المحتويات

المقدمة

المتطلبات الأساسية

المتطلبات

المكونات المستخدمة

الاصطلاحات

معلومات أساسية

التكوين

الرسم التخطيطي للشبكة

التكوينات

أضفت مفتاح إلى ال VTP مجال

التحقق من الصحة

استكشاف الأخطاء وإصلاحها

معلومات ذات صلة

المقدمة

يزود هذا وثيقة عينة تشكيل على كيف أن يهاجر مجمع شبكة من كل VLAN trunking بروتوكول (VTP) أسلوب مفتاح إلى شبكة مع VTP نادل (نادل) وعميل. هذا وثيقة يستطيع أيضا كنت استعملت أن يعيد هيكل ال VTP مجال أن يكون يتواجد.

المتطلبات الأساسية

المتطلبات

تأكد من استيفاء المتطلبات التالية قبل أن تحاول إجراء هذا التكوين:

- معرفة الأساسية من مادة حفازة مفتاح إدارة

- معرفة VTP

المكونات المستخدمة

تستند المعلومات الواردة في هذا المستند إلى برنامج Cisco IOS® الإصدار 12.2(25)SEC2، و Catalyst OS (CatOS) الإصدار 8.1(2).

تنطبق المعلومات الواردة في هذا المستند على جميع أجهزة Cisco التي تدعم بروتوكول خط اتصال شبكة VLAN الإصدار 2.

تم إنشاء المعلومات الواردة في هذا المستند من الأجهزة الموجودة في بيئة معملية خاصة. إذا كانت شبكتك مباشرة، فتأكد من فهمك للتأثير المحتمل لأي أمر.

الاصطلاحات

راجع اصطلاحات تلميحات Cisco التقنية للحصول على مزيد من المعلومات حول اصطلاحات المستندات.

معلومات أساسية

VTP يقلل الإدارة في شبكة محولة. عند تكوين شبكة VLAN جديدة على خادم VTP، يتم توزيع شبكة VLAN عبر جميع المبدلات في المجال. وهذا يقلل من الحاجة إلى تكوين نفس شبكة VLAN بشكل متكرر. VTP هو بروتوكول خاص من Cisco يتوفر على معظم منتجات سلسلة Cisco Catalyst.

ملاحظة: لا يغطي هذا وثيقة VTP صيغة 3. VTP صيغة 3 يختلف من VTP صيغة 1 (v1) و صيغة 2 (v2). هو يتوفر فقط على CatOS 8.1(1) أو الأحدث. VTP يتضمن صيغة 3 كثير تغير من VTP v1 و v2. تأكدت أن أنت تفهم الفروق بين VTP صيغة 3 وإصدارات مبكر قبل أن أنت تغير شبكتك. أحلت واحد من هذا قسم من يشكل VTP ل كثير معلومة:

- يفهم كيف VTP يعمل صيغة 3

- التفاعل مع VTP الإصدار 1 و VTP الإصدار 2

التكوين

في هذا قسم، قدمت أنت مع المعلومة أن يرحل حرم جامعي شبكة من كل VTP تشكيل شفاف إلى VTP نادل تشكيل زبون. يزود هذا قسم أيضا ال steps سريع يستعمل أن يقدم مفتاح جديد إلى ال VTP مجال أن يتواجد.

ملاحظة: أستخدم أداة بحث الأوامر (للعملاء المسجلين فقط) للعثور على مزيد من المعلومات حول الأوامر المستخدمة في هذا المستند.

الرسم التخطيطي للشبكة

يستخدم هذا المستند إعداد الشبكة التالي:

تتضمن الشبكة ما يلي:

- محولا طبقة توزيع -DistributionA وDistributionB كلاهما يشغل برنامج Cisco IOS.

- محولا طبقة وصول— يشغل AccessA برنامج Cisco IOS وAccessB برنامج CatOS.

تتضمن قاعدة بيانات شبكات VLAN الأولية شبكات Ethernet VLAN التالية:

- DistributionA—شبكات VLAN أرقام 1 و 10 و 11

- التوزيع B—شبكات VLAN أرقام 1 و 20 و 21

- AccessA—شبكات VLAN أرقام 1 و 30 و 31

- AccessB—شبكات VLAN أرقام 1 و 40 و 41

التكوينات

يتألف هذا القسم من ثلاثة أقسام فرعية:

- فحوصات ما قبل الترحيل

- تخطيط الهجرة

- إجراءات الهجرة

فحوصات ما قبل الترحيل

يوفر هذا القسم قائمة الاختيار للتأكد من أن الشبكة جاهزة لعملية الترحيل. أصدرت in order to إستلمت المركز الحالي من ال VTP تشكيل في المفتاح، العرض vtp وضع أمر ل cisco ios، والعرض vtp مجال أمر ل CatOS.

IOS من Cisco

DistributionA#show vtp status

VTP Version                     : 2

Configuration Revision          : 0

Maximum VLANs supported locally : 1005

Number of existing VLANs        : 7

VTP Operating Mode              : Transparent

VTP Domain Name                 : migration

VTP Pruning Mode                : Disabled

VTP V2 Mode                     : Disabled

VTP Traps Generation            : Disabled

MD5 digest                      : 0xE5 0x9F 0x80 0x70 0x73 0x62 0xC0 0x54

Configuration last modified by 0.0.0.0 at 3-1-93 04:23:21

DistributionA#

نظام التشغيل Catalyst

AccessB> (enable) show vtp domain

Version      : running VTP1 (VTP3 capable)

Domain Name  : migration                        Password  : not configured

Notifications: disabled                         Updater ID: 0.0.0.0

Feature        Mode           Revision

-------------- -------------- -----------

VLAN           Client         0

Pruning             : disabled

VLANs prune eligible: 2-1000

AccessB> (enable)

1. فحصت إن يكون كل مفتاح في VTP أسلوب شفاف. أصدرت هذا أمر in order to غيرت ال VTP أسلوب:

IOS من Cisco

AccessA#conf t

AccessA(config)#vtp mode transparent

Setting device to VTP TRANSPARENT mode

AccessA(config)#exit

AccessA#

نظام التشغيل Catalyst

AccessB> (enable) set vtp mode transparent

Changing VTP mode for all features

VTP domain migration modified

AccessB> (enable)

2. فحصت إن كل مفتاح يتلقى ال نفسه VTP domain name. أصدرت هذا أمر in order to غيرت ال VTP domain name:

IOS من Cisco

DistributionB(config)#vtp domain migration

Changing VTP domain name from aaaa to migration

DistributionB(config)#

نظام التشغيل Catalyst

AccessB> (enable) set vtp domain migration

VTP domain migration modified

AccessB> (enable)

3. فحصت إن كل مفتاح يركض ال نفسه VTP صيغة. أصدرت هذا أمر in order to غيرت ال VTP صيغة:

IOS من Cisco

vtp version 2

نظام التشغيل Catalyst

set vtp v2 enable

أو

set vtp version 2

4. فحصت إن كل مفتاح يركض ال نفسه VTP كلمة (إن أي يشكل). أصدرت هذا أمر in order to غيرت ال VTP كلمة:

IOS من Cisco

vtp password vtp_password

نظام التشغيل Catalyst

AccessB> (enable) set vtp passwd ?

<passwd>                   Password (0 to clear)

AccessB> (enable) set vtp passwd vtp_password

Generating the secret associated to the password.

VTP domain migration modified

5. تحقق مما إذا كانت جميع المحولات متصلة بروابط خطوط الاتصال.

IOS من Cisco

DistributionA#show interfaces trunk

Port        Mode         Encapsulation  Status        Native vlan

Gi2/0/1     auto         n-isl          trunking      1

Gi2/0/5     auto         n-802.1q       trunking      1

Gi2/0/9     desirable    n-isl          trunking      1

Gi2/0/10    desirable    n-isl          trunking      1

Port      Vlans allowed on trunk

Gi2/0/1     1-4094

Gi2/0/5     1-4094

Gi2/0/9     1-4094

Gi2/0/10    1-4094

Port        Vlans allowed and active in management domain

Gi2/0/1     1,10-11

Gi2/0/5     1,10-11

Gi2/0/9     1,10-11

Gi2/0/10    1,10-11

Port        Vlans in spanning tree forwarding state and not pruned

Gi2/0/1     1,10-11

Gi2/0/5     1,10-11

Gi2/0/9     1,10-11

!--- Rest of output elided.

نظام التشغيل Catalyst

AccessB> (enable) show trunk

* - indicates vtp domain mismatch

# - indicates dot1q-all-tagged enabled on the port

Port      Mode         Encapsulation  Status        Native vlan

--------  -----------  -------------  ------------  -----------

3/25     desirable    n-isl          trunking      1

3/26     desirable    n-isl          trunking      1

6/1      nonegotiate  dot1q          trunking      1

6/2      nonegotiate  dot1q          trunking      1

6/3      nonegotiate  dot1q          trunking      1

6/4      nonegotiate  dot1q          trunking      1

16/1      nonegotiate  isl            trunking      1

Port      Vlans allowed on trunk

--------  ---------------------------------------------------------------------

3/25     1-1005,1025-4094

3/26     1-1005,1025-4094

6/1

6/2

6/3

6/4

16/1      1-1005,1025-4094

Port      Vlans allowed and active in management domain

!--- Rest of output elided.

تخطيط الهجرة

- حدد عدد شبكات VLAN المطلوبة للشبكة. يتغير الحد الأقصى لعدد شبكات VLAN النشطة التي تدعمها محولات Catalyst باستخدام الطرز.

AccessA#show vtp status

VTP Version                     : 2

Configuration Revision          : 0

Maximum VLANs supported locally : 250

Number of existing VLANs        : 7

VTP Operating Mode              : Transparent

VTP Domain Name                 : migration

VTP Pruning Mode                : Disabled

VTP V2 Mode                     : Disabled

VTP Traps Generation            : Disabled

MD5 digest                      : 0xC8 0xB7 0x36 0xC3 0xBD 0xC6 0x56 0xB2

Configuration last modified by 0.0.0.0 at 3-1-93 04:23:21

AccessA#

- حددت المفتاح، مثل DistributionA وDistributionB، أي سيكون ال VTP نادل. واحد أو أكثر مفتاح يستطيع كنت VTP نادل في مجال. أخترت واحد مفتاح، مثل DistributionA، in order to بدأت الترحيل.

إجراءات الهجرة

أتمت هذا steps in order to شكلت الجامعة شبكة مع VTP أسلوب نادل وزبون:

1. غيرت ال VTP أسلوب من DistributionA إلى نادل.

DistributionA#conf t

Enter configuration commands, one per line.  End with CNTL/Z.

DistributionA(config)#vtp mode server

Setting device to VTP SERVER mode

DistributionA(config)#exit

DistributionA#

2. قم بإنشاء شبكات VLAN المطلوبة في المجال.

!--- Before creating VLANs

DistributionA#show vlan

VLAN Name                             Status    Ports

---- -------------------------------- --------- -------------------------------

1    default                          active    Gi2/0/2, Gi2/0/3, Gi2/0/4

Gi2/0/6, Gi2/0/7, Gi2/0/8

Gi2/0/11, Gi2/0/12, Gi2/0/13

Gi2/0/14, Gi2/0/15, Gi2/0/16

Gi2/0/17, Gi2/0/18, Gi2/0/19

Gi2/0/20, Gi2/0/21, Gi2/0/22

10   VLAN0010                         active    Gi2/0/23

11   VLAN0011                         active    Gi2/0/24

1002 fddi-default                     act/unsup

1003 token-ring-default               act/unsup

1004 fddinet-default                  act/unsup

1005 trnet-default                    act/unsup

VLAN Type  SAID       MTU   Parent RingNo BridgeNo Stp  BrdgMode Trans1 Trans2

---- ----- ---------- ----- ------ ------ -------- ---- -------- ------ ------

1    enet  100001     1500  -      -      -        -    -        0      0

10   enet  100010     1500  -      -      -        -    -        0      0

11   enet  100011     1500  -      -      -        -    -        0      0

1002 fddi  101002     1500  -      -      -        -    -        0      0

1003 tr    101003     1500  -      -      -        -    srb      0      0

!--- Rest of output elided.

!--- Creating required VLANs

DistributionA#conf t

Enter configuration commands, one per line.  End with CNTL/Z.

DistributionA(config)#vlan 20-21,30-31,40-41

DistributionA(config-vlan)#exit

DistributionA(config)#exit

DistributionA#

!--- After creating VLANs

DistributionA#show vlan

VLAN Name                             Status    Ports

---- -------------------------------- --------- -------------------------------

1    default                          active    Gi2/0/2, Gi2/0/3, Gi2/0/4

Gi2/0/6, Gi2/0/7, Gi2/0/8

Gi2/0/11, Gi2/0/12, Gi2/0/13

Gi2/0/14, Gi2/0/15, Gi2/0/16

Gi2/0/17, Gi2/0/18, Gi2/0/19

Gi2/0/20, Gi2/0/21, Gi2/0/22

10   VLAN0010                         active    Gi2/0/23

11   VLAN0011                         active    Gi2/0/24

20   VLAN0020                         active

21   VLAN0021                         active

30   VLAN0030                         active

31   VLAN0031                         active

40   VLAN0040                         active

41   VLAN0041                         active

1002 fddi-default                     act/unsup

1003 token-ring-default               act/unsup

1004 fddinet-default                  act/unsup

1005 trnet-default                    act/unsup

VLAN Type  SAID       MTU   Parent RingNo BridgeNo Stp  BrdgMode Trans1 Trans2

!--- Rest of output elided.

إن ما من VLANs جديد أن يكون شكلت، خلقت VLAN وهمي.

هذا يزيد من مراجعة التكوين إلى '1'، والذي يمكن قاعدة بيانات شبكات VLAN من الانتشار عبر الشبكة.

DistributionA#conf t

Enter configuration commands, one per line.  End with CNTL/Z.

DistributionA(config)#vlan 100

DistributionA(config-vlan)#name dummy

DistributionA(config-vlan)#exit

DistributionA(config)#exit

DistributionA#

3. غيرت ال VTP أسلوب DistributionB إلى زبون، يتبع ب AccessA وAccessB.

IOS من Cisco

DistributionB#conf t

Enter configuration commands, one per line.  End with CNTL/Z.

DistributionB(config)#vtp mode client

Setting device to VTP CLIENT mode.

DistributionB(config)#exit

DistributionB#

DistributionB#show vtp status

VTP Version                     : 2

Configuration Revision          : 0

Maximum VLANs supported locally : 1005

Number of existing VLANs        : 13

VTP Operating Mode              : Client

VTP Domain Name                 : migration

VTP Pruning Mode                : Disabled

VTP V2 Mode                     : Disabled

VTP Traps Generation            : Disabled

MD5 digest                      : 0xBD 0xA4 0x94 0xE6 0xE3 0xC7 0xA7 0x86

Configuration last modified by 0.0.0.0 at 3-1-93 04:23:21

نظام التشغيل Catalyst

AccessB> (enable) set vtp mode client

Changing VTP mode for all features

VTP domain migration modified

4. تحقق من نشر جميع شبكات VLAN عبر المجال.

IOS من Cisco

DistributionB#show vlan

VLAN Name                             Status    Ports

---- -------------------------------- --------- -------------------------------

1    default                          active    Fa1/0/1, Fa1/0/3, Fa1/0/4

Fa1/0/5, Fa1/0/7, Fa1/0/8

Fa1/0/11, Fa1/0/12, Fa1/0/13

Fa1/0/14, Fa1/0/15, Fa1/0/16

Fa1/0/17, Fa1/0/18, Fa1/0/19

Fa1/0/20, Fa1/0/21, Fa1/0/22

Fa1/0/23, Fa1/0/24

10   VLAN0010                         active

11   VLAN0011                         active

20   VLAN0020                         active    Gi1/0/1

21   VLAN0021                         active    Gi1/0/2

30   VLAN0030                         active

31   VLAN0031                         active

40   VLAN0040                         active

41   VLAN0041                         active

1002 fddi-default                     act/unsup

1003 token-ring-default               act/unsup

1004 fddinet-default                  act/unsup

1005 trnet-default                    act/unsup

!--- Rest of output elided.

نظام التشغيل Catalyst

AccessB> (enable) show vlan

VLAN Name                             Status    IfIndex Mod/Ports, Vlans

---- -------------------------------- --------- ------- ------------------------

1    default                          active    64      2/1-2

3/1-24,3/27-46

4/1-8

10   VLAN0010                         active    107

11   VLAN0011                         active    108

20   VLAN0020                         active    105

21   VLAN0021                         active    106

30   VLAN0030                         active    109

31   VLAN0031                         active    110

40   VLAN0040                         active    111     3/47

41   VLAN0041                         active    112     3/48

1002 fddi-default                     active    65

1003 token-ring-default               active    68

1004 fddinet-default                  active    66

1005 trnet-default                    active    67

VLAN Type  SAID       MTU   Parent RingNo BrdgNo Stp  BrdgMode Trans1 Trans2

---- ----- ---------- ----- ------ ------ ------ ---- -------- ------ ------

1002 fddi  101002     1500  -      -      -      -    -        0      0

1003 trcrf 101003     1500  -      -      -      -    -        0      0

!--- Rest of output elided.

5. فحصت إن يكون أي switchport في الدولة غير نشط.

switchport يستطيع ذهبت إلى دولة غير فعال إن ال VLAN يشكل ل أن switchport لا يتواجد في المفتاح. خلقت مناسب VLAN (شبكات)، كما هو مطلوب، في ال VTP نادل مفتاح.

IOS من Cisco

من الإنتاج من العرض قارن switchport أمر، أنت يستطيع حددت إن يكون switchport في أسلوب غير نشط إن هو يتلقى ال غير الكلمة المفتاح ل الوصول أسلوب VLAN سمة.

DistributionB#show interfaces switchport

Name: Fa1/0/1

Switchport: Enabled

Administrative Mode: dynamic auto

Operational Mode: down

Administrative Trunking Encapsulation: negotiate

Negotiation of Trunking: On

Access Mode VLAN: 1 (default)

Trunking Native Mode VLAN: 1 (default)

Administrative Native VLAN tagging: enabled

Voice VLAN: none

Administrative private-vlan host-association: none

Administrative private-vlan mapping: none

Administrative private-vlan trunk native VLAN: none

Administrative private-vlan trunk Native VLAN tagging: enabled

Administrative private-vlan trunk encapsulation: dot1q

Administrative private-vlan trunk normal VLANs: none

Administrative private-vlan trunk private VLANs: none

Operational private-vlan: none

Trunking VLANs Enabled: ALL

Pruning VLANs Enabled: 2-1001

Capture Mode Disabled

Capture VLANs Allowed: ALL

!--- Part of output elided.

Name: Fa1/0/24

Switchport: Enabled

Administrative Mode: dynamic auto

Operational Mode: down

Administrative Trunking Encapsulation: negotiate

Negotiation of Trunking: On

Access Mode VLAN: 50 (Inactive)

Trunking Native Mode VLAN: 1 (default)

Administrative Native VLAN tagging: enabled

Voice VLAN: none

Administrative private-vlan host-association: none

Administrative private-vlan mapping: none

Administrative private-vlan trunk native VLAN: none

Administrative private-vlan trunk Native VLAN tagging: enabled

Administrative private-vlan trunk encapsulation: dot1q

Administrative private-vlan trunk normal VLANs: none

Administrative private-vlan trunk private VLANs: none

Operational private-vlan: none

Trunking VLANs Enabled: ALL

Pruning VLANs Enabled: 2-1001

Capture Mode Disabled

Capture VLANs Allowed: ALL

Protected: false

Unknown unicast blocked: disabled

!--- Rest of output elided.

خلقت ال VLAN 50 في ال VTP نادل مفتاح (DistributionA).

DistributionA#conf t

Enter configuration commands, one per line.  End with CNTL/Z.

DistributionA(config)#vlan 50

DistributionA(config-vlan)#name Vlan50

DistributionA(config-vlan)#end

DistributionA#

!--- Verify the switchport status in the DistributionB switch.

DistributionB#show interfaces fa1/0/24 switchport

Name: Fa1/0/24

Switchport: Enabled

Administrative Mode: dynamic auto

Operational Mode: down

Administrative Trunking Encapsulation: negotiate

Negotiation of Trunking: On

Access Mode VLAN: 50 (Vlan50)

Trunking Native Mode VLAN: 1 (default)

Administrative Native VLAN tagging: enabled

Voice VLAN: none

Administrative private-vlan host-association: none

Administrative private-vlan mapping: none

Administrative private-vlan trunk native VLAN: none

Administrative private-vlan trunk Native VLAN tagging: enabled

Administrative private-vlan trunk encapsulation: dot1q

Administrative private-vlan trunk normal VLANs: none

Administrative private-vlan trunk private VLANs: none

Operational private-vlan: none

Trunking VLANs Enabled: ALL

Pruning VLANs Enabled: 2-1001

Capture Mode Disabled

Capture VLANs Allowed: ALL

!--- Rest of output elided.

6. غيرت ال VTP أسلوب من DistributionB مفتاح إلى نادل.

ال VTP نادل مفتاح (محولات) ينبغي يتلقى ال نفسه تشكيل مراجعة رقم، ويجب أن يكون الأعلى في ال VTP مجال.

أضفت مفتاح إلى ال VTP مجال

يمكن أن يؤدي مفتاح تمت إضافته حديثا إلى حدوث مشاكل في الشبكة. هو يستطيع كنت مفتاح أن كان سابقا استعملت في المختبر، وطبقت VTP domain name يكون. شكلت المفتاح كان VTP زبون وكان ربطت إلى الإستراحة من الشبكة. بعد ذلك، قمت برفع إرتباط خط الاتصال إلى باقي الشبكة. في بضع ثوان فقط، يمكن أن تنخفض الشبكة بالكامل.

إن التشكيل مراجعة رقم من المفتاح أن أنت تدرج يكون أعلى من التشكيل مراجعة رقم من ال VTP مجال، هو ينشر ه ه VLAN قاعدة معطيات من خلال ال VTP مجال.

هذا يقع ما إذا المفتاح VTP زبون أو VTP نادل. VTP زبون يستطيع محو معلومة VLAN على VTP نادل. أنت يستطيع أخبرت هذا حدث عندما كثير من الميناء في شبكتك يذهب إلى الدولة غير فعال غير تابع أن يعين إلى VLAN غير موجود.

ملاحظة: راجع Flash Animation: VTP لعرض هذه المشكلة.

أتمت هذا steps in order to تفاديت هذا إصدار عندما أنت تضيف مفتاح إلى الشبكة:

1. قبل أن يربط أنت المفتاح جديد إلى الشبكة، غيرت ال VTP أسلوب من المفتاح إلى شفاف.

يؤدي ذلك إلى إعادة تعيين رقم مراجعة التكوين إلى صفر ('0').

2. قم بتوصيل المحول بالشبكة وتكوين روابط خطوط الاتصال المناسبة.

3. شكلت ال VTP شعار:

1. شكلت ال VTP domain name أن يطابق ال VTP domain name من الشبكة.

2. شكلت ال VTP صيغة وكلمة (إن يكون أي يتطلب).

4. غيرت ال VTP أسلوب إلى زبون.

لا يزال رقم مراجعة التكوين صفرا ('0'). تبدأ شبكات VLAN في التكاثر من خادم (خوادم) VTP الموجودة في الشبكة.

5. دققت إن يكون كل VLANs مطلوب يتوفر في المفتاح جديد وفي ال VTP نادل من الشبكة.

6. إن أي VLAN مفقود، workaround سريع أن يضيف هو من واحد من ال VTP نادل.

راجع كيف يمكن أن يتسبب محول تم إدخاله مؤخرا في مشاكل في الشبكة للحصول على مزيد من المعلومات.

التحقق من الصحة

هناك ما من منفصل تدقيق إجراء يتوفر ل هذا تشكيل. أستخدم خطوات التحقق المقدمة كجزء من مثال التكوين.

تدعم أداة مترجم الإخراج (للعملاءالمسجلين فقط) بعض أوامر show. استخدم أداة مترجم الإخراج (OIT) لعرض تحليل مُخرَج الأمر show .

- عرض vtp وضع [cisco ios]—يعرض الحالة الحالية من ال VTP مجال.

- عرض vtp مجال [مادة حفازة os]— يعرض الحالة الحالية من ال VTP مجال.

- show vlan— يعرض معلومات شبكة VLAN.

استكشاف الأخطاء وإصلاحها

لا تتوفر حاليًا معلومات محددة لاستكشاف الأخطاء وإصلاحها لهذا التكوين.

أحلت VTP يتحرى وتنبيهات لمعلومة على مشكلة المشتركة مع VTP.

معلومات ذات صلة

- بروتوكول توصيل شبكة ‪VLAN (VTP)‬

- دعم منتجات الشبكات المحلية (LAN)

- دعم تقنية تحويل شبكات LAN

- الدعم التقني والمستندات - Cisco Systems