المحتويات

المقدمة

المتطلبات الأساسية

المتطلبات

المكونات المستخدمة

ملاحظات هامة

EtherChannel

توصيل

الاصطلاحات

التكوين

الرسم التخطيطي للشبكة

التكوينات

التحقق من الصحة

أوامر show Catalyst 6500

أوامر عرض الموجه 7500 من Cisco

استكشاف الأخطاء وإصلاحها

معلومات ذات صلة

المقدمة

يزود هذا وثيقة عينة تشكيل ل Fast EtherChannel (FEC)، Inter-Switch خطوة (ISL)، و 802.1Q trunking بين مادة حفازة 6500 مفتاح أن يركض مادة حفازة os (CatOS) و cisco 7500 مسحاج تخديد. يتم عرض نتائج كل أمر عند تنفيذها. على الرغم من أن مادة حفازة 6000 استعملت مفتاح في هذا تشكيل، أنت يستطيع استبدلت مادة حفازة 4000 أو مادة حفازة 5000 عائلة مفتاح أن يركض CatOS.

المتطلبات الأساسية

المتطلبات

تأكد من استيفاء المتطلبات التالية قبل أن تحاول إجراء هذا التكوين:

- المحولات من السلسلة Catalyst 6000

- يتطلب CatOS إطلاق 5.1(1) CSX أو فيما بعد لدعم EtherChannel

- سلسلة موجهات طراز 7000 أو 7500 من Cisco

- سلسلة موجهات Cisco 7000 مع معالج التحويل والتوجيه 7000 Series Route Switch Processor (RSP7000) أو واجهة الهيكل (RSP7000CI)، أو موجهات Cisco 7500 Series مع معالجات واجهة الإيثرنت السريعة (FEIP) أو مهايئات منفذ معالج الواجهة متعدد الاستخدام (VIP2)

- إذا كنت تستخدم مهايئ منفذ PA-2 FEISL، يجب أن يكون لديك مراجعة الأجهزة 1.2 أو إصدار أحدث.

ارجع إلى إشعار ميداني: *Expired* FN - 8791_11301999 - PA-2FEISL 2-Port Fast Ethernet ISL Replace Recommendation للحصول على مزيد من المعلومات.

- تم إدخال الأمر encapsulation dot1q native في البرنامج Cisco IOS® Software، الإصدار 12.1(3) T. يغير هذا الأمر التكوين.

راجع تكوين Cisco 7500 802.1Q لإصدارات برنامج Cisco IOS Software الأقدم من قسم 12.1(3)T في هذا المستند للحصول على مزيد من المعلومات.

- يتم تمكين إعادة التوجيه السريع من Cisco بشكل افتراضي على موجهات سلسلة 7500 من Cisco. ومع ذلك، لم يتوفر دعم إعادة التوجيه السريع من Cisco لتوجيه IP بين شبكات IEEE 802.1Q المحلية الظاهرية (VLANs) حتى برنامج Cisco IOS الإصدار 12.2 و 12.2T. ما يزال من الممكن تكوين عملية كبسلة 802.1Q في الإصدارات السابقة، ولكن يجب عليك أولا إصدار الأمر no ip cef العام لتعطيل إعادة التوجيه السريع من Cisco.

- عند تكوين موجه من السلسلة 7500 لتحويل التسمية متعدد البروتوكولات (MPLS) و FEC، يكون الدعم غير متوفر حاليا لحزم التوجيه (MPLS" IP) التي تتدفق من واجهة MPLS إلى واجهة FEC. لذلك، لا يوصى بوجود تكوين MPLS و FEC معا على موجه واحد.

- يتطلب Cisco IOS Software، الإصدار 11.1(14)CA أو إصدار أحدث لدعم EtherChannel.

برنامج IOS الإصدار 11.3(1)T من Cisco (أي مجموعة ميزات إضافية) أو إصدار أحدث مطلوب لدعم توصيل ISL.

برنامج IOS الإصدار 12.0(1)T من Cisco (أي مجموعة ميزات إضافية) أو إصدار أحدث مطلوب لدعم توصيل IEEE 802.1Q.

المكونات المستخدمة

تستند المعلومات الواردة في هذا المستند إلى إصدارات البرامج والمكونات المادية التالية:

- Catalyst 6500 يشغل CatOS، الإصدار 5.5.14

- cisco 7500 يركض cisco ios برمجية إطلاق 12.2.7b

تم إنشاء المعلومات الواردة في هذا المستند من الأجهزة الموجودة في بيئة معملية خاصة. بدأت جميع الأجهزة المُستخدمة في هذا المستند بتكوين ممسوح (افتراضي). إذا كانت شبكتك مباشرة، فتأكد من فهمك للتأثير المحتمل لأي أمر.

ملاحظات هامة

- تذكر أن محولات Catalyst 4000 series لا تدعم توصيل ISL. in addition، بعض تحويل وحدة نمطية على مادة حفازة 5000 sery مفتاح ليس EtherChannel قادر. قم بإصدار الأمر show port capabilities module لتحديد ما إذا كانت وحدة نمطية معينة قادرة على EtherChannel وما هي عملية كبسلة trunking التي تدعمها.

- هناك guidelines خاص لتكوين EtherChannel و trunking. ارجع دائما إلى وثائق البرامج الخاصة بالمحول لديك.

مثلا، إن يركض أنت برمجية إطلاق 5.5.x على مادة حفازة 5000، أنت كنت تشير إلى البرمجية تشكيل مرشد (5.5) وفحص بعناية أي تشكيل guidelines وقيود في ال يشكل سريع EtherChannel و gigabit EtherChannel قسم.

EtherChannel

تتيح ميزة FEC أو Gigabit EtherChannel (GEC) تجميع روابط متعددة من نقطة إلى نقطة في إرتباط منطقي واحد. يدعم المحول Catalyst 6000 عدد 8 منافذ كحد أقصى في وضع الإرسال ثنائي الإتجاه الكامل، والذي يوفر سعة معالجة بسرعة 1600 ميجابت في الثانية أو 1.6 جيجابت في الثانية ل FEC و 16 جيجابت في الثانية ل GEC. تدعم سلسلة Cisco 7500 أربعة منافذ كحد أقصى لكل FEC، بسرعة 800 ميجابت في الثانية. تختلف إمكانية EtherChannel وأدائها، حسب المحول أو الموجه. أحلت نظام متطلب أن يطبق EtherChannel على مادة حفازة مفتاح ل كثير معلومة.

توزع EtherChannel حركة مرور عبر كل الروابط وتوفر تكرار إذا فشل واحد أو أكثر من الروابط. راجع فهم موازنة حمل EtherChannel وتكرار الإرسال على محولات Catalyst للحصول على مزيد من المعلومات وعينة التكوينات المتعلقة ب EtherChannel.

راجع صفحة EtherChannel الخاصة بدعم Cisco التقني والمستندات للحصول على مزيد من المعلومات.

توصيل

trunking طريقة لحمل حركة المرور من شبكات VLAN المتعددة عبر إرتباط من نقطة إلى نقطة أو حزمة EtherChannel بين جهازين. هذه طريقتان يمكن من خلالها تنفيذ توصيل الإيثرنت:

- ISL (تضمين خط الاتصال الخاص من Cisco)

- 802.1Q (تضمين خط الاتصال القياسي وفقا لمعيار IEEE)

راجع صفحة بروتوكولات إنشاء خط اتصال شبكات VLAN ل Cisco الدعم التقني والمستندات للحصول على مزيد من المعلومات.

الاصطلاحات

راجع اصطلاحات تلميحات Cisco التقنية للحصول على مزيد من المعلومات حول اصطلاحات المستندات.

التكوين

في هذا القسم، تُقدّم لك معلومات تكوين الميزات الموضحة في هذا المستند.

ملاحظة: أستخدم أداة بحث الأوامر (للعملاء المسجلين فقط) للعثور على مزيد من المعلومات حول الأوامر المستخدمة في هذا المستند.

تظهر لك هذه النماذج من التكوينات كيفية القيام بهذه الأمور:

- شكلت إثنان منفذ ميناء ل محطة عمل 1 في VLAN 1 و ل محطة عمل 2 في VLAN 2 على المادة حفازة 6500.

- قم بتكوين البوابة الافتراضية لمحطة العمل 1 لتكون 10.10.10.1 /24 ولتكون محطة العمل 2 هي 10.10.11.1/24 على Cisco 7500.

- شكلت ISL و 802.1Q شنطة عبر إثنان ميناء FEC بين مادة حفازة 6500 مفتاح وال cisco 7500 مسحاج تخديد.

- قم بتكوين واجهتين فرعيتين للقناة المنفذ باستخدام عناوين IP للتوجيه بين شبكات VLAN.

الرسم التخطيطي للشبكة

يستخدم هذا المستند إعداد الشبكة التالي:

Trunking VLAN 1 و VLAN 2 على 2-Port FEC

التكوينات

يستخدم هذا المستند التكوينات التالية:

- محول Catalyst 6500

- موجّه Cisco 7500

- تكوين Cisco 7500 802.1Q لإصدار برنامج Cisco IOS Software الأقدم من 12.1(3)T

محول Catalyst 6500

!--- Set the IP address and default gateway for VLAN 1 for management purposes.

Catalyst6500> (enable) set interface sc0 10.10.10.2 255.255.255.0

Interface sc0 IP address and netmask set.

Catalyst6500> (enable) set ip route default 10.10.10.1

Route added.

!--- Set the VTP mode. In this example, the mode is set to be transparent. Depending on your !--- network, set the VTP mode accordingly. !--- For details on VTP, refer to Understanding and Configuring VLAN Trunk Protocol (VTP).

Catalyst6500> (enable) set vtp mode transparent

VTP domain modified

!--- Add VLAN 2. VLAN 1 already exists by default.

Catalyst6500> (enable) set vlan 2

VLAN 2 configuration successful

!--- Add port 3/4 to VLAN 2. Port 3/3 is already in VLAN 1 by default.

Catalyst6500> (enable) set vlan 2 3/4

VLAN 2 modified.

VLAN 1 modified.

VLAN  Mod/Ports

---- -----------------------

2     3/4

!--- Set the port speed to 100 and duplex to full. One of the requirements for EtherChannel !--- to work is for speed and duplex to be the same on both sides. To guarantee this, hard !--- code both speed and duplex on ports 3/1 and 3/2.

Catalyst6500> (enable) set port speed 3/1-2 100

Ports 3/1-2 transmission speed set to 100Mbps.

Catalyst6500> (enable) set port duplex 3/1-2 full

Ports 3/1-2 set to full-duplex.

!--- Enable FEC on ports 3/1 and 3/2. Because routers do not understand Port Aggregation !--- Protocol (PAgP), set the channel mode to one which causes ports to channel but which !--- does not generate PAgP frames.

Catalyst6500> (enable) set port channel 3/1-2 on

Port(s) 3/1-2 are assigned to admin group 105.

Port(s) 3/1-2 channel mode set to on.

!--- Enable trunking on ports 3/1 and 3/2. Because routers do not understand Dynamic !--- Trunking Protocol (DTP), set the trunking mode to nonegotiate, which causes ports to !--- trunk but which does not generate DTP frames. !--- Note: Because EtherChannel is configured first, any trunk settings that are applied !--- now to one port automatically apply to all other ports in the channel. !--- Enter the trunking encapsulation as either ISL…

Catalyst6500> (enable) set trunk 3/1 nonegotiate isl

Port(s) 3/1-2 trunk mode set to nonegotiate.

Port(s) 3/1-2 trunk type set to isl.

!--- …or as dot1q. !--- Ensure that the native VLAN (default is VLAN 1) matches across the link. For more !--- information about the native VLAN and 802.1Q trunking, refer to Trunking Between !--- Catalyst 4500/4000, 5500/5000, and 6500/6000 Series Switches Using 802.1Q !--- Encapsulation with Cisco CatOS System Software.

Catalyst6500> (enable) set trunk 3/1 nonegotiate dot1q

Port(s) 3/1-2 trunk mode set to nonegotiate.

Port(s) 3/1-2 trunk type set to dot1q.

Catalyst6500> (enable) show config

This command shows non-default configurations only.

Use 'show config all' to show both default and non-default configurations.

.........

..................

..

begin

!

# ***** NON-DEFAULT CONFIGURATION *****

!

!

#time: Thu May 2 2002, 01:26:26

!

#version 5.5(14)

!

!

#system

set system name  Catalyst6500

!

#!

#vtp

set vtp mode transparent

set vlan 1 name default type ethernet mtu 1500 said 100001 state active

set vlan 2 name VLAN0002 type ethernet mtu 1500 said 100002 state active

set vlan 1002 name fddi-default type fddi mtu 1500 said 101002 state active

set vlan 1004 name fddinet-default type fddinet mtu 1500 said 101004 state active stp ieee

set vlan 1005 name trnet-default type trbrf mtu 1500 said 101005 state active stp ibm

set vlan 1003 name token-ring-default type trcrf mtu 1500 said 101003 state active

mode srb aremaxhop 7 stemaxhop 7

backupcrf off

!

#ip

set interface sc0 1 10.10.10.2/255.255.255.0 10.10.10.255

set ip route 0.0.0.0/0.0.0.0 10.10.10.1

!

#set boot command

set boot config-register 0x2102

set boot system flash bootflash:cat6000-sup.5-5-14.bin

!

#port channel

set port channel 3/1-2 105

!

# default port status is enable

!

!

#module 1 empty

!

#module 2 : 2-port 1000BaseX Supervisor

!

#module 3 : 48-port 10/100BaseTX Ethernet

set vlan 2    3/4

set port disable    3/5

set port speed      3/1-2  100

set port duplex     3/1-2  full

set trunk 3/1  nonegotiate isl 1-1005

set trunk 3/2  nonegotiate isl 1-1005

!--- If IEEE 802.1Q is configured, you will see this output instead: set trunk 3/1 nonegotiate dot1q 1-1005 set trunk 3/2 nonegotiate dot1q 1-1005

set port channel 3/1-2 mode on

!

#module 4 : 24-port 100BaseFX MM Ethernet

!

#module 5 empty

!

#module 6 empty

!

#module 15 empty

!

#module 16 empty

end

موجّه Cisco 7500

!--- Configure a port-channel interface to enable FEC.

7500# configure terminal

Enter configuration commands, one per line. End with CNTL/Z.

7500(config)# interface port-channel 1

01:34:10: %LINEPROTO-5-UPDOWN: Line protocol on Interface Port-channel1, changed

state to down

!--- Configure full-duplex to match the duplex setting on the Catalyst switch side.

7500(config-if)# full-duplex

7500(config-if)# exit

!--- If you are using ISL trunking, configure two port-channel sub-interfaces and issue the !--- encapsulation isl

command to enable ISL trunking. !--- Configure IP addresses for InterVLAN routing.

7500(config)# interface port-channel 1.1

7500(config-subif)# encapsulation isl 1

7500(config-subif)# ip address 10.10.10.1 255.255.255.0

7500(config-subif)# exit

7500(config)# interface port-channel 1.2

7500(config-subif)# encapsulation isl 2

7500(config-subif)# ip address 10.10.11.1 255.255.255.0

7500(config-subif)# exit

!--- If you are using 802.1Q trunking, issue the encapsulation dot1Q

native

!--- command to configure two port-channel sub-interfaces and enable 802.1Q trunking. !--- Configure the IP addresses for InterVLAN routing. !--- Note: The encapsulation dot1Q 1 native command was added in Cisco IOS Software !--- Release 12.1(3)T. If you are using an earlier version of Cisco IOS, see the !--- Cisco 7500 802.1Q Configuration for Cisco IOS Software Releases Earlier than 12.1(3)T !--- section of this document, to configure 802.1Q trunking on the router.

!--- Ensure that the native VLAN (default is VLAN 1) matches across the link. For more !--- information about the native VLAN and 802.1Q trunking, refer to Trunking Between !--- Catalyst 4500/4000, 5500/5000, and 6500/6000 Series Switches Using 802.1Q !--- Encapsulation with Cisco CatOS System Software.

7500(config)# interface port-channel 1.1

7500(config-subif)# encapsulation dot1Q 1 native

7500(config-subif)# ip address 10.10.10.1 255.255.255.0

7500(config-subif)# exit

7500(config)# interface port-channel 1.2

7500(config-subif)# encapsulation dot1Q 2

7500(config-subif)# ip address 10.10.11.1 255.255.255.0

7500(config-subif)# exit

!--- Configure the FastEthernet interfaces for speed 100, depending on the port adapter. !--- Some FastEthernet port adapters can autonegotiate speed (10 or 100) and duplex (half !--- or full). Others are only capable of 100 (half or full).

7500(config)# interface fastethernet 5/1/0

7500(config-if)# speed 100

!--- Issue the channel-group command, to configure the FastEthernet interfaces to be !--- members of port-channel 1.

7500(config-if)# channel-group 1

%Interface MTU set to channel-group MTU 1500.

7500(config-if)# no shut

7500(config-if)#

%Interface MTU set to channel-group MTU 1500.

FastEthernet5/1/0 added as member-1 to port-channel1

01:46:09: %LINK-3-UPDOWN: Interface FastEthernet5/1/0, changed state to up

01:46:10: %LINEPROTO-5-UPDOWN: Line protocol on Interface FastEthernet5/1/0,

changed state to up

01:46:12: %LINEPROTO-5-UPDOWN: Line protocol on Interface Port-channel1,

changed state to up

Router(config-if)# exit

Router(config)# interface fastethernet 5/1/1

Router(config-if)# speed 100

Router(config-if)# channel-group 1

%Interface MTU set to channel-group MTU 1500.

Router(config-if)# no shut

Router(config-if)#

%Interface MTU set to channel-group MTU 1500.

FastEthernet5/1/1 added as member-2 to port-channel1

01:54:52: %LINK-3-UPDOWN: Interface FastEthernet5/1/1, changed state to up

01:54:53: %LINEPROTO-5-UPDOWN: Line protocol on Interface FastEthernet5/1/1,

changed state to up

Router(config-if)# exit

!--- Remember to save the configuration.

7500# write memory

Building configuration...

[OK]

7500#

!--- Note: To make this setup work and to successfully ping between Workstation 1 and !--- Workstation 2, you must ensure that the default gateways on the workstations are setup !--- properly. For Workstation 1, the default gateway should be 10.10.10.1; and for !--- Workstation 2, the default gateway should be 10.10.11.1.

7500# show running-config

Building configuration...

Current configuration : 1593 bytes

!

version 12.2

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

no service single-slot-reload-enable

!

hostname 7500

!

boot system disk1:rsp-jsv-mz.122-7b.bin

!

ip subnet-zero

!

ip cef

call rsvp-sync

!

!

!

interface Port-channel1

no ip address

full-duplex

hold-queue 300 in

!

interface Port-channel1.1

encapsulation isl 1

ip address 10.10.10.1 255.255.255.0

!

interface Port-channel1.2

encapsulation isl 2

ip address 10.10.11.1 255.255.255.0

!--- If 802.1Q trunking is configured, you will see this output instead: interface Port-channel1.1 encapsulation dot1Q 1 native ip address 10.10.10.1 255.255.255.0 ! interface Port-channel1.2 encapsulation dot1Q 2 ip address 10.10.11.1 255.255.255.0

!

interface FastEthernet5/1/0

no ip address

no ip mroute-cache

speed 100

full-duplex

channel-group 1

!

interface FastEthernet5/1/1

no ip address

no ip mroute-cache

speed 100

full-duplex

channel-group 1

!

!

ip classless

no ip http server

ip pim bidir-enable

!

!

!

!

line con 0

line aux 0

line vty 0 4

login

!

end

تكوين Cisco 7500 802.1Q لإصدار برنامج Cisco IOS Software الأقدم من 12.1(3)T

في إصدارات Cisco IOS الأقدم من 12.1(3)T، لم يكن الأمر الأصلي الخاص بعملية كبسلة dot1Q 1 متاحا تحت الواجهة الفرعية. ومع ذلك، ما يزال من الضروري مطابقة شبكة VLAN الأصلية عبر الارتباط كما هو موضح مسبقا. أن يشكل 802.1Q trunking في برمجية صيغة مبكر من 12.1(3)T، شكلت العنوان ل VLAN 1 على ال رئيسي ميناء-channel 1 قارن، لا ميناء-channel subinterface.

!--- Configure a port-channel interface to enable FEC.

7500# configure terminal

Enter configuration commands, one per line. End with CNTL/Z.

7500(config)# interface port-channel 1

01:34:10: %LINEPROTO-5-UPDOWN: Line protocol on Interface Port-channel1, changed

state to down

!--- Configure full-duplex to match the duplex setting on the Catalyst switch side.

7500(config-if)# full-duplex

7500(config-if)# exit

!--- Do not configure an interface port-channel 1.1 !--- Instead, create a port-channel 1 main interface and configure the IP address !--- for VLAN 1 here.

7500(config)# interface port-channel 1

7500(config-if)# full-duplex

7500(config-if)# ip address 10.10.10.1 255.255.255.0

7500(config-if)# exit

7500(config)#

!--- It is still necessary to create a subinterface for VLAN 2.

7500(config)# interface port-channel 1.2

7500(config-subif)# encapsulation dot1Q 2

7500(config-subif)# ip address 10.10.11.1 255.255.255.0

7500(config-subif)# exit

!--- Configure the FastEthernet interfaces for speed 100, depending on the port adapter. !--- Some FastEthernet port adapters can autonegotiate speed (10 or 100) and duplex (half !--- or full). Others are only capable of 100 (half or full).

7500(config)# interface fastethernet 5/1/0

7500(config-if)# speed 100

!--- Issue the channel-group command to configure the FastEthernet interfaces to be !--- members of port-channel 1.

7500(config-if)# channel-group 1

%Interface MTU set to channel-group MTU 1500.

7500(config-if)# no shut

7500(config-if)#

%Interface MTU set to channel-group MTU 1500.

FastEthernet5/1/0 added as member-1 to port-channel1

01:46:09: %LINK-3-UPDOWN: Interface FastEthernet5/1/0, changed state to up

01:46:10: %LINEPROTO-5-UPDOWN: Line protocol on Interface FastEthernet5/1/0,

changed state to up

01:46:12: %LINEPROTO-5-UPDOWN: Line protocol on Interface Port-channel1,

changed state to up

Router(config-if)# exit

Router(config)# interface fastethernet 5/1/1

Router(config-if)# speed 100

Router(config-if)# channel-group 1

%Interface MTU set to channel-group MTU 1500.

Router(config-if)# no shut

Router(config-if)#

%Interface MTU set to channel-group MTU 1500.

FastEthernet5/1/1 added as member-2 to port-channel1

01:54:52: %LINK-3-UPDOWN: Interface FastEthernet5/1/1, changed state to up

01:54:53: %LINEPROTO-5-UPDOWN: Line protocol on Interface FastEthernet5/1/1,

changed state to up

Router(config-if)# exit

!--- Remember to save the configuration.

7500# write memory

Building configuration...

[OK]

7500#

!--- Note: Remember also that—in any version of software previous to 12.2 or 12.2T for the !--- 7000/7500 series—you will have to issue the no ip cef command globally before you !--- configure 802.1Q trunking on a subinterface. Otherwise, you will see this error !--- message: 802.1q encapsulation not supported with CEF configured on the interface. !--- See the Components Used section of this document for more information.

7500# show running-config

Building configuration...

Current configuration : 1593 bytes

!

version 12.1

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname 7500

!

!

ip subnet-zero

!

no ip cef

!

!

!

interface Port-channel1

ip address 10.10.10.1 255.255.255.0

full-duplex

hold-queue 300 in

!

interface Port-channel1.2

encapsulation dot1Q 2

ip address 10.10.11.1 255.255.255.0

!

interface FastEthernet5/1/0

no ip address

no ip mroute-cache

speed 100

full-duplex

channel-group 1

!

interface FastEthernet5/1/1

no ip address

no ip mroute-cache

speed 100

full-duplex

channel-group 1

!

!

ip classless

no ip http server

!

!

!

line con 0

line aux 0

line vty 0 4

login

!

end

7500#

التحقق من الصحة

استخدم هذا القسم لتأكيد عمل التكوين بشكل صحيح.

تدعم أداة مترجم الإخراج (للعملاءالمسجلين فقط) بعض أوامر show. استخدم أداة مترجم الإخراج (OIT) لعرض تحليل مُخرَج الأمر show .

أوامر show Catalyst 6500

- show interface— يعرض عنوان IP لواجهة إدارة sc0 وشبكة VLAN. في هذا المثال، يتم إستخدام شبكة VLAN الافتراضية (VLAN 1).

Catalyst6500> (enable) show interface

sl0: flags=51<UP,POINTOPOINT,RUNNING>

slip 0.0.0.0 dest 0.0.0.0

sc0: flags=63

VLAN 1 inet 10.10.10.2 netmask 255.255.255.0 broadcast 10.10.10.255

Catalyst6500> (enable)

- show ip route— يعرض البوابة الافتراضية. في هذا المثال، 10.10.10.1 هو عنوان IP الخاص بقناة المنفذ 1 (ل 802.1Q trunking) أو قناة المنفذ 1.1 (ل ISL trunking).

Catalyst6500> (enable) show ip route

Fragmentation   Redirect   Unreachable

-------------   --------   -----------

enabled         enabled    enabled

The primary gateway: 10.10.10.1

Destination      Gateway          RouteMask    Flags   Use       Interface

---------------  ---------------  ----------   -----   --------  ---------

default          10.10.10.1       0x0          UG      0           sc0

10.10.10.0       10.10.10.2       0xffffff00   U       8           sc0

default          default          0xff000000   UH      0           sl0

Catalyst6500> (enable)

- show port capabilities mod/port —يلقي نظرة سريعة على إمكانيات الأجهزة الخاصة بوحدات التحويل النمطية. في هذا مثال، أنت يستطيع رأيت أن ميناء 3/1 (و 3/2) يكون EtherChannel قادر، أي trunking عملية كبسلة يدعمها، ومعلومات أخرى.

Catalyst6500> (enable) show port capabilities 3/1

Model                    WS-X6248-RJ-45

Port                     3/1

Type                     10/100BaseTX

Speed                    auto,10,100

Duplex                   half,full

Trunk encap type         802.1q,ISL

Trunk mode               on,off,desirable,auto,nonegotiate

Channel                  yes

Broadcast suppression    percentage(0-100)

Flow control             receive-(off,on),send-(off)

Security                 yes

Membership               static,dynamic

Fast start               yes

QOS scheduling           rx-(1q4t),tx-(2q2t)

CoS rewrite              yes

ToS rewrite              DSCP

UDLD                     yes

Inline power             no

AuxiliaryVlan            1..1000,untagged,dot1p,none

SPAN                     source,destination

COPS port group          not supported

Catalyst6500> (enable)

- show port counters mod/port — يعطي نظرة سريعة على أخطاء المنفذ المحتملة. في هذا مثال، هذا ميناء خالي من أي خطأ. إن يمر أنت إختبار خطأ على الميناء، أحلت يتحرى مفتاح ميناء وقارن مشكلة ل كثير معلومة.

Catalyst6500> (enable) show port counters 3/1

Port  Align-Err  FCS-Err    Xmit-Err   Rcv-Err    UnderSize

----- ---------- ---------- ---------- ---------- ---------

3/1           0          0          0          0         0

Port  Single-Col Multi-Coll Late-Coll  Excess-Col Carri-Sen Runts     Giants

----- ---------- ---------- ---------- ---------- --------- --------- ---------

3/1           0          0          0          0         0         0         -

Last-Time-Cleared

--------------------------

Thu May 2 2002, 02:11:55

Catalyst6500> (enable)

- show port mod — يعرض حالة المنفذ، شبكة VLAN، خط الاتصال، ومعلومات السرعة والإرسال ثنائي الإتجاه. في هذا المثال، يكون منفذ الوصول لمحطة العمل 1 هو 3/3، أي في شبكة VLAN رقم 1. منفذ الوصول لمحطة العمل 2 هو 3/4، أي يكون VLAN 2. الميناء 3/1 و 3/2 ال trunking و FEC ميناء.

Catalyst6500> (enable) show port 3

Port  Name                 Status     VLAN       Duplex Speed Type

----- -------------------- ---------- ---------- ------ ----- ------------

3/1                       connected  trunk        full   100 10/100BaseTX

3/2                       connected  trunk        full   100 10/100BaseTX

3/3                       connected  1          a-half  a-10 10/100BaseTX

3/4                       connected  2          a-full a-100 10/100BaseTX

!--- Output suppressed.

- يبدي أبديت vlan— الذي ميناء يكون عينت إلى VLANs خاص. لاحظت أن شنطة ميناء في هذا مثال (3/1 و 3/2) لا يظهر في هذا إنتاج، أي يكون عادي.

Catalyst6500> (enable) show vlan

VLAN Name                             Status    IfIndex Mod/Ports, Vlans

---- -------------------------------- --------- ------- ------------------------

1    default                          active    119     2/1-2

3/3,3/5-48

4/1-24

2    VLAN0002                         active    124     3/4

!--- Output suppressed.

- show trunk— يعرض وضع التوصيل، نوع التضمين، شبكات VLAN المسموح بها، وشبكات VLAN النشطة. في هذا المثال، تكون شبكة VLAN 1 (مسموح بها ونشطة دائما بشكل افتراضي) وشبكة VLAN 2 هي شبكات VLAN النشطة حاليا للشنطة. لاحظت أن كلا شنطة ميناء في VLAN 1.

Catalyst6500> (enable) show trunk

* - indicates vtp domain mismatch

Port      Mode         Encapsulation  Status        Native vlan

--------  -----------  -------------  ------------  -----------

3/1      nonegotiate  isl            trunking      1

3/2      nonegotiate  isl            trunking      1

Port      VLANs allowed on trunk

--------  ---------------------------------------------------------------------

3/1      1-1005

3/2      1-1005

Port      VLANs allowed and active in management domain

--------  ---------------------------------------------------------------------

3/1      1-2

3/2      1-2

Port      VLANs in spanning tree forwarding state and not pruned

--------  ---------------------------------------------------------------------

3/1      1-2

3/2      1-2

بالنسبة لتوصيل 802.1Q، يتغير إخراج الأمر السابق إلى هذا:

Catalyst6500> (enable) show trunk

* - indicates vtp domain mismatch

Port      Mode         Encapsulation  Status        Native VLAN

--------  -----------  -------------  ------------  -----------

3/1      nonegotiate  dot1q          trunking      1

3/2      nonegotiate  dot1q          trunking      1

Port      VLANs allowed on trunk

--------  ---------------------------------------------------------------------

3/1      1-1005

3/2      1-1005

Port      VLANs allowed and active in management domain

--------  ---------------------------------------------------------------------

3/1      1-2

3/2      1-2

Port      VLANs in spanning tree forwarding state and not pruned

--------  ---------------------------------------------------------------------

3/1      1-2

3/2      1-2

Catalyst6500> (enable)

- يبدي أبديت ميناء قناة— المركز EtherChannel. في هذا مثال، هناك 2 ميناء FEC (ميناء 3/1 و 3/2) قيد التشغيل، لمنع إطارات PAgP من أن يتم إرسالها. يمكنك أيضا رؤية واجهة قناة المنفذ البعيد للموجه 7500.

Catalyst6500> (enable)  show port channel

Port  Status     Channel              Admin Ch

Mode                 Group Id

----- ---------- -------------------- ----- -----

3/1  connected  on                     105   833

3/2  connected  on                     105   833

----- ---------- -------------------- ----- -----

Port  Device-ID                       Port-ID                   Platform

----- ------------------------------- ------------------------- ----------------

3/1  7500                            Port-channel1.1           cisco RSP4

3/2

----- ------------------------------- ------------------------- ----------------

Catalyst6500> (enable)

بالنسبة ل FEC مع 802.1Q trunking، يتغير إخراج الأمر السابق إلى هذا:

Catalyst6500> (enable) show port channel

Port  Status     Channel              Admin Ch

Mode                 Group Id

----- ---------- -------------------- ----- -----

3/1   connected  on                    257   769

3/2   connected  on                    257   769

----- ---------- -------------------- ----- -----

Port  Device-ID                       Port-ID                   Platform

----- ------------------------------- ------------------------- ----------------

3/1       7500                            FastEthernet5/1/0         cisco RSP4

3/2       7500                            FastEthernet5/1/1         cisco RSP4

----- ------------------------------- ------------------------- ----------------

Catalyst6500> (enable)

إن يتلقى أنت الإنتاج من technologie دعم أمر من ك cisco أداة، أنت يستطيع استعملت إنتاج مترجم أداة (يسجل زبون فقط) أن يعرض ممكن إصدار ونقطة معينة.

أوامر عرض الموجه 7500 من Cisco

- show interface port-channel number — يعطي حالة العضو للواجهات المادية. في هذا مثال، شكلت 2-port FEC بين ميناء 3/1 و 3/2 على المادة حفازة 6000 وبين قارن FastEthernet 5/1/0 و 5/1/1 على ال 7500. تظهر قناة المنفذ 1 ك up/up.

هو يتلقى عنوان يشكل، أي في هذه الحالة يعني أن هو ال VLAN عنوان أهلي طبيعي ل 802.1Q trunking. راجع تكوين Cisco 7500 802.1Q لإصدارات برنامج Cisco IOS Software الأقدم من قسم 12.1(3)T في هذا المستند للحصول على مزيد من المعلومات. أبديت إنتاج أيضا ل ال VLAN 2 802.1Q subinterface، من العرض قارن ميناء قناة 1.2 أمر.

7500# show interface port-channel 1

Port-channel1 is up, line protocol is up

Hardware is FEChannel, address is 0001.6490.f8a8 (bia 0000.0000.0000)

Internet address is 10.10.10.1/24

MTU 1500 bytes, BW 200000 Kbit, DLY 100 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, loopback not set

Keepalive set (10 sec)

Full-duplex, Unknown Speed

ARP type: ARPA, ARP Timeout 04:00:00

No. of active members in this channel: 2

Member 0 : FastEthernet5/1/0

Member 1 : FastEthernet5/1/1

Last input 00:00:14, output never, output hang never

Last clearing of "show interface" counters never

Input queue: 0/300/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue :0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

6720 packets input, 923310 bytes, 0 no buffer

Received 5010 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored

0 watchdog

0 input packets with dribble condition detected

1902 packets output, 573088 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 babbles, 0 late collision, 0 deferred

0 lost carrier, 0 no carrier

0 output buffer failures, 0 output buffers swapped out

7500#

7500# show interface port-channel 1.2

Port-channel1.2 is up, line protocol is up

Hardware is FEChannel, address is 0001.6490.f8a8 (bia 0000.0000.0000)

Internet address is 10.10.11.1/24

MTU 1500 bytes, BW 200000 Kbit, DLY 100 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation 802.1q Virtual LAN, Vlan ID  2.

ARP type: ARPA, ARP Timeout 04:00:00

هذا هو مخرج توصيل ISL و FEC:

7500# show interface port-channel 1

Port-channel1 is up, line protocol is up

Hardware is FEChannel, address is 0001.6490.f8a8 (bia 0000.0000.0000)

MTU 1500 bytes, BW 200000 Kbit, DLY 100 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, loopback not set

Keepalive set (10 sec)

Full-duplex, Unknown Speed

ARP type: ARPA, ARP Timeout 04:00:00

No. of active members in this channel: 2

Member 0 : FastEthernet5/1/0

Member 1 : FastEthernet5/1/1

Last input 00:00:01, output never, output hang never

Last clearing of "show interface" counters never

Input queue: 0/300/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue :0/40 (size/max)

5 minute input rate 0 bits/sec, 1 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

113 packets input, 7278 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored

0 watchdog

0 input packets with dribble condition detected

13 packets output, 2264 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 babbles, 0 late collision, 0 deferred

0 lost carrier, 0 no carrier

0 output buffer failures, 0 output buffers swapped out

7500# show interface port-channel 1.1

Port-channel1.1 is up, line protocol is up

Hardware is FEChannel, address is 0001.6490.f8a8 (bia 0000.0000.0000)

Internet address is 10.10.10.1/24

MTU 1500 bytes, BW 200000 Kbit, DLY 100 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ISL Virtual LAN, Color 1.

ARP type: ARPA, ARP Timeout 04:00:00

7500# show interface port-channel 1.2

Port-channel1.2 is up, line protocol is up

Hardware is FEChannel, address is 0001.6490.f8a8 (bia 0000.0000.0000)

Internet address is 10.10.11.1/24

MTU 1500 bytes, BW 200000 Kbit, DLY 100 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ISL Virtual LAN, Color 2.

ARP type: ARPA, ARP Timeout 04:00:00

- يبدي أبديت قارن FastEthernet slot/port-adapter/port — حالة الواجهات المادية من المسحاج تخديد وما إذا كان هناك أي خطأ على الواجهات. في هذا مثال، هو خالي من الخطأ.

7500# show interface fastethernet 5/1/0

FastEthernet5/1/0 is up, line protocol is up

Hardware is cyBus FastEthernet Interface, address is 0001.6490.f8a8

(bia 0001.6490.f8a8)

MTU 1500 bytes, BW 100000 Kbit, DLY 100 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, loopback not set

Keepalive set (10 sec)

Full-duplex, 100Mb/s, 100BaseTX/FX

ARP type: ARPA, ARP Timeout 04:00:00

Last input 1d00h, output 00:00:07, output hang never

Last clearing of "show interface" counters 1d00h

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue :0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

2929 packets input, 425318 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored

0 watchdog

0 input packets with dribble condition detected

12006 packets output, 1539768 bytes, 0 underruns

0 output errors, 0 collisions, 6 interface resets

0 babbles, 0 late collision, 0 deferred

0 lost carrier, 0 no carrier

0 output buffer failures, 0 output buffers swapped out

7500#

استكشاف الأخطاء وإصلاحها

لا تتوفر حاليًا معلومات محددة لاستكشاف الأخطاء وإصلاحها لهذا التكوين.

معلومات ذات صلة

- صفحات دعم منتجات شبكة LAN

- صفحة دعم EtherChannel

- صفحة دعم تحويل شبكة LAN

- الدعم التقني والمستندات - Cisco Systems