المحتويات

المقدمة

معلومات أساسية

المشكلة

الحل

المقدمة

يصف هذا وثيقة الأعراض يلاحظ على منصة NCS4K عندما يتأثر ب cisco بق id CSCwb69873

معلومات أساسية

هناك يتعدد حالة حيث {upper}forwarding كشف (BFD) جلسة يرفرف بين إثنان NCS4K عقدة (SW 6.5.26)، وأخيرا وضعت في حالة مخففة.

في الوقت نفسه، يمكن لكلا العقدتين إختبار الاتصال ببعضهما البعض دون فقدان الحزمة.

المشكلة

على عقدة مشكلة، أنت ترى جلسة BFD في حالة INIT على LC نشط واحتياطي VM:

Hu0/4/0/11/2.4001   10.55.6.180    0s               6s(2s*3)         INIT

Yes   0/LC0

Hu0/4/0/11/2.4001   10.55.6.180    0s               6s(2s*3)         INIT

Yes   0/LC1

في عرض إخراج التسجيل، ترى عمليات التتبع التالية:

LC/0/LC1:2022 Nov 24 11:29:37.098 UTC: fib_mgr[198]: %ROUTING-FIB-3-PLATF_UPD_FAIL : FIB platform update failed: Obj=DATA_TYPE_NHINFO[ptr=0x87c654c0,refc=0,flags=0x10000008] Action=CREATE Proto=ipv4. Cerr='Subsystem(8165)' detected the 'resource not available' condition 'Code(0)'  : fib_mgr : (PID=5045) :  -Traceback= 7f648e9733c7 7f648f8d546e 7f648f74cb3f 7f648f75449c 7f648f75a3c4 7f648f7cee95 7f648f8c7e58 7f648f7c623f 7f648f7ca7f4 7f648f8c841f 7f648f8fc3f7 7f648f8c7e58 7f648f7c623f 7f648f7ca7f4 7f648f8c8465 7f648f7d3028

LC/0/LC1:2022 Nov 24 11:29:52.163 UTC: fib_mgr[198]: %ROUTING-FIB-3-PLATF_UPD_FAIL : FIB platform update failed: Obj=DATA_TYPE_NHINFO[ptr=0x87c652d0,refc=0,flags=0x10000008] Action=CREATE Proto=ipv4. Cerr='Subsystem(8165)' detected the 'resource not available' condition 'Code(0)'  : fib_mgr : (PID=5045) :  -Traceback= 7f648e9733c7 7f648f8d546e 7f648f74cb3f 7f648f75449c 7f648f75a3c4 7f648f7cee95 7f648f8c7e58 7f648f7c623f 7f648f7ca7f4 7f648f8c841f 7f648f8fc3f7 7f648f8c7e58 7f648f7c623f 7f648f7ca7f4 7f648f8c8465 7f648f7d3028

في الأمر، أظهر منصة CEF تتبع كل موقع <نشط LC VM>إنتاج أنت ترى:

Nov 23 21:03:03.659 dnx_fib_retry_event 0/LC1 t5851 TP764,ppinfo_send_encap_gcc,ppindex_alloc_failed,trans_id,716207282,ifh,0x800087c,rc,-806191104:'Subsystem(8165)' detected the 'resource not available' condition 'Code(0)'

وأخيرا، يمكنك رؤية هذه الأخطاء في الأمر show ppinfo product trac all location <active LCVM>inc resource output:

Nov 28 07:47:20.819 ppinfo/prod/fib/ipv4/err 0/LC1 517384# t5851 ppindex alloc Cerr:'Subsystem(8165)' detected the 'resource not available' condition 'Code(0)'

Nov 28 07:47:20.819 ppinfo/prod/fib/ipv4/err 0/LC1 452746# t5851 indx alloc failed:  Cerr:'Subsystem(8165)' detected the 'resource not available' condition 'Code(0)'

Nov 28 07:47:20.819 ppinfo/prod/fib/ipv4/err 0/LC1 508753# t5851 ppindex alloc Cerr: 'Subsystem(8165)' detected the 'resource not available' condition 'Code(0)'

Nov 28 07:47:20.827 ppinfo/prod/fib/ipv4/err 0/LC1 504601# t5851 ppindex alloc Cerr:'Subsystem(8165)' detected the 'resource not available' condition 'Code(0)'

Nov 28 07:47:20.827 ppinfo/prod/fib/ipv4/err 0/LC1 619759# t5851 indx alloc failed:  Cerr:'Subsystem(8165)' detected the 'resource not available' condition 'Code(0)'

Nov 28 07:47:20.827 ppinfo/prod/fib/ipv4/err 0/LC1 1067176# t5851 ppindex alloc Cerr: 'Subsystem(8165)' detected the 'resource not available' condition 'Code(0)'

Nov 28 07:47:20.835 ppinfo/prod/fib/mpls/err 0/LC1 517116# t5851 ppindex alloc Cerr:'Subsystem(8165)' detected the 'resource not available' condition 'Code(0)'

Nov 28 07:47:20.835 ppinfo/prod/fib/mpls/err 0/LC1 2096661# t5851 indx alloc failed:  Cerr:'Subsystem(8165)' detected the 'resource not available' condition 'Code(0)'

Nov 28 07:47:20.835 ppinfo/prod/fib/mpls/err 0/LC1 617742# t5851 ppindex alloc Cerr: 'Subsystem(8165)' detected the 'resource not available' condition 'Code(0)'

Nov 28 07:47:20.843 ppinfo/prod/fib/mpls/err 0/LC1 1298595# t5851 ppindex alloc Cerr:'Subsystem(8165)' detected the 'resource not available' condition 'Code(0)'

Nov 28 07:47:20.843 ppinfo/prod/fib/mpls/err 0/LC1 190161# t5851 indx alloc failed:  Cerr:'Subsystem(8165)' detected the 'resource not available' condition 'Code(0)'

Nov 28 07:47:20.843 ppinfo/prod/fib/mpls/err 0/LC1 1299219# t5851 ppindex alloc Cerr: 'Subsystem(8165)' detected the 'resource not available' condition 'Code(0)'

Nov 28 07:47:35.845 ppinfo/prod/fib/ipv4/err 0/LC1 621013# t5851 ppindex alloc Cerr:'Subsystem(8165)' detected the 'resource not available' condition 'Code(0)'

Nov 28 07:47:35.845 ppinfo/prod/fib/ipv4/err 0/LC1 512881# t5851 indx alloc failed:  Cerr:'Subsystem(8165)' detected the 'resource not available' condition 'Code(0)'

الحل

كل هذه الأعراض مجتمعة تتطابق مع ال دي دي تي إس:

فشل تخصيص معرف تصحيح الأخطاء من Cisco CSCwb69873PPINFO:

عيب الملخص

ثابت في 6. 5. 33.

العرض:

إرتباط BFD جلسة يرفرف أو علق في حالة INIT.

الشروط:

يسبب رفرفة من التالي جنجل عنوان هذا إصدار.

الحل البديل:

محول بطاقة RP (محول RP و LC VM بشكل أساسي). يعمل هذا على مسح فشل تخصيص PPIndex. لحل مشكلة BFD الخاصة بالارتباط، قم بتنفيذ أي من هذه الخطوات، احذف الواجهة الفرعية المتأثره (OR) وقم بإعادة إنشائها / لم يتم إيقاف تشغيل الواجهة الفرعية المتأثرة.

وصف آخر للمشكلة:

تسرب إدخالات ppindex وتتسبب في إستهلاك جميع الإدخالات الحرة وهذا يتسبب في حدوث مشكلة في إستهلاك الموارد. يتم تحرير PPindex عند حذف NH وتخصيص ppindex عند إنشاء NH. هناك خطأ يتسبب في عدم حذف NH لتحرير ppindex الذي يسبب التسريب. بمجرد إستخدام كل PPPindex، لا توجد مكالمات لتحريرها وهذا يجعل النظام يفشل باستمرار وينشئ أي NHs جديدة. يوجد تحقق من ENCAP_ID تم تخصيصه أو لا، ولكن الرمز لا يحصل على encap_id، ويتسبب في فشل الشيك وتسريعه مبكرا بدون إستدعاء ppindex_free.