目录

简介

先决条件

要求

使用的组件

规则

配置

网络图

配置

验证

故障排除

相关信息

简介

本文档提供使用自适应时钟的T1非结构化电路仿真服务(CES)的示例配置。松散组织结构服务意味着PVC使用了整个T1/E1带宽。ATM交换机不查看T1/E1，而只是通过从接收端口到目标端口的时钟来再现比特流。自适应时钟意味着CES模块通过计算平均接收数据速率来推断数据传输的适当定时。这种方法的主要优点是不需要网络时钟同步。有关CES服务的更详细说明，请阅读电路仿真服务简介。

假设

本文档中的示例配置基于以下假设：

- 本示例使用自适应时钟模式。由于我们使用的是自适应时钟，因此您不需要network-clock-select语句。但是，您可以选择配置缓冲区长度以防止缓冲区溢出和流量不足，同时控制延迟（缓冲区大小越大，延迟越大）。 缓冲区长度与最大信元延迟变化(CDV)成比例，您可以使用ces circuit circuit-id [cas] [cdv max-req]命令配置该长度。默认值为2000毫秒。测量值显示在show ces circuit命令的输出中。

- 在两个PBX上的成帧都是扩展超帧(ESF)。 这是在LS1010的默认值，因此不需要明确地配置它。但是，为了进行演示，我们将在本例中配置它。

- 在两个PBX的line编码是二进制的8个零替补(B8ZS)。 这是在LS1010的默认值，因此不需要明确地配置它。但是，为了进行演示，我们将在本例中配置它。

- LS1010是软PVC的活动侧；8540-MSR是被动端。

- 在CES PAM，PBX和ATM交换机之间的距离小于110英尺。此长度是默认线路缆线长度(lbo)，因此不需要明确地配置它。但是，为了进行演示，我们将在本例中配置它。

- LS1010配备有功能卡每流队列(FC-PFQ)，该功能卡每流队列使用能够锁定和跟踪所选时钟源的锁相环(PLL)。此高质量，锁定时钟然后对网络时钟接口提供界面规定期限。8540 MSR装备网络时钟模块(NetClkMod)，提供Stratum 3时钟资源的优势。

- 当电路被定义时，ATM Pseudo接口(ATM-Px/y/z)被创建。有关详细信息，请参阅文档配置电路仿真服务。

先决条件

要求

本文档没有任何特定的要求。

使用的组件

本文档不限于特定的软件和硬件版本。

规则

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

配置

本部分提供有关如何配置本文档所述功能的信息。

注：要查找有关本文档中使用的命令的其他信息，请使用命令查找工具(仅注册客户)。

网络图

本文档使用下图所示的网络设置。

配置

本文档使用如下所示的配置。

- 8540-MSR

- LS1010-A

8540-MSR

8540-MSR#show running-config

Building configuration...

Current configuration:

!

version 12.0

no service pad

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

service internal

!

hostname 8540-MSR

!

boot system flash bootflash:cat8540m-wp-mz.120-1a.W5.7.bin

logging buffered 4096 debugging

!

redundancy

main-cpu

no sync config startup

sync config running

facility-alarm core-temperature major 53

facility-alarm core-temperature minor 45

network-clock-select 1 system

ip subnet-zero

atm address 47.0091.8100.0000.0090.2144.8401.0090.2144.8401.00

atm router pnni

no aesa embedded-number left-justified

node 1 level 56 lowest

redistribute atm-static

!

interface ATM3/0/0

no ip address

no ip directed-broadcast

!

interface ATM3/0/1

no ip address no

ip directed-broadcast

!

interface CBR3/1/0

no ip address no

ip directed-broadcast

ces aal1 clock adaptive

ces circuit 0 circuit-name example

ces dsx1 linecode b8zs

ces dsx1 framing esf

ces dsx1 lbo 0_110

!

interface ATM0

no ip address

no ip directed-broadcast

atm maxvp-number 0

!

interface Ethernet0

no ip directed-broadcast

!

line con 0

transport input none

line aux 0

line vty 0 4

login

!

end

在软PVC的被动端使用show ces address获取配置软PVC的活动端（本例中为LS1010）所需的地址和VPI/VCI对。 请参阅以下输出示例：

8540-MSR#show ces address

CES-IWF ATM Address(es):47.0091.8100.0000.0090.2144.8401.4000.0c81.9030.10 CBR3/1/0:0

vpi 0 vci 16

LS1010-A

ls1010#show running-config

Building configuration...

Current configuration:

!

version 11.3

no service pad

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

service internal

!

hostname ls1010

!

atm address 47.0091.8100.0000.0090.92b8.6401.0090.92b8.6401.00

atm router pnni

?no aesa embedded-number left-justified

?node 1 level 56 lowest

? redistribute atm-static

!

no ip address

!

interface CBR12/1/0

?no ip address

?ces aal1 clock adaptive

?ces circuit 0 circuit-name example

?ces dsx1 linecode b8zs

?ces dsx1 framing esf

?ces dsx1 lbo 0_110

?ces pvc 0 dest-address 47.0091.8100.0000.0090.2144.8401.4000.0c81.9030.10

vpi 0 vci 16

!

interface CBR12/1/1

?no ip address

!

interface CBR12/1/2

?no ip address

!

interface CBR12/1/3

?no ip address

!

interface ATM13/0/0

?no ip address

?atm maxvp-number 0

!

interface Ethernet13/0/0

ip classless

!

line con 0

line aux 0

line vty 0 4

login

!

end

使用show ces interface命令验证CES电路是否在两端都处于打开状态。请参阅以下输出示例：

ls1010#show ces interface cbr 12/1/0

Interface: CBR12/1/0 Port-type:T1-DCU

IF Status: UP Admin Status: UP

Channels in use on this port: 1-24

LineType: ESF LineCoding: B8ZS LoopConfig: NoLoop?

SignalMode: NoSignalling XmtClockSrc: network-derived

DataFormat: UnStructured AAL1 Clocking Mode: Adaptive LineLength: 0_110

LineState: NoAlarm<

Errors in the Current Interval:

PCVs 514 LCVs 2 ESs 0 SESs 1 SEFSs 0

UASs 0 CSSs 0 LESs 0 BESs 0 DMs 0

Errors in the last 24Hrs:

PCVs 2057 LCVs 10 ESs 0 SESs 4 SEFSs 0

UASs 19 CSSs 0 LESs 0 BESs 0 DMs 0

Input Counters: 1054405 cells, 49557035 bytes

Output Counters: 1054405 cells, 49557035 bytes

使用show atm vc命令验证在两台ATM交换机之间已建立软PVC。请参阅以下输出示例：

8540-MSR#show atm vc interface ATM-P3/1/3

Interface?? VPI?? VCI?? Type?? X-Interface?? X-VPI?? X-VCI?? Encap Status

ATM-P3/1/3??? 0??? 16 SoftVC????? ATM3/0/0?????? 0?????? 39??????????? UP

LS1010#show atm vc interface ATM-P12/1/3

Interface?? VPI?? VCI?? Type?? X-Interface?? X-VPI?? X-VCI?? Encap Status

ATM-P12/1/3?? 0??? 16 SoftVC??? ATM12/0/0??????? 0????? 39???????????? UP

使用show ces circuit cbr x/y/z 0命令验证是否没有时钟滑移，并查看下溢或溢流是否在增加。保证使用在8540 MSR端的此指令。请参阅以下输出示例：

ls1010#show ces circuit cbr 12/1/0 0

Circuit: Name sil, Circuit-state ADMIN_UP / Interface CBR12/1/0,

Circuit_id 0, Port-Type T1, Port-State UP?

Port Clocking network-derived, aal1 Clocking Method CESIWF_AAL1_CLOCK_ADAPT

Channel in use on this port: 1-24

Channels used by this circuit: 1-24

Cell-Rate: 4107, Bit-Rate 1544000

cas OFF, cell_header 0x100 (vci = 16)

Configured CDV 2000 usecs, Measured CDV 373 usecs

De-jitter: UnderFlow 1, OverFlow 0

ErrTolerance 8, idleCircuitdetect OFF, onHookIdleCode 0x0

state: VcActive, maxQueueDepth 823, startDequeueDepth 435

Partial Fill: 47, Structured Data Transfer 0

Active SoftVC

Src: atm addr 47.0091.8100.0000.0090.92b8.6401.4000.0c86.1030.10 vpi 0, vci 16

Dst: atm addr 47.0091.8100.0000.0090.2144.8401.4000.0c81.9030.10

验证

当前没有可用于此配置的验证过程。

故障排除

目前没有针对此配置的故障排除信息。

相关信息

- ATM技术支持页

- 电路仿真服务 介绍

- ATM交换路由器命令参考

- 技术支持和文档 - Cisco Systems