المحتويات

المقدمة

المتطلبات الأساسية

المتطلبات

المكونات المستخدمة

تجاور نظام وسيط إلى نظام وسيط (IS) مع ميزة Down

محاذاة ISIS (غير المرتبطة بعدم تطابق MTU)

عدم إستقرار تجاور IS-IS

تجاور IS-IS غير مستقر (جرات عشوائية)

المقدمة

يصف هذا وثيقة كيف أن يتحرى IS-IS بروتوكول ل cisco IOS® XE منصة.

المتطلبات الأساسية

المتطلبات

توصي Cisco بأن تكون لديك معرفة بالمواضيع التالية:

- بروتوكول النظام الوسيط إلى النظام الوسيط (IS-IS)

- IOS XE من Cisco

لمزيد من المعلومات حول هذه الموضوعات، راجع:

- توجيه IP: دليل تكوين ISIS

- تكوين تجاور IS-IS وأنواع المنطقة

المكونات المستخدمة

تستند المعلومات الواردة في هذا المستند إلى برنامج Cisco IOS XE.

تم إنشاء المعلومات الواردة في هذا المستند من الأجهزة الموجودة في بيئة معملية خاصة. بدأت جميع الأجهزة المُستخدمة في هذا المستند بتكوين ممسوح (افتراضي). إذا كانت شبكتك قيد التشغيل، فتأكد من فهمك للتأثير المحتمل لأي أمر.

تجاور نظام وسيط إلى نظام وسيط (IS) مع ميزة Down

يوفر هذا القسم حلا للمشكلة الشائعة لتعطل نظام وسيط إلى نظام وسيط (IS-IS). يتم إستخدام هذا الرسم التخطيطي للشبكة كمثال:

طبولوجيا الأساس

IS-IS معطل بين DeviceA و DeviceB.

DeviceA#show isis neighbors detail

System Id       Type Interface     IP Address      State Holdtime Circuit Id

DeviceA#

DeviceB#show isis neighbors detail

System Id       Type Interface     IP Address      State Holdtime Circuit Id

DeviceA         L1L2 Twe1/0/9      192.0.2.1       DOWN  28       05

Area Address(es): 49.0001

SNPA: a84f.b1c3.9484

State Changed: never

Format: Phase V

Remote TID: 0

Local TID:  0

Interface name: TwentyFiveGigE1/0/9

Neighbor Circuit Id: 5

Adj sync: Full

تشخيص المشكلة:

1. التحقق من صحة الاتصال بين الأجهزة.

DeviceA#ping 192.0.2.2 size 1500  df-bit

Type escape sequence to abort.

Sending 5, 1500-byte ICMP Echos to 192.0.2.2, timeout is 2 seconds:

Packet sent with the DF bit set

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/1/1 ms

DeviceA#

DeviceB#ping 192.0.2.1 size 1500  df-bit

Type escape sequence to abort.

Sending 5, 1500-byte ICMP Echos to 192.0.2.1, timeout is 2 seconds:

Packet sent with the DF bit set

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/1/1 ms

DeviceB#

2. مراجعة التكوين على كلا الجانبين.

DeviceA#show running-config | sec router isis

ip router isis

router isis

net 49.0001.0000.0000.000a.00

DeviceA#

DeviceB#show running-config | sec router isis

ip router isis

router isis

net 49.0001.0000.0000.000b.00

DeviceB#

3. التحقق من صحة ما إذا كان التجاور في خدمة الشبكة غير المتصلة (CLNS). يقدم ذلك ملخصا للجيران المتصلين بجهازك.

DeviceA#show clns neighbors  detail

System Id       Interface     SNPA                State  Holdtime  Type Protocol

0000.0000.000B  Te0/0/4       6c31.0edb.3b5f      Up     257       IS   ES-IS

Area Address(es): 49.0001

Uptime: 02:02:11

Interface name: TenGigabitEthernet0/0/4

DeviceA#

DeviceB#show clns neighbors  detail

System Id       Interface     SNPA                State  Holdtime  Type Protocol

0000.0000.000A  Twe1/0/9      a84f.b1c3.9484      Down   20        L1L2 IS-IS

Area Address(es): 49.0001

IP Address(es):  192.0.2.1*

Uptime: 02:02:09

NSF capable

Interface name: TwentyFiveGigE1/0/9

DeviceB#

عناوين MAC المدرجة على كل جارة CLNS هي عناوين MAC الخاصة بالأجهزة البعيدة والتي تتوافق مع الجهاز المحلي.

DeviceA#show interface TenGigabitEthernet0/0/4

TenGigabitEthernet0/0/4 is up, line protocol is up

Hardware is 8xSFP+, address is a84f.b1c3.9484 (bia a84f.b1c3.9484) < mac address appeared on SNPA DeviceB

Internet address is 192.0.2.1/30

MTU 1500 bytes, BW 10000000 Kbit/sec, DLY 10 usec,

reliability 255/255, txload 1/255, rxload 1/255

DeviceB#show interface TwentyFiveGigE1/0/9

TwentyFiveGigE1/0/9 is up, line protocol is up (connected)

Hardware is Twenty Five Gigabit Ethernet, address is 6c31.0edb.3b5f (bia 6c31.0edb.3b5f) < mac address appeared on SNPA DeviceA

Internet address is 192.0.2.2/30

MTU 9216 bytes, BW 10000000 Kbit/sec, DLY 10 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, loopback not set

4. قم بتشغيل الأمرshow clns interface

للتحقق من صحة تطابق المعلمات مع النظير.

تأكد من مطابقة هذه القيم:

- وحدة الإرسال القصوى (MTU)

- نوع الدائرة

DeviceA

DeviceA#show clns interface TenGigabitEthernet0/0/4

TenGigabitEthernet0/0/4 is up, line protocol is up

Attached to: isis

Checksums enabled, MTU 1497, Encapsulation SAP

ERPDUs enabled, min. interval 10 msec.

CLNS fast switching disabled

CLNS SSE switching disabled

DEC compatibility mode OFF for this interface

Next ESH/ISH in 19 seconds

Routing Protocol: IS-IS

Circuit Type: level-1-2

Interface number 0x0, local circuit ID 0x5

Neighbor Extended Local Circuit ID: 0x0

Level-1 Metric: 10, Priority: 64, Circuit ID: DeviceA.05

Level-1 IPv6 Metric: 10

Number of active level-1 adjacencies: 0

Level-2 Metric: 10, Priority: 64, Circuit ID: DeviceA.05

Level-2 IPv6 Metric: 10

Number of active level-2 adjacencies: 0

Next IS-IS Hello in 908 milliseconds

if state DOWN

DeviceB

DeviceB#show clns interface TwentyFiveGigE1/0/9

TwentyFiveGigE1/0/9 is up, line protocol is up

Attached to: isis

Checksums enabled, MTU 9213, Encapsulation SAP

ERPDUs enabled, min. interval 10 msec.

CLNS fast switching disabled

CLNS SSE switching disabled

DEC compatibility mode OFF for this interface

Next ESH/ISH in 8 seconds

Routing Protocol: IS-IS

Circuit Type: level-1-2

Interface number 0x0, local circuit ID 0xB

Neighbor Extended Local Circuit ID: 0x5

Neighbor System-ID: 0000.0000.000A

P2P retransmit queue size: 0

Level-1 Metric: 10, Priority: 64, Circuit ID: DeviceB.0B

Level-1 IPv6 Metric: 10

Number of active level-1 adjacencies: 0

Level-2 Metric: 10, Priority: 64, Circuit ID: DeviceB.0B

Level-2 IPv6 Metric: 10

Number of active level-2 adjacencies: 0

Next IS-IS Hello in 2 seconds

if state INIT

في هذا السيناريو، تتعلق المشكلة بعدم تطابق MTU. إذا لم يكن النظير البعيد يمكن الوصول إليه، يمكن أن debug isis adj-packets

يعرض قيمة MTU التي يتم إرسالها واستقبالها.

ملاحظة: يطبق هذا فقط عندما show clns interfaceيطبع الأمر if state INIT.

DeviceA#debug isis adj-packets TenGigabitEthernet 0/0/4

IS-IS Adjacency related packets debugging is on for router process null

*Jul 18 23:24:16.598: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0x0 Length:5

*Jul 18 23:24:16.599: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:DOWN, length 1496 < MTU sent to the neighbor >

*Jul 18 23:24:25.189: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0x0 Length:5

*Jul 18 23:24:25.189: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:DOWN, length 1496

*Jul 18 23:24:34.057: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0x0 Length:5

*Jul 18 23:24:34.057: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:DOWN, length 1496

*Jul 18 23:24:42.866: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0x0 Length:5

*Jul 18 23:24:42.866: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:DOWN, length 1496

*Jul 18 23:24:51.646: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0x0 Length:5

*Jul 18 23:24:51.646: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:DOWN, length 1496

*Jul 18 23:24:59.606: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0x0 Length:5

*Jul 18 23:24:59.606: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:DOWN, length 1496

DeviceB#debug isis adj-packets twentyFiveGigE 1/0/9

*Jul 18 23:53:22.420: ISIS-Adj: Sending serial IIH on TwentyFiveGigE1/0/9, 3way state:INIT, length 9212  < MTU sent to the neighbor >

*Jul 18 23:53:22.591: ISIS-Adj: Rec serial IIH from a84f.b1c3.9484 (TwentyFiveGigE1/0/9)

*Jul 18 23:53:22.591: ISIS-Adj: cir type L1L2, cir id 05, length 1496   < MTU received from neighbor >

*Jul 18 23:53:22.592: ISIS-Adj: rcvd state DOWN, old state INIT, new state INIT, nbr usable TRUE

*Jul 18 23:53:22.592: ISIS-Adj: RCV:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0x49000184 Length:5

*Jul 18 23:53:22.592: ISIS-Adj: Nghbr Ckt ID changed: FALSE

*Jul 18 23:53:22.592: ISIS-Adj: newstate:1, state_changed:0, going_up:0, going_down:0

*Jul 18 23:53:22.592: ISIS-Adj: Action = ACCEPT

*Jul 18 23:53:22.592: ISIS-Adj: ACTION_ACCEPT:

...

محاذاة ISIS (غير المرتبطة بعدم تطابق MTU)

نظام وسيط إلى نظام وسيط (IS-IS) معطل وتطابقات وحدة الحد الأقصى للنقل (MTU) على الواجهات.

DeviceA#show clns neighbors

System Id       Interface     SNPA                State  Holdtime  Type Protocol

DeviceA#

DeviceB#show clns neighbors

System Id       Interface     SNPA                State  Holdtime  Type Protocol

DeviceB#

1. تحقق من صحة التكوين المطابق للنظير.

2. ضمنت أن القارن طبيعي في حالة جيدة أن يبث (ما من خطأ أو خفيف مستوى مشكلة).

3. تحقق من الاتصال بين النظراء (إختبار إختبار الاتصال إضافة حجم وحدة الحد الأقصى للنقل (MTU) وبت DF).

4. التحقق من صحة جيران CLNS بين النظراء.

5. تأكد من أن لكلا الطرفين نفس وحدة الحد الأقصى للنقل (MTU) ونفس نوع الدائرة مع الدولة.

DeviceA

DeviceA#show clns interface TenGigabitEthernet 0/0/4

TenGigabitEthernet0/0/4 is up, line protocol is up

Attached to: isis

Checksums enabled, MTU 1497, Encapsulation SAP

ERPDUs enabled, min. interval 10 msec.

CLNS fast switching disabled

CLNS SSE switching disabled

DEC compatibility mode OFF for this interface

Next ESH/ISH in 41 seconds

Routing Protocol: IS-IS

Circuit Type: level-1-2

Interface number 0x0, local circuit ID 0x5

Neighbor Extended Local Circuit ID: 0x0

Level-1 Metric: 10, Priority: 64, Circuit ID: DeviceA.05

Level-1 IPv6 Metric: 10

Number of active level-1 adjacencies: 0

Level-2 Metric: 10, Priority: 64, Circuit ID: DeviceA.05

Level-2 IPv6 Metric: 10

Number of active level-2 adjacencies: 0

Next IS-IS Hello in 2 seconds

if state DOWN

DeviceB

DeviceB#show clns interface twentyFiveGigE 1/0/9

TwentyFiveGigE1/0/9 is up, line protocol is up

Attached to: isis

Checksums enabled, MTU 1497, Encapsulation SAP

ERPDUs enabled, min. interval 10 msec.

CLNS fast switching disabled

CLNS SSE switching disabled

DEC compatibility mode OFF for this interface

Next ESH/ISH in 42 seconds

Routing Protocol: IS-IS

Circuit Type: level-1-2

Interface number 0x0, local circuit ID 0xB

Neighbor Extended Local Circuit ID: 0x0

P2P retransmit queue size: 0

Level-1 Metric: 10, Priority: 64, Circuit ID: DeviceB.0B

Level-1 IPv6 Metric: 10

Number of active level-1 adjacencies: 0

Level-2 Metric: 10, Priority: 64, Circuit ID: DeviceB.0B

Level-2 IPv6 Metric: 10

Number of active level-2 adjacencies: 0

Next IS-IS Hello in 5 seconds

if state DOWN

6. قم بتمكين debug isis adj-packet

الحزم التي يتم إرسالها واستقبالها والتحقق من صحتها.

DeviceA#debug isis adj-packets TenGigabitEthernet 0/0/4

IS-IS Adjacency related packets debugging is on for router process null

*Jul 19 13:32:52.788: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0x0 Length:5

*Jul 19 13:32:52.788: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:DOWN, length 1496

*Jul 19 13:33:00.708: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0x0 Length:5

*Jul 19 13:33:00.709: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:DOWN, length 1496

*Jul 19 13:33:09.726: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0x0 Length:5

*Jul 19 13:33:09.726: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:DOWN, length 1496

*Jul 19 13:33:18.376: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0x0 Length:5

*Jul 19 13:33:18.376: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:DOWN, length 1496

*Jul 19 13:33:26.132: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0x0 Length:5

*Jul 19 13:33:26.132: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:DOWN, length 1496

DeviceA#

DeviceB#debug isis adj-packets TwentyFiveGigE1/0/9

IS-IS Adjacency related packets debugging is on for router process null

*Jul 19 14:01:32.125: ISIS-Adj: SND:3way Adj. Local Ckt ID:0xB Nghbr Ckt ID:0x0 Length:5

*Jul 19 14:01:32.125: ISIS-Adj: Sending serial IIH on TwentyFiveGigE1/0/9, 3way state:DOWN, length 1496

*Jul 19 14:01:40.005: ISIS-Adj: SND:3way Adj. Local Ckt ID:0xB Nghbr Ckt ID:0x0 Length:5

*Jul 19 14:01:40.005: ISIS-Adj: Sending serial IIH on TwentyFiveGigE1/0/9, 3way state:DOWN, length 1496

*Jul 19 14:01:49.602: ISIS-Adj: SND:3way Adj. Local Ckt ID:0xB Nghbr Ckt ID:0x0 Length:5

*Jul 19 14:01:49.602: ISIS-Adj: Sending serial IIH on TwentyFiveGigE1/0/9, 3way state:DOWN, length 1496

*Jul 19 14:01:58.284: ISIS-Adj: SND:3way Adj. Local Ckt ID:0xB Nghbr Ckt ID:0x0 Length:5

*Jul 19 14:01:58.284: ISIS-Adj: Sending serial IIH on TwentyFiveGigE1/0/9, 3way state:DOWN, length 1496

يتم إرسال كلا الجهازين، ولكنهما لا يتلقيان حزمة "مرحبا" من جيرانهما.

7. قم بتمكين الالتقاط للتحقق من إرسال الحزم إلى كل جار. بمجرد اكتمال عملية الالتقاط، قم بتصديره إلى ذاكرة Bootflash (الذاكرة المؤقتة) أو الذاكرة المؤقتة (flash) على.pcap file هيئة وتحميله إلى خادم TFTP للحصول على مزيد من التفاصيل.

DeviceA#show monitor cap cap parameter

monitor capture cap interface TenGigabitEthernet0/0/4 BOTH < Interface from where send and receive the Hello Packets >

monitor capture cap control-plane IN  < Packets to be process and generated by the CPU >

monitor capture cap access-list TAC  < ACL for capture only the IS-IS packets >

monitor capture cap buffer size 10

monitor capture cap limit pps 1000

DeviceA#show access-list TAC

Extended MAC access list TAC

permit host a84f.b1c3.9484 host 0900.2b00.0005  < Local MAC address towards the IS-IS Hello >

permit host 6c31.0edb.3b5f host 0900.2b00.0005  < Remote MAC address towards the IS-IS Hello >

DeviceB#show monitor capture cap parameter

monitor capture cap interface TwentyFiveGigE1/0/9 BOTH < Interface from where send and receive the Hello Packets >

monitor capture cap control-plane BOTH < Packets to be process and generated by the CPU >

monitor capture cap match any < match all the packets on the switch >

monitor capture cap buffer size 10

ملاحظة: على قبض EPC في مادة حفازة cisco IOS XE مفتاح فقط خارج IS-IS ولا على المدخل ربط. كبديل، فسحة بين دعامتين يستحسن التقاط.

يتم عرض مرجع إلى حزم Hello في هذا الجدول.

الاسم

غاية ماك عنوان

جميع ملحقات L1 IS

0180٫c200٫0014

جميع ملقمات L2

0180٫c200٫0015

كل ISs

0900.2b00.005

كافة ESs

0900.2b00.004

8. راجع التسجيل المصدر وتأكد من تبادل حزم مرحبا بين الجيران.

يرسل DeviceA حزم HELLO التي تضيف معرف النظام (المربع الأحمر) الخاص بها. من المتوقع أن يستلم حزمة من جاره بمعرف النظام الخاص به. في هذا الالتقاط، يمكنك تقدير أن DeviceB لا يرسل هذه الحزم إلى النظير.

DeviceA ISIS Down Capture

يظهر التقاط DeviceB أن حزم الترحيب يتم إرسالها إلى جارتها (المربع الأحمر). ومع ذلك، وكما هو الحال في الالتقاط الأخير، فإنه لا يستقبل حزم Hello من جاره.

DeviceB ISIS Down Capture

ترجع المشكلة في هذا سيناريو إلى جهاز متوسط لا يسمح بإرسال حزم الترحيب. إن يلاحظ أنت حالة مماثلة ويحتاج أن يتحرى أكثر، افتح حالة Cisco TAC.

عدم إستقرار تجاور IS-IS

يوفر هذا القسم حلا للمشكلة الشائعة لجرافات IS-IS.

تشخيص المشكلة:

IS-IS غير مستقر بين DeviceA و DeviceB.

DeviceA#show logging

Jul 19 15:05:03.623: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceB (TenGigabitEthernet0/0/4) Down, hold time expired

Jul 19 15:05:15.075: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceB (TenGigabitEthernet0/0/4) Up, new adjacency

Jul 19 15:07:04.575: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceB (TenGigabitEthernet0/0/4) Down, hold time expired

Jul 19 15:07:15.759: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceB (TenGigabitEthernet0/0/4) Up, new adjacency

Jul 19 15:09:04.983: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceB (TenGigabitEthernet0/0/4) Down, hold time expired

Jul 19 15:09:14.835: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceB (TenGigabitEthernet0/0/4) Up, new adjacency

DeviceB#show logging

Jul 19 15:05:02.316: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceA (TwentyFiveGigE1/0/9) Down, hold time expired

Jul 19 15:05:18.191: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceA (TwentyFiveGigE1/0/9) Up, new adjacency

Jul 19 15:07:09.280: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceA (TwentyFiveGigE1/0/9) Down, hold time expired

Jul 19 15:07:18.876: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceA (TwentyFiveGigE1/0/9) Up, new adjacency

Jul 19 15:09:06.080: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceA (TwentyFiveGigE1/0/9) Down, hold time expired!

Jul 19 15:09:17.948: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceA (TwentyFiveGigE1/0/9) Up, new adjacency

1. تحقق من الاتصال بين النظراء (إختبار إختبار الاتصال مع حجم MTU ومجموعة بت DF).

2. تأكد من أن الواجهة المادية في حالة جيدة للإرسال (لا توجد أخطاء أو مشاكل في مستويات الضوء).

3. تحقق من أن جيران CLNS يقومون بإرسال حركة مرور البيانات إلى بعضهم البعض باستخدام الأمر show clns traffic interface

.

DeviceA#show clns traffic interface TenGigabitEthernet0/0/4

CLNS:  Time since last clear: 00:01:57

CLNS & ESIS Output: 3, Input: 21

Dropped Protocol not enabled on interface: 0

CLNS Local: 0, Forward: 0

Interface TenGigabitEthernet0/0/4:

IS-IS: Time since last clear: 00:01:57

IS-IS: Level-1 Hellos (sent/rcvd): 0/0

IS-IS: Level-2 Hellos (sent/rcvd): 0/0

IS-IS: PTP Hellos     (sent/rcvd): 15/11  < DeviceA sends hello packets and receives less than its sends>

IS-IS: Level-1 LSPs flooded (sent/rcvd): 2/2

IS-IS: Level-2 LSPs flooded (sent/rcvd): 2/2

IS-IS: Level-1 CSNPs (sent/rcvd): 1/1

IS-IS: Level-2 CSNPs (sent/rcvd): 1/1

IS-IS: Level-1 PSNPs (sent/rcvd): 1/1

IS-IS: Level-2 PSNPs (sent/rcvd): 1/1

IS-IS: Level-1 DR Elections: 0

IS-IS: Level-2 DR Elections: 0

DeviceB#show clns traffic interface TwentyFiveGigE1/0/9

CLNS:  Time since last clear: 00:00:27

CLNS queue depth: 0/100, drops: 0, highest: 2

CLNS & ESIS Output: 1, Input: 14

Dropped Protocol not enabled on interface: 0

CLNS Local: 0, Forward: 0

Interface TwentyFiveGigE1/0/9:

IS-IS: Time since last clear: 00:00:27

IS-IS: Level-1 Hellos (sent/rcvd): 0/0

IS-IS: Level-2 Hellos (sent/rcvd): 0/0

IS-IS: PTP Hellos     (sent/rcvd): 4/5  < DeviceB, sends and receives a couple of hellos in comparison with DeviceA>

IS-IS: Level-1 LSPs flooded (sent/rcvd): 2/2

IS-IS: Level-2 LSPs flooded (sent/rcvd): 2/2

IS-IS: Level-1 CSNPs (sent/rcvd): 1/1

IS-IS: Level-2 CSNPs (sent/rcvd): 1/1

IS-IS: Level-1 PSNPs (sent/rcvd): 1/1

IS-IS: Level-2 PSNPs (sent/rcvd): 1/1

IS-IS: Level-1 DR Elections: 0

IS-IS: Level-2 DR Elections: 0

تلميح: يعرض الأمرclns trafficعلامة IS-IS استنادا إلى مستوى IS-IS ونوع شبكة IS-IS.

4. مكن debug ISIS adj-packets

in order to رأيت أي ربط يتم تبادلها بين الجيران.

DeviceA#show isis adj-packets TenGigabitEthernet0/0/4

<  Hellos sent to the DeviceB with no response >

Jul 19 18:58:34.779: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0xB Length:15

Jul 19 18:58:34.779: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:UP, length 1496

Jul 19 18:58:42.719: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0xB Length:15

Jul 19 18:58:42.719: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:UP, length 1496

Jul 19 18:58:50.430: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0xB Length:15

Jul 19 18:58:50.430: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:UP, length 1496

Jul 19 18:58:58.356: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0xB Length:15

Jul 19 18:58:58.356: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:UP, length 1496

< IS-IS declares the protocol down >

Jul 19 18:59:01.879: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceB (TenGigabitEthernet0/0/4) Down, hold time expired

< IS-IS sends hellos to the neighbor and receives a response from DeviceB >

Jul 19 18:59:01.879: ISIS-Adj: L2 adj count 0

Jul 19 18:59:07.724: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0x0 Length:5

Jul 19 18:59:07.724: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:DOWN, length 1496

Jul 19 18:59:15.894: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0x0 Length:5

Jul 19 18:59:15.894: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:DOWN, length 1496

Jul 19 18:59:15.896: ISIS-Adj: Rec serial IIH from 6c31.0edb.3b5f (TenGigabitEthernet0/0/4)

Jul 19 18:59:15.896: ISIS-Adj: cir type L2, cir id 0B, length 1496

Jul 19 18:59:15.896: ISIS-Adj: RCV:3way Adj. Local Ckt ID:0xB Nghbr Ckt ID:0x5 Length:15

Jul 19 18:59:15.896: ISIS-Adj: Nghbr Ckt ID changed: TRUE

Jul 19 18:59:15.896: ISIS-Adj: received Neighbor System-ID (must be our) 0000.0000.000A

Jul 19 18:59:15.896: ISIS-Adj: received Neighbor ext.circuit ID (must be our) 0x5

Jul 19 18:59:15.896: ISIS-Adj: newstate:1, state_changed:1, going_up:0, going_down:0

Jul 19 18:59:15.896: ISIS-Adj: Action = GOING UP, new type = L2

< DeviceA declares that the adjacency is UP and starts to establish the session >

Jul 19 18:59:15.896: ISIS-Adj: New serial adjacency

Jul 19 18:59:15.896: ISIS-Adj: rcvd state INIT, old state DOWN, new state INIT, nbr usable TRUE

Jul 19 18:59:15.898: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0xB Length:15

Jul 19 18:59:15.898: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:INIT, length 1496

Jul 19 18:59:15.900: ISIS-Adj: Rec serial IIH from 6c31.0edb.3b5f (TenGigabitEthernet0/0/4)

Jul 19 18:59:15.900: ISIS-Adj: cir type L2, cir id 0B, length 1496

Jul 19 18:59:15.900: ISIS-Adj: rcvd state UP, old state INIT, new state UP, nbr usable TRUE

Jul 19 18:59:15.900: ISIS-Adj: RCV:3way Adj. Local Ckt ID:0xB Nghbr Ckt ID:0x5 Length:15

Jul 19 18:59:15.900: ISIS-Adj: Nghbr Ckt ID changed: FALSE

Jul 19 18:59:15.900: ISIS-Adj: received Neighbor System-ID (must be our) 0000.0000.000A

Jul 19 18:59:15.900: ISIS-Adj: received Neighbor ext.circuit ID (must be our) 0x5

Jul 19 18:59:15.900: ISIS-Adj: newstate:0, state_changed:1, going_up:1, going_down:0

Jul 19 18:59:15.900: ISIS-Adj: Action = GOING UP, new type = L2

Jul 19 18:59:15.900: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceB (TenGigabitEthernet0/0/4) Up, new adjacency

DeviceB#debug isis adj-packets TwentyFiveGigE1/0/9

<  Hello sent to the DeviceA with no response >

Jul 19 18:58:44.105: ISIS-Adj: SND:3way Adj. Local Ckt ID:0xB Nghbr Ckt ID:0x5 Length:15

Jul 19 18:58:44.105: ISIS-Adj: Sending serial IIH on TwentyFiveGigE1/0/9, 3way state:UP, length 1496

Jul 19 18:58:51.814: ISIS-Adj: SND:3way Adj. Local Ckt ID:0xB Nghbr Ckt ID:0x5 Length:15

Jul 19 18:58:51.814: ISIS-Adj: Sending serial IIH on TwentyFiveGigE1/0/9, 3way state:UP, length 1496

Jul 19 18:58:59.768: ISIS-Adj: SND:3way Adj. Local Ckt ID:0xB Nghbr Ckt ID:0x5 Length:15

Jul 19 18:58:59.768: ISIS-Adj: Sending serial IIH on TwentyFiveGigE1/0/9, 3way state:UP, length 1496

< IS-IS declares the protocol down >

Jul 19 18:59:07.886: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceA (TwentyFiveGigE1/0/9) Down, hold time expired

< IS-IS sends hellos to the neighbor and receives a response from DeviceA >

Jul 19 18:59:07.887: ISIS-Adj: L2 adj count 0

Jul 19 18:59:08.422: ISIS-Adj: SND:3way Adj. Local Ckt ID:0xB Nghbr Ckt ID:0x0 Length:5

Jul 19 18:59:08.422: ISIS-Adj: Sending serial IIH on TwentyFiveGigE1/0/9, 3way state:DOWN, length 1496

Jul 19 18:59:16.144: ISIS-Adj: SND:3way Adj. Local Ckt ID:0xB Nghbr Ckt ID:0x0 Length:5

Jul 19 18:59:16.144: ISIS-Adj: Sending serial IIH on TwentyFiveGigE1/0/9, 3way state:DOWN, length 1496

Jul 19 18:59:19.001: ISIS-Adj: Rec serial IIH from a84f.b1c3.9484 (TwentyFiveGigE1/0/9)

Jul 19 18:59:19.001: ISIS-Adj: cir type L2, cir id 05, length 1496

Jul 19 18:59:19.001: ISIS-Adj: RCV:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0x49000184 Length:5

Jul 19 18:59:19.001: ISIS-Adj: Nghbr Ckt ID changed: TRUE

Jul 19 18:59:19.001: ISIS-Adj: newstate:1, state_changed:1, going_up:0, going_down:0

Jul 19 18:59:19.001: ISIS-Adj: Action = GOING UP, new type = L2

< DeviceB declares that the adjacency is UP and starts to establish the session >

Jul 19 18:59:19.001: ISIS-Adj: New serial adjacency

Jul 19 18:59:19.001: ISIS-Adj: rcvd state DOWN, old state DOWN, new state INIT, nbr usable TRUE

Jul 19 18:59:19.002: ISIS-Adj: SND:3way Adj. Local Ckt ID:0xB Nghbr Ckt ID:0x5 Length:15

Jul 19 18:59:19.002: ISIS-Adj: Sending serial IIH on TwentyFiveGigE1/0/9, 3way state:INIT, length 1496

Jul 19 18:59:19.004: ISIS-Adj: Rec serial IIH from a84f.b1c3.9484 (TwentyFiveGigE1/0/9)

Jul 19 18:59:19.004: ISIS-Adj: cir type L2, cir id 05, length 1496

Jul 19 18:59:19.004: ISIS-Adj: rcvd state INIT, old state INIT, new state UP, nbr usable TRUE

Jul 19 18:59:19.004: ISIS-Adj: RCV:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0xB Length:15

Jul 19 18:59:19.004: ISIS-Adj: Nghbr Ckt ID changed: FALSE

Jul 19 18:59:19.004: ISIS-Adj: received Neighbor System-ID (must be our) 0000.0000.000B

Jul 19 18:59:19.004: ISIS-Adj: received Neighbor ext.circuit ID (must be our) 0xB

Jul 19 18:59:19.004: ISIS-Adj: newstate:0, state_changed:1, going_up:1, going_down:0

Jul 19 18:59:19.004: ISIS-Adj: Action = GOING UP, new type = L2

Jul 19 18:59:19.004: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceA (TwentyFiveGigE1/0/9) Up, new adjacency

5. قم بتمكين الالتقاط للتحقق من إرسال الحزم إلى كل جار. بمجرد اكتمال عملية الالتقاط، قم بتصدير عملية الالتقاط إلى ذاكرة التمهيد المؤقتة (bootflash) .pcap file وتحميلها إلى خادم TFTP للحصول على مزيد من التفاصيل.

يستلم DeviceA حزمة من DeviceB (19:15.05) بعد إستلام هذه الحزمة. يرسل DeviceA ترحيبه المطابق بدون أي رد من الجار حتى يصل إلى وقت الانتظار منتهي الصلاحية وهو 30 ثانية بشكل افتراضي (المربع الأحمر).

هذا عندما يعلن هذا الموجه عن التجاور أسفل. بعد هذه الفترة، يرسل DeviceB ترحيبه ويتم إستقباله بواسطة DeviceA ويتم تبادل هذه الحزم بدون مشكلة (المربع الأخضر).

جهاز غير مستقر ل ISIS

التقاط من DeviceB مماثل للعرض من النظير. لا يستقبل الجهاز حزم الترحيب من جارته. يتم إرسال الحزمة الأخيرة من DeviceB بدون رد من DeviceA حتى تصل إلى مؤقت التعليق في 30 ثانية. يأخذ هذا المفتاح في الاعتبار التجاور إلى أسفل. بعد هذا الفشل، يتلقى المفتاح التحية من DeviceA ويبدأ الجوار.

جهاز تنظيم الدولة الإسلامية غير مستقر(ب)

هذا يستنتج أن هناك مشكلة في النقل ويجب عليك مراجعة سبب فقدان الحزم.

تجاور IS-IS غير مستقر (جرات عشوائية)

IS-IS غير مستقر بين DeviceA و DeviceB. يواجه البروتوكول خطوات عشوائية.

DeviceA#show logging

Jul 21 10:03:38.633: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceB (TenGigabitEthernet0/0/4) Down, hold time expired

Jul 21 10:05:10.272: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceB (TenGigabitEthernet0/0/4) Up, new adjacency

Jul 21 10:33:41.528: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceB (TenGigabitEthernet0/0/4) Down, hold time expired

Jul 21 10:35:07.979: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceB (TenGigabitEthernet0/0/4) Up, new adjacency

Jul 21 11:03:42.442: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceB (TenGigabitEthernet0/0/4) Down, hold time expired

Jul 21 11:05:08.469: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceB (TenGigabitEthernet0/0/4) Up, new adjacency

DeviceB#show logging

Jul 21 10:03:44.535: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceA (TwentyFiveGigE1/0/9) Down, hold time expired

Jul 21 10:05:13.281: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceA (TwentyFiveGigE1/0/9) Up, new adjacency

Jul 21 10:33:38.408: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceA (TwentyFiveGigE1/0/9) Down, hold time expired

Jul 21 10:35:10.989: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceA (TwentyFiveGigE1/0/9) Up, new adjacency

Jul 21 11:03:39.291: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceA (TwentyFiveGigE1/0/9) Down, hold time expired

Jul 21 11:05:11.479: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceA (TwentyFiveGigE1/0/9) Up, new adjacency

عند حدوث المشكلة، تأكد من متابعة هذه الإجراءات:

1. تحقق من تطابق التكوين مع النظير.

2. ضمنت أن القارن طبيعي في حالة جيدة أن يبث (ما من خطأ أو خفيف مستوى مشكلة).

3. تحقق من الاتصال بين النظراء (إختبار الاتصال باستخدام حجم وحدة الحد الأقصى للنقل (MTU) ومجموعة وحدات بت DF).

تلميح: ليس من السهل أستكشاف أخطاء هذه الأنواع من المشاكل وإصلاحها بسبب حالة الجنيحات العشوائية. لحل هذه الحالة، فكر في إستخدام نصوص تنفيذية لتشغيل الأوامر الضرورية ومتابعة أستكشاف الأخطاء وإصلاحها.

4. انتقل إلى تكوين التقاط شاشة باستخدام قائمة الوصول لتكون أكثر تحديدا حول أستكشاف الأخطاء وإصلاحها.

5. قم بتعطيل وحدة تحكم التسجيل وتمكينdebug isis adj-packets

.

DeviceA(config)#no logging console

DeviceA(config)#exit

DeviceA#debug isis adj-packets TenGigabitEthernet0/0/4

6. تمكين التقاط الحزمة على الجهاز وتنشيطه.

DeviceA#show monitor capture cap parameter

monitor capture cap interface TenGigabitEthernet0/0/4 BOTH

monitor capture cap control-plane IN

monitor capture cap access-list TAC > match only the packets allowed on the ACL

monitor capture cap buffer size 100 circular > when the capture reaches the size of 100 MB this overwrite the previous information.

monitor capture cap limit pps 1000

DeviceA#show access-lists TAC

Extended MAC access list TAC

permit host a84f.b1c3.9484 host 0900.2b00.0005  < Local MAC address towards the IS-IS Hello >

permit host 6c31.0edb.3b5f host 0900.2b00.0005  < Remote MAC address towards the IS-IS Hello >

DeviceA#monitor capture cap start

7. قم بتكوين مدير الحدث المضمن (IM) على جهاز Cisco. ما إن يثير الإصدار ال syslog نقش، هذا يلد سجل أن يكون خزنت على البرق كمبرد.txt. قم بالمتابعة لتحميلها إلى خادم TFTP للحصول على مزيد من المعلومات.

DeviceA#show running-config | sec event

event manager applet ISIS_Flap authorization bypass

event syslog pattern "%CLNS-5-ADJCHANGE:.*hold time expired"

action 1.0 syslog msg "ISIS down Please wait - capturing the traffic"

action 1.1 cli command "enable"

action 1.2 cli command "show clns interface ten0/0/4 | append bootflash:ISIS_DeviceA.txt"

action 1.3 cli command "show clns traffic interface tenGigabitEthernet 0/0/4 | append bootflash:ISIS_DeviceA.txt"

action 2.0 cli command "show logging | append bootflash:debug_DeviceA.txt"

action 2.1 cli command "undebug all"

action 2.2 cli command "monitor capture cap stop"

action 3.0 cli command "end"

For switches to append the logs it is neccesary to use the append flash:

, as example:

event manager applet ISIS_Flap authorization bypass

event syslog pattern "%CLNS-5-ADJCHANGE:.*hold time expired"

action 1.0 syslog msg "ISIS down Please wait - capturing the traffic"

action 1.1 cli command "enable"

action 1.2 cli command "show clns interface ten0/0/4 | append flash:ISIS_DeviceB.txt"

action 3.0 cli command "end"

8. بمجرد أن تبدأ المشكلة، انتقل إلى تصدير الالتقاط على bootflash/flash وتأكد من.txtتخزين الملفات بشكل صحيح في نفس الموقع.

DeviceA#monitor capture cap export bootflash:ISIS_DeviceA.pcap

Exported Successfully

DeviceA#dir bootflash:*.txt

Directory of bootflash:/*.txt

Directory of bootflash:/

19  -rw-        6048  Jul 22 2023 13:33:40 +00:00  ISIS_DeviceA.txt

20  -rw-      103153  Jul 22 2023 13:33:40 +00:00  debug_DeviceA.txt

26975526912 bytes total (20527607808 bytes free)

DeviceB#monitor capture cap export location flash:ISIS_DeviceB.pcap

Exported Successfully

DeviceB#dir bootflash:*.txt

Directory of bootflash:/*.txt

Directory of bootflash:/

356939  -rw-         660  Jul 22 2023 13:33:42 +00:00  ISIS_DeviceB.txt

356943  -rw-      103283  Jul 22 2023 13:33:42 +00:00  debug_DeviceB.txt

9. قم بتحميل الملفات إلى خادم TFTP لمقارنة السجلات بين الأجهزة.

DeviceA#copy bootflash:ISIS_DeviceA.txt tftp:

Address or name of remote host []? < TFTP IP address >

Destination filename [ISIS_DeviceA.txt]?

!!

18144 bytes copied in 0.095 secs (190989 bytes/sec)

10. قارن عمليات الالتقاط والسجلات للتحقق من صحة ما إذا تم إرسال الحزم واستقبالها من كلا الموجهين.

تحليل سجلات IS-IS:

- يتم تكوين كلا واجهات IS-IS باستخدام نفس نوع الشبكة L1-L2.

- تظهر حالة الواجهات (إذا كانت الحالة أسفل) أن كلا الواجهات لا تستلم حزمة مرحبا.

- IS-IS: PTP Hellos به عدم تطابق في الحزم المرسلة والمستلمة. بينما يرسل DeviceA 205 حزم ويستلم 199 من النظير، يحتوي DeviceB على 202 من 202. وهذا يشير إلى أن النقل غير موثوق به.

DeviceA

TenGigabitEthernet0/0/4 is up, line protocol is up

Attached to: isis

Checksums enabled, MTU 1497, Encapsulation SAP

ERPDUs enabled, min. interval 10 msec.

CLNS fast switching disabled

CLNS SSE switching disabled

DEC compatibility mode OFF for this interface

Next ESH/ISH in 30 seconds

Routing Protocol: IS-IS

Circuit Type: level-1-2

Interface number 0x0, local circuit ID 0x5

Neighbor Extended Local Circuit ID: 0x0

Level-1 Metric: 10, Priority: 64, Circuit ID: DeviceA.05

Level-1 IPv6 Metric: 10

Number of active level-1 adjacencies: 0

Level-2 Metric: 10, Priority: 64, Circuit ID: DeviceA.05

Level-2 IPv6 Metric: 10

Number of active level-2 adjacencies: 0

Next IS-IS Hello in 574 milliseconds

if state DOWN

CLNS:  Time since last clear: 00:29:37

CLNS & ESIS Output: 33, Input: 241

Dropped Protocol not enabled on interface: 0

CLNS Local: 0, Forward: 0

Interface TenGigabitEthernet0/0/4:

IS-IS: Time since last clear: 00:29:37

IS-IS: Level-1 Hellos (sent/rcvd): 0/0

IS-IS: Level-2 Hellos (sent/rcvd): 0/0

IS-IS: PTP Hellos     (sent/rcvd): 205/199

IS-IS: Level-1 LSPs flooded (sent/rcvd): 2/2

IS-IS: Level-2 LSPs flooded (sent/rcvd): 2/2

IS-IS: Level-1 CSNPs (sent/rcvd): 0/0

IS-IS: Level-2 CSNPs (sent/rcvd): 0/0

IS-IS: Level-1 PSNPs (sent/rcvd): 2/2

IS-IS: Level-2 PSNPs (sent/rcvd): 2/2

IS-IS: Level-1 DR Elections: 0

IS-IS: Level-2 DR Elections: 0

DeviceB

TwentyFiveGigE1/0/9 is up, line protocol is up

Attached to: isis

Checksums enabled, MTU 1497, Encapsulation SAP

ERPDUs enabled, min. interval 10 msec.

CLNS fast switching disabled

CLNS SSE switching disabled

DEC compatibility mode OFF for this interface

Next ESH/ISH in 20 seconds

Routing Protocol: IS-IS

Circuit Type: level-1-2

Interface number 0x0, local circuit ID 0xB

Neighbor Extended Local Circuit ID: 0x0

P2P retransmit queue size: 0

Level-1 Metric: 10, Priority: 64, Circuit ID: DeviceB.0B

Level-1 IPv6 Metric: 10

Number of active level-1 adjacencies: 0

Level-2 Metric: 10, Priority: 64, Circuit ID: DeviceB.0B

Level-2 IPv6 Metric: 10

Number of active level-2 adjacencies: 0

Next IS-IS Hello in 7 seconds

if state DOWN

CLNS:  Time since last clear: 00:29:34

CLNS queue depth: 0/100, drops: 0, highest: 1

CLNS & ESIS Output: 34, Input: 243

Dropped Protocol not enabled on interface: 0

CLNS Local: 0, Forward: 0

Interface TwentyFiveGigE1/0/9:

IS-IS: Time since last clear: 00:29:34

IS-IS: Level-1 Hellos (sent/rcvd): 0/0

IS-IS: Level-2 Hellos (sent/rcvd): 0/0

IS-IS: PTP Hellos     (sent/rcvd): 202/202

IS-IS: Level-1 LSPs flooded (sent/rcvd): 2/2

IS-IS: Level-2 LSPs flooded (sent/rcvd): 2/2

IS-IS: Level-1 CSNPs (sent/rcvd): 0/0

IS-IS: Level-2 CSNPs (sent/rcvd): 0/0

IS-IS: Level-1 PSNPs (sent/rcvd): 2/2

IS-IS: Level-2 PSNPs (sent/rcvd): 2/2

IS-IS: Level-1 DR Elections: 0

IS-IS: Level-2 DR Elections: 0

تتمثل الخطوة التالية في مقارنة عمليات تصحيح الأخطاء والتقاط.

DeviceA

Jul 22 19:17:24.929: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0xB Length:15

Jul 22 19:17:24.929: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:UP, length 1496

Jul 22 19:17:31.685: ISIS-Adj: Rec serial IIH from 6c31.0edb.3b5f (TenGigabitEthernet0/0/4)

Jul 22 19:17:31.685: ISIS-Adj: cir type L1L2, cir id 0B, length 1496

Jul 22 19:17:31.685: ISIS-Adj: rcvd state UP, old state UP, new state UP, nbr usable TRUE

Jul 22 19:17:31.685: ISIS-Adj: RCV:3way Adj. Local Ckt ID:0xB Nghbr Ckt ID:0x5 Length:15

Jul 22 19:17:31.685: ISIS-Adj: Nghbr Ckt ID changed: FALSE

Jul 22 19:17:31.685: ISIS-Adj: received Neighbor System-ID (must be our) 0000.0000.000A

Jul 22 19:17:31.685: ISIS-Adj: received Neighbor ext.circuit ID (must be our) 0x5

Jul 22 19:17:31.685: ISIS-Adj: newstate:0, state_changed:0, going_up:0, going_down:0

Jul 22 19:17:31.685: ISIS-Adj: Action = ACCEPT

Jul 22 19:17:31.685: ISIS-Adj: ACTION_ACCEPT:

Jul 22 19:17:33.626: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0xB Length:15

Jul 22 19:17:33.627: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:UP, length 1496

Jul 22 19:17:42.671: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0xB Length:15

Jul 22 19:17:42.672: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:UP, length 1496

Jul 22 19:17:52.008: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0xB Length:15

Jul 22 19:17:52.008: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:UP, length 1496

Jul 22 19:18:01.475: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0xB Length:15

Jul 22 19:18:01.475: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:UP, length 1496

Jul 22 19:18:01.685: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceB (TenGigabitEthernet0/0/4) Down, hold time expired

Jul 22 19:18:01.685: ISIS-Adj: L1 adj count 0

Jul 22 19:18:01.685: ISIS-Adj: L2 adj count 0

DeviceB

Jul 22 19:17:25.693: ISIS-Adj: SND:3way Adj. Local Ckt ID:0xB Nghbr Ckt ID:0x5 Length:15

Jul 22 19:17:25.693: ISIS-Adj: Sending serial IIH on TwentyFiveGigE1/0/9, 3way state:UP, length 1496

Jul 22 19:17:27.882: ISIS-Adj: Rec serial IIH from a84f.b1c3.9484 (TwentyFiveGigE1/0/9)

Jul 22 19:17:27.882: ISIS-Adj: cir type L1L2, cir id 05, length 1496

Jul 22 19:17:27.882: ISIS-Adj: rcvd state UP, old state UP, new state UP, nbr usable TRUE

Jul 22 19:17:27.882: ISIS-Adj: RCV:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0xB Length:15

Jul 22 19:17:27.882: ISIS-Adj: Nghbr Ckt ID changed: FALSE

Jul 22 19:17:27.882: ISIS-Adj: received Neighbor System-ID (must be our) 0000.0000.000B

Jul 22 19:17:27.882: ISIS-Adj: received Neighbor ext.circuit ID (must be our) 0xB

Jul 22 19:17:27.882: ISIS-Adj: newstate:0, state_changed:0, going_up:0, going_down:0

Jul 22 19:17:27.882: ISIS-Adj: Action = ACCEPT

Jul 22 19:17:27.882: ISIS-Adj: ACTION_ACCEPT:

Jul 22 19:17:34.637: ISIS-Adj: SND:3way Adj. Local Ckt ID:0xB Nghbr Ckt ID:0x5 Length:15

Jul 22 19:17:34.637: ISIS-Adj: Sending serial IIH on TwentyFiveGigE1/0/9, 3way state:UP, length 1496

Jul 22 19:17:36.579: ISIS-Adj: Rec serial IIH from a84f.b1c3.9484 (TwentyFiveGigE1/0/9)

Jul 22 19:17:36.579: ISIS-Adj: cir type L1L2, cir id 05, length 1496

Jul 22 19:17:36.579: ISIS-Adj: rcvd state UP, old state UP, new state UP, nbr usable TRUE

Jul 22 19:17:36.579: ISIS-Adj: RCV:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0xB Length:15

Jul 22 19:17:36.579: ISIS-Adj: Nghbr Ckt ID changed: FALSE

Jul 22 19:17:36.579: ISIS-Adj: received Neighbor System-ID (must be our) 0000.0000.000B

Jul 22 19:17:36.579: ISIS-Adj: received Neighbor ext.circuit ID (must be our) 0xB

Jul 22 19:17:36.579: ISIS-Adj: newstate:0, state_changed:0, going_up:0, going_down:0

Jul 22 19:17:36.579: ISIS-Adj: Action = ACCEPT

Jul 22 19:17:36.579: ISIS-Adj: ACTION_ACCEPT:

Jul 22 19:17:43.270: ISIS-Adj: SND:3way Adj. Local Ckt ID:0xB Nghbr Ckt ID:0x5 Length:15

Jul 22 19:17:43.271: ISIS-Adj: Sending serial IIH on TwentyFiveGigE1/0/9, 3way state:UP, length 1496

Jul 22 19:17:51.658: ISIS-Adj: SND:3way Adj. Local Ckt ID:0xB Nghbr Ckt ID:0x5 Length:15

Jul 22 19:17:51.658: ISIS-Adj: Sending serial IIH on TwentyFiveGigE1/0/9, 3way state:UP, length 1496

Jul 22 19:18:00.248: ISIS-Adj: SND:3way Adj. Local Ckt ID:0xB Nghbr Ckt ID:0x5 Length:15

Jul 22 19:18:00.248: ISIS-Adj: Sending serial IIH on TwentyFiveGigE1/0/9, 3way state:UP, length 1496

Jul 22 19:18:06.579: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceA (TwentyFiveGigE1/0/9) Down, hold time expired

Jul 22 19:18:06.579: ISIS-Adj: L1 adj count 0

Jul 22 19:18:06.579: ISIS-Adj: L2 adj count 0

تحليل سجلات تصحيح أخطاء IS-IS:

- يرسل DeviceA حزمة ترحيب (JUL 22 19:17:24)، ويستجيب DeviceB لهذه الحزمة (JUL 22 19:17:25)، ويستلم DeviceA هذه الاستجابة (JUL 22 19:17:31).

DeviceA

Jul 22 19:17:24.929: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0xB Length:15

Jul 22 19:17:24.929: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:UP, length 1496

Jul 22 19:17:31.685: ISIS-Adj: Rec serial IIH from 6c31.0edb.3b5f (TenGigabitEthernet0/0/4)

DeviceB

Jul 22 19:17:25.693: ISIS-Adj: SND:3way Adj. Local Ckt ID:0xB Nghbr Ckt ID:0x5 Length:15

Jul 22 19:17:25.693: ISIS-Adj: Sending serial IIH on TwentyFiveGigE1/0/9, 3way state:UP, length 1496

Jul 22 19:17:27.882: ISIS-Adj: Rec serial IIH from a84f.b1c3.9484 (TwentyFiveGigE1/0/9)

- يرسل DeviceA حزمة ترحيب أخرى (JUL 22 19:17:33)، ويرسل DeviceB حزمة الترحيب الخاصة به (JUL 22 19:17:34)، وبعد ثانيتين يستلم الحزمة من نظيره.

DeviceA

Jul 22 19:17:33.626: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0xB Length:15

Jul 22 19:17:33.627: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:UP, length 1496

DeviceB

Jul 22 19:17:34.637: ISIS-Adj: SND:3way Adj. Local Ckt ID:0xB Nghbr Ckt ID:0x5 Length:15

Jul 22 19:17:34.637: ISIS-Adj: Sending serial IIH on TwentyFiveGigE1/0/9, 3way state:UP, length 1496

Jul 22 19:17:36.579: ISIS-Adj: Rec serial IIH from a84f.b1c3.9484 (TwentyFiveGigE1/0/9)

- أثناء الفترة التي لا يستلم فيها DeviceA الحزمة المرسلة بواسطة DeviceB، يعلن البروتوكول عن ذلك بعد 30 ثانية.

DeviceA

Jul 22 19:17:42.671: ISIS-Adj: SND:3way Adj. Local Ckt ID:0x5 Nghbr Ckt ID:0xB Length:15

Jul 22 19:17:42.672: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:UP, length 1496

Jul 22 19:18:01.475: ISIS-Adj: Sending serial IIH on TenGigabitEthernet0/0/4, 3way state:UP, length 1496

Jul 22 19:18:01.685: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceB (TenGigabitEthernet0/0/4) Down, hold time expired

- لا يتلقى DeviceB أي حزمة من النظير الخاص به. بعد فترة الاحتجاز الافتراضية، يعلن هذا البروتوكول عن نفسه.

DeviceB

Jul 22 19:17:43.270: ISIS-Adj: SND:3way Adj. Local Ckt ID:0xB Nghbr Ckt ID:0x5 Length:15

Jul 22 19:17:43.271: ISIS-Adj: Sending serial IIH on TwentyFiveGigE1/0/9, 3way state:UP, length 1496

<snip>

Jul 22 19:18:06.579: %CLNS-5-ADJCHANGE: ISIS: Adjacency to DeviceA (TwentyFiveGigE1/0/9) Down, hold time expired

تحليل الالتقاط:

يستقبل DeviceA الحزم من DeviceB، ولكن الحزمة الأخيرة التي يستلمها هذا الموجه من النظير هي في الدقيقة 13:17.31. ثم يرسل DeviceA حزم Hello

بدون أي تجاوب من النظير.

ISIS Random Flaps Device

يظهر التقاط DeviceB شرط مماثل، المفتاح يستلم آخر حزمة ترحيب من نظيره، ومع ذلك، يبدأ DeviceB في إرسال حزم الترحيب الخاصة به بدون إستجابة.

جهاز تنظيم الدولة الإسلامية غير مستقر(ب)

في عمليات الالتقاط المصدرة، لا يتم تسليم حزم الترحيب بين الأقران. يبدو أن هذه المشكلة مع النقل.