المحتويات

المقدمة

المتطلبات الأساسية

المتطلبات

المكونات المستخدمة

المنتجات ذات الصلة

الاصطلاحات

وحدات EtherSwitch النمطية - المفاهيم

التكوين

الرسم التخطيطي للشبكة

التكوينات

التكوين الأولي للوحدة النمطية EtherSwitch Module

شكلت VTP و VLAN

تكوين قناة الشجرة المتفرعة والشنطة والمنفذ

تكوين منفذ الوصول

تكوين منفذ الصوت

تكوين التوجيه

تكوين جودة الخدمة

التحقق من الصحة

استكشاف الأخطاء وإصلاحها

معلومات ذات صلة

المقدمة

يوفر هذا المستند مثالاً على تكوين وحدة الخدمة EtherSwitch المثبّتة في موجّه الخدمة المتكامل (ISR). لا يناقش هذا المستند مثالاً على التكوين الخاص بوحدة شبكة EtherSwitch.

المتطلبات الأساسية

المتطلبات

لا توجد متطلبات خاصة لهذا المستند.

المكونات المستخدمة

تستند المعلومات الواردة في هذا المستند إلى إصدارات البرامج والمكونات المادية التالية:

- cisco 2800 sery مسحاج تخديد على cisco ios ® برمجية إطلاق 12.4(10)

- الوحدة النمطية NME-16ES-1G-P - 16-port 10/100 Cisco EtherSwitch Service Module

تم إنشاء المعلومات الواردة في هذا المستند من الأجهزة الموجودة في بيئة معملية خاصة. بدأت جميع الأجهزة المُستخدمة في هذا المستند بتكوين ممسوح (افتراضي). إذا كانت شبكتك مباشرة، فتأكد من فهمك للتأثير المحتمل لأي أمر.

المنتجات ذات الصلة

يمكن أيضا إستخدام هذا التكوين مع موجهات سلسلة 2600/3600/3700/3800 من Cisco.

راجع الجدول 6 في الوحدات النمطية Cisco EtherSwitch service modules - ورقة البيانات للحصول على مزيد من المعلومات.

الاصطلاحات

راجع اصطلاحات تلميحات Cisco التقنية للحصول على مزيد من المعلومات حول اصطلاحات المستندات.

وحدات EtherSwitch النمطية - المفاهيم

هذا إثنان نوع من EtherSwitch وحدة نمطية يتوفر ل cisco ISRs:

- تتمتع الوحدة النمطية EtherSwitch Service Module (ES) — وحدات ES بالمعالجات ومحركات التحويل والبرامج وذاكرة الفلاش الخاصة بها والتي تعمل بشكل مستقل عن موارد الموجه المضيف. بعد تثبيت وحدة ES النمطية في الموجه، يمكنك التحكم في الوحدة النمطية ES من الموجه المضيف. بعد ذلك، أنت يستطيع خلقت VLANs، شكلت VLANs، يجسر - شجرة، فعلي terminal بروتوكول (VTP) من ال es وحدة نمطية. تستند وحدات ES النمطية إلى النظام الأساسي Catalyst 3750. يوضح هذا المستند مثال التكوين للوحدة النمطية ES فقط.

- راجع الوحدات النمطية Cisco EtherSwitch Service Modules - ورقة البيانات للحصول على مزيد من المعلومات حول الوحدات النمطية ES.

- ارجع إلى دليل ميزة الوحدات النمطية Cisco EtherSwitch service Modules للحصول على معلومات حول كيفية إدارة وحدات ES النمطية.

- أحلت مادة حفازة 3750 sery مفتاح - تشكيل مرشد لمعلومة على كيف أن يشكل ES وحدة.

- يتم تكوين الوحدة النمطية لشبكة EtherSwitch (ESW)— الوحدات النمطية ESW بواسطة Router IOS. لا تقوم هذه الوحدات بتشغيل برامج منفصلة. ويتم دمجه في برنامج IOS الخاص بالموجه المضيف. أنت يستطيع خلقت VLANs، شكلت VLANs، يجسر - شجرة، و VTP من المضيف مسحاج تخديد. يخزن المسحاج تخديد ال VLAN قاعدة معطيات مبرد (vlan.dat) في البرق.

- ارجع إلى الوحدات النمطية لشبكة Cisco EtherSwitch - صفحة البيانات للحصول على مزيد من المعلومات حول وحدات ESW النمطية.

- ارجع إلى دليل ميزة وحدات شبكة Cisco EtherSwitch النمطية للحصول على معلومات حول كيفية تكوين وحدات ESW النمطية.

- ارجع إلى مثال تكوين وحدة شبكة (ESW) EtherSwitch للحصول على معلومات حول تكوين وحدة ESW النمطية الأساسية.

التكوين

في هذا القسم، تُقدّم لك معلومات تكوين الميزات الموضحة في هذا المستند.

ملاحظة: أستخدم أداة بحث الأوامر (للعملاء المسجلين فقط) للحصول على مزيد من المعلومات حول الأوامر المستخدمة في هذا القسم.

الرسم التخطيطي للشبكة

يستخدم هذا المستند إعداد الشبكة التالي:

التكوينات

يستخدم هذا المستند التكوينات التالية:

- التكوين الأولي للوحدة النمطية EtherSwitch Module

- شكلت VTP، VLAN

- تكوين قناة الشجرة المتفرعة والشنطة والمنفذ

- تكوين منفذ الوصول

- تكوين منفذ الصوت

- تكوين التوجيه

- تكوين جودة الخدمة

التكوين الأولي للوحدة النمطية EtherSwitch Module

بعد تثبيت وحدة ES النمطية على الموجه، يمكنك مشاهدة واجهة GigabitEthernet جديدة بسرعة x/0 (حيث يمثل x رقم الفتحة) يتم التعرف عليها بواسطة IOS. يتم أخذ هذا الإخراج بعد تثبيت وحدة ES النمطية على الموجه:

Router1#show ip interface brief

Interface                  IP-Address      OK? Method Status                Protocol

GigabitEthernet0/0         1.1.1.3         YES NVRAM  up                    down

GigabitEthernet0/1         unassigned      YES NVRAM  administratively down down

GigabitEthernet1/0         unassigned      YES unset  administratively down down

Vlan1                      unassigned      YES NVRAM  up                    up

يعد الأمر service-module gigabitEthernet x/0 session هو أمر وضع EXEC ذي الامتيازات المستخدم لوحدة التحكم في الوحدة النمطية ES من الموجه المضيف. تحتاج إلى وحدة تحكم داخل وحدة ES من أجل تكوينها. من أجل وحدة التحكم في الوحدة النمطية ES، يلزم تكوين عنوان IP لواجهة GigabitEthernet x/0. إذا حاولت إدخال وحدة تحكم في الوحدة النمطية دون تعيين عنوان IP، فأنت تتلقى رسالة الخطأ هذه:

Router1#service-module gigabitEthernet 1/0 session

IP address needs to be configured on interface GigabitEthernet1/0

الموجه 1

Find out the router interface connected to the ES module.

Router1#show cdp neighbors

Capability Codes: R - Router, T - Trans Bridge, B - Source Route Bridge

S - Switch, H - Host, I - IGMP, r - Repeater, P - Phone

Device ID    Local Intrfce   Holdtme    Capability   Platform    Port ID

Lab-2811     Gi 1/0          157               R     NME-16ES-1G Gi 1/0/2

!--- The Local interface shows the interface !--- on the router connected internally to the switch.

Configure the host router to manage the ES module.

Router1#configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

Router1(config)#interface gigabitethernet 1/0

Router1(config-if)#ip address 172.16.1.1 255.255.255.0

Router1(config-if)#no shutdown

Router1(config-if)#exit

Router1(config)#exit

Console into the ES Module

Router1#service-module gigabitEthernet 1/0 session

Trying 172.16.1.1, 2066 ... Open

--- System Configuration Dialog ---

Would you like to enter the initial configuration dialog? [yes/no]: no

Would you like to terminate autoinstall? [yes]:

Switch>enable

Switch#configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

Switch(config)#hostname Switch-ES

Switch-ES(config)#interface gigabitethernet 1/0/2

Switch-ES(config-if)#no switchport

Switch-ES(config-if)#ip address 172.16.1.2 255.255.255.0

Switch-ES(config-if)#exit

!--- GigabitEthernet 1/0/2 connects the ES module to the router.

Switch-ES(config)#line console 0

Switch-ES(config-line)#password a99l3

Switch-ES(config-line)#exec-timeout 30

Switch-ES(config-line)#exit

Switch-ES(config)#line vty 0 4

Switch-ES(config-line)#password a99l3

Switch-ES(config-line)#login

Switch-ES(config-line)#exec-timeout 30

Switch-ES(config-line)#exit

يعرض هذا الإخراج الأمر show ip interface brief من الوحدة النمطية ES. تقوم واجهة GigabitEthernet1/0/2 بتوصيل وحدة ES النمطية بواجهة GigabitEthernet1/0 الخاصة بالموجه المضيف.

Switch-ES#show ip int brief

Interface              IP-Address      OK? Method Status                Protocol

Vlan1                  unassigned      YES unset  administratively down down

FastEthernet1/0/1      unassigned      YES unset  down                  down

FastEthernet1/0/2      unassigned      YES unset  down                  down

FastEthernet1/0/3      unassigned      YES unset  down                  down

FastEthernet1/0/4      unassigned      YES unset  down                  down

FastEthernet1/0/5      unassigned      YES unset  down                  down

FastEthernet1/0/6      unassigned      YES unset  down                  down

FastEthernet1/0/7      unassigned      YES unset  down                  down

FastEthernet1/0/8      unassigned      YES unset  down                  down

FastEthernet1/0/9      unassigned      YES unset  down                  down

FastEthernet1/0/10     unassigned      YES unset  down                  down

FastEthernet1/0/11     unassigned      YES unset  down                  down

FastEthernet1/0/12     unassigned      YES unset  down                  down

FastEthernet1/0/13     unassigned      YES unset  down                  down

FastEthernet1/0/14     unassigned      YES unset  down                  down

FastEthernet1/0/15     unassigned      YES unset  down                  down

FastEthernet1/0/16     unassigned      YES unset  down                  down

GigabitEthernet1/0/1   unassigned      YES unset  down                  down

GigabitEthernet1/0/2   172.16.1.2      YES manual  up                    up

إذا كانت وحدة ES النمطية أو الأجهزة المتصلة بهذه الوحدة النمطية ES بحاجة إلى الاتصال بالشبكة الخارجية عبر موجه المضيف، فإن هذا المنفذ (GigabitEthernet1/0/2) يحتاج إلى أن يكون منفذ من الطبقة 3 أو يحتاج إلى أن يكون عضوا في شبكة VLAN من الطبقة 3. راجع قسم تكوين التوجيه في هذا المستند لفهم كيفية تكوين التوجيه على الوحدة النمطية ES.

يشرح هذا المخطط الموجه المضيف والاتصال المنطقي للوحدة النمطية ES:

تحتاج إلى الضغط على Ctrl+العالي+6، ثم X للعودة إلى الموجه المضيف.

إذا كنت بحاجة إلى مسح الجلسة من الموجه، فعليك إصدار أمر مسح الجلسة service-module gigabitEthernet x/0 session clear من وضع EXEC للموجه ذي الامتيازات.

شكلت VTP و VLAN

افتراضيا، ال VTP أسلوب نادل وال VTP domain name فارغ في ES وحدة نمطية. افتراضيا، ينتسب all the ميناء إلى VLAN1. في هذا المثال، يوجد خادم DHCP (172.16.10.20) في شبكة VLAN رقم 10. تم تكوين الأمر ip assistant-address 172.16.10.20 على جميع شبكات VLAN باستثناء شبكة VLAN رقم 10 للحصول على عناوين IP من خادم DHCP للأجهزة الموجودة في شبكات VLAN هذه.

المحول ES

VTP Configuration

Switch-ES(config)#vtp mode transparent

Setting device to VTP TRANSPARENT mode.

Switch-ES(config)#vtp domain LAB

Changing VTP domain name from NULL to LAB

Switch-ES(config)#

Create VLANs

Switch-ES(config)#vlan 10,50,51,100,200

Switch-ES(config-vlan)#exit

Switch-ES(config)#

Configure VLANs

Switch-ES(config)#interface vlan 10

Switch-ES(config-if)#ip address 172.16.10.1 255.255.255.0

Switch-ES(config-if)#no shutdown

Switch-ES(config-if)#interface vlan 50

Switch-ES(config-if)#ip address 172.16.50.1 255.255.255.0

Switch-ES(config-if)#ip helper-address 172.16.10.20

Switch-ES(config-if)#no shutdown

Switch-ES(config-if)#interface vlan 51

Switch-ES(config-if)#ip address 172.16.51.1 255.255.255.0

Switch-ES(config-if)#ip helper-address 172.16.10.20

Switch-ES(config-if)#no shutdown

Switch-ES(config-if)#interface vlan 100

Switch-ES(config-if)#ip address 172.16.100.1 255.255.255.0

Switch-ES(config-if)#ip helper-address 172.16.10.20

Switch-ES(config-if)#no shutdown

Switch-ES(config-if)#interface vlan 200

Switch-ES(config-if)#ip address 172.16.200.1 255.255.255.0

Switch-ES(config-if)#ip helper-address 172.16.10.20

Switch-ES(config-if)#no shutdown

Switch-ES#show vlan

VLAN Name                             Status    Ports

---- -------------------------------- --------- -------------------------------

1    default                          active    Fa1/0/1, Fa1/0/2, Fa1/0/3

Fa1/0/4, Fa1/0/7, Fa1/0/8

Fa1/0/9, Fa1/0/10, Fa1/0/11

Fa1/0/12, Fa1/0/13, Fa1/0/14

Fa1/0/15, Fa1/0/16, Gi1/0/1

Gi1/0/2

10   VLAN0010                         active

50   VLAN0050                         active

51   VLAN0051                         active

100  VLAN0100                         active

200  VLAN0200                         active

1002 fddi-default                     act/unsup

1003 token-ring-default               act/unsup

1004 fddinet-default                  act/unsup

1005 trnet-default                    act/unsup

VLAN Type  SAID       MTU   Parent RingNo BridgeNo Stp  BrdgMode Trans1 Trans2

---- ----- ---------- ----- ------ ------ -------- ---- -------- ------ ------

1    enet  100001     1500  -      -      -        -    -        0      0

VLAN Type  SAID       MTU   Parent RingNo BridgeNo Stp  BrdgMode Trans1 Trans2

---- ----- ---------- ----- ------ ------ -------- ---- -------- ------ ------

10   enet  100010     1500  -      -      -        -    -        0      0

50   enet  100050     1500  -      -      -        -    -        0      0

51   enet  100051     1500  -      -      -        -    -        0      0

100  enet  100100     1500  -      -      -        -    -        0      0

200  enet  100200     1500  -      -      -        -    -        0      0

1002 fddi  101002     1500  -      -      -        -    -        0      0

1003 tr    101003     1500  -      -      -        -    -        0      0

1004 fdnet 101004     1500  -      -      -        ieee -        0      0

1005 trnet 101005     1500  -      -      -        ibm  -        0      0

Remote SPAN VLANs

------------------------------------------------------------------------------

Primary Secondary Type              Ports

------- --------- ----------------- ------------------------------------------

Switch-ES#show vtp status

VTP Version                     : 2

Configuration Revision          : 0

Maximum VLANs supported locally : 1005

Number of existing VLANs        : 10

VTP Operating Mode              : Transparent

VTP Domain Name                 : LAB

VTP Pruning Mode                : Disabled

VTP V2 Mode                     : Disabled

VTP Traps Generation            : Disabled

MD5 digest                      : 0x21 0x51 0xD5 0x4E 0x30 0xA5 0x46 0x3C

Configuration last modified by 0.0.0.0 at 10-27-06 18:28:10

تكوين قناة الشجرة المتفرعة والشنطة والمنفذ

يوضح هذا القسم تكوين الشجرة المتفرعة على الوحدة النمطية ES ومحول Access1. يبدي هذا قسم أيضا الميناء قناة وال شنطة تشكيل بين ال ES وحدة نمطية وال access1 مفتاح. يقوم هذا المثال بتكوين الشجرة المتفرعة السريعة على جميع المحولات. يتم تكوين الوحدة النمطية ES كجذر الشجرة المتفرعة لجميع الشبكات المحلية الظاهرية (VLANs).

المحول ES

Spanning-Tree Configuration

Switch-ES(config)#spanning-tree mode rapid-pvst

Switch-ES(config)#spanning-tree vlan 10,50,51,100,200 root primary

Trunk & Port Channel Configuration

Switch-ES(config)#interface port-channel 1

Switch-ES(config-if)#switchport trunk encapsulation dot1q

Switch-ES(config-if)#switchport mode trunk

Switch-ES(config-if)#switchport trunk allowed vlan 100,200

Switch-ES(config-if)#exit

Switch-ES(config)#interface range fastethernet 1/0/5-6

Switch-ES(config-if-range)#switchport trunk encapsulation dot1q

Switch-ES(config-if-range)#switchport mode trunk

Switch-ES(config-if-range)#switchport trunk allowed vlan 100,200

Switch-ES(config-if-range)#channel-group 1 mode on

Switch-ES(config-if-range)#exit

Access1

Access1 switch configuration

Access1(config)#vtp mode transparent

Setting device to VTP TRANSPARENT mode.

Access1(config)#vtp domain LAB

Changing VTP domain name from NULL to LAB

Access1(config)#vlan 100,200

Access1(config-vlan)#exit

Access1(config)#spanning-tree mode rapid-pvst

Access1(config)#interface port-channel 1

Access1(config-if)#switchport trunk encapsulation dot1q

Access1(config-if)#switchport mode trunk

Access1(config-if)#switchport trunk allowed vlan 100,200

Access1(config-if)#exit

Access1(config)#interface range FastEthernet 0/1 - 2

Access1(config-if-range)#switchport trunk encapsulation dot1q

Access1(config-if-range)#switchport mode trunk

Access1(config-if-range)#switchport trunk allowed vlan 100,200

Access1(config-if-range)#channel-group 1 mode on

Access1(config-if-range)#exit

Switch-ES#show spanning-tree summary

Switch is in rapid-pvst mode

Root bridge for: VLAN0001, VLAN0100, VLAN0200

Extended system ID           is enabled

Portfast Default             is disabled

PortFast BPDU Guard Default  is disabled

Portfast BPDU Filter Default is disabled

Loopguard Default            is disabled

EtherChannel misconfig guard is enabled

UplinkFast                   is disabled

BackboneFast                 is disabled

Configured Pathcost method used is short

Name                   Blocking Listening Learning Forwarding STP Active

---------------------- -------- --------- -------- ---------- ----------

VLAN0001                     0         0        0          1          1

VLAN0100                     0         0        0          1          1

VLAN0200                     0         0        0          1          1

---------------------- -------- --------- -------- ---------- ----------

3 vlans                      0         0        0          3          3

Switch-ES#show interface port-channel 1 trunk

Port        Mode         Encapsulation  Status        Native vlan

Po1         on           802.1q         trunking      1

Port      Vlans allowed on trunk

Po1         100,200

Port        Vlans allowed and active in management domain

Po1         100,200

Port        Vlans in spanning tree forwarding state and not pruned

Po1         100,200

تكوين منفذ الوصول

يكون تكوين منفذ الوصول مماثلا لتكوين محول شبكة LAN القياسية.

المحول ES

Configure the port for server

Switch-ES(config)#interface fastEthernet 1/0/7

Switch-ES(config-if)#switchport mode access

Switch-ES(config-if)#switchport access vlan 10

Switch-ES(config-if)#spanning-tree portfast

Switch-ES(config-if)#speed 100

Switch-ES(config-if)#duplex full

Switch-ES(config-if)#exit

Configure Port for Printer

Switch-ES(config)#interface fastethernet 1/0/8

Switch-ES(config-if)#switchport mode access

Switch-ES(config-if)#switchport access vlan 51

Switch-ES(config-if)#spanning-tree portfast

Switch-ES(config-if)#exit

تكوين منفذ الصوت

ويكون تكوين المنفذ الصوتي مماثلا لتكوين محول شبكة LAN القياسي.

المحول ES

Configure the port for Voice

Switch-ES(config)#interface fastethernet 1/0/9

Switch-ES(config-if)#switchport mode access

Switch-ES(config-if)#switchport access vlan 51

Switch-ES(config-if)#switchport voice vlan 50

Switch-ES(config-if)#spanning-tree portfast

تكوين التوجيه

يستخدم هذا المثال الموجهات الثابتة لتكوين التوجيه.

المحول ES

Configure the default route

Switch-ES(config)#ip routing

Switch-ES(config)#ip route 0.0.0.0 0.0.0.0 172.16.1.1

الموجه 1

Configure the route to LAN

Router1(config)#ip route 172.16.0.0 255.255.0.0 172.16.1.2

تكوين جودة الخدمة

يستخدم هذا القسم جودة الخدمة التلقائية لتكوين جودة الخدمة. راجع تقرير Cisco AutoQoS الأبيض للحصول على مزيد من المعلومات حول جودة الخدمة التلقائية.

المحول ES

Configure QoS on the port where IP phone is connected

Switch-ES(config)#interface fastethernet 1/0/9

Switch-ES(config-if)#auto qos voip cisco-phone

Switch-ES(config-if)#exit

Configure QoS on the uplink port to the host router.

Switch-ES(config)#interface gigabitEthernet 1/0/2

Switch-ES(config-if)#auto qos voip trust

الموجه 1

Create Class map

Router1(config)#class-map match-any VoIP-Control

Router1(config-cmap)#match ip dscp AF31

Router1(config-cmap)#exit

Router1(config)#class-map match-any VoIP-RTP

Router1(config-cmap)#match ip dscp EF

Router1(config-cmap)#exit

Create Policy map

Router1(config)#policy-map Policy-VoIP

Router1(config-pmap)#class VoIP-RTP

Router1(config-pmap-c)#priority percent 70

Router1(config-pmap-c)#class VoIP-Control

Router1(config-pmap-c)#bandwidth percent 5

Router1(config-pmap-c)#class class-default

Router1(config-pmap-c)#fair-queue

Router1(config-pmap-c)#exit

Router1(config-pmap)#exit

Apply the policy on the interface connects to the ES Module

Router1(config)#interface gigabitEthernet 1/0

Router1(config-if)#service-policy output Policy-VoIP

Router1(config-if)#exit

التحقق من الصحة

لا يوجد حاليًا إجراء للتحقق من صحة هذا التكوين.

استكشاف الأخطاء وإصلاحها

لا تتوفر حاليًا معلومات محددة لاستكشاف الأخطاء وإصلاحها لهذا التكوين.

معلومات ذات صلة

- استكشاف أخطاء واجهات المُوجّه والوحدات النمطية وإصلاحها

- صفحة دعم الموجهات

- الدعم التقني والمستندات - Cisco Systems