المحتويات

المقدمة

الاستخدام

ASR9K - كلاسيكي

ASR9K - eXR

منصات NCSxxxx، و Whitebox

CRS

Cisco 8xxx

المقدمة

يصف هذا وثيقة المجموعة العامة من الأمر أن يجمع من cisco IOS® XR مسحاج تخديد في وقت/بعد إصدار لحالات TAC.

الاستخدام

يمكن لصق قائمة الأوامر إلى واجهة سطر الأوامر (CLI) الخاصة بالموجه تماما كما هو مدرج دون إجراء أي تغييرات. يمكن أن تخرج أوامر معينة خطأ إذا لم يتم تنفيذ الميزات التي تتطابق. وهذه نتيجة متوقعة ولا تسبب أية مشاكل.

يمكن نسخ/لصق هذه القائمة بالكامل في الموجه الخاص بك. ما عليك سوى تمكين تسجيل الدخول إلى عميل SSH/telnet لديك لالتقاط الصورة.

ASR9K - كلاسيكي

term length 0

show platform

admin show platform

show install active summary

show version

show hw-module fpd location all

show diag

show logging

show install log

show running

admin show running

show configuration failed

show configuration commit changes all

show configuration history

show configuration failed startup

show history

show cli history detail

admin show environment

admin show led

show pfm location all

show processes

show processes cpu

show processes blocked location all

show watchdog memory-state

show context location all

show controllers np counters all

show drops

show redundancy

show redundancy summary

show snmp mib access

show snmp interface

show interfaces description

show ospf neighbor

show bgp sessions

show bgp summary

show rib update-groups

show tcp brief

show l2vpn xconnect

show mpls traffic-eng tunnels

show bfd session

show virtual-service list

ASR9K - eXR

term length 0

show platform

show install active summary

show version

show hw-module fpd

show diag

show logging

show install log

show running

admin show running

show configuration failed

show configuration commit changes all

show configuration history

show configuration failed startup

show history

show cli history detail

admin show environment

admin show led

show pfm location all

show processes

show processes cpu

show processes blocked location all

show watchdog memory-state

show context location all

show controllers np counters all

show drops

show redundancy

show redundancy summary

show snmp mib access

show snmp interface

show interfaces description

show ospf neighbor

show bgp sessions

show bgp summary

show rib update-groups

show tcp brief

show l2vpn xconnect

show mpls traffic-eng tunnels

show bfd session

منصات NCSxxxx، و Whitebox

هذا لكل منصة NCS، على سبيل المثال، لكن لا يقتصر على NCS6K، NCS5K، NCS55xx، NCS540، و NCS560.

term length 0

show platform

admin show platform

show inventory

show install active summary

show version

show hw-module fpd

show diag

show logging

show install log

show running

admin show running

show configuration failed

show configuration commit changes all

show configuration history

show configuration failed startup

show history

show cli history detail

show environment

admin show environment

show led

admin show led

show alarms brief system active

show asic-errors all detail location 0/RP0/CPU0

show asic-errors all detail location 0/0/CPU0

show processes

show processes cpu

show processes blocked location all

show watchdog memory-state

show context location all

show redundancy

show redundancy summary

show snmp mib access

show snmp interface

show interfaces description

show ospf neighbor

show bgp sessions

show bgp summary

show rib update-groups

show tcp brief

show l2vpn xconnect

show mpls traffic-eng tunnels

show bfd session

CRS

term length 0

show platform

admin show platform

show install active summary

show version

show hw-module fpd location all

show diag

show logging

show install log

show running

admin show running

show configuration failed

show configuration commit changes all

show configuration history

show configuration failed startup

show history

show cli history detail

admin show environment

admin show led

show processes

show processes cpu

show processes blocked location all

show watchdog memory-state

show context location all

show redundancy

show redundancy summary

show snmp mib access

show snmp interface

show interfaces description

show ospf neighbor

show bgp sessions

show bgp summary

show rib update-groups

show tcp brief

show l2vpn xconnect

show mpls traffic-eng tunnels

show bfd session

Cisco 8xxx

term length 0

show platform

show install active summary

show version

show hw-module fpd

show diag

show logging

show install log

show running

show configuration failed

show configuration commit changes all

show configuration history

show configuration failed startup

show history

show cli history detail

show environment

show led

show processes

show processes cpu

show processes blocked location all

show watchdog memory-state

show context location all

show reboot history

show redundancy

show redundancy summary

show snmp mib access

show snmp interface

show interfaces description

show ospf neighbor

show bgp sessions

show bgp summary

show rib update-groups

show tcp brief

show l2vpn xconnect

show mpls traffic-eng tunnels

show bfd session