المحتويات

المقدمة

قبل البدء

الاصطلاحات

المتطلبات الأساسية

المكونات المستخدمة

النظرية الأساسية

التكوين

الرسم التخطيطي للشبكة

التكوينات

التحقق من الصحة

استكشاف الأخطاء وإصلاحها

معلومات ذات صلة

المقدمة

يحتوي هذا المستند على أوصاف وتكوينات وعمليات تحقق لتغليف التوجيه العام (GRE) في بيئة كبلية. GRE هو بروتوكول إنشاء أنفاق مطوّر من قبل Cisco يمكنه تضمين مجموعة متنوعة من أنواع حزم بروتوكولات طبقة الشبكة داخل أنفاق IP.

قبل البدء

الاصطلاحات

للحصول على مزيد من المعلومات حول اصطلاحات المستندات، راجع اصطلاحات تلميحات Cisco التقنية.

المتطلبات الأساسية

لا توجد متطلبات أساسية خاصة لهذا المستند.

المكونات المستخدمة

تستند المعلومات الواردة في هذا المستند إلى إصدارات البرامج والمكونات المادية أدناه.

- مودم الكبل uBR924 الذي يشغل برنامج Cisco IOS® الإصدار 12.1(5)T4

ملاحظة: على الرغم من أنه من الممكن تكوين أنفاق GRE في منصات مودم كبل Cisco الأخرى، مثل على uBR904 باستخدام إصدارات مختلفة من Cisco IOS، فإن الدعم الرسمي لهذه الميزة هو على Cisco IOS 12.1(5)T4 ل uBR920 ومن Cisco IOS 12.1(3) ل uBR910.

النظام الأساسي لمودم الكبل

إصدار برنامج IOS من Cisco

uBR920

12.1(5)T4

uBR910

من 12.1(3) وما بعده

لتشغيل هذا التكوين، يلزمك توفر اتصال IP بين أجهزة مودم الكبل.

تم إنشاء المعلومات المُقدمة في هذا المستند من الأجهزة الموجودة في بيئة معملية خاصة. بدأت جميع الأجهزة المُستخدمة في هذا المستند بتكوين ممسوح (افتراضي). إذا كنت تعمل في شبكة مباشرة، فتأكد من فهمك للتأثير المحتمل لأي أمر قبل استخدامه.

النظرية الأساسية

يوفر الاتصال النفقي طريقة لتضمين الحزم من بروتوكول خارجي داخل بروتوكول نقل. يتم تنفيذ الاتصال النفقي كواجهة افتراضية لتوفير واجهة بسيطة للتكوين. لا يتم ربط واجهة النفق ببروتوكولات نقل أو ركاب معينة، ومع ذلك، فهي بنية تم تصميمها لتوفير الخدمات الضرورية لتنفيذ أي مخطط تضمين قياسي من نقطة إلى نقطة. تكون الأنفاق إرتباطات من نقطة إلى نقطة، ويجب عليك تكوين نفق منفصل لكل إرتباط.

تقوم GRE بإنشاء إرتباط ظاهري من نقطة إلى نقطة بموجهات Cisco عند نقاط بعيدة عبر شبكة IP البينية. من خلال توصيل الشبكات الفرعية متعددة البروتوكولات في بيئة أساسية أحادية البروتوكول، تتيح أنفاق IP باستخدام GRE إمكانية توسيع الشبكة عبر بيئة أساسية أحادية البروتوكول. نظام توصيل مودم الكبل (CMTS) هو أي موجه كبل وحدة الاستقبال والبث عبر الكبلات (DOCSIS) متوافق مع مواصفات واجهة خدمة البيانات المنقولة عبر الكبلات، مثل Cisco uBR7246، أو uBR7223، أو uBR7246VXR.

التكوين

في هذا القسم، تُقدّم لك معلومات تكوين الميزات الموضحة في هذا المستند.

الرسم التخطيطي للشبكة

يستخدم هذا المستند إعداد الشبكة الموضح في الرسم التخطيطي أدناه.

يقوم هذا الإعداد بإنشاء نفق بين مودم الكبل uBR924-ddd5 و uBR924-b5db. يستخدم المثال التالي وحدتي uBR924s و uBR7246VXR. بالنسبة لهذا الإعداد، أسماء أجهزة مودم الكبلات هي uBR924-ddd5 و uBR924-b5db، وهي تستخدم الإصدار 12.1(5)T4 من Cisco IOS. يتم إنشاء واجهات النفق ديناميكيا في وضع التكوين العام من خلال إصدار الأمر interface tunnel 0.

ملاحظة: لا يلزم توصيل أجهزة مودم كبل uBR900 ب CMTS نفسه uBR7200 أو شبكة مزود الخدمة نفسه طالما كان هناك اتصال IP بين أجهزة مودم الكبل.

التكوينات

يستخدم هذا المستند التكوينات الموضحة أدناه.

ملاحظة: يشير النص الغامق إلى الأوامر ذات الصلة ب GRE. التعليقات تكون بالأزرق وتشير إلى السطر أعلاه.

uBR924-d5

version 12.1

no service single-slot-reload-enable

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname ubr924-ddd5

!

logging rate-limit console 10 except errors

!

clock timezone - -80

ip subnet-zero

no ip finger

!

call rsvp-sync

!

!

!

!

!

!

!

!

!

!

interface Tunnel0

!--- Tunnel interface 0.

ip address 192.168.20.1 255.255.255.0

!--- IP address of the GRE tunnel interface 0.

tunnel source Ethernet0

!--- IP source of the tunnel. It is best to make this an !--- interface with a public, routable IP address so that !--- it is reachable from the other endpoint of the tunnel.

tunnel destination 11.11.11.11

!--- IP destination of the tunnel. Make sure this is !--- reachable via the ping command !--- Otherwise, the tunnel will not be created properly.

!

interface Ethernet0

ip address 9.9.9.9 255.255.255.0

ip rip send version 2

!--- Send RIP version 2 packets.

ip rip receive version 2

!--- Receive RIP version 2 packets.

!

interface cable-modem0

ip rip send version 2

!--- Send RIP version 2 packets.

ip rip receive version 2

!--- Receive RIP version 2 packets.

cable-modem downstream saved channel 525000000 40 1

cable-modem mac-timer t2 40000

no cable-modem compliant bridge

!

router rip

version 2

passive-interface Tunnel0

!--- This command is used to avoid recursive routing.

network 10.0.0.0

network 9.0.0.0

no auto-summary

!

ip default-gateway 10.1.4.1

ip classless

no ip http server

no ip http cable-monitor

!

snmp-server packetsize 4096

snmp-server manager

!

voice-port 0

input gain -2

!

voice-port 1

input gain -2

!

!

line con 0

transport input none

line vty 0 4

login

!

end

ubr924-ddd5#

uBR924-b5db

version 12.1

no service single-slot-reload-enable

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname ubr924-b5db

!

logging rate-limit console 10 except errors

enable password ww

!

clock timezone - -80

ip subnet-zero

no ip finger

!

mgcp

call rsvp-sync

!

!

!

!

!

!

!

!

!

!

interface Tunnel0

!--- Tunnel interface 0

ip address 192.168.20.2 255.255.255.0

!--- IP address of the gre tunnel interface 0

tunnel source Ethernet0

!--- IP source of the tunnel. It is best to make this an !--- interface with a public, routable IP address so that !--- it is reachable from the other endpoint of the tunnel.

tunnel destination 9.9.9.9

!--- IP destination of the tunnel. Make sure this is !--- reachable via the ping command !--- Otherwise, the tunnel will not be created properly.

!

interface Ethernet0

ip address 11.11.11.11 255.255.255.0

ip rip send version 2

!--- Send RIP version 2 packets.

ip rip receive version 2

!--- Receive RIP version 2 packets.

!

no ip route-cache

no ip mroute-cache

!

interface cable-modem0

ip rip send version 2

!--- Send RIP version 2 packets.

ip rip receive version 2

!--- Receive RIP version 2 packets.

no ip route-cache

no ip mroute-cache

no cable-modem compliant bridge

!

router rip

version 2

passive-interface Tunnel0

!--- This command is used to avoid recursive routing.

network 10.0.0.0

network 11.0.0.0

no auto-summary

!

ip default-gateway 10.1.4.1

ip classless

no ip http server

no ip http cable-monitor

!

snmp-server packetsize 4096

snmp-server manager

!

voice-port 0

input gain -2

!

voice-port 1

input gain -2

!

!

line con 0

exec-timeout 0 0

transport input none

line vty 0 4

password ww

login

!

end

ubr924-b5db#

التحقق من الصحة

يوفر هذا القسم معلومات يمكنك إستخدامها للتأكد من أن التكوين يعمل بشكل صحيح.

يتم دعم بعض أوامر العرض بواسطة أداة مترجم الإخراج، والتي تتيح لك عرض تحليل إخراج أمر العرض.

تحقق من صحة تكوين CMTS (7246VXR)، ومن اتصال أجهزة مودم الكبلات. يتم عرض تكوين CMTS أدناه.

7246VXR#show run

Building configuration...

Current configuration : 4579 bytes

!

! Last configuration change at 13:22:17 PDT Mon Feb 26 2001

! NVRAM config last updated at 13:22:46 PDT Mon Feb 26 2001

!

version 12.1

no service single-slot-reload-enable

no service pad

service timestamps debug datetime msec localtime

service timestamps log datetime localtime

no service password-encryption

service linenumber

service udp-small-servers max-servers no-limit

!

hostname 7246VXR

!

logging buffered 1000000 debugging

logging rate-limit console 10 except errors

enable password cable

!

cable qos profile 8

cable qos profile 10

cable qos profile 10 grant-size 1500

cable qos profile 12 guaranteed-upstream 100000

no cable qos permission create

no cable qos permission update

cable qos permission modems

cable time-server

clock timezone PDT -8

clock summer-time PDT recurring

clock calendar-valid

ip subnet-zero

no ip finger

!

interface Ethernet2/0

ip address 172.16.30.4 255.255.255.192

no ip mroute-cache

half-duplex

!

interface Cable4/0

ip address 172.16.29.1 255.255.255.224 secondary

ip address 10.1.4.1 255.255.255.0

no keepalive

cable downstream rate-limit token-bucket shaping

cable downstream annex B

cable downstream modulation 64qam

cable downstream interleave-depth 32

cable downstream frequency 555000000

cable upstream 0 frequency 40000000

cable upstream 0 power-level 0

no cable upstream 0 shutdown

cable upstream 1 shutdown

cable upstream 2 shutdown

cable upstream 3 shutdown

cable upstream 4 shutdown

cable upstream 5 shutdown

cable dhcp-giaddr policy

cable helper-address 172.16.30.2

!

interface Cable5/0

ip address 172.16.29.225 255.255.255.224 secondary

ip address 10.1.5.1 255.255.255.0

load-interval 30

no keepalive

cable downstream rate-limit token-bucket shaping

cable downstream annex B

cable downstream modulation 64qam

cable downstream interleave-depth 32

cable downstream frequency 620000000

cable upstream 0 frequency 25008000

cable upstream 0 power-level 0

no cable upstream 0 shutdown

no cable upstream 1 shutdown

cable dhcp-giaddr policy

!

router eigrp 202

redistribute connected

redistribute static

network 10.0.0.0

network 172.16.0.0

no auto-summary

no eigrp log-neighbor-changes

!

router rip

version 2

redistribute connected

redistribute static

network 10.0.0.0

network 172.16.0.0

no auto-summary

!

ip default-gateway 172.16.30.1

ip classless

ip route 0.0.0.0 0.0.0.0 172.16.30.1

ip route 172.16.30.0 255.255.255.0 Ethernet2/0

ip http server

ip http authentication local

!

access-list 188 permit tcp any any eq www log

access-list 188 permit ip any any

route-map docsis permit 10

!

snmp-server engineID local 00000009020000E01ED77E40

snmp-server community public RO

snmp-server community private RW

line con 0

exec-timeout 0 0

transport input none

line aux 0

speed 19200

line vty 0 4

session-timeout 60

exec-timeout 0 0

!

ntp clock-period 17179973

end

7246VXR#show cable modem

Interface   Prim Online     Timing Rec    QoS CPE IP address      MAC address

Sid  State      Offset Power

Cable4/0/U0 69   online     2812    0.25  5   0   10.1.4.3        0002.1685.b5db

Cable4/0/U0 70   online     2288    0.00  5   0   10.1.4.6        0010.7bed.9b23

Cable4/0/U0 71   online     2289    0.50  5   0   10.1.4.2        0010.7bed.9b45

Cable4/0/U0 72   online     2812    0.00  5   0   10.1.4.4        0002.fdfa.0a63

Cable4/0/U0 73   online     2812   -0.75  5   0   10.1.4.5        0004.2752.ddd5

Cable4/0/U0 74   online     2813    0.25  5   0   10.1.4.7        0001.64ff.e47d

إذا لم تظهر حالة أجهزة مودم الكبل على الإنترنت ، فارجع إلى أستكشاف أخطاء أجهزة مودم كبل uBR التي لا تظهر المستند على الإنترنت وإصلاحها.

7246VXR#show ip interface brief

Interface                  IP-Address      OK? Method Status                Protocol

FastEthernet0/0            192.168.7.253   YES NVRAM  up                    down

Ethernet2/0                172.16.30.4     YES manual up                    up

Ethernet2/1                unassigned      YES NVRAM  administratively down down

Ethernet2/2                unassigned      YES NVRAM  administratively down down

Ethernet2/3                unassigned      YES NVRAM  administratively down down

Cable3/0                   10.1.3.1        YES manual up                    up

Cable4/0                   10.1.4.1        YES manual up                    up

Cable5/0                   10.1.5.1        YES manual up                    up

7246VXR#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 172.16.30.1 to network 0.0.0.0

172.16.0.0/16 is variably subnetted, 4 subnets, 3 masks

C       172.16.29.224/27 is directly connected, Cable5/0

C       172.16.29.0/27 is directly connected, Cable4/0

S       172.16.30.0/24 is directly connected, Ethernet2/0

C       172.16.30.0/26 is directly connected, Ethernet2/0

9.0.0.0/24 is subnetted, 1 subnets

R       9.9.9.0 [120/1] via 10.1.4.5, 00:00:09, Cable4/0

R    192.168.20.0/24 [120/1] via 10.1.4.5, 00:00:09, Cable4/0

10.0.0.0/8 is variably subnetted, 5 subnets, 2 masks

C       10.1.3.0/24 is directly connected, Cable3/0

R       10.5.5.0/24 [120/1] via 10.1.4.4, 00:00:01, Cable4/0

R       10.0.0.0/8 [120/1] via 172.16.30.10, 00:00:24, Ethernet2/0

C       10.1.5.0/24 is directly connected, Cable5/0

C       10.1.4.0/24 is directly connected, Cable4/0

11.0.0.0/24 is subnetted, 1 subnets

R       11.11.11.0 [120/1] via 10.1.4.3, 00:00:15, Cable4/0

S*   0.0.0.0/0 is directly connected

من جانب أجهزة مودم الكبل، تحقق من إصدار sh من كلا الجهازين، كما هو موضح أدناه.

ubr924-ddd5#sh ver

Cisco Internetwork Operating System Software

IOS (tm) 920 Software (UBR920-K1V4Y556I-M), Version 12.1(5)T4,  RELEASE SOFTWARE (fc1)

TAC Support: http://www.cisco.com/pcgi-bin/ibld/view.pl?i=support

Copyright (c) 1986-2001 by cisco Systems, Inc.

Compiled Fri 02-Feb-01 10:55 by ccai

Image text-base: 0x800100A0, data-base: 0x806DB770

ROM: System Bootstrap, Version 12.0(6r)T3, RELEASE SOFTWARE (fc1)

ROM: 920 Software (UBR920-K1V4Y556I-M), Version 12.1(5)T4,  RELEASE SOFTWARE (fc1)

ubr924-ddd5 uptime is 2 hours, 1 minute

System returned to ROM by reload at 12:45:25 - Fri Feb 23 2001

System restarted at 12:46:07 - Fri Feb 23 2001

System image file is "flash:ubr920-k1v4y556i-mz.121-5.T4"

cisco uBR920 CM (MPC850) processor (revision 4.d) with 15872K/1024K bytes of memory.

Processor board ID FAA0444Q14Z

Bridging software.

1 Ethernet/IEEE 802.3 interface(s)

1 Cable Modem network interface(s)

3968K bytes of processor board System flash (Read/Write)

1536K bytes of processor board Boot flash (Read/Write)

Configuration register is 0x2102

ubr924-b5db#show ver

Cisco Internetwork Operating System Software

IOS (tm) 920 Software (UBR920-K1V4Y556I-M), Version 12.1(5)T4,  RELEASE SOFTWARE (fc1)

TAC Support: http://www.cisco.com/pcgi-bin/ibld/view.pl?i=support

Copyright (c) 1986-2001 by cisco Systems, Inc.

Compiled Fri 02-Feb-01 10:55 by ccai

Image text-base: 0x800100A0, data-base: 0x806DB770

ROM: System Bootstrap, Version 12.0(6r)T3, RELEASE SOFTWARE (fc1)

ROM: 920 Software (UBR920-K1V4Y556I-M), Version 12.1(5)T4,  RELEASE SOFTWARE (fc1)

ubr924-b5db uptime is 1 hour, 53 minutes

System returned to ROM by reload at 12:55:34 - Fri Feb 23 2001

System restarted at 12:56:15 - Fri Feb 23 2001

System image file is "flash:ubr920-k1v4y556i-mz.121-5.T4"

cisco uBR920 CM (MPC850) processor (revision 3.e) with 15872K/1024K bytes of memory.

Processor board ID FAA0422Q04F

Bridging software.

1 Ethernet/IEEE 802.3 interface(s)

1 Cable Modem network interface(s)

3968K bytes of processor board System flash (Read/Write)

1536K bytes of processor board Boot flash (Read/Write)

Configuration register is 0x2102

يظهر النفق لأعلى/لأعلى، ما دامت الشروط التالية موجودة:

- تم تكوينه بعناوين IP صالحة.

- هناك مسار في جدول التوجيه إلى عنوان IP لوجهة النفق، وليس عنوان IP المعين إلى الطرف البعيد من النفق.

يجب أن يكون هذا صحيحا بغض النظر عما إذا كان يمكنك إختبار اتصال عنوان الوجهة أم لا. مسار ثابت غير صحيح أو مسار افتراضي يشير إلى الإتجاه الخاطئ سيجلب النفق، ومع ذلك، لن يعمل النفق.

الخطوة الأولى للتحقق من عمل النفق هي التحقق من تشغيل النفق. قم بإصدار الأمر show ip interface brief وshow interface tunnel 0 على كل من أجهزة مودم الكبل. يتم عرض عينة من مخرجات الأمر أدناه.

ubr924-ddd5#show ip interface brief

Interface                  IP-Address      OK? Method Status                Protocol

Ethernet0                  9.9.9.9         YES manual up                    up

Tunnel0                    192.168.20.1    YES manual up                    up

cable-modem0               10.1.4.5        YES unset  up                    up

ubr924-ddd5#show interface tunnel 0

Tunnel0 is up, line protocol is up

Hardware is Tunnel

Internet address is 192.168.20.1/24

MTU 1514 bytes, BW 9 Kbit, DLY 500000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation TUNNEL, loopback not set

Keepalive set (10 sec)

Tunnel source 9.9.9.9 (Ethernet0), destination 11.11.11.11

Tunnel protocol/transport GRE/IP, key disabled, sequencing disabled

Checksumming of packets disabled

Last input 00:15:25, output 00:14:27, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/0, 2 drops; input queue 0/75, 0 drops

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

146 packets input, 21024 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

172 packets output, 57392 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 output buffer failures, 0 output buffers swapped out

ubr924-b5db#show ip interface brief

Interface                  IP-Address      OK? Method Status                Protocol

Ethernet0                  11.11.11.11     YES manual up                    up

Tunnel0                    192.168.20.2    YES manual up                    up

cable-modem0               10.1.4.3        YES NVRAM  up                    up

ubr924-b5db#show interface tunnel 0

Tunnel0 is up, line protocol is up

Hardware is Tunnel

Internet address is 192.168.20.2/24

MTU 1514 bytes, BW 9 Kbit, DLY 500000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation TUNNEL, loopback not set

Keepalive set (10 sec)

Tunnel source 11.11.11.11 (Ethernet0), destination 9.9.9.9

Tunnel protocol/transport GRE/IP, key disabled, sequencing disabled

Checksumming of packets disabled

Last input 00:16:42, output 00:17:40, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/0, 5 drops; input queue 0/75, 0 drops

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

118 packets input, 19144 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

164 packets output, 49624 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 output buffer failures, 0 output buffers swapped out

دققت أن يعمل النفق أن يؤشر النفق غاية عنوان. سيقوم هذا بالتحقق من اتصال IP فقط، وليس التشغيل الفعلي للنفق.

From ubr924-ddd5 we ping 11.11.11.11

ubr924-ddd5#ping 11.11.11.11

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 11.11.11.11, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 12/14/17 ms

ubr924-ddd5#

يتم إختبار الاتصال من uBR924-b5db عنوان الوجهة 9.9.9.9.

ubr924-b5db#ping 9.9.9.9

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 9.9.9.9, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 12/14/16 ms

ubr924-b5db#

للتحقق من عمل النفق، قم بإصدار الأمر show ip route x.x.x.x، حيث يكون x.x.x.x عنوان IP المعين إلى الطرف البعيد من النفق. في هذه الحالة، سيكون هو عنوان التكرار الحلقي للموجه البعيد. إذا كان المسار الوحيد الموضح هو إلى واجهة النفق، فسيثبت إختبار الاتصال بهذا العنوان أن النفق يعمل.

إذا كان هناك مخطط عنونة IP يعلن عن الموجهات إلى مقطع النفق عبر الشبكة، فسيكون هناك أكثر من موجه إلى الطرف البعيد لواجهة النفق. وإذا كان هذا هو الحال، فمن الصعب جدا التحقق من ان النفق يعمل. عادة في هذه الحالة، لا تحتاج إلى مسارات متكررة إلى شبكة النفق. يجب إتخاذ خطوات لمنع الإعلان عن الموجهات بواسطة بروتوكول توجيه عبر الشبكة. إن يكون النفق يكون استعملت أن ينقل حركة مرور من بروتوكول مختلف من IP، ال نفسه أساسي تدقيق طريقة يطبق.

From ubr924-ddd5 we get

ubr924-ddd5#show ip route 192.168.20.2

Routing entry for 192.168.20.0/24

Known via "connected", distance 0, metric 0 (connected, via interface)

Routing Descriptor Blocks:

* directly connected, via Tunnel0

Route metric is 0, traffic share count is 1

From ubr924-b5db we get

ubr924-b5db#show ip route 192.168.20.1

Routing entry for 192.168.20.0/24

Known via "connected", distance 0, metric 0 (connected, via interface)

Routing Descriptor Blocks:

* directly connected, via Tunnel0

Route metric is 0, traffic share count is 1

للتحقق من إمكانية وصول PC1 إلى PC2 والعكس بالعكس، قم بإجراء إختبارات اتصال موسعة على أجهزة مودم الكبلات، وكذلك إختبارات الاتصال من أجهزة الكمبيوتر .

قم بإجراء إختبار اتصال موسع على uBR924-b5db من واجهة إيثرنت (11.11.11.11) إلى واجهة إيثرنت الخاصة ب uBR924-ddd5 (9.9.9.9).

ubr924-b5db#ping ip

Target IP address: 9.9.9.9

!--- ubr924-ddd5 Ethernet's IP address.

Repeat count [5]:

Datagram size [100]:

Timeout in seconds [2]:

Extended commands [n]: y

Source address or interface: 11.11.11.11

!--- ubr924-b5db Ethernet's IP address.

Type of service [0]:

Set DF bit in IP header? [no]:

Validate reply data? [no]:

Data pattern [0xABCD]:

Loose, Strict, Record, Timestamp, Verbose[none]:

Sweep range of sizes [n]:

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 9.9.9.9, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 12/16/28 ms

ubr924-b5db#

قم بإجراء العكس لاختبار اتصال الجانب الآخر.

ubr924-ddd5#ping ip

Target IP address: 11.11.11.11

!--- ubr924-b5db Ethernet's IP address.

Repeat count [5]:

Datagram size [100]:

Timeout in seconds [2]:

Extended commands [n]: y

Source address or interface: 9.9.9.9

!--- ubr924-ddd5 Ethernet's IP address.

Type of service [0]:

Set DF bit in IP header? [no]:

Validate reply data? [no]:

Data pattern [0xABCD]:

Loose, Strict, Record, Timestamp, Verbose[none]:

Sweep range of sizes [n]:

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 11.11.11.11, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 12/14/16 ms

ubr924-ddd5#

الاختبار الأخير هو إختبار الاتصال من PC1 إلى PC2، و PC2 إلى PC1.

PC1 له عنوان IP 9.9.9.1.

PC2 له عنوان IP و 11.11.11.1.

إختبار الاتصال من PC1 إلى PC2.

إختبار الاتصال من PC2 إلى PC1.

استكشاف الأخطاء وإصلاحها

لا تتوفر حاليًا معلومات محددة لاستكشاف الأخطاء وإصلاحها لهذا التكوين.

معلومات ذات صلة

- أستكشاف أخطاء أجهزة مودم كبل uBR وإصلاحها غير متوفرة عبر الإنترنت

- الدعم الفني - Cisco Systems