:

- كبل وحدة التحكم

- كات 5

- صورة برنامج Hypervisor وصورة النظام وصورة الحزمة

المكونات المستخدمة

المعلومات الواردة في هذا المستند مقيدة بإصدار IOS الذي يتم تشغيله على CGR 1120 و CGR1240 فقط.

تم إنشاء المعلومات الواردة في هذا المستند من الأجهزة الموجودة في بيئة معملية خاصة. بدأت جميع الأجهزة المُستخدمة في هذا المستند بتكوين ممسوح (افتراضي). إذا كانت شبكتك مباشرة، فتأكد من فهمك للتأثير المحتمل لأي أمر.

خطوات إسترداد برنامج مراقبة الأجهزة الافتراضية وصورة النظام

تنزيل صور برنامج Hypervisor وصور النظام

1. على cisco جلبت أي صورة cgr1000-universalk9-bundle.xxx.xxx.xxx.bin.

2. أستخدم 7z لفتح ملف الحاوية.

3. انقر نقرا مزدوجا فوق الملف لاستعراض المحتوى.

4. تنزيل صورة برنامج hypervisor (cgr1000-hv.srp.spa.1.1) وصورة النظام (cgr1000-universalk9-mz.SPA.155-2.T).

انقل هذه الملفات الثلاثة إلى خادم TFTP.

- cgr1000-hv.srp.spa.1.1.1 (صورة برنامج hypervisor)

- cgr1000-universalk9-mz.SPA.155-2.T (صورة النظام)

- cgr1000-bundle-universalk9-bundle.SPA.155-2.T.bin (صورة الحزمة)

تسلسل تمهيد CGR ل IOS

ترتيب تسلسل التمهيد هو:

شغل > BIOS > صورة برنامج Hypervisor > صورة النظام > التشغيل العادي لبرنامج IOS

في حالة عدم وجود صورة لبرنامج hypervisor، فسيرى المستخدم ما يلي:

IOFPGA @ 0xd0000000 version=0x23020900, datecode=0xd091e17 CPLD version 0x13

Reset reason (0.0):   Unknown

BIOS Version: Build # 14 - Wed 04/30/2014

CGR Loader Stage 1 Version: 1.9.16

Autoboot string bootstrap:cgr1000-hv.srp.SPA.1.1.0

Booting image: bootstrap:cgr1000-hv.srp.SPA.1.1.0....

Autoboot failed with error=1

rommon-1>

في حالة عدم وجود صورة نظام (IOS image)، سيرى المستخدم ما يلي:

IOFPGA @ 0xd0000000 version=0x23020900, datecode=0xd091e17 CPLD version 0x13

Reset reason (0.0):   Unknown

CGR Loader Stage 2 Version: 1.9.16

Autoboot string flash:/cgr1000-universalk9-mz.SPA.154-3.M1,12;

rommon-2>

خطوات الاسترداد

1. إعداد كبل وحدة التحكم باستخدام برنامج.

2. قم بتوصيل كبل CAT5 من بطاقة واجهة الشبكة (NIC) الخاصة بالكمبيوتر المحلي إلى CGR ETH 2/2 . هذه هي الواجهة الوحيدة التي تعمل أثناء عملية الاسترداد.

3. قم بإعداد بطاقة واجهة الشبكة (NIC) الخاصة بالكمبيوتر المحلي لتكون في الشبكة الفرعية نفسها الخاصة ب CGR.

على سبيل المثال، بطاقة واجهة الشبكة (NIC) الخاصة بالكمبيوتر هي 192.0.2.1 شبكة فرعية 255.255.255.0.

بالنسبة ل CGR ستكون 192.0.2.2 شبكة فرعية 255.255.255.0.

4. في جلسة PuTTY، يمكنك الاطلاع على rommon-1>إذا تعذر على CGR العثور على صورة برنامج Hypervisor.

IOFPGA @ 0xd0000000 version=0x23020900, datecode=0xd091e17 CPLD version 0x13

Reset reason (0.0):   Unknown

BIOS Version: Build # 14 - Wed 04/30/2014

CGR Loader Stage 1 Version: 1.9.16

Autoboot string bootstrap:cgr1000-hv.srp.SPA.1.1.0

Booting image: bootstrap:cgr1000-hv.srp.SPA.1.1.0....

Autoboot failed with error=1

rommon-1>

5. قم بإعداد عنوان IP الخاص ب ETH2/2 باستخدام مجموعة الأوامر IP.

set ip 192.0.2.2 255.255.255.0

Correct - ip addr is 192.0.2.2, mask is 255.255.255.0

Found Intel IOH GBE [2:0.1] at 0xe020, ROM address 0x0000

Probing...[Intel IOH GBE]

MAC address bc:16:65:31:58:b2

External PHY link UP @ 1000/full

Address: 192.0.2.2

Netmask: 255.255.255.0

Server: 0.0.0.0

Gateway: 0.0.0.0

6. قم بإعداد عنوان البوابة ليكون هو بطاقة واجهة الشبكة (NIC) الخاصة بالكمبيوتر المحلي باستخدام مجموعة الأوامر GW.

set gw 192.0.2.1

Correct gateway addr 192.0.2.1

Address: 192.0.2.2

Netmask: 255.255.255.0

Server: 0.0.0.0

Gateway: 192.0.2.1

7. قم بتمهيد صورة برنامج مراقبة الأجهزة الافتراضية من خادم TFTP المحلي باستخدام الأمر boot tftp://.

Boot tftp://192.0.2.1/cgr1000-hv.srp.SPA.1.1.1

Booting: /cgr1000-hv.srp.SPA.1.1.1 console=ttyS0,9600n8nn quiet loader_ver="1.9

16"....   [Multiboot-kludge, loadaddr=0x1c100000, text-and-data=0x16d05c2

Signature verification was successful, bss=0x0, entry=0x1c10005c]

RIF heap: 1519616 bytes, SKH heap: 2310144 bytes

RIF: used 7691/16384 bytes of stack

8. يجب أن تبدو الشاشة بهذا الشكل بمجرد أن يقوم CGR بتحميل صورة برنامج hypervisor ولا يمكنه تمهيد صورة النظام.

LynxSecure TRUNK (i386; No Service Packs installed)

Copyright 2005-2014 LynuxWorks, Inc

All rights reserved.

LynxSecure (i386) build ENGINEERING created on 03/14/2014 13:21:02

URL:         svn://txx.lynx.com/svn/lynxsecure-svn/engr/psubramaniam/cisco/ohci/lynxsk

Revision(s): 5194M

Built by:    psubramaniam@paricos62.localdomain

Initializing the Internal Timekeeping...

Initializing the System State Manager...

Initializing LynxSecure global data areas.

Number of CPU(s) : 2

Initializing the CPU Support Package.

Initializing LynxSecure page table...

Initializing the Board Support Package.

Starting up the other CPUs...

CPUs online: #0 #1

Initializing Scheduler...

Initializing the VCPU module...

Initializing Device Configuration Virtualization...

Initializing Subject Resources...

Initializing Interrupt Routing...

Initializing Hypercalls...

Heap memory used by LynxSecure: 2240444 (0x222fbc) bytes

Launching Subjects

IOFPGA @ 0xd0000000 version=0x23020900, datecode=0xd091e17 CPLD version 0x13

Reset reason (0.0):   Unknown

CGR Loader Stage 2 Version: 1.9.16

rommon-2>

9. قم بإعداد عنوان IP الخاص ب ETH2/2 باستخدام مجموعة الأوامر IP.

set ip 192.0.2.2 255.255.255.0

Correct - ip addr is 192.0.2.2, mask is 255.255.255.0

Found Intel IOH GBE [2:0.1] at 0xe020, ROM address 0x0000

Probing...[Intel IOH GBE]

MAC address bc:16:65:31:58:b2

External PHY link UP @ 1000/full

Address: 192.0.2.2

Netmask: 255.255.255.0

Server: 0.0.0.0

Gateway: 0.0.0.0

10. قم بإعداد عنوان البوابة ليكون هو بطاقة واجهة الشبكة (NIC) الخاصة بالكمبيوتر المحلي باستخدام مجموعة الأوامر GW.

set gw 192.0.2.1

Correct gateway addr 192.0.2.1

Address: 192.0.2.2

Netmask: 255.255.255.0

Server: 0.0.0.0

Gateway: 192.0.2.1

11. قم بتمهيد صورة النظام من خادم TFTP باستخدام الأمر boot tftp://.

Boot tftp://192.0.2.1/cgr1000-universalk9-mz.SPA.155-2.T

Booting: /cgr1000-universalk9-mz.SPA.155-2.T console=ttyS0,9600n8nn quiet loade

r_ver="1.9.16"....   [Multiboot-elf, <0x110000:0xc599aec:0x6667dc>, shtab=0xcd1

1500

Signature verification was successful, entry=0x110240]

Smart Init is enabled

smart init is sizing iomem

TYPE      MEMORY_REQ

Onboard devices &

buffer pools      0x02E44000

-----------------------------------------------

TOTAL:      0x02E44000

Rounded IOMEM up to: 47MB.

Using 10 percent iomem. [47MB/448MB]

Restricted Rights Legend

Use, duplication, or disclosure by the Government is

subject to restrictions as set forth in subparagraph

(c) of the Commercial Computer Software - Restricted

Rights clause at FAR sec. 52.227-19 and subparagraph

(c) (1) (ii) of the Rights in Technical Data and Computer

Software clause at DFARS sec. 252.227-7013.

cisco Systems, Inc.

170 West Tasman Drive

San Jose, California 95134-1706

Cisco IOS Software, cgr1000 Software (cgr1000-UNIVERSALK9-M), Version 15.5(2)T, RELEASE SOFTWARE (fc1)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2015 by Cisco Systems, Inc.

Compiled Wed 25-Mar-15 17:01 by prod_rel_team

This product contains cryptographic features and is subject to United

States and local country laws governing import, export, transfer and

use. Delivery of Cisco cryptographic products does not imply

third-party authority to import, export, distribute or use encryption.

Importers, exporters, distributors and users are responsible for

compliance with U.S. and local country laws. By using this product you

agree to comply with applicable laws and regulations. If you are unable

to comply with U.S. and local laws, return this product immediately.

A summary of U.S. laws governing Cisco cryptographic products may be found at:

http://www.cisco.com/wwl/export/crypto/tool/stqrg.html

If you require further assistance please contact us by sending email to export@cisco.com.

Installed image archive

Reading module 3 idprom, please wait......

..........

Reading module 4 idprom, please wait......

Cisco CGR1240/K9 (revision 1.0) with 373760K/52224K bytes of memory.

Processor board ID JAF1720BBGS

Last reset from Power-on

FPGA version: 2.9.0

2 Serial(sync/async) interfaces

4 FastEthernet interfaces

3 Gigabit Ethernet interfaces

6 terminal lines

1 802.11 Radio

1 Cellular interface

DRAM configuration is 72 bits wide with parity disabled.

256K bytes of non-volatile configuration memory.

524320K bytes of ATA System Flash (Read/Write)

262176K bytes of ATA Bootstrap Flash (Read/Write)

12. إذا كانت ذاكرة NVRAM لا تزال سليمة، فسيتم تحميل running-configuration. يجب أن يظل الموجه محتفظا بالتكوين القديم المحفوظ.

13. (إختياري) إذا تم وضع بطاقة SD جديدة في CGR، فعليك تقسيم بطاقة SD الجديدة باستخدام الأمر partition flash:. وإلا، يمكن تخطي هذه الخطوة إذا تم تأكيد أن بطاقة SD الحالية جيدة.

format flash:

Format operation may take a while. Continue? [confirm]

Format operation will destroy all data in "flash:".  Continue? [confirm]

Format: All system sectors written. OK...

Format: Total sectors in formatted partition: 1048257

Format: Total bytes in formatted partition: 536707584

Format: Operation completed successfully.

Format of flash: complete

14. في IOS، GigabitEthernet2/2 هو المنفذ ل ETH2/2 على المربع المادي. شكلت GigabitEthernet2/2 مع عنوان 192.0.2.2 حتى أنت يستطيع نسخت الحزمة صورة من ال TFTP نادل.

Configure terminal

Interface gigaethernet2/2

Ip address 192.0.2.2 255.255.255.0

No shut

14. انسخ صورة الحزمة من TFTP إلى ذاكرة CGR flash باستخدام الأمر copy tftp: flash:

copy tftp: flash:

Source filename [cgr1000-universalk9-bundle.SPA.155-2.T.bin]? cgr1000-universalk9-bundle.SPA.155-2.T.bin

Destination filename [cgr1000-universalk9-bundle.SPA.155-2.T.bin]? cgr1000-universalk9-bundle.SPA.155-2.T.bin

Accessing tftp://192.0.2.1/cgr1000-universalk9-bundle.SPA.155-2.T.bin...

Loading cgr1000-universalk9-bundle.SPA.155-2.T.bin from 192.0.2.1 (via GigabitEthernet2/2): !!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

[OK - 163484669 bytes]

163484669 bytes copied in 570.760 secs (286433 bytes/sec)

15. لتثبيت صورة برنامج hypervisor، تستخدم صورة النظام ونظام التشغيل الضيف الأمر حزمة تثبيت flash: <حزمة صورة>.

CGR1240-AST04#bundle install flash:/cgr1000-universalk9-bundle.SPA.155-2.T.bin

Installing bundle image: /cgr1000-universalk9-bundle.SPA.155-2.T.bin...........................................................................................................................................................................................................................................................................................................................................................................................................................................

updating Hypervisor image...

Sending file modes: C0444 23922114 cgr1000-hv.srp.SPA.1.1.1

SRP md5 verification passed!

updating IOS image...

Sending file modes: C0664 79967086 cgr1000-universalk9-mz.SPA.155-2.T

IOS md5 verification passed!

Done!

CGR1240-AST04#

*Mar 27 18:35:09.805: %SYS-5-CONFIG_I: Configured from console by bundle install command

*Mar 27 18:35:09.805: %CGR1K_INSTALL-6-SUCCESS_BUNDLE_INSTALL: Successfully installed bundle image.