目录

简介

先决条件

要求

使用的组件

背景信息

ISE IPSec体系结构

网络图

配置ikev1 IPSec VPN使用预先共享密钥(箱外)

IOS路由器CLI配置

配置接口

配置ISAKMP (IKEv1)策略

配置crypto Isakmp key

配置VPN流量的ACL利益

配置转换集

配置加密映射并且应用它对接口

IOS最终配置

ISE配置

配置在ISE的IP地址

添加纳季到ISE的IPSec组

启用在ISE的IPSEC

设置在ISE的TACACS策略

验证

IOS 路由器

ESR

ISE

故障排除

配置FlexVPN站点到站点(对SVTI的DVTI)在纳季和ISE 2.2之间

弹性VPN设计优点

路由器配置

在ISE的ESR配置

FlexVPN设计注意事项

简介

本文描述如何配置和排除故障TACACS IPSEC巩固思科身份服务引擎(ISE) 2.2 -网络接入设备(纳季)通信。TACACS流量可以用在路由器和ISE之间的站点到站点(LAN对LAN) IPSec互联网密钥交换版本2 (IKEv2)通道加密。本文不包括TACACS配置零件。

先决条件

要求

Cisco 建议您了解以下主题：

- ISE

- Cisco 路由器

- 将军IPSec概念

- 一般TACACS概念

使用的组件

本文档中的信息基于以下软件和硬件版本：

- 运行软件版本15.4(3)S2的Cisco ISR4451-X路由器

- Cisco身份服务引擎版本2.2

- Windows 7服务包1

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

背景信息

目标是对以IPSec使用不安全MD5哈希、Radius和TACACS的安全协议。考虑到的少量事实：

- 思科ISE支持在通道和交通方式的IPSec。

- 当您启用在思科ISE接口时的IPSec， IPSec隧道创建在思科ISE和纳季之间巩固通信。

- 您能定义预先共享密钥或使用X.509证书IPSec认证。

- IPSec在Eth1可以启用通过Eth5接口。您只能配置在一个思科ISE接口的IPSec每个PSN。

ISE IPSec体系结构

一旦加密的信息包由GE-1 ISE接口接收，嵌入式服务路由器(ESR)在Eth0/0接口拦截他们。

interface Ethernet0/0

description e0/0->connection to external NAD

ip address 10.48.17.87 255.255.255.0

ip nat outside

ip virtual-reassembly in

no ip route-cache

crypto map radius

ESR解密他们，并且根据预先配置的NAT规则进行地址转换。流出的(往纳季) RADIUS/TACACS数据包翻译对Ethernet0/0接口地址并且之后加密。

ip nat inside source list 1 interface Ethernet0/0 overload

ip nat inside source static udp 10.1.1.2 1645 interface Ethernet0/0 1645

ip nat inside source static udp 10.1.1.2 1646 interface Ethernet0/0 1646

ip nat inside source static udp 10.1.1.2 1812 interface Ethernet0/0 1812

ip nat inside source static udp 10.1.1.2 1813 interface Ethernet0/0 1813

ip nat inside source static tcp 10.1.1.2 49 interface Ethernet0/0 49

access-list 1 permit 10.1.1.0 0.0.0.3

被注定对Eth0/0在RADIUS/TACACS端口的接口的数据包应该通过Eth0/1对10.1.1.2 IP地址的接口forwared，是ISE内部地址。Eth0/1的ESR配置

interface Ethernet0/1

description e0/1->tap0 internal connection to ISE

ip address 10.1.1.1 255.255.255.252

ip nat inside

ip virtual-reassembly in

no ip route-cache

内部Tap-0接口的ISE配置：

ISE22-1ek/admin# show interface | b tap0

tap0: flags=4163<UP,BROADCAST,RUNNING,MULTICAST>  mtu 1500

inet 10.1.1.2  netmask 255.255.255.252  broadcast 10.1.1.3

inet6 fe80::6c2e:37ff:fe5f:b609  prefixlen 64  scopeid 0x20<link>

ether 6e:2e:37:5f:b6:09  txqueuelen 500  (Ethernet)

RX packets 81462  bytes 8927953 (8.5 MiB)

RX errors 0  dropped 68798  overruns 0  frame 0

TX packets 105  bytes 8405 (8.2 KiB)

TX errors 0  dropped 0 overruns 0  carrier 0  collisions 0

网络图

本文档中的信息使用此网络设置：

配置ikev1 IPSec VPN使用预先共享密钥(箱外)

此部分描述如何完成IOS CLI和ISE配置。

IOS路由器CLI配置

配置接口

如果IOS路由器接口没有配置，则应该配置至少广域网接口。示例如下：

interface GigabitEthernet0/0/0

ip address 10.48.23.68 255.255.255.0

negotiation auto

no shutdown

!

保证有连接给应该使用为了设立站点到站点VPN通道的远端对等体。您能使用ping为了验证基本连通性。

配置ISAKMP (IKEv1)策略

为了配置IKEv1连接的ISAKMP策略，请输入crypto isakmp policy <priority> in命令全局配置模式。 示例如下：

crypto isakmp policy 10

encr aes

hash sha256

authentication pre-share

group 16

注意： 您能配置在参加IPSec的每对等体的多IKE策略。当IKE协商开始时，尝试查找在两个配置对等体的一项普通政策，并且从在远端对等体指定的最高优先级的策略开始。

配置crypto Isakmp key

为了配置一预共享认证密钥，请输入crypto isakmp key命令在全局配置模式：

crypto isakmp key Krakow123 address 10.48.17.87

配置VPN流量的ACL利益

请使用延长或指定访问表为了指定应该由加密保护的流量。示例如下：

access-list 101 permit ip 10.48.23.68 0.0.0.0 10.48.17.87 0.0.0.0

注意： VPN流量的ACL在NAT以后使用源和目的IP地址。

配置转换集

为了定义IPSec转换集(安全协议和算法的一个可接受组合)，请输入crypto ipsec transform-set命令在全局配置模式。示例如下：

crypto ipsec transform-set SET esp-aes esp-sha256-hmac

mode transport

配置加密映射并且应用它对接口

为了创建或修改加密映射项和输入加密映射配置模式，请输入加密映射全局配置命令。为了的加密映射项完成，那里是必须定义在最低的一些方面：

- 已保护流量可以转发的IPSec对等体必须定义。这些是SA可以设立的对等体。为了指定加密映射项的IPSec对等体，请输入set peer命令。

- 是可接受为了用在已保护流量上的转换集必须定义。为了指定能使用与加密映射项的转换集，请输入set transform-set命令。

- 应该保护的流量必须定义。为了指定加密映射项的一扩展访问列表，请输入address命令的匹配。

示例如下：

crypto map MAP 10 ipsec-isakmp

set peer 10.48.17.87

set transform-set SET

match address 101

最后一步将应用以前定义加密映射集对接口。为了应用此，请输入加密映射接口配置命令：

interface GigabitEthernet0/0

crypto map MAP

IOS最终配置

这是最终IOS路由器CLI配置：

aaa group server tacacs+ ISE_TACACS

server name ISE22

!

aaa authentication login default group ISE_TACACS

aaa authorization exec default group ISE_TACACS

!

crypto isakmp policy 10

encr aes

hash sha256

authentication pre-share

group 16

!

crypto isakmp key Krakow123 address 10.48.17.87

!

crypto ipsec transform-set SET esp-aes esp-sha256-hmac

mode transport

!

crypto map MAP 10 ipsec-isakmp

set peer 10.48.17.87

set transform-set SET

match address 101

!

access-list 101 permit ip 10.48.23.68 0.0.0.0 10.48.17.87 0.0.0.0

!

interface GigabitEthernet0/0/0

ip address 10.48.23.68 255.255.255.0

negotiation auto

no shutdown

!

crypto map MAP 10 ipsec-isakmp

set peer 10.48.17.87

set transform-set SET

match address 101

!

tacacs server ISE22

address ipv4 10.48.17.87

key cisco

ISE配置

配置在ISE的IP地址

在从CLI的接口GE1-GE5应该配置地址， GE0不支持。

interface GigabitEthernet 1

ip address 10.48.17.87 255.255.255.0

ipv6 address autoconfig

ipv6 enable

注意：在IP地址以后的应用程序重新启动在接口配置：

更改IP地址的%也许引起ISE服务重新启动

继续IP地址更改？ Y/N [N] ：Y

添加纳季到ISE的IPSec组

导航到Administration >网络资源>网络设备。单击 Add。保证您配置名称， IP地址，共享塞克雷。终止从纳季挑选YES的IPSec隧道IPSEC网络设备组。

一旦纳季被添加，在ISE应该创建额外路由，保证RADIUS流量通过ESR并且被加密：

ip route 10.48.23.68 255.255.255.255 gateway 10.1.1.1

在ISE的Enable (event) IPSEC

导航对管理>System >设置。点击Radius并且促进在IPSEC。选择PSN (单个/多个/所有)选择Enable选项，选择接口并且选择认证方法。单击 Save。服务在所选节点这时重新启动。

注意，那，在服务重新启动ISE CLI配置显示配置接口，不用IP地址和在关闭状态后，预计，当ESR (嵌入式服务路由器)控制ISE接口。

interface GigabitEthernet 1

shutdown

ipv6 address autoconfig

ipv6 enable

一旦服务被重新启动， ESR功能启用。要登陆到ESR请键入在line命令的esr ：

ISE22-1ek/admin# esr

% Entering ESR 5921 shell

% Cisco IOS Software, C5921 Software (C5921_I86-UNIVERSALK9-M), Version 15.5(2)T2, RELEASE SOFTWARE (fc3)

% Technical Support: http://www.cisco.com/techsupport

% Copyright (c) 1986-2015 Cisco Systems, Inc.

Press RETURN to get started, <CTRL-C> to exit

ise-esr5921>en

ise-esr5921#

ESR附有此加密配置，是足够有IPSec隧道终止与预先共享密钥：

crypto keyring MVPN-spokes

pre-shared-key address 0.0.0.0 0.0.0.0 key Krakow123

!

crypto isakmp policy 10

encr aes

hash sha256

authentication pre-share

group 16

!

crypto isakmp policy 20

encr aes

hash sha256

authentication pre-share

group 14

!

crypto isakmp key Krakow123 address 0.0.0.0

!

crypto isakmp profile MVPN-profile

description LAN-to-LAN for spoke router(s) connection

keyring MVPN-spokes

match identity address 0.0.0.0

!

crypto ipsec transform-set radius esp-aes esp-sha256-hmac

mode tunnel

crypto ipsec transform-set radius-2 esp-aes esp-sha256-hmac

mode transport

!

crypto dynamic-map MVPN-dynmap 10

set transform-set radius radius-2

!

crypto map radius 10 ipsec-isakmp dynamic MVPN-dynmap

确保ESR有发送的路由加密的信息包：

ip route 0.0.0.0 0.0.0.0 10.48.26.1

设置在ISE的TACACS策略

验证

IOS 路由器

在SSH会话启动到路由器前，没有激活VPN连接：

ISR4451#sh cry isa sa

IPv4 Crypto ISAKMP SA

dst             src             state          conn-id status

IPv6 Crypto ISAKMP SA

因为使用，客户端连接到路由器验证来源ISE 2.2。

EKORNEYC-M-K04E:~ ekorneyc$ ssh alice@10.48.23.68

Password:

ISR4451#

IOS在路由器发送TACACS数据包，触发VPN会话建立，一次通道是此输出被看到。它确认通道的相位1是UP ：

ISR4451#sh cry isa sa

IPv4 Crypto ISAKMP SA

dst             src             state          conn-id status

10.48.17.87     10.48.23.68     QM_IDLE           1962 ACTIVE

IPv6 Crypto ISAKMP SA

ISR4451#

第2阶段是UP，并且数据包加密并且解密：

ISR4451#sh cry ipsec sa

interface: GigabitEthernet0/0/0

Crypto map tag: MAP, local addr 10.48.23.68

protected vrf: (none)

local  ident (addr/mask/prot/port): (10.48.23.68/255.255.255.255/0/0)

remote ident (addr/mask/prot/port): (10.48.17.87/255.255.255.255/0/0)

current_peer 10.48.17.87 port 500

PERMIT, flags={origin_is_acl,}

#pkts encaps: 48, #pkts encrypt: 48, #pkts digest: 48

#pkts decaps: 48, #pkts decrypt: 48, #pkts verify: 48

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed: 0, #pkts compr. failed: 0

#pkts not decompressed: 0, #pkts decompress failed: 0

#send errors 0, #recv errors 0

local crypto endpt.: 10.48.23.68, remote crypto endpt.: 10.48.17.87

plaintext mtu 1458, path mtu 1500, ip mtu 1500, ip mtu idb GigabitEthernet0/0/0

current outbound spi: 0x64BD51B8(1690128824)

PFS (Y/N): N, DH group: none

inbound esp sas:

spi: 0xFAE51DF8(4209319416)

transform: esp-aes esp-sha256-hmac ,

in use settings ={Transport, }

conn id: 2681, flow_id: ESG:681, sibling_flags FFFFFFFF80004008, crypto map: MAP

sa timing: remaining key lifetime (k/sec): (4607998/3127)

IV size: 16 bytes

replay detection support: Y

Status: ACTIVE(ACTIVE)

inbound ah sas:

inbound pcp sas:

outbound esp sas:

spi: 0x64BD51B8(1690128824)

transform: esp-aes esp-sha256-hmac ,

in use settings ={Transport, }

conn id: 2682, flow_id: ESG:682, sibling_flags FFFFFFFF80004008, crypto map: MAP

sa timing: remaining key lifetime (k/sec): (4607997/3127)

IV size: 16 bytes

replay detection support: Y

Status: ACTIVE(ACTIVE)

outbound ah sas:

outbound pcp sas:

ISR4451#

ESR

同样输出可以被检查ESR，第一阶段是UP ：

ise-esr5921#sh cry isa sa

IPv4 Crypto ISAKMP SA

dst             src             state          conn-id status

10.48.17.87     10.48.23.68     QM_IDLE           1002 ACTIVE

IPv6 Crypto ISAKMP SA

ise-esr5921#

第2阶段是UP，数据包顺利地加密并且解密：

ise-esr5921#sh cry ipsec sa

interface: Ethernet0/0

Crypto map tag: radius, local addr 10.48.17.87

protected vrf: (none)

local  ident (addr/mask/prot/port): (10.48.17.87/255.255.255.255/0/0)

remote ident (addr/mask/prot/port): (10.48.23.68/255.255.255.255/0/0)

current_peer 10.48.23.68 port 500

PERMIT, flags={}

#pkts encaps: 48, #pkts encrypt: 48, #pkts digest: 48

#pkts decaps: 48, #pkts decrypt: 48, #pkts verify: 48

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed: 0, #pkts compr. failed: 0

#pkts not decompressed: 0, #pkts decompress failed: 0

#send errors 0, #recv errors 0

local crypto endpt.: 10.48.17.87, remote crypto endpt.: 10.48.23.68

plaintext mtu 1458, path mtu 1500, ip mtu 1500, ip mtu idb Ethernet0/0

current outbound spi: 0xFAE51DF8(4209319416)

PFS (Y/N): N, DH group: none

inbound esp sas:

spi: 0x64BD51B8(1690128824)

transform: esp-aes esp-sha256-hmac ,

in use settings ={Transport, }

conn id: 3, flow_id: SW:3, sibling_flags 80000000, crypto map: radius

sa timing: remaining key lifetime (k/sec): (4242722/3056)

IV size: 16 bytes

replay detection support: Y

Status: ACTIVE(ACTIVE)

inbound ah sas:

inbound pcp sas:

outbound esp sas:

spi: 0xFAE51DF8(4209319416)

transform: esp-aes esp-sha256-hmac ,

in use settings ={Transport, }

conn id: 4, flow_id: SW:4, sibling_flags 80000000, crypto map: radius

sa timing: remaining key lifetime (k/sec): (4242722/3056)

IV size: 16 bytes

replay detection support: Y

Status: ACTIVE(ACTIVE)

outbound ah sas:

outbound pcp sas:

ise-esr5921#

ISE

Live验证指示正常PAP_ASCII验证：

捕获采取在GE1 ISE接口和过滤与ESP或TACACS，确认没有在明文的TACACS，并且所有流量加密：

故障排除

普通的VPN故障排除技术可以应用排除故障与IPSEC涉及的问题。您能找到下面有用的文件：

站点到站点VPN的IOS IKEv2调试与排除故障TechNote的PSKs

站点到站点VPN的ASA IKEv2调试与PSKs

IPSec故障排除：了解和使用调试指令

配置FlexVPN站点到站点(对SVTI的DVTI)在纳季和ISE 2.2之间

保护与FlexVPN的RADIUS流量也是可能的。以下拓扑用于下面示例：

FlexVPN配置是直接的。可以找到更多详细信息此处：

http://www.cisco.com/c/en/us/support/docs/security/flexvpn/115782-flexvpn-site-to-site-00.html

弹性VPN设计优点

- 您能运行沿所有您的上一个IPsec VPN的弹性。多数方案允许先前配置和弹性共存。

- 弹性VPN根据而不是IKEv2 IKEv1，改进几乎协商和协议稳定性的所有方面。

- 多个功能可达成与一个框架。

- 配置方便通过使用神志正常的默认的-您在有意义和更新的默认不需要定义策略，转换集等， IKEv2构件。

路由器配置

aaa new-model

!

!

aaa group server tacacs+ ISE_TACACS

server name ISE22_VRF

ip vrf forwarding TACACS

!

aaa authentication login default group ISE_TACACS

aaa authorization exec default group ISE_TACACS

aaa authorization network default local

!

crypto ikev2 authorization policy default

route set interface Loopback0

no route set interface

!

!

crypto ikev2 keyring mykeys

peer ISE22

address 10.48.17.87

pre-shared-key Krakow123

!

!

!

crypto ikev2 profile default

match identity remote address 10.48.17.87 255.255.255.255

authentication remote pre-share (with the command authentication remote pre-share key <key> in place keyring is not required)

authentication local pre-share

keyring local mykeys

aaa authorization group psk list default default

!

!

ip tftp source-interface GigabitEthernet0

!

!

!

crypto ipsec profile default

set ikev2-profile default (it is default configuration)

!

!

!

interface Loopback0

ip vrf forwarding TACACS

ip address 100.100.100.100 255.255.255.0

!

interface Tunnel0

ip vrf forwarding TACACS

ip address 10.1.12.1 255.255.255.0

tunnel source GigabitEthernet0/0/0

tunnel mode ipsec ipv4

tunnel destination 10.48.17.87

tunnel protection ipsec profile default

!

interface GigabitEthernet0/0/0

ip address 10.48.23.68 255.255.255.0

negotiation auto

!

!

ip route 0.0.0.0 0.0.0.0 10.48.23.1

ip tacacs source-interface Loopback0

!

!

tacacs server ISE22_VRF

address ipv4 10.1.1.2

key cisco

!

ISR4451#

在ISE的ESR配置

ise-esr5921#sh run

Building configuration...

Current configuration : 5778 bytes

!

! Last configuration change at 17:32:58 CET Thu Feb 23 2017

!

version 15.5

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

service call-home

!

hostname ise-esr5921

!

boot-start-marker

boot host unix:default-config

boot-end-marker

!

!

!

no aaa new-model

bsd-client server url https://cloudsso.cisco.com/as/token.oauth2

clock timezone CET 1 0

mmi polling-interval 60

no mmi auto-configure

no mmi pvc

mmi snmp-timeout 180

call-home

! If contact email address in call-home is configured as sch-smart-licensing@cisco.com

! the email address configured in Cisco Smart License Portal will be used as contact email address to send SCH notifications.

contact-email-addr sch-smart-licensing@cisco.com

profile "CiscoTAC-1"

active

destination transport-method http

no destination transport-method email

!

!

!

!

!

!

!

!

!

!

!

!

ip cef

no ipv6 cef

!

multilink bundle-name authenticated

!

!

!

!

!

!

!

!

!

crypto pki trustpoint SLA-TrustPoint

enrollment pkcs12

revocation-check crl

!

!

crypto pki certificate chain SLA-TrustPoint

certificate ca 01

30820321 30820209 A0030201 02020101 300D0609 2A864886 F70D0101 0B050030

32310E30 0C060355 040A1305 43697363 6F312030 1E060355 04031317 43697363

6F204C69 63656E73 696E6720 526F6F74 20434130 1E170D31 33303533 30313934

3834375A 170D3338 30353330 31393438 34375A30 32310E30 0C060355 040A1305

43697363 6F312030 1E060355 04031317 43697363 6F204C69 63656E73 696E6720

526F6F74 20434130 82012230 0D06092A 864886F7 0D010101 05000382 010F0030

82010A02 82010100 A6BCBD96 131E05F7 145EA72C 2CD686E6 17222EA1 F1EFF64D

CBB4C798 212AA147 C655D8D7 9471380D 8711441E 1AAF071A 9CAE6388 8A38E520

1C394D78 462EF239 C659F715 B98C0A59 5BBB5CBD 0CFEBEA3 700A8BF7 D8F256EE

4AA4E80D DB6FD1C9 60B1FD18 FFC69C96 6FA68957 A2617DE7 104FDC5F EA2956AC

7390A3EB 2B5436AD C847A2C5 DAB553EB 69A9A535 58E9F3E3 C0BD23CF 58BD7188

68E69491 20F320E7 948E71D7 AE3BCC84 F10684C7 4BC8E00F 539BA42B 42C68BB7

C7479096 B4CB2D62 EA2F505D C7B062A4 6811D95B E8250FC4 5D5D5FB8 8F27D191

C55F0D76 61F9A4CD 3D992327 A8BB03BD 4E6D7069 7CBADF8B DF5F4368 95135E44

DFC7C6CF 04DD7FD1 02030100 01A34230 40300E06 03551D0F 0101FF04 04030201

06300F06 03551D13 0101FF04 05300301 01FF301D 0603551D 0E041604 1449DC85

4B3D31E5 1B3E6A17 606AF333 3D3B4C73 E8300D06 092A8648 86F70D01 010B0500

03820101 00507F24 D3932A66 86025D9F E838AE5C 6D4DF6B0 49631C78 240DA905

604EDCDE FF4FED2B 77FC460E CD636FDB DD44681E 3A5673AB 9093D3B1 6C9E3D8B

D98987BF E40CBD9E 1AECA0C2 2189BB5C 8FA85686 CD98B646 5575B146 8DFC66A8

467A3DF4 4D565700 6ADF0F0D CF835015 3C04FF7C 21E878AC 11BA9CD2 55A9232C

7CA7B7E6 C1AF74F6 152E99B7 B1FCF9BB E973DE7F 5BDDEB86 C71E3B49 1765308B

5FB0DA06 B92AFE7F 494E8A9E 07B85737 F3A58BE1 1A48A229 C37C1E69 39F08678

80DDCD16 D6BACECA EEBC7CF9 8428787B 35202CDC 60E4616A B623CDBD 230E3AFB

418616A9 4093E049 4D10AB75 27E86F73 932E35B5 8862FDAE 0275156F 719BB2F0

D697DF7F 28

quit

license udi pid CISCO5921-K9 sn 98492083R3X

username lab password 0 lab

!

redundancy

!

!

!

crypto keyring MVPN-spokes

pre-shared-key address 0.0.0.0 0.0.0.0 key Krakow123

crypto ikev2 authorization policy default

route set interface

route set remote ipv4 10.1.1.0 255.255.255.0

!

!

!

crypto ikev2 keyring mykeys

peer ISR4451

address 10.48.23.68

pre-shared-key Krakow123

!

!

!

crypto ikev2 profile default

match identity remote address 0.0.0.0

authentication remote pre-share

authentication local pre-share

keyring local mykeys

aaa authorization group psk list default default local

virtual-template 1

!

!

crypto isakmp policy 10

encr aes

hash sha256

authentication pre-share

group 16

!

crypto isakmp policy 20

encr aes

hash sha256

authentication pre-share

group 14

crypto isakmp key Krakow123 address 0.0.0.0

crypto isakmp profile MVPN-profile

description LAN-to-LAN for spoke router(s) connection

keyring MVPN-spokes

match identity address 0.0.0.0

!

!

crypto ipsec transform-set radius esp-aes esp-sha256-hmac

mode tunnel

crypto ipsec transform-set radius-2 esp-aes esp-sha256-hmac

mode transport

!

!

!

crypto dynamic-map MVPN-dynmap 10

set transform-set radius radius-2

!

!

crypto map radius 10 ipsec-isakmp dynamic MVPN-dynmap

!

!

!

!

!

interface Loopback0

ip address 10.1.12.2 255.255.255.0

!

interface Ethernet0/0

description e0/0->connection to external NAD

ip address 10.48.17.87 255.255.255.0

ip nat outside

ip virtual-reassembly in

no ip route-cache

crypto map radius

!

interface Ethernet0/1

description e0/1->tap0 internal connection to ISE

ip address 10.1.1.1 255.255.255.252

ip nat inside

ip virtual-reassembly in

no ip route-cache

!

interface Ethernet0/2

description e0/2->connection to CSSM backend license server

no ip address

ip virtual-reassembly in

no ip route-cache

!

interface Ethernet0/3

no ip address

shutdown

!

interface Virtual-Template1 type tunnel

ip unnumbered Loopback0

tunnel source Ethernet0/0

tunnel mode ipsec ipv4

tunnel protection ipsec profile default

!

ip forward-protocol nd

!

!

no ip http server

no ip http secure-server

ip nat inside source list 1 interface Ethernet0/0 overload

ip nat inside source static udp 10.1.1.2 1645 interface Ethernet0/0 1645

ip nat inside source static udp 10.1.1.2 1646 interface Ethernet0/0 1646

ip nat inside source static udp 10.1.1.2 1812 interface Ethernet0/0 1812

ip nat inside source static udp 10.1.1.2 1813 interface Ethernet0/0 1813

ip nat inside source static tcp 10.1.1.2 49 interface Ethernet0/0 49

ip route 0.0.0.0 0.0.0.0 10.48.17.1

!

!

!

access-list 1 permit 10.1.1.0 0.0.0.3

!

control-plane

!

!

!

!

!

!

!

!

!

!

!

!

line con 0

logging synchronous

line aux 0

line vty 0 4

login

transport input none

!

!

end

FlexVPN设计注意事项

- 在G0/1 ISE接口应该终止在大多数情况下Radius连接，是E0/0 ESR接口。使用路由，当曾经加密映射时，应该定义关注数据流与访问列表，与SVTI -。它不会工作，如果两路由器配置对ISE接口一通过通道(加密)和一通过接口(隧道建立)。同一个问题适用于路由器配置。

- 为此关注数据流(已加密Radius)被传达在路由器的Lo0 ISE接口和Tap0接口之间(没有nat在ESR在这种情况下必要)。因此， ip route可以配置，强制RADIUS流量通过通道和被加密。

- 因为Tap0 ISE的接口的IP地址修复(10.1.1.2)在VRF可以安置在路由器，保证通信对此IP地址仅仅发生为TACACS和通过通道。