المحتويات

المقدمة

المتطلبات الأساسية

المتطلبات

المكونات المستخدمة

الاصطلاحات

التكوين

الرسم التخطيطي للشبكة

التكوينات

التحقق من الصحة

استكشاف الأخطاء وإصلاحها

كافيتس

معلومات ذات صلة

المقدمة

يزود هذا وثيقة عينة تشكيل لمثيل VPN تحشد وإعادة توجيه (VRF) تحت عام تحشد عملية كبسلة (GRE) نفق قارن.

المتطلبات الأساسية

المتطلبات

قبل أن تحاول إجراء هذا التكوين، فتأكد من استيفاء المتطلبات التالية:

يجب أن يكون لدى قراء هذا المستند معرفة بالمواضيع التالية:

- تكوين تحويل التسمية متعدد البروتوكولات

- شبكات MPLS الخاصة الافتراضية

- عضوية VRF الخاصة بوجهة مصدر IP الخاص بنفق تضمين التوجيه العام

المكونات المستخدمة

تستند المعلومات الواردة في هذا المستند إلى برنامج Cisco IOS® الإصدار 12.3(4)T1 على موجهات سلسلة 3725.

أستخدم متصفح الميزات Cisco Feature Navigator II (العملاء المسجلون فقط) وابحث عن ميزة مصدر IP لنفق GRE وعضوية الوجهة VRF، للحصول على متطلبات البرامج والأجهزة الإضافية التي تحتاجها.

تم إنشاء المعلومات الواردة في هذا المستند من الأجهزة الموجودة في بيئة معملية خاصة. بدأت جميع الأجهزة المُستخدمة في هذا المستند بتكوين ممسوح (افتراضي). إذا كانت شبكتك مباشرة، فتأكد من فهمك للتأثير المحتمل لأي أمر.

الاصطلاحات

للحصول على مزيد من المعلومات حول اصطلاحات المستندات، ارجع إلى اصطلاحات تلميحات Cisco التقنية.

التكوين

في هذا القسم، تُقدّم لك معلومات تكوين الميزات الموضحة في هذا المستند.

يتم إعداد التكوين بهذه الطريقة:

- R1-CE و R2-CE يوجدان في VRF Blue.

- كما يوجد الطراز R1-CE في الطراز VRF Green من خلال إستخدام نفق GRE إلى الطراز R3-PE.

يستخدم R1-CE مسار مضيف ساكن إستاتيكي للوصول إلى R3-PE (وجهة النفق)، والذي يضمن عدم حدوث التوجيه المتكرر لنفق GRE (تعلم عنوان وجهة النفق من خلال النفق).

ويملك شركتين مختلفتين VRF Blue و VRF Green، ولا تحدث تسريبات للمسار بينهما. بالإضافة إلى ذلك، يمكن إستخدام قائمة التحكم في الوصول (ACL) على الواجهة بين R1-CE و R2-CE للسماح فقط لحركة مرور GRE فيما بينهم.

ملاحظة: للعثور على معلومات إضافية حول الأوامر المستخدمة في هذا المستند، أستخدم أداة بحث الأوامر (للعملاء المسجلين فقط).

الرسم التخطيطي للشبكة

يستخدم هذا المستند إعداد الشبكة التالي:

الشكل 1 - المخطط المادي

الشكل 2 - طبولوجيا منطقية للتردد اللاسلكي (VRF)

التكوينات

يستخدم هذا المستند التكوينات التالية:

- R3-PE

- R4-PE

- R1-CE

- r2-ce

- R5-Ce

- R6-CE

R3-PE (نقطة نهاية النفق)

R3-PE# show running-config

Building configuration...

.

!

no ip domain lookup

!

ip vrf blue

rd 1:1

route-target export 311:311

route-target import 411:411

!

ip vrf green

rd 2:2

route-target export 322:322

route-target import 422:422

!

ip cef

!

interface Tunnel0

ip vrf forwarding green

ip address 200.200.200.3 255.255.255.0

tunnel source Ethernet0/0

tunnel destination 10.10.10.1

tunnel vrf blue

!--- Tunnel 0 is part of VRF GREEN; but it uses the tunnel !--- destination and source addresses from the routing !--- table of VRF BLUE, because of this tunnel vrf blue !--- command.

!

interface Ethernet0/0

ip vrf forwarding blue

ip address 20.20.20.3 255.255.255.0

!--- Connection to the VRF BLUE network and the VRF GREEN !--- network using the GRE tunnel.

!

interface Ethernet1/0

ip address 30.30.30.3 255.255.255.0

tag-switching ip

!

router bgp 1

no bgp default ipv4-unicast

bgp log-neighbor-changes

neighbor 30.30.30.4 remote-as 1

!

address-family vpnv4

neighbor 30.30.30.4 activate

neighbor 30.30.30.4 send-community extended

exit-address-family

!

address-family ipv4 vrf green

redistribute connected

no auto-summary

no synchronization

exit-address-family

!

address-family ipv4 vrf blue

redistribute connected

no auto-summary

no synchronization

exit-address-family

!

ip classless

ip route vrf blue 10.10.10.1 255.255.255.255 20.20.20.2

!--- Static Host route to ensure that recursive routing !--- does not occur.

no ip http server

!

.

end

R4-PE

R4-PE# show running-config

Building configuration...

.

.

.

no ip domain lookup

!

ip vrf blue

rd 1:1

route-target export 411:411

route-target import 311:311

!

ip vrf green

rd 2:2

route-target export 422:422

route-target import 322:322

!

ip cef

!

interface Ethernet0/0

ip address 30.30.30.4 255.255.255.0

tag-switching ip

!

interface Ethernet1/0

ip vrf forwarding green

ip address 100.100.100.4 255.255.255.0

!

interface Ethernet2/0

ip vrf forwarding blue

ip address 40.40.40.4 255.255.255.0

!

router bgp 1

no bgp default ipv4-unicast

bgp log-neighbor-changes

neighbor 30.30.30.3 remote-as 1

!

address-family vpnv4

neighbor 30.30.30.3 activate

neighbor 30.30.30.3 send-community extended

exit-address-family

!

address-family ipv4 vrf green

redistribute connected

no auto-summary

no synchronization

exit-address-family

!

address-family ipv4 vrf blue

redistribute connected

no auto-summary

no synchronization

exit-address-family

!

ip classless

.

.

end

R1-CE (نقطة نهاية النفق)

R1-CE# show running-config

Building configuration...

.

.

no ip domain lookup

!

ip cef

!

interface Tunnel0

ip address 200.200.200.1 255.255.255.0

tunnel source Ethernet0/0

tunnel destination 20.20.20.3

!--- Both the tunnel source and destination address are in !--- the VRF BLUE, to provide transport for the VRF GREEN !--- network.

!

interface Ethernet0/0

description Connection to R2-CE router

ip address 10.10.10.1 255.255.255.0

ip access-group 100 in

ip access-group 100 out

!--- Access-group to allow only GRE packets through the !--- R2-CE network. However, R1-CE networks data is in the !--- GRE packet.

!

!

ip classless

ip route 0.0.0.0 0.0.0.0 Tunnel0

ip route 20.20.20.3 255.255.255.255 10.10.10.2

!--- Static Host route to ensure that recursive routing !--- does not occur.

no ip http server

!

access-list 100 permit gre host 10.10.10.1 host 20.20.20.3

access-list 100 permit gre host 20.20.20.3 host 10.10.10.1

!--- Permits only GRE packets between the endpoints.

!

.

.

end

r2-ce

R2-CE# show running-config

Building configuration...

.

.

no ip domain lookup

!

ip cef

!

interface Ethernet0/0

description Connection to R1-CE router

ip address 10.10.10.2 255.255.255.0

ip access-group 100 in

ip access-group 100 out

!

interface Ethernet1/0

ip address 20.20.20.2 255.255.255.0

!

ip classless

ip route 0.0.0.0 0.0.0.0 20.20.20.3

no ip http server

!

access-list 100 permit gre host 10.10.10.1 host 20.20.20.3

access-list 100 permit gre host 20.20.20.3 host 10.10.10.1

!--- Permits only GRE packets between the endpoints.

.

!

end

R5-Ce

R5-CE# show running-config

Building configuration...

.

.

no ip domain lookup

!

interface Ethernet0/0

ip address 100.100.100.5 255.255.255.0

!

!

ip classless

ip route 0.0.0.0 0.0.0.0 100.100.100.4

no ip http server

!

.

end

R6-CE

R6-CE# show running-config

Building configuration...

.

.

no ip domain lookup

!

interface Ethernet0/0

ip address 40.40.40.6 255.255.255.0

!

!

ip classless

ip route 0.0.0.0 0.0.0.0 40.40.40.4

no ip http server

!

.

end

التحقق من الصحة

يوفر هذا القسم معلومات يمكنك إستخدامها للتأكد من أن التكوين يعمل بشكل صحيح.

يتم دعم بعض أوامر العرض بواسطة أداة مترجم الإخراج (العملاء المسجلون فقط)، والتي تتيح لك عرض تحليل إخراج أمر العرض.

- show ip route ، show ip route vrf — قم بإصدار هذه الأوامر على نقاط نهاية النفق لضمان إمكانية الوصول إلى وجهة النفق. وهذا يضمن ظهور واجهة النفق.

- ping — قم بإصدار هذا الأمر من الطرف الآخر من CE لضمان إمكانية الوصول إلى الأنفاق من CE.

- show ip bgp vpnv4 all labels — قم بإصدار هذا الأمر على أجهزة PE لعرض تسميات VPN الموزعة لكل بادئة عبر بروتوكول العبارة الحدودية (BGP) إلى أجهزة PE الأخرى.

R3-PE# show ip route vrf blue 10.10.10.1

Routing entry for 10.10.10.1/32

Known via "static", distance 1, metric 0

Routing Descriptor Blocks:

* 20.20.20.2

Route metric is 0, traffic share count is 1

R3-PE# show ip route vrf green

Routing Table: green

Codes: C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route

Gateway of last resort is not set

C    200.200.200.0/24 is directly connected, Tunnel0

100.0.0.0/24 is subnetted, 1 subnets

B       100.100.100.0 [200/0] via 30.30.30.4, 01:11:45

R3-PE# show interfaces tunnel 0

Tunnel0 is up, line protocol is up

Hardware is Tunnel

Internet address is 200.200.200.3/24

MTU 1514 bytes, BW 9 Kbit, DLY 500000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation TUNNEL, loopback not set

Keepalive not set

Tunnel source 20.20.20.3 (Ethernet0/0), destination 10.10.10.1

Tunnel protocol/transport GRE/IP, key disabled, sequencing disabled

Tunnel TTL 255

Checksumming of packets disabled, fast tunneling enabled

Last input 00:44:05, output 00:26:16, output hang never

Last clearing of "show interface" counters never

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue: 0/0 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

105 packets input, 11964 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

83 packets output, 10292 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 output buffer failures, 0 output buffers swapped out

R3-PE# show ip bgp vpnv4 all labels

Network          Next Hop      In label/Out label

Route Distinguisher: 1:1 (blue)

20.20.20.0/24    0.0.0.0         16/aggregate(blue)

Route Distinguisher: 2:2 (green)

100.100.100.0/24 30.30.30.4      nolabel/16

200.200.200.0    0.0.0.0         17/aggregate(green)

R4-PE# show ip route vrf blue

Routing Table: blue

Codes: C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route

Gateway of last resort is not set

20.0.0.0/24 is subnetted, 1 subnets

B       20.20.20.0 [200/0] via 30.30.30.3, 01:14:05

R4-PE# show ip route vrf green

Routing Table: green

Codes: C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route

Gateway of last resort is not set

B    200.200.200.0/24 [200/0] via 30.30.30.3, 01:14:10

100.0.0.0/24 is subnetted, 1 subnets

C       100.100.100.0 is directly connected, Ethernet1/0

R1-CE# show ip route 20.20.20.3

Routing entry for 20.20.20.3/32

Known via "static", distance 1, metric 0

Routing Descriptor Blocks:

* 10.10.10.2

Route metric is 0, traffic share count is 1

R1-CE# show interfaces tunnel 0

Tunnel0 is up, line protocol is up

Hardware is Tunnel

Internet address is 200.200.200.1/24

MTU 1514 bytes, BW 9 Kbit, DLY 500000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation TUNNEL, loopback not set

Keepalive not set

Tunnel source 10.10.10.1 (Ethernet0/0), destination 20.20.20.3

Tunnel protocol/transport GRE/IP, key disabled, sequencing disabled

Tunnel TTL 255

Checksumming of packets disabled, fast tunneling enabled

Last input 00:26:57, output 00:26:57, output hang never

Last clearing of "show interface" counters never

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue: 0/0 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

83 packets input, 10292 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

106 packets output, 12088 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 output buffer failures, 0 output buffers swapped out

R5-CE# ping 200.200.200.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 200.200.200.1, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 40/54/80 ms

R5-CE# ping 200.200.200.3

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 200.200.200.3, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 20/36/72 ms

استكشاف الأخطاء وإصلاحها

لا تتوفر حاليًا معلومات محددة لاستكشاف الأخطاء وإصلاحها لهذا التكوين.

كافيتس

يتم تحديد هذه المحاذير المعروفة لتكوين هذه الميزة. يمكنك إستخدام مجموعة أدوات الأخطاء (العملاء المسجلون فقط) للبحث عن الأخطاء.

- CSCea81266 (العملاء المسجلون فقط) —تم الحل (R) GRE: تتوقف حركة المرور بعد مسح مسار بروتوكول الإنترنت *.

- CSCdx74855 (العملاء المسجلون فقط) —تم الحل (R) لا يمكن إختبار عنوان IP الخاص بواجهة نفق GRE المحلية.

- CSCdx57718 (العملاء المسجلون فقط) —تم حل (R) فقد حزمة IP في نفق GRE عندما تم تعطيل إعادة التوجيه السريع Cisco (CEF) على الواجهة الصادرة.

معلومات ذات صلة

- صفحة دعم تقنية MPLS

- الدعم التقني والمستندات - Cisco Systems