المحتويات

المقدمة

تفاصيل إضافية

بدء سريع لعنوان خطأ

1 - قيادة "مجموعة الحموضة"

2. صحة APIC SSD

3. حالة عمليات DME

الخطوات التالية:

1. مشاكل اتصال APIC

2. إيقاف عملية إدارة المحتوى الرقمي (DME)

4. تحقق من الملفات الأساسية

3. جمع الدعم الفني وتحميله إلى SR

المقدمة

يوضح هذا المستند الخطوات التالية لمعالجة الخطأ أدناه:

"Code" : "F0321",

"Description" : "Controller <id> is unhealthy because: Data Layer Partially Degraded Leadership",

"Dn" : "topology/pod-<POD-ID>/node-<NODE-ID>/av/node-<NODE-ID>/fault-F0321",

"Code" : "F0321",

"Description" : "Controller 3 is unhealthy because: Data Layer Partially Diverged"

"Dn" : "topology/pod-<POD-ID>/node-<NODE-ID>/av/node-<NODE-ID>/fault-F0321",

"Code" : "F0325",

"Description" : "Connectivity has been lost to the leader for some data subset(s) of a service on <node >, the service may have unexpectedly restarted or failed",

"Dn" : "topology/pod-<POD-ID>/node-<NODE-ID>/av/node-<NODE-ID>/fault-F0325",

"Code" : "F0323",

"Description" : "Lost connectivity to leader for some data subset(s) of Access <Service> on <controller >",

"Dn" : "topology/pod-<POD-ID>/node-<NODE-ID>/av/node-<NODE-ID>/fault-F0323",

إذا كان لديك بنية واجهة تحكم في الوصول (ACI) متصلة ب Intersight، فسيتم إنشاء طلب خدمة نيابة عنك للإشارة إلى العثور على مثيلات هذا الخطأ داخل بنية واجهة التحكم في الوصول (ACI) المتصلة ب Intersight.

ويثار هذا الخطأ المحدد عندما يكون نظام APIC Cluster غير صحي. يظهر أختلاف طبقة البيانات جزئيا عندما يكون أي من الشارد/النسخة المتماثلة في الأسفل والتي يشار إليها بواسطة "\" في "إخراج Acidag rvread". يمكن أيضا ملاحظة هذا الخطأ عندما تكون النسخة المتماثلة أو قاعدة البيانات مفقودة تماما من APIC المشار إليها ب "X". نحتاج إلى إصلاح أي مشكلة أساسية واستعادة سلامة نظام المجموعة.

ويتم مراقبة هذا الأمر بشكل نشط كجزء من مفاوضات واجهة التحكم في الوصول (ACI) الاستباقية.

تفاصيل إضافية

يرجى عدم تجربة أي خطوات تطفلية مثل إيقاف تشغيل الطاقة أو إعادة التحميل أو الفك لاستكشاف أخطاء مجموعات البيانات وإصلاحها، إذا كانت البنية قيد الإنتاج. قم بتجميع ملفات TS وتحميلها إلى حالة TAC لمعرفة الخطوات الدقيقة لاستعادة مجموعة APIC.

بدء سريع لعنوان خطأ

1 - قيادة "مجموعة الحموضة"

من خلال تشغيل هذا الأمر، فإنه يقوم بالعديد من عمليات التحقق بما في ذلك الاتصال ببروتوكولات APICs. لازم نشوف كل نتائج التحاليل ترجع ماشي. إذا لاحظنا أي شيء غير "موافق"، سنحتاج إلى تفسير السبب.

######## Sample output on a healthy cluster ########

apic1# acidiag cluster

Admin password:

Running...

Checking Wiring and UUID: OK

Checking AD Processes: Running

Checking All Apics in Commission State: OK

Checking All Apics in Active State: OK

Checking Fabric Nodes: OK

Checking Apic Fully-Fit: OK

Checking Shard Convergence: OK

Checking Leadership Degration: Optimal leader for all shards

Ping OOB IPs:

APIC-1: 10.197.204.149 - OK

APIC-2: 10.197.204.150 - OK

APIC-3: 10.197.204.151 - OK

Ping Infra IPs:

APIC-1: 10.0.0.1 - OK

APIC-2: 10.0.0.2 - OK

APIC-3: 10.0.0.3 - OK

Checking APIC Versions: Same (5.2(4d))

Checking SSL: OK

Full file system(s): None

Done!

######## Sample output on a unhealthy cluster ########

apic1# acidiag cluster

Admin password:

Running...

Checking Wiring and UUID: switch(302) reports apic(3) has wireIssue: unapproved-ctrlr

Checking AD Processes: Running

Checking All Apics in Commission State: OK

Checking All Apics in Active State: OK

Checking Fabric Nodes: OK

Checking Apic Fully-Fit: OK

Checking Shard Convergence: OK

Checking Leadership Degration: Non optimal leader for shards : 3:1,3:2,3:4,3:5,3:7,3:8,3:10,3:11,3:13,3:14,3:16,3:17,3:19,3:20,3:22,3:23,3:25,3:26,3:28,3:29,3:31,3:32,6:1,6:2,6:4,6:5,6:7,6:8,6:10,6:11,6:13,6:14,6:16,6:17,6:19,6:20,6:22,6:23,6:25,6:26,6:28,6:29,6:31,6:32,9:1,9:2,9:4,9:5,9:7,9:8,9:10,9:11,9:13,9:14,9:16,9:17,9:19,9:20,9:22,9:23,9:25,9:26,9:28,9:29,9:31,9:32,10:1,10:2,10:4,10:5,10:7,10:8,10:10,10:11,10:13,10:14,10:16,10:17,10:19,10:20,10:22,10:23,10:25,10:26,10:28,10:29,10:31,10:32,11:1,11:2,11:4,11:5,11:7,11:8,11:10,11:11,11:13,11:14,11:16,11:17,11:19,11:20,11:22,11:23,11:25,11:26,11:28,11:29,11:31,11:32,14:1,14:2,14:4,14:5,14:7,14:8,14:10,14:11,14:13,14:14,14:16,14:17,14:19,14:20,14:22,14:23,14:25,14:26,14:28,14:29,14:31,14:32,16:1,16:2,16:4,16:5,16:7,16:8,16:10,16:11,16:13,16:14,16:16,16:17,16:19,16:20,16:22,16:23,16:25,16:26,16:28,16:29,16:31,16:32,22:1,22:2,22:4,22:5,22:7,22:8,22:10,22:11,22:13,22:14,22:16,22:17,22:19,22:20,22:22,22:23,22:25,22:26,22:28,22:29,22:31,22:32,23:1,23:2,23:4,23:5,23:7,23:8,23:10,23:11,23:13,23:14,23:16,23:17,23:19,23:20,23:22,23:23,23:25,23:26,23:28,23:29,23:31,23:32,33:1,34:1,34:2,34:4,34:5,34:7,34:8,34:10,34:11,34:13,34:14,34:16,34:17,34:19,34:20,34:22,34:23,34:25,34:26,34:28,34:29,34:31,34:32,35:1,35:2,35:4,35:5,35:7,35:8,35:10,35:11,35:13,35:14,35:16,35:17,35:19,35:20,35:22,35:23,35:25,35:26,35:28,35:29,35:31,35:32,36:1,39:1,39:2,39:4,39:5,39:7,39:8,39:10,39:11,39:13,39:14,39:16,39:17,39:19,39:20,39:22,39:23,39:25,39:26,39:28,39:29,39:31,39:32

Ping OOB IPs:

APIC-1: 10.197.204.184 - OK

APIC-2: 10.197.204.185 - OK

APIC-3: 10.197.204.186 - OK

Ping Infra IPs:

APIC-1: 10.0.0.1 - OK

APIC-2: 10.0.0.2 - OK

APIC-3: 10.0.0.3 - OK

Checking APIC Versions: Same (5.2(3e))

Checking SSL: OK

Full file system(s): None

Done!

2. صحة APIC SSD

تأكد من أن محركات الأقراص المزودة بذاكرة مصنوعة من مكونات صلبة (SSD) الخاصة بواجهة برمجة التطبيقات (APIC) بحالة صحية وأن أحد هذه العيوب لم يتم إثارته على بنية بنية ACI - F2730 و F2731 و F2732. فيما يلي الأوامر التي يتم تشغيلها على واجهة سطر الأوامر (CLI) لواجهة سطر الأوامر (APIC) لمعرفة ما إذا كان أي من هذه الأخطاء موجودا أو يمكن التحقق من صحته على واجهة المستخدم الرسومية (GUI) (النظام > الأخطاء)

- إظهار وحدة التحكم F2730 الخاصة برمز الأخطاء

- إظهار وحدة التحكم في رمز الأخطاء F2731

- إظهار وحدة التحكم F2732 الخاصة برمز الأخطاء

#####  Example:

# faultRecord

ack             : no

cause           : equipment-wearout

changeSet       : available:unspecified, blocks:unspecified, capUtilized:0, device:Solid State Device, fileSystem:/dev/sdb, firmwareVersion:Dxxxxxxx, mediaWearout:1, model:INTEL SSDSC2BB120G4, mount:/dev/sdb, name:/dev/sdb, operSt:ok, serial:ABCDxxxxxxxxxxxXYZ, used:unspecified

childAction     :

code            : F2730

created         : 2022-01-10T03:13:08.026+00:00

delegated       : no

descr           : Storage unit /dev/sdb on Node 3 with hostname apic1.cisco.com mounted at /dev/sdb has 1% life remaining

dn              : topology/pod-2/node-3/sys/ch/p-[/dev/sdb]-f-[/dev/sdb]/fault-F2730

domain          : infra

highestSeverity : warning

lastTransition  : 2022-01-10T03:13:08.026+00:00

lc              : raised

occur           : 1

origSeverity    : warning

prevSeverity    : warning

rule            : eqpt-storage-wearout-warning

severity        : warning

status          :

subject         : equipment-wearout

type            : operational

# faultRecord

ack             : no

cause           : equipment-wearout

changeSet       : available:unspecified, blocks:unspecified, capUtilized:0, device:Solid State Device, fileSystem:/dev/sdb, firmwareVersion:Dxxxxxxx, mediaWearout:1, model:INTEL SSDSC2BB120G4, mount:/dev/sdb, name:/dev/sdb, operSt:ok, serial:ABCDxxxxxxxxxxxXYZ, used:unspecified

childAction     :

code            : F2731

created         : 2022-01-10T03:13:08.026+00:00

delegated       : no

descr           : Storage unit /dev/sdb on Node 3 mounted at /dev/sdb has 1% life remaining

dn              : topology/pod-2/node-3/sys/ch/p-[/dev/sdb]-f-[/dev/sdb]/fault-F2731

domain          : infra

highestSeverity : major

lastTransition  : 2022-01-10T03:13:08.026+00:00

lc              : raised

occur           : 1

origSeverity    : major

prevSeverity    : major

rule            : eqpt-storage-wearout-major

severity        : major

status          :

subject         : equipment-wearout

type            : operational

3. حالة عمليات DME

التحقق مما إذا كانت كافة عمليات DME قيد التشغيل

تشغيل PS -aux | egrep "svc|nginx.bin|dhcp"

الناتج المتوقع أدناه:

apic1# ps -ef | egrep "svc|nginx.bin|dhcp"

root      3063     1  5 22:08 ?        00:04:40 /mgmt//bin/nginx.bin -p /data//nginx/

root      8889     1  7 21:53 ?        00:06:43 /mgmt//bin/svc_ifc_appliancedirector.bin --x

ifc       8891     1  1 21:53 ?        00:01:29 /mgmt//bin/svc_ifc_policydist.bin --x

root      8893     1  2 21:53 ?        00:02:28 /mgmt//bin/svc_ifc_bootmgr.bin --x

ifc       8894     1  1 21:53 ?        00:01:41 /mgmt//bin/svc_ifc_vmmmgr.bin --x

ifc       8895     1  2 21:53 ?        00:02:14 /mgmt//bin/svc_ifc_topomgr.bin --x

ifc       8901     1  2 21:53 ?        00:02:22 /mgmt//bin/svc_ifc_observer.bin --x

root      8903     1  1 21:53 ?        00:01:40 /mgmt//bin/svc_ifc_plgnhandler.bin --x

ifc       8914     1  1 21:53 ?        00:01:34 /mgmt//bin/svc_ifc_domainmgr.bin --x

ifc       8915     1  2 21:53 ?        00:02:04 /mgmt//bin/svc_ifc_dbgr.bin --x

ifc       8917     1  1 21:53 ?        00:01:34 /mgmt//bin/svc_ifc_edmgr.bin --x

ifc       8918     1  1 21:53 ?        00:01:22 /mgmt//bin/svc_ifc_vtap.bin --x

ifc       8922     1  2 21:53 ?        00:02:09 /mgmt//bin/svc_ifc_eventmgr.bin --x

ifc       8925     1  3 21:53 ?        00:03:15 /mgmt//bin/svc_ifc_reader.bin --x

ifc       8929     1  1 21:53 ?        00:01:34 /mgmt//bin/svc_ifc_idmgr.bin --x

ifc       8930     1  1 21:53 ?        00:01:26 /mgmt//bin/svc_ifc_licensemgr.bin --x

ifc       8937     1  3 21:53 ?        00:03:18 /mgmt//bin/svc_ifc_policymgr.bin --x

ifc       8941     1  1 21:53 ?        00:01:34 /mgmt//bin/svc_ifc_scripthandler.bin --x

root     11157     1  1 21:54 ?        00:01:29 /mgmt//bin/dhcpd.bin -f -4 -cf /data//dhcp/dhcpd.conf -lf /data//dhcp/dhcpd.lease -pf /var/run//dhcpd.pid --no-pid bond0.3902

root     11170     1  4 21:54 ?        00:04:15 /mgmt//bin/svc_ifc_ae.bin --x

admin    17094 16553  0 23:27 pts/0    00:00:00 grep -E svc|nginx.bin|dhcp

يمكنك التحقق من رمز الخطأ F1419 ل DMEs الفاشلة.

apic1# show faults code F1419 history

ID                     : 4294971876

Description            : Service policymgr failed on apic bgl-aci02-apic1 of fabric

POD02 with a hostname bgl-aci02-apic1

Severity               : major

DN                     : subj-[topology/pod-1/node-1/sys/proc/proc-

policymgr]/fr-4294971876

Created                : 2022-03-21T18:29:20.570+12:00

Code                   : F1419

Type                   : operational

Cause                  : service-failed

Change Set             : id (Old: 5152, New: 0), maxMemAlloc (Old: 1150246912, New:

0), operState (Old: up, New: down)

Action                 : creation

Domain                 : infra

Life Cycle             : soaking

Count Fault Occurred   : 1

Acknowledgement Status : no

الخطوات التالية:

1. مشاكل اتصال APIC

إذا كان هناك فقدان في الاتصال بين القردة العليا يمكن أن يكون أحد الأسباب المحتملة مشاكل متذبذبة. سيظهر أمر مجموعة الحموضة أيضا أي نوع من مشاكل الأسلاك موجودة على الارتباط. فيما يلي كل الأمور المحتملة المتعلقة بالأسلاك:

ctrlr-uid-mismatch - APIC UUID حالة عدم توافق (معرف APIC مكرر)

Fabric-domain-mismatch - تنتمي العقدة المجاورة إلى بنية مختلفة

عدم تطابق الأسلاك - اتصال غير صالح (من الورقة إلى الورقة، ومن العمود الفقري إلى غير الورقة، ومن منفذ من النسيج الطرفي إلى غير العمود الفقري، إلخ).

adajeceny - لا يوجد تجاور LLDP على منفذ البنية

infra-vlan-mismatch - عدم تطابق تحت شبكة VLAN بين الورقة وواجهة برمجة التطبيقات (APIC).

pod-id-mismatch - عدم تطابق معرف Pod بين APIC و Leaf

Unapproved-Ctrlr - لم يتم إكمال مصافحة SSL بين APIC والورقة المتصلة.

Unapproved-Serialnumber - كشف عن عقدة غير موجودة في قاعدة بيانات APIC.

2. إيقاف عملية إدارة المحتوى الرقمي (DME)

إذا لم يتم دمج الإخراج من قسم حالة عملية DME مع الإخراج المتوقع. حاول بدء تشغيل DME باستخدام 'acidiag start <dme>' على سبيل المثال إذا كان svc_ifc_eventmgr مفقودا، فحاول 'acidag start eventMGR'

apic1# ps -aux | egrep "svc|nginx.bin|dhcp"

root      5112  7.3  0.4 1033952 323180 ?      Ssl  Mar10 3073:27 /mgmt//bin/svc_ifc_appliancedirector.bin --x

ifc       5117  1.7  0.6 1062664 439876 ?      Ssl  Mar10 720:52 /mgmt//bin/svc_ifc_topomgr.bin --x

ifc       5118  2.1  2.2 2164512 1468200 ?     Ssl  Mar10 884:11 /mgmt//bin/svc_ifc_policymgr.bin --x

ifc       5119  1.5  0.3 1115984 256904 ?      Ssl  Mar10 664:51 /mgmt//bin/svc_ifc_licensemgr.bin --x

ifc       5120  1.5  0.5 1088252 356760 ?      Ssl  Mar10 666:26 /mgmt//bin/svc_ifc_edmgr.bin --x

root      5121  1.6  0.6 1125948 423392 ?      Ssl  Mar10 698:11 /mgmt//bin/svc_ifc_bootmgr.bin --x

ifc       5123  2.3  1.2 1474388 800564 ?      Ssl  Mar10 994:15 /mgmt//bin/svc_ifc_eventmgr.bin --x

ifc       5126  1.5  8.2 6032524 5363184 ?     Ssl  Mar10 635:58 /mgmt//bin/svc_ifc_reader.bin --x

root      5130  4.6  0.6 1092480 439580 ?      Ssl  Mar10 1927:08 /mgmt//bin/svc_ifc_ae.bin --x

ifc       5132  1.6  0.8 1312136 567420 ?      Ssl  Mar10 689:43 /mgmt//bin/svc_ifc_vmmmgr.bin --x

ifc       5133  1.5  0.5 1064176 346760 ?      Ssl  Mar10 659:03 /mgmt//bin/svc_ifc_domainmgr.bin --x

ifc       5135  1.8  1.6 1736876 1099924 ?     Ssl  Mar10 770:39 /mgmt//bin/svc_ifc_observer.bin --x

root      5141  1.5  0.7 1092948 458156 ?      Ssl  Mar10 663:41 /mgmt//bin/svc_ifc_plgnhandler.bin --x

ifc       5146  2.0  0.6 1037676 397236 ?      Ssl  Mar10 857:43 /mgmt//bin/svc_ifc_idmgr.bin --x

ifc       5148  1.3  0.3 650596 222336 ?       Ssl  Mar10 580:25 /mgmt//bin/svc_ifc_vtap.bin --x

ifc       5160  1.6  0.6 1098280 453492 ?      Ssl  Mar10 669:17 /mgmt//bin/svc_ifc_scripthandler.bin --x

root      7089  1.4  0.4 856360 315016 ?       Ssl  Mar10 592:04 /mgmt//bin/dhcpd.bin -f -4 -cf /data//dhcp/dhcpd.conf -lf /data//dhcp/dhcpd.lease -pf /var/run//dhcpd.pid --no-pid bond0.3903

admin    29834  0.0  0.0 112800  1780 pts/1    S+   17:22   0:00 grep -E svc|nginx.bin|dhcp

ifc      30432  1.4  0.6 894088 405968 ?       Ssl  Mar17 473:45 /mgmt//bin/svc_ifc_policydist.bin --x

root     31215  2.8  5.2 4503880 3397276 ?     Ssl  Apr05 124:08 /mgmt//bin/nginx.bin -p /data//nginx/

في الإخراج أعلاه، يكون svc_ifc_dbgr.bin مفقودا عند مقارنته بالناتج المتوقع المذكور في قسم حالة عملية DME. يمكننا بدء العملية باستخدام "إعادة تشغيل DBGR"

apic1# acidiag start dbgr

apic1# ps -aux | egrep "svc|nginx.bin|dhcp"

root      5112  7.3  0.4 1033952 323240 ?      Ssl  Mar10 3073:43 /mgmt//bin/svc_ifc_appliancedirector.bin --x

ifc       5117  1.7  0.6 1062664 439876 ?      Ssl  Mar10 720:56 /mgmt//bin/svc_ifc_topomgr.bin --x

ifc       5118  2.1  2.2 2164512 1468200 ?     Ssl  Mar10 884:16 /mgmt//bin/svc_ifc_policymgr.bin --x

ifc       5119  1.5  0.3 1115984 256904 ?      Ssl  Mar10 664:55 /mgmt//bin/svc_ifc_licensemgr.bin --x

ifc       5120  1.5  0.5 1088252 356760 ?      Ssl  Mar10 666:30 /mgmt//bin/svc_ifc_edmgr.bin --x

root      5121  1.6  0.6 1125948 423392 ?      Ssl  Mar10 698:15 /mgmt//bin/svc_ifc_bootmgr.bin --x

ifc       5123  2.3  1.2 1474388 800784 ?      Ssl  Mar10 994:21 /mgmt//bin/svc_ifc_eventmgr.bin --x

ifc       5126  1.5  8.2 6032524 5363184 ?     Ssl  Mar10 636:01 /mgmt//bin/svc_ifc_reader.bin --x

root      5130  4.6  0.6 1092480 439580 ?      Ssl  Mar10 1927:18 /mgmt//bin/svc_ifc_ae.bin --x

ifc       5132  1.6  0.8 1312136 567420 ?      Ssl  Mar10 689:46 /mgmt//bin/svc_ifc_vmmmgr.bin --x

ifc       5133  1.5  0.5 1064176 346760 ?      Ssl  Mar10 659:07 /mgmt//bin/svc_ifc_domainmgr.bin --x

ifc       5135  1.8  1.6 1736876 1099924 ?     Ssl  Mar10 770:43 /mgmt//bin/svc_ifc_observer.bin --x

root      5141  1.5  0.7 1092948 458156 ?      Ssl  Mar10 663:45 /mgmt//bin/svc_ifc_plgnhandler.bin --x

ifc       5146  2.0  0.6 1037676 397236 ?      Ssl  Mar10 857:48 /mgmt//bin/svc_ifc_idmgr.bin --x

ifc       5148  1.3  0.3 650596 222336 ?       Ssl  Mar10 580:28 /mgmt//bin/svc_ifc_vtap.bin --x

ifc       5160  1.6  0.6 1098280 453492 ?      Ssl  Mar10 669:21 /mgmt//bin/svc_ifc_scripthandler.bin --x

root      7089  1.4  0.4 856360 315016 ?       Ssl  Mar10 592:07 /mgmt//bin/dhcpd.bin -f -4 -cf /data//dhcp/dhcpd.conf -lf /data//dhcp/dhcpd.lease -pf /var/run//dhcpd.pid --no-pid bond0.3903

ifc       7609  126  0.5 987404 362824 ?       Ssl  17:25   0:02 /mgmt//bin/svc_ifc_dbgr.bin --x  <=====

admin     7762  0.0  0.0 112800  1668 pts/1    S+   17:26   0:00 grep -E svc|nginx.bin|dhcp

ifc      30432  1.4  0.6 894088 405968 ?       Ssl  Mar17 473:48 /mgmt//bin/svc_ifc_policydist.bin --x

root     31215  2.8  5.2 4503880 3397252 ?     Ssl  Apr05 124:13 /mgmt//bin/nginx.bin -p /data//nginx/

بعد تشغيل "Acidiag start dbgr" بدأت العملية مرة أخرى. إذا لم يظهر لديك بدء تشغيل العملية، فيرجى الرجوع إلى TAC لمزيد من أستكشاف الأخطاء وإصلاحها.

4. تحقق من الملفات الأساسية

قم بتشغيل show core، إذا كان هناك أي ملفات أساسية قم بتحميلها إلى SR.

apic1# show core

Node  Module  Creation-Time  File-Size  Service       Process  Original-Location   Exit-Code  Death-Reason  Last-Heartbeat

----  ------  -------------  ---------  ------------  -------  ------------------  ---------  ------------  --------------

Ctrlr-Id  Creation-Time          File-Size  Service       Process  Original-Location                         Exit-Code

--------  ---------------------  ---------  ------------  -------  ----------------------------------------  ---------

1         2021-10-05T21:19:55.0  204534444  eventmgr      22453    /dmecores/svc_ifc_eventmgr.bin_log.22453  134

00-07:00                                                 .tar.gz

ارجع إلى الارتباط الخاص بالدراسة الأساسية https://www.cisco.com/c/en/us/support/docs/cloud-systems-management/application-policy-infrastructure-controller-apic/214520-guide-to-collect-tech-support-and-tac-re.html

3. جمع الدعم الفني وتحميله إلى SR

التقط سجلات APIC TS، وتحميلها إلى SR، لمزيد من أستكشاف الأخطاء وإصلاحها. https://www.cisco.com/c/en/us/support/docs/cloud-systems-management/application-policy-infrastructure-controller-apic/214520-guide-to-collect-tech-support-and-tac-re.html