المحتويات

المقدمة

معلومات أساسية

المشكلة

الحل

المقدمة

يصف هذا المستند الخطوات المطلوبة لإجراء تحويل لبطاقة وحدة النقل المتزامنة (STM)/OC3 على Cisco ASR5000.

معلومات أساسية

توفر بطاقات STM1/OC3 الموجودة على ASR5000 منافذ STM-1 وبالتالي تتطلب المعالجة بعناية خاصة.

يعرض الأمر STM-1 (مستوى-1) هو النظام الهرمي الرقمي المتزامن (SDH) معيار إرسال شبكة الألياف الضوئية ITU-T. تبلغ سرعة البت فيه 155.52 ميجابت/ثانية.

تختلف حماية مستوى الإدارة (SDH) عن شبكة الإيثرنت ولها بعض التفاصيل التي يجب أخذها في الاعتبار.

المشكلة

يحتوي الإعداد على زوج من بطاقات STM1/OC3 التي تم تكوينها باستخدام تكرار وضع التحويل التلقائي للحماية (AP) - البطاقة 21 والبطاقة 37. البطاقة 37 نشطة والبطاقة 21 في وضع الاستعداد. يكون الميناء 21/1 و 21/2 معطلا و APs يعمل. يتم تشغيل منافذ 37/1 و 37/2 ويحمي نقاط الوصول (AP).

card 21

redundancy aps-mode

aps 1+1 uni-directional non-revertive

framing sdh e1

initial-e1-framing crc4

service-type frame-relay

#exit

******** show card table all *******

Slot        Card Type                               Oper State   SPOF Attach

----------- -------------------------------------- ------------- ---- ------

21: LC      4 PORT STM1/OC3 Channelized Card       Standby          -    5

37: LC      4 PORT STM1/OC3 Channelized Card       Active          No    5

[local]gre2mme01# show aps info 37/1

Port :37/1

Role : Protected

Mode : 1+1

Revertive : No

State : Active

Direction : Uni

Wait To Restore(sec) : 0

Redundant Port : 21/1

Lockout : No

[local]gre2mme01# show aps info 21/1

Port :21/1

Role : Working

Mode : 1+1

Revertive : No

State : Standby

Direction : Uni

Wait To Restore(sec) : 0

Redundant Port : 37/1

Lockout : No

[local]mme01# show port table

Thursday March 08 11:20:20 CET 2018

Port  Role Type                      Admin   Oper Link State   Pair Redundant

----- ---- ------------------------ -------- ---- ---- ------- ----- ---------

21/1  Srvc STM1/OC3 Channelized     Enabled     - Down Standby 37/1 APS Workn

21/2  Srvc STM1/OC3 Channelized     Enabled     - Down Standby 37/2 APS Workn

37/1  Srvc STM1/OC3 Channelized     Enabled     - Up   Active 21/1 APS Protd

37/2  Srvc STM1/OC3 Channelized     Enabled     - Up   Active 21/2 APS Protd

فشل محاولات تنفيذ تبديل بين البطاقات 21 و 37 مع خطأ "وضع تكرار خاطئ".

[local]gre2mme01# card switch from 37 to 21

Friday March 09 00:28:10 CET 2018

Failure: wrong redundancy mode

الحل

لا يتم دعم التحويل باستخدام محول البطاقة من X إلى Y لبطاقات STM1/OC3 ذات تكرار وضع نقاط الوصول (AP).

يجب إستخدام أوامر APs المحددة بدلا من ذلك.

aps { clear slot#/port# | exercise slot#/port# | lockout slot#/port# | switch { force | manual } slot#/port# }

switch { force | manual } slot#/port#

Switch to either the working port or the protection port:

force: Forces a switch of ports, even if there is an active alarm state.

manual: Implements a switch of ports if there are no active alarms.

slot#/port# is the CLC2/OLC2 slot number (valid range is 17 - 48) and appropriate port number (CLC2 valid range is 1 - 4; OLC2 valid value is 1)

في هذه الحالة، تم حل المشكلة ب:

aps switch manual 37/1

aps switch manual 37/2

ملاحظة: إذا فشل التحويل اليدوي، فقد يكون ذلك بسبب أخطاء على المنفذ. تحقق من حالة المنفذ باستخدام show ap port-status <card/slot>". لا يزال من الممكن فرض التحويل باستخدام خيار فرض".

[local]gre2mme01# show aps port-status 21/1

Friday March 09 13:19:49 CET 2018

Port                      : 21/1

Role                      : Working

Lockout                   : No

APS  Signal Failure       : No

APS  Signal Degrade       : No

Switch Over               : No

Far End Failiure          : No

Remote Not Compatible     : No

Current Command           : No Request

Switch Status             : No request

[local]gre2mme01#

[local]gre2mme01# show aps port-status 37/1

Friday March 09 13:20:07 CET 2018

Port                      : 37/1

Role                      : Protected

Lockout                   : No

APS  Signal Failure       : No

APS  Signal Degrade       : No

Switch Over               : No

Far End Failiure          : No

Remote Not Compatible     : No

Current Command           : No Request

Switch Status             : No request

Invalid K1 K2             : No

Rx K1                     : Reqest : 0x 0  (--              Channel - 0)

Rx K2                     : Status : 0x 0  (--              Channel - 0)

Tx K1                     : Reqest : 0x 0  (No Request      Channel - 0)

Tx K2                     : Status : 0x 4  (UNI,1+1         Channel - 0)