المحتويات

المقدمة

المتطلبات الأساسية

المتطلبات

المكونات المستخدمة

المخطط

المشكلة

إجراء الترقية

المقدمة

يصف هذا المستند إجراء خطوة بخطوة حول كيفية ترقية إصدار "الجهاز المنطقي المعقد القابل للبرمجة (CPLD)" على إعداد Catalyst 9400 StackWise Virtual Link (SVL).

المتطلبات الأساسية

المتطلبات

cisco يوصي أن يتلقى أنت معرفة الأساسية من StackWise-Virtual setup وتشكيل على مادة حفازة 9400.

المكونات المستخدمة

تستند المعلومات الواردة في هذا المستند إلى إصدارات البرامج والمكونات المادية PID:C9404R.

الوحدات النمطية:

C9400-SUP-1XL

الطراز C9400-LC-24XS

الإصدار SW: 17.09.4a

تم إنشاء المعلومات الواردة في هذا المستند من الأجهزة الموجودة في بيئة معملية خاصة. بدأت جميع الأجهزة المُستخدمة في هذا المستند بتكوين ممسوح (افتراضي). إذا كانت شبكتك قيد التشغيل، فتأكد من فهمك للتأثير المحتمل لأي أمر.

المخطط

المشكلة

في مادة حفازة 9400، بينما يحسن ال cisco ios ® صيغة في بعض الحالات النادرة ال CPLD صيغة من الأداة لا يحسن. يمكن التحقق من CPLD وإصدار ROMMON للإصدار المعين من https://www.cisco.com/c/en/us/td/docs/switches/lan/catalyst9400/software/release/17-13/release_notes/ol-17-13-9400/rommon_versions.html link.

أحلت هذا قصاصة:

9400-1#show platform

Chassis type: C9404R

Switch 1

Slot      Type                State                 Insert time (ago)

--------- ------------------- --------------------- -----------------

1         C9400-LC-24XS       ok                    00:05:00

1/0       C9400-LC-24XS       ok                    00:00:56

2         C9400-SUP-1XL       ok                    00:05:00

2/0       C9400-SUP-1XL       ok                    00:00:53

R0                            ok, active            00:05:00

P1        C9400-PWR-3200AC    ok                    00:04:38

P9        C9404-FAN           ok                    00:04:37

Slot      CPLD Version        Firmware Version

--------- ------------------- ---------------------------------------

1         20062105            17.10.1r

2         20062105            17.10.1r

Switch 2

Slot      Type                State                 Insert time (ago)

--------- ------------------- --------------------- -----------------

1         C9400-LC-24XS       ok                    00:04:57

1/0       C9400-LC-24XS       ok                    00:00:08

2         C9400-SUP-1XL       ok                    00:04:57

2/0       C9400-SUP-1XL       ok                    00:00:07

R0                            ok, standby           00:04:57

P1        C9400-PWR-3200AC    ok                    00:04:35

P9        C9404-FAN           ok                    00:04:33

Slot      CPLD Version        Firmware Version

--------- ------------------- ---------------------------------------

1         19032905            17.10.1r                         >>>>>>>>>>CPLD did not get upgraded

2         19032905            17.10.1r                         >>>>>>>>>>CPLD did not get upgraded

في هذه الحالة، لم تتم ترقية CPLD الخاص بالاستعداد بعد الترقية.

إجراء الترقية

الخطوة 1. أستخدم show redundacny الأمر للتحقق من عمل SVL بشكل صحيح.

9400-1#show redundancy

Redundant System Information :

------------------------------

Available system uptime = 4 minutes

Switchovers system experienced = 0

Standby failures = 0

Last switchover reason = none

Hardware Mode = Duplex

Configured Redundancy Mode = sso

Operating Redundancy Mode = sso

Maintenance Mode = Disabled

Communications = Up

Current Processor Information :

-------------------------------

Active Location = Switch 1

Current Software state = ACTIVE

Uptime in current state = 4 minutes

Image Version = Cisco IOS Software [Cupertino], Catalyst L3 Switch Software (CAT9K_IOSXE), Version 17.9.4a, RELEASE SOFTWARE (fc3)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2023 by Cisco Systems, Inc.

Compiled Fri 20-Oct-23 10:44 by mcpre

BOOT = bootflash:packages.conf;

Peer Processor Information :

----------------------------

Standby Location = Switch 2 >>>>>>>>>>Switch 2 is standby

Current Software state = STANDBY HOT

Uptime in current state = 0 minutes

Image Version = Cisco IOS Software [Cupertino], Catalyst L3 Switch Software (CAT9K_IOSXE), Version 17.9.4a, RELEASE SOFTWARE (fc3)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2023 by Cisco Systems, Inc.

Compiled Fri 20-Oct-23 10:44 by mcpre

BOOT = bootflash:packages.conf;

الخطوة 2. استعملت in order to حسنت ال CPLD صيغة هذا أمر:

upgrade hw-programmable cpld filename bootflash: switch {1-2} RP active

9400-1#upgrade hw-programmable cpld filename bootflash: switch 2 R0

Firmware upgrade requires the SVL member to reload. Do you want to proceed?(y/n)y

Use cli 'redundancy reload peer' to upgrade the firmware on peer

9400-1#redundancy reload peer

Stack is in Half ring setup; Reloading a switch might cause stack split

Reload peer [confirm]

Preparing to reload peer

الخطوة 3. هنا يمكنك أن ترى أن CPLD يتم ترقيته:

Chassis 2 reloading, reason - Admin reload CLI

May 4 01:34:23.829: %PMAN-5-EXITACTION: R0/0: pvp:

Initializing Hardware......

System Bootstrap, Version 17.10.1r, RELEASE SOFTWARE (P)

Compiled Tue Aug 2 13:02:51 2022 by rel

Current ROMMON image : Primary

Last reset cause : SoftwareResetTrig

C9400-SUP-1XL platform with 16777216 Kbytes of main memory

Starting System FPGA Upgrade .....

Programming SPI Primary image is completed.

Authenticating SPI Primary image .....

IO FPGA image is authenticated successfully.

Programming Header .....

FPGA HDR file size: 12

Image page count: 1

Verifying programmed header .....

Verifying programmed header .....

Programmed header is verified successfully.

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

Power Cycle is needed to complete System firmware upgrade.

It takes ~7 mins to upgrade firmwre after power cycle starts.

DO NOT DISRUPT AFTER POWER C

Initializing Hardware......

Initializing Hardware......

System Bootstrap, Version 17.10.1r, RELEASE SOFTWARE (P)

Compiled Tue Aug 2 13:02:51 2022 by rel

الخطوة 4. تأكيد ما إذا كان قد تمت ترقية CPLD في وضع الاستعداد:

F241.24.02-9400-1#show platform

Chassis type: C9404R

Switch 1

Slot      Type                State                 Insert time (ago)

--------- ------------------- --------------------- -----------------

1         C9400-LC-24XS       ok                    00:29:38

1/0       C9400-LC-24XS       ok                    00:25:34

2         C9400-SUP-1XL       ok                    00:29:38

2/0       C9400-SUP-1XL       ok                    00:25:31

R0                            ok, active            00:29:38

P1        C9400-PWR-3200AC    ok                    00:29:16

P9        C9404-FAN           ok                    00:29:14

Slot      CPLD Version        Firmware Version

--------- ------------------- ---------------------------------------

1         20062105            17.10.1r

2         20062105            17.10.1r

Switch 2

Slot      Type                State                 Insert time (ago)

--------- ------------------- --------------------- -----------------

1         C9400-LC-24XS       ok                    00:29:35

1/0       C9400-LC-24XS       ok                    00:00:11

2         C9400-SUP-1XL       ok                    00:29:35

2/0       C9400-SUP-1XL       ok                    00:00:10

R0                            ok, standby           00:29:35

P1        C9400-PWR-3200AC    ok                    00:29:13

P9        C9404-FAN           ok                    00:29:11

Slot      CPLD Version        Firmware Version

--------- ------------------- ---------------------------------------

1 20062105 17.10.1r >>>>>>>>>>CPLD got upgraded

2 20062105 17.10.1r >>>>>>>>>>CPLD got upgraded

الخطوة 5. في الحالة، إن ال CPLD يحتاج صيغة من المفتاح نشط يحتاج أن يكون حسنت، أنت ينبغي تلاحق هذا steps:

1. Do a switchover

9400-1#redundency force-switchover                             >>>>>>>>>>Initially Switch 1 is active and Switch 2 is standby.

After switchover it is vise-versa

2. Upgrade the CPLD version of previous active [now standby] with the command:

9400-1#upgrade hw-programmable cpld filename bootflash: switch 1 R0

3. Reload the the standby

9400-1#redundancy reload peer