المحتويات

المقدمة

المتطلبات الأساسية

المتطلبات

المكونات المستخدمة

الاصطلاحات

النظرية الأساسية

التكوين

الرسم التخطيطي للشبكة

التكوين 1: أجهزة المودم المتعددة في نطاق تجمع

التكوين 2: مودم واحد في تجمع

التكوين 3: تجميع المودم دون نطاق تجمع

التحقق من الصحة

استكشاف الأخطاء وإصلاحها

معلومات ذات صلة

المقدمة

توضح نماذج التكوينات الواردة في هذا المستند كيفية تكوين دعم خدمة تعريف الرقم الرقمي (DNIS) لواجهة المعدل الأولي (PRI) وكيفية إعداد تجميع المودم. يتم توفير ثلاث تكوينات:

1. تجميع المودم مع أجهزة مودم متعددة معرفة في نطاق المجموعة.

2. تجمع المودم مع مودم واحد في نطاق التجمع.

3. تجميع المودم دون نطاق تجمع.

المتطلبات الأساسية

المتطلبات

لا توجد متطلبات خاصة لهذا المستند.

المكونات المستخدمة

تستند المعلومات الواردة في هذا المستند إلى إصدارات البرامج والمكونات المادية أدناه.

- برنامج IOS® الإصدار 11.3(1.1)T من Cisco أو إصدار أحدث.

- PRI المزود بواسطة Telco لدعم DNIS.

- سلسلة موجهات طراز AS5x00 من Cisco.

ملاحظة: تجميع المودم غير ممكن على موجه سلسلة 3600 من Cisco.

تم إنشاء المعلومات المُقدمة في هذا المستند من الأجهزة الموجودة في بيئة معملية خاصة. بدأت جميع الأجهزة المُستخدمة في هذا المستند بتكوين ممسوح (افتراضي). إذا كنت تعمل في شبكة مباشرة، فتأكد من فهمك للتأثير المحتمل لأي أمر قبل استخدامه.

الاصطلاحات

للحصول على مزيد من المعلومات حول اصطلاحات المستندات، راجع اصطلاحات تلميحات Cisco التقنية.

النظرية الأساسية

إذا كنت تستخدم خدمة مستخدم طلب الاتصال عن بعد (RADIUS) كبروتوكول مصادقة، فأنت بحاجة إلى معرفة سمة محاسبة RADIUS (IETF) رقم 30 (Station-ID).

يسمح معرف المحطة لخادم الوصول إلى الشبكة (NAS) بإرسال الرقم الذي إستدعاه المستخدم كجزء من حزمة طلب الوصول (باستخدام DNIS أو تقنية مماثلة). يتم دعم معرف المحطة فقط على مكالمات ISDN والمودم على Cisco AS5x00 عند إستخدامه مع PRI.

التكوين

يستخدم هذا المستند التكوينات الموضحة أدناه.

- أجهزة المودم المتعددة في نطاق تجمع

- مودم واحد في مجموعة

- تجميع المودم دون نطاق تجمع

في هذا القسم، تُقدّم لك معلومات تكوين الميزات الموضحة في هذا المستند.

ملاحظة: للعثور على معلومات إضافية عن الأوامر المستخدمة في هذا المستند، أستخدم أداة بحث الأوامر

الرسم التخطيطي للشبكة

يستخدم هذا المستند إعداد الشبكة الموضح في الرسم التخطيطي أدناه.

التكوين 1: أجهزة المودم المتعددة في نطاق تجمع

ملاحظات التكوين

يختلف العميل عن 5557528 ويتصل بمودم في نطاق المجموعة من 3 إلى 5. تم تكوين الأسطر 3 إلى 5 للأمر التلقائي telnet للمستخدم إلى عنوان IP محدد بعد إدخال معرف مستخدم تسجيل الدخول وكلمة المرور في موجه الأمر (>).

تحذير: عندما تقوم بتكوين ميزة إستدعاء-number ولا تضع في رقم max-conn، فإن موجه Cisco يتم تعيينه افتراضيا على عدد أجهزة المودم في المجموعة. في نموذج التكوين هذا، يتم تكوين أجهزة المودم من 3 إلى 5 وبالتالي يضع برنامج Cisco IOS Software في max-conn 3 في نهاية الأمر call-number.

إذا قمت بتغيير عدد أجهزة المودم في المجموعة، فيجب عليك تغيير رقم max-conn يدويا.

يستخدم نموذج التكوين هذا المصادقة المحلية.

أجهزة المودم المتعددة في نطاق تجمع

Current configuration:

!

version 11.3

service timestamps debug datetime msec

service password-encryption

service udp-small-servers

service tcp-small-servers

!

hostname isdn2-2

!

aaa new-model

!

username cisco password 7 xxxxxxxxx

!

modem-pool tito

pool-range 3-5

called-number 5557528 max-conn 3

ip domain-name cisco.com

isdn switch-type primary-5ess

clock timezone PST -8

clock summer-time PDT recurring

!

!

controller T1 0

framing esf

clock source line primary

linecode b8zs

pri-group timeslots 1-24

description 5557528 pri

!

controller T1 1

framing esf

clock source line secondary

linecode b8zs

!

interface Loopback0

ip address 10.1.1.1 255.0.0.0

!

interface Ethernet0

ip address 172.16.25.52 255.255.255.240

!

interface Serial0

no ip address

shutdown

!

interface Serial1

no ip address

shutdown

!

interface Serial0:23

no ip address

no ip mroute-cache

isdn incoming-voice modem

no cdp enable

!

interface Group-Async1

no ip address

group-range 1 24

!

router eigrp 202

network 172.16.0.0

distance 90 172.16.25.49 0.0.0.0

distance 255 0.0.0.0 255.255.255.255

no auto-summary

!

ip default-gateway 172.16.25.49

ip classless

ip route 0.0.0.0 0.0.0.0 172.16.25.49

!

line con 0

exec-timeout 0 0

line 1 2

modem InOut

line 3 5

modem InOut

autocommand telnet 10.1.1.1

line 6 24

modem InOut

line aux 0

line vty 0 4

password 7 xxxxx

!

end

isdn2-2#

تلميحات تصحيح الأخطاء والتحقق

لضمان أن التكوين لديك يعمل بشكل صحيح، أستخدم أوامر show وdebug. يجب أن يكون الإخراج من هذه الأوامر مماثلا للمخرجات التي تليها.

isdn2-2#show version

Cisco Internetwork Operating System Software

IOS (tm) 5200 Software (C5200-D-L), Version 11.3(1.1)T,

MAINTENANCE INTERIM SOFTWARE

Copyright (c) 1986-1998 by cisco Systems, Inc.

Compiled Sun 11-Jan-98 07:12 by ccai

Image text-base: 0x03034CD4, data-base: 0x00005000

ROM: System Bootstrap, Version 11.1(473), SOFTWARE

isdn2-2 uptime is 18 hours, 41 minutes

System restarted by reload

System image file is "bootflash:c5200-d-l.113-1.1.T", booted via flash

cisco AS5200 (68030) processor (revision 0x00) with 16384K/8192K

bytes of memory.

Processor board ID 03676053

Bridging software.

X.25 software, Version 3.0.0.

Primary Rate ISDN software, Version 1.0.

Mother board without terminator card.

1 Ethernet/IEEE 802.3 interface(s)

26 Serial network interface(s)

24 terminal line(s)

2 Channelized T1/PRI port(s)

128K bytes of non-volatile configuration memory.

8192K bytes of processor board System flash (Read/Write)

8192K bytes of processor board Boot flash (Read ONLY)

Configuration register is 0x2101

isdn2-2#

- إظهار تجمع المودم عند عدم اتصال أي مستخدم

تم تكوين أجهزة المودم 3 و 4 و 5 لتجمع المودم المسمى "tito" ولم يتم طلب أي أجهزة مودم حتى الآن. التجمع الافتراضي هو للمستخدمين الذين يطلبون رقما لم يتم تكوينه لتجمع مودم محدد.

isdn2-2#show modem-pool

modem-pool: System-def-Mpool

!--- default pool

modems in pool: 21 active conn: 0

3 no free modems in pool

modem-pool: tito

!--- modem-pool named 'tito'

modems in pool: 3 active conn: 0

0 no free modems in pool

called_party_number: 5557528

max conn allowed: 3, active conn: 0

0 max-conn exceeded, 0 no free modems in pool

- إظهار تجمع المودم مع اتصال مستخدم واحد

تم طلب أحد المستخدمين وتوصيله بمودم 5. لا يعرض الأمر show modem-pool المودم الذي تم إستخدامه في التجمع.

show modem-pool

-------------

modem-pool: tito

modems in pool: 3 active conn: 1

0 no free modems in pool

called_party_number: 5557528

max conn allowed: 3, active conn: 1

0 max-conn exceeded, 0 no free modems in pool

يوضح الأمر show line أنه يتم إستخدام المودم 5.

isdn2-2#show line

Tty Typ   Tx/Rx   A Modem Roty AccO AccI Uses  Noise  Overruns

* 0 CTY        -  -   -  -  -   0    0    0/0

1 TTY 115200/115200 - inout   -  -  -   0    0    0/0

2 TTY 115200/115200 - inout   -  -  -   0    0    0/0

3 TTY 115200/115200 - inout   -  -  -   0    0    0/0

4 TTY 115200/115200 - inout   -  -  -   1    0    0/0

* 5 TTY 115200/115200 - inout   -  -  -   1    0    0/0

6 TTY 115200/115200 - inout   -  -  -   0    0    0/0

7 TTY 115200/115200 - inout   -  -  -   0    0    0/0

8 TTY 115200/115200 - inout   -  -  -   0    0    0/0

9 TTY 115200/115200 - inout   -  -  -   0    0    0/0

10 TTY 115200/115200 - inout   -  -  -   0    0    0/0

11 TTY 115200/115200 - inout   -  -  -   0    0    0/0

12 TTY 115200/115200 - inout   -  -  -   0    0    0/0

[remaining output omitted]

- إستخدام الأمر debug isdn q931

لاحظ الرقم المطلوب بواسطة المستخدم البعيد. يجب أن يتطابق هذا الرقم مع الرقم الذي تم تكوينه ضمن تيتو تجمع المودم. رقم هاتف المستخدم غير مهم في هذا السيناريو.

*Mar 1 18:54:31.951:     Called Party Number i = 0xC1, '4085557528'

ملاحظة: يتم تقسيم بعض سطور مخرجات تصحيح الأخطاء التالية إلى سطور متعددة لأغراض الطباعة.

isdn2-2#

*Mar 1 18:54:31.935: ISDN Se0:23: RX <- SETUP pd = 8 callref = 0x2B

*Mar 1 18:54:31.939:     Bearer Capability i = 0x9090A2

*Mar 1 18:54:31.939:     Channel ID i = 0xA98393

*Mar 1 18:54:31.943:     Progress Ind i = 0x8381 - Call not end-to-end ISDN,

may have in-band info

*Mar 1 18:54:31.947:     Calling Party Number i = '!', 0x83, '4085559486'

*Mar 1 18:54:31.951:     Called Party Number i = 0xC1, '4085557528'

*Mar 1 18:54:31.963: ISDN Se0:23: Incoming call id = 0xA

*Mar 1 18:54:31.987: ISDN Se0:23: TX -> CALL_PROC pd = 8 callref = 0x802B

*Mar 1 18:54:31.991:     Channel ID i = 0xA98393

*Mar 1 18:54:32.023: ISDN Se0:23: TX -> ALERTING pd = 8 callref = 0x802B

*Mar 1 18:54:33.067: ISDN Se0:23: TX -> CONNECT pd = 8 callref = 0x802B

*Mar 1 18:54:33.143: ISDN Se0:23: RX <- CONNECT_ACK pd = 8 callref = 0x2B

isdn2-2#

- إخراج debug isdn Q931 وdebug modem csm

المستخدم متصل بالخط 5 أو المودم 5 (slot/port)=0/4. معالجة المكالمة هي ترتيب دوري. أول مودم مستخدم هو 3، التالي هو 4، و الأخير هو 5. لا يهم ما إذا كان المودم الأول متاحا.

isdn2-2# show line 5

TTY Typ   TX/Rx   A Modem Roty AccO AccI Uses  Noise  Overruns

* 5 TTY 115200/115200 - inout   -  -  -   1    0    0/0

Line 5, Location: "", Type: ""

Length: 24 lines, Width: 80 columns

Baud rate (TX/RX) is 115200/115200, no parity, 1 stopbits, 8 databits

Status: Ready, Active, No Exit Banner

Capabilities: Hardware Flowcontrol In, Hardware Flowcontrol Out

Modem Callout, Modem RI is CD

Modem state: Ready

modem(slot/port)=0/4, state=CONNECTED

dsx1(slot/unit/channel)=2/0/18, status=VDEV_STATUS_ACTIVE_CALL.

Modem hardware state: CTS DSR DTR RTS

Special Chars: Escape Hold Stop Start Disconnect Activation

^^x  none  -   -    none

Timeouts:   Idle EXEC  Idle Session  Modem Answer Session  Dispatch

00:10:00    never            none   not set

Idle Session Disconnect Warning

never

Modem type is unknown.

Session limit is not set.

Time since activation: 00:01:35

Editing is enabled.

History is enabled, history size is 10.

DNS resolution in show commands is enabled

Full user help is disabled

Allowed transports are pad telnet rlogin mop. Preferred is telnet.

Automatically execute command "telnet 10.1.1.1"

No output characters are padded

No special data dispatching characters

isdn2-2#

- إخراج تصحيح الأخطاء

isdn2-2#

%SYS-5-CONFIG_I: Configured from console by console

*Mar 1 19:00:07.227: ISDN Se0:23: RX <- SETUP pd = 8 callref = 0x2D

*Mar 1 19:00:07.227:     Bearer Capability i = 0x9090A2

*Mar 1 19:00:07.231:     Channel ID i = 0xA98393

*Mar 1 19:00:07.235:     Progress Ind i = 0x8381 - Call not end-to-end ISDN,

may have in-band info

*Mar 1 19:00:07.239:     Calling Party Number i = '!', 0x83, '4085559444'

*Mar 1 19:00:07.243:     Called Party Number i = 0xC1, '4085557528'

*Mar 1 19:00:07.255: ISDN Se0:23: Incoming call id = 0xC

*Mar 1 19:00:07.259: EVENT_FROM_ISDN::dchan_idb=0x25B660, call_id=0xC, ces=0x1

bchan=0x12, event=0x1, cause=0x0

*Mar 1 19:00:07.263: VDEV_ALLOCATE: slot 0 and port 4 is allocated.

*Mar 1 19:00:07.263: EVENT_FROM_ISDN:(000C): DEV_INCALL at slot 0 and port 4

*Mar 1 19:00:07.267: CSM_PROC_IDLE: CSM_EVENT_ISDN_CALL at slot 0, port 4

*Mar 1 19:00:07.267: Fast Ringing On at modem slot 0, port 4

*Mar 1 19:00:07.291: ISDN Se0:23: TX -> CALL_PROC pd = 8 callref = 0x802D

*Mar 1 19:00:07.291:     Channel ID i = 0xA98393

*Mar 1 19:00:07.343: ISDN Se0:23: TX -> ALERTING pd = 8 callref = 0x802D

*Mar 1 19:00:08.367: Fast Ringing Off at modem slot 0, port 4

*Mar 1 19:00:08.367: CSM_PROC_IC1_RING: CSM_EVENT_MODEM_OFFHOOK at slot 0, port 4

*Mar 1 19:00:08.379: ISDN Se0:23: TX -> CONNECT pd = 8 callref = 0x802D

*Mar 1 19:00:08.451: ISDN Se0:23: RX <- CONNECT_ACK pd = 8 callref = 0x2D

*Mar 1 19:00:08.463: EVENT_FROM_ISDN::dchan_idb=0x25B660, call_id=0xC, ces=0x1

bchan=0x12, event=0x4, cause=0x0

*Mar 1 19:00:08.467: EVENT_FROM_ISDN:(000C): DEV_CONNECTED at slot 0 and port 4

*Mar 1 19:00:08.471: CSM_PROC_IC4_WAIT_FOR_CARRIER: CSM_EVENT_ISDN_CONNECTED at

slot 0, port 4

*Mar 1 19:00:20.939: TTY5: DSR came up

*Mar 1 19:00:20.947: tty5: Modem: IDLE->READY

*Mar 1 19:00:20.951: TTY5: EXEC creation

- إظهار تجمع المودم بدون أجهزة مودم مجانية

يظهر الإخراج التالي جميع أجهزة المودم مشغولة ورفض مكالمة بواسطة إعداد إستدعاء ISDN.

modem-pool: System-def-Mpool

modems in pool: 21 active conn: 0

3 no free modems in pool

modem-pool: tito

modems in pool: 3 active conn: 0

3 no free modems in pool

!--- This number is the number of times it has failed to allocate a modem !--- from the pool. It is not the number of modems in the pool.)

called_party_number: 5557528

max conn allowed: 3, active conn: 0

!--- 3 is the number of modems configured in the pool tito. !--- None are active.

0 max-conn exceeded, 3 no free modems in pool

!--- failed 3 times to allocate a modem from the pool

isdn2-2#debug isdn events

ISDN events debugging is on

isdn2-2#

*Mar 1 19:11:26.471: ISDN Se0:23: RX <- SETUP pd = 8 callref = 0x2F

*Mar 1 19:11:26.475:     Bearer Capability i = 0x9090A2

*Mar 1 19:11:26.479:     Channel ID i = 0xA98393

*Mar 1 19:11:26.479:     Progress Ind i = 0x8381

- Call not end-to-end ISDN, may have in-band info

*Mar 1 19:11:26.483:     Calling Party Number i = '!', 0x83, '4085559445'

*Mar 1 19:11:26.487:     Called Party Number i = 0xC1, '4085557528'

*Mar 1 19:11:26.499: ISDN Se0:23: Incoming call id = 0xE

*Mar 1 19:11:26.503: CCPRI, state = 0, serv = 0, int_id = 0,

lo_chan = 19, type = 3, Dsl_Id = 0, callid = E

*Mar 1 19:11:26.507: CCPRI in a Glare situation state 0 serv 0

*Mar 1 19:11:26.511: ISDN Se0:23: received CALL_INCOMING

*Mar 1 19:11:26.511:  extracted channel ie[0-8]= 18 3 A9 83 93 38 34 33 32

*Mar 1 19:11:26.515:

*Mar 1 19:11:26.519: ISDN Se0:23: Event:

Received a Voice call from 4085559445 on B19 at 64 Kb/s

*Mar 1 19:11:26.519: ISDN Se0:23:

CALL_INCOMING: MODEM ERROR 2C: bchan 18, call id E

*Mar 1 19:11:26.535: in CCPRI_ReleaseCall bchan is 13 dsl is 0

*Mar 1 19:11:26.539: leaving CCPRI_ReleaseCall, Allocated CCBs = 0

*Mar 1 19:11:26.543: ISDN Se0:23: entering process_rxstate, CALL_CLEARED

*Mar 1 19:11:26.615: ISDN Se0:23: TX -> RELEASE_COMP pd = 8 callref = 0x802F

*Mar 1 19:11:26.615:     Cause i = 0x80AC - Requested channel not available

isdn2-2#

التكوين 2: مودم واحد في تجمع

مودم واحد في مجموعة

enable password 7 XXXXXXXXXX

!

username cisco password 7 xxxxxxxxxxxx

!

modem-pool tito

pool-range 3

! -- only modem #3 is configured

called-number 5557528 max-conn 1

ip domain-name cisco.com

isdn switch-type primary-5ess

clock timezone PST -8

clock summertime PDT recurring

!

!

تلميحات تصحيح الأخطاء والتحقق

لضمان أن التكوين لديك يعمل بشكل صحيح، أستخدم الأمر show. يجب أن يكون الإخراج من هذا الأمر مماثلا للمخرجات التي تلي.

- إظهار تجمع المودم مع مودم واحد

يعرض الإخراج التالي تجمع مودم تم تكوينه بمودم واحد. يتصل إثنان من المستخدمين في نفس الوقت ويتم توصيل مستخدم واحد.

isdn2-2# show modem-pool

modem-pool: System-def-Mpool

modems in pool: 23 active conn: 0

3 no free modems in pool

modem-pool: tito

modems in pool: 1 active conn: 1

4 no free modems in pool

called_party_number: 5557528

max conn allowed: 1, active conn: 1

0 max-conn exceeded, 1 no free modems in pool

isdn2-2# show modem-pool

modem-pool: System-def-Mpool

modems in pool: 23 active conn: 0

3 no free modems in pool

modem-pool: tito

modems in pool: 1 active conn: 1

4 no free modems in pool

called_party_number: 5557528

max conn allowed: 1, active conn: 1

0 max-conn exceeded, 1 no free modems in pool

isdn2-2#

في الإخراج التالي، يظل المستخدم الأول متصلا بينما يبقى المستخدم الثاني على اتصال في مرة واحدة ويفشل الاتصال.

isdn2-2#

isdn2-2#

*Mar 1 19:38:57.103: ISDN Se0:23: RX <- SETUP pd = 8 callref = 0x33

*Mar 1 19:38:57.107:     Bearer Capability i = 0x9090A2

*Mar 1 19:38:57.111:     Channel ID i = 0xA98394

*Mar 1 19:38:57.111:     Progress Ind i = 0x8381

- Call not end-to-end ISDN, may have in-band info

*Mar 1 19:38:57.115:     Calling Party Number i = '!', 0x83, '4085559474'

*Mar 1 19:38:57.119:     Called Party Number i = 0xC1, '4085557528'

*Mar 1 19:38:57.135: ISDN Se0:23: Incoming call id = 0x12

*Mar 1 19:38:57.139: ISDN Se0:23: CALL_INCOMING: MODEM ERROR 2C: bchan 19,

call id 12

*Mar 1 19:38:57.235: ISDN Se0:23: TX -> RELEASE_COMP pd = 8 callref = 0x8033

*Mar 1 19:38:57.239:     Cause i = 0x80AC - Requested channel not available

isdn2-2#

isdn2-2#show modem-pool

modem-pool: System-def-Mpool

modems in pool: 23 active conn: 0

3 no free modems in pool

modem-pool: tito

modems in pool: 1 active conn: 1

4 no free modems in pool

called_party_number: 5557528

max conn allowed: 1, active conn: 1

1 max-conn exceeded, 1 no free modems in pool

isdn2-2#

حاول مستخدم ثان الاتصال مرة أخرى وفشل. لاحظ تجاوز الحد الأقصى ل 2 جملة.

isdn2-2#

*Mar 1 19:40:34.143: ISDN Se0:23: RX <- SETUP pd = 8 callref = 0x34

*Mar 1 19:40:34.147:     Bearer Capability i = 0x9090A2

*Mar 1 19:40:34.147:     Channel ID i = 0xA98394

*Mar 1 19:40:34.151:     Progress Ind i = 0x8381 - Call not end-to-end ISDN,

may have in-band info

*Mar 1 19:40:34.155:     Calling Party Number i = '!', 0x83, '4085559486'

*Mar 1 19:40:34.159:     Called Party Number i = 0xC1, '4085557528'

*Mar 1 19:40:34.171: ISDN Se0:23: Incoming call id = 0x13

*Mar 1 19:40:34.179: ISDN Se0:23: CALL_INCOMING: MODEM ERROR 2C: bchan 19,

call id 13

*Mar 1 19:40:34.267: ISDN Se0:23: TX -> RELEASE_COMP pd = 8 callref = 0x8034

*Mar 1 19:40:34.271:     Cause i = 0x80AC - Requested channel not available

isdn2-2#

isdn2-2#show modem-pool

modem-pool: System-def-Mpool

modems in pool: 23 active conn: 0

3 no free modems in pool

modem-pool: tito

modems in pool: 1 active conn: 1

4 no free modems in pool

called_party_number: 5557528

max conn allowed: 1, active conn: 1

2 max-conn exceeded, 1 no free modems in pool

isdn2-2#

- إظهار تجمع المودم عند انتهاء مهلة المستخدم الأول بسبب عدم النشاط

isdn2-2#show modem-pool

modem-pool: System-def-Mpool

modems in pool: 23 active conn: 0

3 no free modems in pool

modem-pool: tito

modems in pool: 1 active conn: 0

4 no free modems in pool

called_party_number: 5557528

max conn allowed: 1, active conn: 0

2 max-conn exceeded, 1 no free modems in pool

modem-pool: System-def-Mpool

!--- This is the default modem pool

modems in pool: 23 active conn: 0

!--- There are 24 modems installed on this access server, !--- 23 are available to the default pool, the other !--- modem is available only to modem-pool tito

3 no free modems in pool

!--- Three failures to allocate a modem from a pool for a user dialing in

modem-pool: tito

!--- Pool named tito

modems in pool: 1 active conn: 0

!--- One modem configured in this pool, 0 active connections to !--- modems in this pool

4 no free modems in pool

!--- Four failed attempts to allocate a modem to a user that dialed in.

called_party_number: 5557528

!--- This is the number of the Cisco access-server that the remote user dialed.

max conn allowed: 1, active conn: 0

!--- Max connection allowed per pool, 0 active

2 max-conn exceeded, 1 no free modems in pool

!--- Failed twice to allocate a modem to the user because the !--- number of connections was exceeded for that pool)

isdn2-2#

التكوين 3: تجميع المودم دون نطاق تجمع

باستثناء الأمر pool-range 3-5 والوسيطة max-conn، يكون هذا التكوين هو نفسه أجهزة المودم المتعددة في تكوين التجمع-النطاق.

تجميع المودم دون نطاق تجمع

!

modem-pool tito

called-number 5557528 max-conn 0

ip domain-name cisco.com

isdn switch-type primary-5ess

!

تلميحات تصحيح الأخطاء والتحقق

لضمان أن التكوين لديك يعمل بشكل صحيح، أستخدم الأمر show. يجب أن يكون الإخراج من هذا الأمر مماثلا للمخرجات التي تلي.

- إظهار تجمع المودم قبل الطلب الأول

isdn2-2#show modem-pool

modem-pool: System-def-Mpool

modems in pool: 24 active conn: 1

3 no free modems in pool

modem-pool: tito

modems in pool: 0 active conn: 0

4 no free modems in pool

called_party_number: 5557528

max conn allowed: 0, active conn: 0

0 max-conn exceeded, 0 no free modems in pool

- إظهار تجمع المودم وتصحيح الأخطاء بعد إشعارات المستخدم وفشل في الاتصال

isdn2-2#debug isdn q931

ISDN Q931 packets debugging is on

isdn2-2#debug modem

Modem control/process activation debugging is on

isdn2-2#

*Mar 1 19:56:50.827: ISDN Se0:23: RX <- SETUP pd = 8 callref = 0x38

*Mar 1 19:56:50.827:     Bearer Capability i = 0x9090A2

*Mar 1 19:56:50.831:     Channel ID i = 0xA98393

*Mar 1 19:56:50.835:     Progress Ind i = 0x8381 - Call not end-to-end

ISDN, may have in-band info

*Mar 1 19:56:50.839:     Calling Party Number i = '!', 0x83, '4085559474'

*Mar 1 19:56:50.843:     Called Party Number i = 0xC1, '4085557528'

*Mar 1 19:56:50.851: ISDN Se0:23: Incoming call id = 0x17

*Mar 1 19:56:50.859: ISDN Se0:23: CALL_INCOMING: MODEM ERROR 2C: bchan 18,

call id 17

*Mar 1 19:56:50.947: ISDN Se0:23: TX -> RELEASE_COMP pd = 8 callref = 0x8038

*Mar 1 19:56:50.951:     Cause i = 0x80AC - Requested channel not available

isdn2-2#

isdn2-2#show modem-pool

modem-pool: System-def-Mpool

modems in pool: 24 active conn: 0

3 no free modems in pool

modem-pool: tito

modems in pool: 0 active conn: 0

4 no free modems in pool

called_party_number: 5557528

max conn allowed: 0, active conn: 0

1 max-conn exceeded, 0 no free modems in pool

التحقق من الصحة

يرجى الرجوع إلى أمثلة التكوين الواردة أعلاه للحصول على معلومات تحقق محددة.

استكشاف الأخطاء وإصلاحها

يرجى الرجوع إلى أمثلة التكوين الواردة أعلاه للحصول على معلومات تحقق محددة.

معلومات ذات صلة

- الدعم الفني - Cisco Systems