المحتويات

المقدمة

المتطلبات الأساسية

المتطلبات

المكونات المستخدمة

الاصطلاحات

التكوين

الرسم التخطيطي للشبكة

التكوينات

التحقق من الصحة

استكشاف الأخطاء وإصلاحها

معلومات ذات صلة

المقدمة

يزود هذا وثيقة عينة تشكيل لطبقة 2 tunneling بروتوكول صيغة 3 (L2TPv3) ساكن إستاتيكي وقارن طريقة.

يصف هذا الجدول دعم تعديل إصدار برنامج Cisco IOS® ل L2TPv3:

إصدار برنامج IOS من Cisco

وصف دعم L2TPv3

12.0(21)S

تم تقديم الدعم الأولي لمستوى البيانات ل L2TPv3 على الأنظمة الأساسية لسلسلة Cisco 7200 و Cisco 7500 Series و Cisco 10720 و Cisco 12000.

12.0(23)S

تم تقديم دعم مستوى التحكم L2TPv3 على الأنظمة الأساسية لسلسلة Cisco 7200 و Cisco 7500 Series و Cisco 10720 و Cisco 12000.

12.3(2)T

تم دمج هذه الميزة في برنامج CISCO IOS الإصدار 12.3(2)T.

يجب تمكين إعادة التوجيه السريع من Cisco (CEF) لاستخدام ميزة L2TPv3. يتم حظر الوضع الفرعي لتكوين Xconnect حتى يتم تمكين CEF. على الأنظمة الأساسية الموزعة، مثل سلسلة Cisco 7500، إذا تم تعطيل CEF أثناء إنشاء جلسة عمل، يتم تقسيم الجلسة ويبقى معطلا إلى أن يتم تمكين CEF. أستخدم الأمر ip cef أو ip cef distributed لتمكين CEF.

يوصى بشدة بتحديد عنوان IP للمصدر لتكوين واجهة إسترجاع. إذا لم تقم بتكوين واجهة إسترجاع، فسيقوم الموجه بتحديد أفضل عنوان محلي متاح، والذي يمكن أن يكون أي عنوان IP تم تكوينه على واجهة واجهة تدعم المركز. قد يمنع هذا التكوين إنشاء قناة تحكم. يجب أن يكون عنوان الاسترجاع قابلا للوصول إليه من الشبكات الأساسية.

المتطلبات الأساسية

المتطلبات

قبل محاولة هذا التكوين، تأكد من أنك على دراية بما يلي:

- L2TPv3: بروتوكول نفق الطبقة 2 الإصدار 3

المكونات المستخدمة

لا يقتصر هذا المستند على إصدارات برامج ومكونات مادية معينة.

الاصطلاحات

للحصول على مزيد من المعلومات حول اصطلاحات المستندات، ارجع إلى اصطلاحات تلميحات Cisco التقنية.

التكوين

في هذا القسم، تُقدّم لك معلومات تكوين الميزات الموضحة في هذا المستند.

ملاحظة: للعثور على معلومات إضافية حول الأوامر المستخدمة في هذا المستند، أستخدم أداة بحث الأوامر (للعملاء المسجلين فقط).

الرسم التخطيطي للشبكة

يستخدم هذا المستند إعداد الشبكة التالي:

ملاحظة: يتم إستخدام الموجهين R2 و R3 من قبل الموفر. الموجهات R1 و R4 و R5 و R6 هي العملاء النهائيون. باستخدام L2TPv3، يبدو أن الموجه R4 لديه اتصال مباشر ب R5، وهذا صحيح أيضا للاتصال بين الموجه R1 والموجه R6.

التكوينات

يستخدم هذا المستند التكوينات التالية:

- سلك كاذب ثابت من خلال سحابة IP. يمكن العثور على الجزء ذي الصلة من التكوين في R2 و R3 حيث تم تكوين نفقين أحادي الإتجاه.

- سلك كاشف ذو مسمار بارز أو تحويل محلي (من منفذ إلى منفذ آخر في نفس الموجه). يتم إجراء التكوين على R2 فقط ويتكون من تكوين نفقين أحاديين الإتجاه يشيران إلى استعراضين، وهما على الموجه R2.

R2

R2# show running-config

Building configuration...

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname R2

!

!

clock timezone EST 10

ip subnet-zero

ip cef

no ip domain-lookup

l2tp-class R2signal

hello 10

password 0 cisco

cookie size 8

!

pseudowire-class wireR5R4

encapsulation l2tpv3

protocol l2tpv3 R2signal

ip local interface Loopback0

ip dfbit set

!

pseudowire-class wireR6R1

encapsulation l2tpv3

protocol l2tpv3 R2signal

ip local interface Loopback1

ip dfbit set

!

pseudowire-class wireR1R6

encapsulation l2tpv3

protocol l2tpv3 R2signal

ip local interface Loopback2

ip dfbit set

!

interface Loopback0

description Used by wireR5R4 for Static Connection

ip address 2.2.2.2 255.255.255.255

no ip directed-broadcast

!

interface Loopback1

description Used by wireR6R1 for Hair Pinning Connection

ip address 2.2.2.6 255.255.255.255

no ip directed-broadcast

!

interface Loopback2

description Used by wireR1R6 for Hair Pinning Connection

ip address 2.2.2.1 255.255.255.255

no ip directed-broadcast

!

interface Ethernet0/0

description Connection to R1

no ip address

no ip directed-broadcast

xconnect 2.2.2.6 16 encapsulation l2tpv3 pw-class wireR1R6

!

interface Ethernet1/0

description Connection to Pretend Cloud.

ip address 20.20.20.2 255.255.255.0

no ip directed-broadcast

no cdp enable

!

interface Ethernet2/0

description Connection to R5

no ip address

no ip directed-broadcast

no cdp enable

xconnect 3.3.3.3 12 encapsulation l2tpv3 pw-class wireR5R4

!

interface Ethernet3/0

description Connection to R6

no ip address

no ip directed-broadcast

xconnect 2.2.2.1 16 encapsulation l2tpv3 pw-class wireR6R1

!

ip classless

ip route 3.3.3.3 255.255.255.255 20.20.20.3

!--- The other end of wireR5R4 loopback (3.3.3.3) must be

!--- reachable from this router. Hair Pinning loopbacks

!--- are reachable—there is no need for additional routes.

!

!

line con 0

exec-timeout 0 0

privilege level 15

line aux 0

line vty 0 4

login

!

end

R3

R3# show running-config

Building configuration...

version 12.0

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname R3

!

!

clock timezone EST 10

ip subnet-zero

ip cef

!

l2tp-class R3signal

hello 10

password 0 cisco

cookie size 8

!

pseudowire-class wireR4R5

encapsulation l2tpv3

protocol l2tpv3 R3signal

ip local interface Loopback0

ip dfbit set

!

interface Loopback0

description Use by wireR4R5 for static connection

ip address 3.3.3.3 255.255.255.255

no ip directed-broadcast

!

interface Ethernet0/0

ip address 20.20.20.3 255.255.255.0

no ip directed-broadcast

!

interface Ethernet1/0

no ip address

no ip directed-broadcast

no cdp enable

xconnect 2.2.2.2 12 encapsulation l2tpv3 pw-class wireR4R5

!

ip classless

ip route 2.2.2.2 255.255.255.255 Ethernet0/0

!--- The other end of wireR4R5 loopback (3.3.3.3) must be

!--- reachable from this router.

!

line con 0

exec-timeout 0 0

privilege level 15

line aux 0

line vty 0 4

login

!

end

تكوين الموجه الطرفي للنفق Customer R1R6 (pseudo-wire):

R1

R1# show running-config

Building configuration...

version 12.0

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname R1

!

!

clock timezone EST 10

ip subnet-zero

no ip domain-lookup

!

interface Ethernet0/0

ip address 10.10.10.1 255.255.255.0

no ip directed-broadcast

!

ip classless

!

line con 0

exec-timeout 0 0

privilege level 15

line aux 0

line vty 0 4

login

!

end

R6

R6# show running-config

Building configuration...

version 12.0

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname R6

!

!

clock timezone EST 10

ip subnet-zero

no ip domain-lookup

!

interface Ethernet0/0

ip address 10.10.10.6 255.255.255.0

no ip directed-broadcast

!

ip classless

!

line con 0

exec-timeout 0 0

privilege level 15

line aux 0

line vty 0 4

login

!

end

تكوين الموجه الطرفي للنفق Customer R4R5 (pseudo-wire):

R4

R4# show running-config

Building configuration...

version 12.0

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname R4

!

!

ip subnet-zero

!

interface Ethernet0/0

ip address 30.30.30.4 255.255.255.0

no ip directed-broadcast

!

router ospf 1

log-adjacency-changes

network 30.30.30.0 0.0.0.255 area 0

!

ip classless

!

line con 0

exec-timeout 0 0

privilege level 15

line aux 0

line vty 0 4

login

!

end

R5

R5# show running-config

Building configuration...

version 12.0

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname R5

!

!

ip subnet-zero

!

interface Ethernet0/0

ip address 30.30.30.5 255.255.255.0

no ip directed-broadcast

!

router ospf 1

log-adjacency-changes

network 30.30.30.0 0.0.0.255 area 0

!

ip classless

!

line con 0

exec-timeout 0 0

privilege level 15

line aux 0

line vty 0 4

login

!

end

التحقق من الصحة

يوفر هذا القسم معلومات يمكنك إستخدامها للتأكد من أن التكوين يعمل بشكل صحيح.

R4# show ip ospf neighbor

Neighbor ID  Pri  State     Dead Time   Address     Interface

30.30.30.5    1   FULL/DR   00:00:39    30.30.30.5  Ethernet0/0

R5# show ip ospf neighbor

Neighbor ID  Pri  State     Dead Time   Address     Interface

30.30.30.4    1   FULL/BDR  00:00:38    30.30.30.4  Ethernet0/0

R1# show cdp neighbors

Capability Codes: R - Router, T - Trans Bridge, B - Source Route Bridge

S - Switch, H - Host, I - IGMP, r - Repeater

Device ID   Local Intrfce  Holdtme Capability Platform  Port ID

R6           Eth 0/0       158        R       7206VXR   Eth 0/0

يتم دعم بعض أوامر العرض بواسطة أداة مترجم الإخراج (العملاء المسجلون فقط)، والتي تتيح لك عرض تحليل إخراج أمر العرض.

- show l2tun tunnel all—لعرض الحالة الحالية لجلسة عمل L2TPv3 وعرض المعلومات حول الجلسات التي تم تكوينها حاليا، بما في ذلك أسماء مضيفي L2TP المحلية والبعيدة، وأعداد الحزم المجمعة، وقنوات التحكم في L2TP، أستخدم الأمر show l2tun tunnel all في وضع EXEC.

R2# show l2tun tunnel all

Tunnel Information Total tunnels 3 sessions 3

Tunnel id 54217 is up, remote id is 44186, 1 active sessions

Tunnel state is established, time since change 00:12:07

Tunnel transport is IP (115)

Remote tunnel name is R2

Internet Address 2.2.2.6, port 0

Local tunnel name is R2

Internet Address 2.2.2.1, port 0

Tunnel domain is

VPDN group for tunnel is -

L2TP class for tunnel is R2signal

88 packets sent, 87 received

10086 bytes sent, 11092 received

Control Ns 76, Nr 74

Local RWS 1024 (default), Remote RWS 1024 (max)

Tunnel PMTU checking disabled

Retransmission time 1, max 1 seconds

Unsent queuesize 0, max 0

Resend queuesize 0, max 2

Total resends 0, ZLB ACKs sent 72

Current nosession queue check 0 of 5

Retransmit time distribution: 0 0 0 0 0 0 0 0 0

Sessions disconnected due to lack of resources 0

Tunnel id 44186 is up, remote id is 54217, 1 active sessions

Tunnel state is established, time since change 00:12:08

Tunnel transport is IP (115)

Remote tunnel name is R2

Internet Address 2.2.2.1, port 0

Local tunnel name is R2

Internet Address 2.2.2.6, port 0

Tunnel domain is

VPDN group for tunnel is -

L2TP class for tunnel is R2signal

87 packets sent, 88 received

11092 bytes sent, 10086 received

Control Ns 74, Nr 76

Local RWS 1024 (default), Remote RWS 1024 (max)

Tunnel PMTU checking disabled

Retransmission time 1, max 1 seconds

Unsent queuesize 0, max 0

Resend queuesize 0, max 1

Total resends 0, ZLB ACKs sent 74

Current nosession queue check 0 of 5

Retransmit time distribution: 0 0 0 0 0 0 0 0 0

Sessions disconnected due to lack of resources 0

Tunnel id 24124 is up, remote id is 48735, 1 active sessions

Tunnel state is established, time since change 00:11:00

Tunnel transport is IP (115)

Remote tunnel name is R3

Internet Address 3.3.3.3, port 0

Local tunnel name is R2

Internet Address 2.2.2.2, port 0

Tunnel domain is

VPDN group for tunnel is -

L2TP class for tunnel is R2signal

155 packets sent, 158 received

15230 bytes sent, 17586 received

Control Ns 69, Nr 67

Local RWS 1024 (default), Remote RWS 1024 (max)

Tunnel PMTU checking disabled

Retransmission time 1, max 1 seconds

Unsent queuesize 0, max 0

Resend queuesize 0, max 2

Total resends 1, ZLB ACKs sent 65

Current nosession queue check 0 of 5

Retransmit time distribution: 0 0 1 0 0 0 0 0 0

Sessions disconnected due to lack of resources 0

R3# show l2tun tunnel all

Tunnel Information Total tunnels 1 sessions 1

Tunnel id 48735 is up, remote id is 24124, 1 active sessions

Tunnel state is established, time since change 00:12:36

Tunnel transport is IP (115)

Remote tunnel name is R2

Internet Address 2.2.2.2, port 0

Local tunnel name is R3

Internet Address 3.3.3.3, port 0

Tunnel domain is

VPDN group for tunnel is -

L2TP class for tunnel is R3signal

180 packets sent, 176 received

19766 bytes sent, 17316 received

Control Ns 77, Nr 79

Local RWS 1024 (default), Remote RWS 1024 (max)

Tunnel PMTU checking disabled

Retransmission time 1, max 1 seconds

Unsent queuesize 0, max 0

Resend queuesize 0, max 1

Total resends 1, ZLB ACKs sent 78

Current nosession queue check 0 of 5

Retransmit time distribution: 0 0 1 0 0 0 0 0 0

Sessions disconnected due to lack of resources 0

- show l2tun جلسة all—لعرض الحالة الحالية لجلسة عمل الطبقة 2 وعرض معلومات البروتوكول حول قناة التحكم L2TPv3، أستخدم الأمر show l2tun جلسة all في وضع EXEC.

R2# show l2tun session all

Session Information Total tunnels 3 sessions 3

Session id 19996 is up, tunnel id 54217

Call serial number is 1492400000

Remote tunnel name is R2

Internet address is 2.2.2.6

Session is L2TP signalled

Session state is established, time since change 00:15:37

112 Packets sent, 111 received

12309 Bytes sent, 13312 received

Receive packets dropped:

out-of-order: 0

total: 0

Send packets dropped:

exceeded session MTU: 0

total: 0

Session vcid is 16

Session Layer 2 circuit, type is Ethernet, name is Ethernet0/0

Circuit state is UP

Remote session id is 19999, remote tunnel id 44186

DF bit on, ToS reflect disabled, ToS value 0, TTL value 255

Session cookie information:

local cookie, size 8 bytes, value 6E 47 8C 4A BA BF 7E A4

remote cookie, size 8 bytes, value 7F 9F 65 C4 C7 5B 57 FF

FS cached header information:

encap size = 32 bytes

00000000 00000000 00000000 00000000

00000000 00000000 00000000 00000000

Sequencing is off

Session id 19999 is up, tunnel id 44186

Call serial number is 1492400000

Remote tunnel name is R2

Internet address is 2.2.2.1

Session is L2TP signalled

Session state is established, time since change 00:15:38

111 Packets sent, 112 received

13312 Bytes sent, 12309 received

Receive packets dropped:

out-of-order: 0

total: 0

Send packets dropped:

exceeded session MTU: 0

total: 0

Session vcid is 16

Session Layer 2 circuit, type is Ethernet, name is Ethernet3/0

Circuit state is UP

Remote session id is 19996, remote tunnel id 54217

DF bit on, ToS reflect disabled, ToS value 0, TTL value 255

Session cookie information:

local cookie, size 8 bytes, value 7F 9F 65 C4 C7 5B 57 FF

remote cookie, size 8 bytes, value 6E 47 8C 4A BA BF 7E A4

FS cached header information:

encap size = 32 bytes

00000000 00000000 00000000 00000000

00000000 00000000 00000000 00000000

Sequencing is off

Session id 20005 is up, tunnel id 24124

Call serial number is 1492400002

Remote tunnel name is R3

Internet address is 3.3.3.3

Session is L2TP signalled

Session state is established, time since change 00:14:29

200 Packets sent, 204 received

19650 Bytes sent, 22100 received

Receive packets dropped:

out-of-order: 0

total: 0

Send packets dropped:

exceeded session MTU: 0

total: 0

Session vcid is 12

Session Layer 2 circuit, type is Ethernet, name is Ethernet2/0

Circuit state is UP

Remote session id is 17834, remote tunnel id 48735

DF bit on, ToS reflect disabled, ToS value 0, TTL value 255

Session cookie information:

local cookie, size 8 bytes, value 22 09 F1 E9 BC 8C 00 94

remote cookie, size 8 bytes, value 39 DD CB 00 9C 4B 1C 8C

FS cached header information:

encap size = 32 bytes

00000000 00000000 00000000 00000000

00000000 00000000 00000000 00000000

Sequencing is off

R3# show l2tun session all

Session Information Total tunnels 1 sessions 1

Session id 17834 is up, tunnel id 48735

Call serial number is 1492400002

Remote tunnel name is R2

Internet address is 2.2.2.2

Session is L2TP signalled

Session state is established, time since change 00:23:53

327 Packets sent, 322 received

33758 Bytes sent, 31248 received

Receive packets dropped:

out-of-order: 0

total: 0

Send packets dropped:

exceeded session MTU: 0

total: 0

Session vcid is 12

Session Layer 2 circuit, type is Ethernet, name is Ethernet1/0

Circuit state is UP

Remote session id is 20005, remote tunnel id 24124

DF bit on, ToS reflect disabled, ToS value 0, TTL value 255

Session cookie information:

local cookie, size 8 bytes, value 39 DD CB 00 9C 4B 1C 8C

remote cookie, size 8 bytes, value 22 09 F1 E9 BC 8C 00 94

FS cached header information:

encap size = 32 bytes

00000000 00000000 00000000 00000000

00000000 00000000 00000000 00000000

Sequencing is off

استكشاف الأخطاء وإصلاحها

يوفر هذا القسم معلومات يمكنك استخدامها لاستكشاف أخطاء التكوين وإصلاحها.

يمكنك إستخدام مجموعة أدوات الأخطاء (العملاء المسجلون فقط) للحصول على مزيد من المعلومات حول الأخطاء المتعلقة بميزة L2TPv3 هذه:

- CSCdz01467 (العملاء المسجلون فقط) — تم الحل (R) L2TPv3: عداد حزمة النفق، يعرض عددا غير دقيق.

- CSCeb56061 (العملاء المسجلون فقط) — تم الحل (R) L2TPv3: L2TPv3oETH يقوم بإنشاء أنفاق زومبي.

- CSCeb35497 (العملاء المسجلون فقط) — تم حل (R) تسلسل L2TPv3: لا يلتف Tx Seqnum إلى 1 بعد 16777215.

- CSCdz48481 (العملاء المسجلون فقط) — تم حل (R) تكوين إعادة توجيه L2TPv3 لم يعد مدعوما.

- CSCec00463 (العملاء المسجلون فقط) — تم الحل (R) L2TPv3: فشل وضع منفذ Gig Ethernet

- CSCec44356 (العملاء المسجلون فقط) — تم الحل (R) C10720: تم كسر عملية مطابقة 802.1P في L2TPv3.

معلومات ذات صلة

- صفحة دعم بروتوكولات IP المُوجَّهة

- صفحة دعم توجيه IP

- الدعم الفني - Cisco Systems