المحتويات

المقدمة

المتطلبات الأساسية

المتطلبات

المكونات المستخدمة

معلومات أساسية

القيود

التكوين

التحديات أثناء أستكشاف الأخطاء وإصلاحها

الرسم التخطيطي للشبكة

التكوينات

التحقق من الصحة

استكشاف الأخطاء وإصلاحها

المقدمة

يصف هذا المستند كيفية تكوين حركة مرور بروتوكول العبارة الحدودية (BGP) IPv6 على ASR1K.

المتطلبات الأساسية

المتطلبات

cisco يوصي أن يتلقى أنت معرفة من هذا موضوع:

- مستقل عن المنبر

المكونات المستخدمة

تستند المعلومات الواردة في هذا المستند إلى إصدارات البرامج والمكونات المادية التالية:

- IOS-XE

- ASR1000

- ASR9K

- ASR1K

- BGP

- Flowspec

- IPv6

تم إنشاء المعلومات الواردة في هذا المستند من الأجهزة الموجودة في بيئة معملية خاصة. بدأت جميع الأجهزة المُستخدمة في هذا المستند بتكوين ممسوح (افتراضي). إذا كانت شبكتك قيد التشغيل، فتأكد من فهمك للتأثير المحتمل لأي أمر.

معلومات أساسية

تحدد FlowSpec الإجراءات الخاصة بتوزيع قواعد مواصفات التدفق عبر BGP وتعرف إجراء تشفير قواعد مواصفات التدفق على أنها معلومات قابلية الوصول إلى طبقة شبكة بروتوكول العبارة الحدودية (BGP NLRI) التي يمكن إستخدامها في أي تطبيق. كما يحدد التطبيق بغرض تصفية الحزم للحد (الموزع) من هجمات رفض الخدمة.

القيود

هذا التحديد للتكوين:

- غير مسموح بمزيج من عائلات العناوين في قواعد تدفق البيانات.

- في سيناريو التطابق المتعدد، يتم تطبيق قاعدة تدفق البيانات المطابقة الأولى فقط.

- يتم دعم 3000 قاعدة FlowSpec كحد أقصى لكل نظام.

التكوين

في هذا المثال، قمنا بتكوين ASR9K كوحدة تحكم و ASR1K كعميل PE و RR و FlowSpec.

هذا هو الحد الأدنى للتكوين المطلوب لسير عمل IPv6.

On controller to push the policy to PE/client:

class-map type traffic match-all FLOWSPEC

match destination-address ipv6 2001:db8::/32   <<<<< Match destination address/subnet.

end-class-map

!

policy-map type pbr FS_P

class type traffic FLOWSPEC                    <<<<< Apply class-map under policy-map.

drop

!

flowspec

address-family ipv4

service-policy type pbr FSP_V4

!

address-family ipv6

service-policy type pbr FS_P                  <<<<< Apply policy-map inside Flowspec under AF.

!

On PE/client is to enable IPv6 flowspec AF under BGP.

address-family ipv6 flowspec                   <<<<< Under ipv6 flowspec AF, activate the neighbor.

neighbor 10.192.202.5 activate

neighbor 10.192.202.5 validation off

To apply the flowspec policy on interface, "local-install interface-all" command is must under flowspec.

flowspec

local-install interface-all                    <<<<< Push the policy on interface.

- استنادا إلى تكوين وحدة التحكم، يجب إسقاط أي حركة مرور موجهة إلى 2001:db8:/32 وفقا للسياسة.

- قم بإيقاف تشغيل التحقق من الصحة للجار ضمن عائلة عناوين IPv6 حتى لا يتم التحقق من ASR1K للخطوة التالية.

- من الناحية المثالية، إذا كان النهج قيد العمل، يتم مشاهدة العداد في وحدة التحكم ولكن في حالة ما إذا كنت تريد رؤيته على أي جهاز آخر، قم بتثبيت نهج تدفق البيانات على جميع واجهات المستخدم التي يلزم إصدار أمر التثبيت المحلي interface-all لها ضمن FlowSpec.

التحديات أثناء أستكشاف الأخطاء وإصلاحها

- إذا كانت الشبكة الأساسية هي IPv4 و BGP التي يتم تشغيلها وفقا لمواصفات بروتوكول IPv6، فهذا يعني وجود مشكلة في التحقق من الصحة على كل خطوة ويسبب مشكلة في سياسة تدفق بيانات بروتوكول IPv6. وبالتالي، أبق التحقق قيد التشغيل بحيث لا يقوم الجار بالتحقق من الصحة.

- بخلاف وحدة التحكم، لا يمكنك رؤية مطابقة نهج FlowSpec/عداد الإجراءات. للتحقق من العدادات، يجب أن يتم تثبيت الواجهة-all محليا ضمن FlowSpec (أسفل AF). يقوم هذا الأمر بدفع تكوين سياسة مواصفات التدفق على جميع واجهات الجهاز لعائلات عناوين IPv4 و IPv6، وعلى الواجهات داخل مثيل VRF.

الرسم التخطيطي للشبكة

+----------------+              +-----------------+            +------------------+             +-----------------+

|                |              |                 |            |                  |             |                 |

|   Controller   +--------------+     PE/RR1      +------------+      PE/RR2      +-------------+      End-PE     |

|     ASR9K      |              |     CRR01       |            |      CRR02       |             |      DCPR01     |

+----------------+              +-----------------+            +------------------+             +-----------------+

التكوينات

يعتمد هذا التكوين على الرسم التخطيطي للشبكة، وهو نفس إعداد المستخدم.

Controller:

RP/0/RSP0/CPU0:Controller# show running-config

Mon Apr  8 16:33:36.578 UTC

Building configuration...

!! IOS XR Configuration 5.3.4

!! Last configuration change at Wed Apr  3 17:34:59 2019 by admin

!

hostname Controller

cdp

cdp advertise v1

!

class-map type traffic match-all FLOWSPEC

match destination-address ipv6 2001:db8::/32

end-class-map

!

class-map type traffic match-all V4_FLOWSPEC

match source-address ipv4 102.102.102.102 255.255.255.255

end-class-map

!

policy-map type pbr FS_P

class type traffic FLOWSPEC

drop

!

class type traffic class-default

!

end-policy-map

!

policy-map type pbr FSP_V4

class type traffic V4_FLOWSPEC

set dscp ef

!

class type traffic class-default

!

end-policy-map

!

interface Loopback0

ipv4 address 10.192.202.5 255.255.255.255

!

interface Loopback100

ipv4 address 102.102.102.102 255.255.255.255

ipv6 address 2001:db8::1/32

!

interface TenGigE0/0/0/0

ipv4 address 10.10.12.1 255.255.255.0

ipv6 address 2001:10:10:12::1/64

!

route-policy ALL

pass

end-policy

!

router static

address-family ipv4 unicast

203.202.143.33/32 TenGigE0/0/0/0

!

address-family ipv6 unicast

2003::/64 2001:10:10:12::2

!

!

router ospfv3 1

area 0

interface TenGigE0/0/0/0

network point-to-point

!

!

!

router bgp 64696

bgp router-id 10.192.202.5

address-family ipv4 unicast

network 102.102.102.102/32

!

address-family vpnv4 unicast

!

address-family ipv4 flowspec

!

address-family ipv6 flowspec

!

neighbor 203.202.143.33

remote-as 7474

ebgp-multihop 10

update-source Loopback0

address-family ipv4 unicast

route-policy ALL in

route-policy ALL out

!

address-family vpnv4 unicast

!

address-family ipv4 flowspec

route-policy ALL in

route-policy ALL out

!

address-family ipv6 flowspec

route-policy ALL in

route-policy ALL out

!

!

!

flowspec

local-install interface-all

address-family ipv4

service-policy type pbr FSP_V4

!

address-family ipv6

service-policy type pbr FS_P

!

!

end

PE/RR1:

CRR01#show running-config

Building configuration...

!

ipv6 unicast-routing

mpls label protocol ldp

!

spanning-tree extend system-id

flowspec

local-install interface-all

diagnostic bootup level minimal

!

interface Loopback0

ip address 203.202.143.33 255.255.255.255

ip ospf 1 area 0

!

interface Loopback1010

no ip address

ipv6 address 2001:DB8::10/32

!

interface TenGigabitEthernet0/0/0

ip address 10.10.12.2 255.255.255.0

ip ospf network point-to-point

cdp enable

ipv6 address 2001:10:10:12::2/64

!

interface TenGigabitEthernet0/0/3

ip address 10.10.23.2 255.255.255.0

ip ospf network point-to-point

ip ospf 1 area 0

cdp enable

ipv6 address 2003::1/64

mpls ip

!

router ospf 1

mpls ldp autoconfig

!

router bgp 7474

bgp router-id 203.202.143.33

bgp log-neighbor-changes

neighbor 10.192.202.5 remote-as 64696

neighbor 10.192.202.5 ebgp-multihop 10

neighbor 10.192.202.5 update-source Loopback0

neighbor 2001:10:10:12::1 remote-as 64696

neighbor 203.202.143.44 remote-as 7474

neighbor 203.202.143.44 update-source Loopback0

!

address-family ipv4

neighbor 10.192.202.5 activate

no neighbor 2001:10:10:12::1 activate

neighbor 203.202.143.44 activate

neighbor 203.202.143.44 route-reflector-client

exit-address-family

!

address-family ipv4 flowspec

neighbor 10.192.202.5 activate

neighbor 203.202.143.44 activate

neighbor 203.202.143.44 send-community both

neighbor 203.202.143.44 route-reflector-client

exit-address-family

!

address-family ipv6

neighbor 10.192.202.5 activate

neighbor 203.202.143.44 activate

neighbor 203.202.143.44 route-reflector-client

neighbor 203.202.143.44 send-label

exit-address-family

!

address-family ipv6 flowspec

neighbor 10.192.202.5 activate

neighbor 10.192.202.5 validation off

neighbor 203.202.143.44 activate

neighbor 203.202.143.44 send-community both

neighbor 203.202.143.44 route-reflector-client

neighbor 203.202.143.44 next-hop-self

exit-address-family

!

ip route 10.192.202.5 255.255.255.255 10.10.12.1

!

!

ipv6 route 2001:DB8::1/128 2001:10:10:12::1

!

end

PE/RR2:

CRR02#show running-config

Building configuration...

Current configuration : 7227 bytes

!

! Last configuration change at 18:21:29 UTC Mon Apr 8 2019

!

hostname CRR02

!

boot-start-marker

boot system flash bootflash:asr1000rpx86-universalk9.16.10.01a.SPA.bin

boot-end-marker

!

ipv6 unicast-routing

multilink bundle-name authenticated

!

spanning-tree extend system-id

flowspec

diagnostic bootup level minimal

!

interface Loopback0

ip address 203.202.143.44 255.255.255.255

ip ospf 1 area 0

!

interface TenGigabitEthernet1/0/0

ip address 10.10.23.3 255.255.255.0

ip ospf network point-to-point

ip ospf 1 area 0

cdp enable

ipv6 address 2003::2/64

mpls ip

!

interface TenGigabitEthernet1/0/1

ip address 10.10.34.3 255.255.255.0

ip ospf network point-to-point

ip ospf 1 area 0

cdp enable

!

router ospf 1

mpls ldp autoconfig

!

router bgp 7474

bgp router-id 203.202.143.44

bgp log-neighbor-changes

neighbor 203.202.143.33 remote-as 7474

neighbor 203.202.143.33 update-source Loopback0

neighbor 203.202.143.45 remote-as 7474

neighbor 203.202.143.45 update-source Loopback0

!

address-family ipv4

neighbor 203.202.143.33 activate

neighbor 203.202.143.45 activate

exit-address-family

!

address-family ipv4 flowspec

neighbor 203.202.143.33 activate

neighbor 203.202.143.45 activate

neighbor 203.202.143.45 send-community both

neighbor 203.202.143.45 route-reflector-client

exit-address-family

!

address-family ipv6

neighbor 203.202.143.33 activate

neighbor 203.202.143.33 send-label

exit-address-family

!

address-family ipv6 flowspec

neighbor 203.202.143.33 activate

neighbor 203.202.143.33 validation off

neighbor 203.202.143.45 activate

neighbor 203.202.143.45 send-community both

neighbor 203.202.143.45 route-reflector-client

exit-address-family

!

ipv6 route 2001:10:10:12::/64 2003::1

ipv6 route 2001:DB8::1/128 2003::1

!

end

End-PE:

DCPR01#show running-config

Building configuration...

!

hostname DCPR01

!

subscriber templating

!

ipv6 unicast-routing

!

flowspec

diagnostic bootup level minimal

!

interface Loopback0

ip address 203.202.143.45 255.255.255.255

ip ospf 1 area 0

!

interface TenGigabitEthernet1/3/0

ip address 10.10.34.4 255.255.255.0

ip ospf network point-to-point

ip ospf 1 area 0

cdp enable

ipv6 address 2001::1/64

!

router ospf 1

mpls ldp autoconfig

!

router bgp 7474

bgp router-id 203.202.143.45

bgp log-neighbor-changes

neighbor 203.202.143.44 remote-as 7474

neighbor 203.202.143.44 update-source Loopback0

!

address-family ipv4 flowspec

neighbor 203.202.143.44 activate

exit-address-family

!

address-family ipv6 flowspec

neighbor 203.202.143.44 activate

neighbor 203.202.143.44 validation off

exit-address-family

!

ipv6 route ::/0 TenGigabitEthernet1/3/0

!

end

التحقق من الصحة

PE/RR2:

CRR02#ping 2001:db8::1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 2001:DB8::1, timeout is 2 seconds:

.....

Success rate is 0 percent (0/5)

CRR02#

Controller:

RP/0/RSP0/CPU0:Controller#show bgp ipv6 flowspec

Mon Apr  8 17:55:17.041 UTC

BGP router identifier 10.192.202.5, local AS number 64696

BGP generic scan interval 60 secs

Non-stop routing is enabled

BGP table state: Active

Table ID: 0x0   RD version: 20

BGP main routing table version 20

BGP NSR Initial initsync version 0 (Reached)

BGP NSR/ISSU Sync-Group versions 0/0

BGP scan interval 60 secs

Status codes: s suppressed, d damped, h history, * valid, > best

i - internal, r RIB-failure, S stale, N Nexthop-discard

Origin codes: i - IGP, e - EGP, ? - incomplete

Network            Next Hop            Metric LocPrf Weight Path

*> Dest:2001:db8::/0-32/56

::                                     0 i

Processed 1 prefixes, 1 paths

RP/0/RSP0/CPU0:Controller#show flowspec ipv6 detail

Mon Apr  8 17:55:36.786 UTC

AFI: IPv6

Flow           :Dest:2001:db8::/0-32

Actions      :Traffic-rate: 0 bps  (policy.1.FS_P.FLOWSPEC)

Statistics                        (packets/bytes)

Matched             :                  14/1652

Dropped             :                  14/1652

RP/0/RSP0/CPU0:BGL14.1.J.05-ASR-9000-1#

PE/RR1:

CRR01#show bgp ipv6 flowspec

BGP table version is 2, local router ID is 203.202.143.33

Status codes: s suppressed, d damped, h history, * valid, > best, i - internal,

r RIB-failure, S Stale, m multipath, b backup-path, f RT-Filter,

x best-external, a additional-path, c RIB-compressed,

t secondary path,

Origin codes: i - IGP, e - EGP, ? - incomplete

RPKI validation codes: V valid, I invalid, N Not found

Network          Next Hop            Metric LocPrf Weight Path

*>   Dest:2001:DB8::/0-32

::                                     0 64696 i

CRR01#

CRR01#show flowspec ipv6 detail

AFI: IPv6

Flow           :Dest:2001:DB8::/0-32

Actions      :Traffic-rate: 0 bps  (bgp.1)

Statistics                        (packets/bytes)

Matched             :                   4/456

Dropped             :                   4/456

CRR01#

استكشاف الأخطاء وإصلاحها

لا تتوفر حاليًا معلومات محددة لاستكشاف الأخطاء وإصلاحها لهذا التكوين.

تلميح: إذا قمت بفتح حالة باستخدام 3.16.5S وصدمت بمعرف الخطأ CSCva55510. رغم أنه لم يتم توثيقه في الخطأ إلا أنه ينطبق على IPv6. ويتم تأكيد هذا من ASR1K BGP BU ويتم التحقق من صحته. خطأ آخر CSCvp18767 أيضا مرفوعة لأمر show الذي تم تحديده في 16.12.1، ومن ثم فمن الأفضل إستخدام هذا الإصدار. ومع ذلك، يمكن أن يعمل تدفق بروتوكول IPv6 في أي إصدار 16.x.