目录

简介

先决条件

要求

使用的组件

规则

背景信息

假设

配置

网络图

配置

验证

故障排除

相关信息

简介

本文档提供使用同步时钟和永久虚电路(PVC)的非结构化电路仿真服务(CES)的示例配置。 松散组织结构服务意味着PVC使用了整个T1/E1带宽。ATM交换机不查看T1/E1，而只是通过从接收端口到目标端口的时钟来再现比特流。同步服务假设，同步的时钟在每个末端是可用的。所以，没有计时信息在ATM信元中被运输。需要时钟源的传播在网络可中的。有关CES服务的更详细说明，请阅读电路仿真服务简介。

先决条件

要求

本文档没有任何特定的要求。

使用的组件

本文档不限于特定的软件和硬件版本。

规则

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

背景信息

假设

本文档中的示例配置基于以下假设：

- 本示例使用同步时钟。

- PBX1为ATM网络提供时钟源 — 主参考源(PRS)。请参阅下图。

- PBX2的时钟与PBX1（来自服务提供商）的时钟相同。

注意：这些时钟的准确性必须相同，并且需要同步。

- 在两个PBX上的成帧都是扩展超帧(ESF)。 这是在LS1010的默认值，因此不需要明确地配置它。但是，为了进行演示，我们将在本例中配置它。

- 在两个PBX的line编码是二进制的8个零替补(B8ZS)。 这是在LS1010的默认值，因此不需要明确地配置它。但是，为了进行演示，我们将在本例中配置它。

- PVC 0/100在8540-MSR和LS1010之间使用。

- 在CES PAM，PBX和ATM交换机之间的距离小于110英尺。此长度是默认线路缆线长度(lbo)，因此不需要明确地配置它。但是，为了进行演示，我们将在本例中配置它。

- LS1010配备FC-PFQ，8540MSR配备RP Stratum 3时钟。您需要这些卡来确保良好的时钟恢复。

- 当电路被定义时，ATM Pseudo接口(ATM-Px/y/z)被创建。有关详细信息，请参阅此相关文档。

配置

本部分提供有关如何配置本文档所述功能的信息。

注：要查找有关本文档中使用的命令的其他信息，请使用命令查找工具(仅注册客户)。

网络图

本文档使用以下网络设置：

配置

本文档使用以下配置：

8540-MSR 配置

8540-MSR

8540-MSR#show running-config

Building configuration...

Current configuration:

!

version 12.0

no service pad

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

service internal

!

hostname 8540-MSR

!

network-clock-select 1 cbr3/1/0

!

boot system flash bootflash:cat8540m-wp-mz.120-1a.W5.7.bin

logging buffered 4096 debugging

!

redundancy

main-cpu

no sync config startup

sync config running

facility-alarm core-temperature major 53

facility-alarm core-temperature minor 45

ip subnet-zero

atm address 47.0091.8100.0000.0090.2144.8401.0090.2144.8401.00

atm router pnni

no aesa embedded-number left-justified

node 1 level 56 lowest

redistribute atm-static

!

interface ATM3/0/0

no ip address

no ip directed-broadcast

!

interface ATM3/0/1

no ip address

no ip directed-broadcast

!

interface CBR3/1/0

no ip address

no ip directed-broadcast

ces circuit 0 circuit-name example

ces pvc 0 interface atm3/0/0 vpi 0 vci 100

ces dsx1 linecode b8zs

ces dsx1 framing esf

ces dsx1 lbo 0_110

!

interface ATM0

no ip address

no ip directed-broadcast

atm maxvp-number 0

!

interface Ethernet0

no ip directed-broadcast

!

line con 0

transport input none

line aux 0

line vty 0 4

login

!

end

LS1010-A 配置

LS1010-A

ls1010#show running-config

Building configuration...

Current configuration:

!

version 11.3

no service pad

service time

stamps debug date

time msec

service time

stamps log date

time mse

cno service password-encryption

service internal

!

hostname ls1010

!

network-clock-select 1 CBR12/1/0

!

atm address 47.0091.8100.0000.0090.92b8.6401.0090.92b8.6401.00

atm router pnnino aes

a embedded-number left-justified

node 1 level 56 lowestre

distribute atm-static

!

!

no ip address

!

interface CBR12/1/0

no ip address

ces circuit 0 circuit-name example

ces pvc 0 interface atm12/0/0 vpi 0 vci 100

ces dsx1 linecode b8zs

ces dsx1 framing esfces dsx1 lbo 0_110

!

interface CBR12/1/1no ip address

!

interface CBR12/1/2

no ip address

!

interface CBR12/1/3

no ip address

!

interface ATM13/0/0

no ip address

atm maxvp-number 0

!

interface Ethernet13/0/0

ip classless

!

line con 0

line aux 0

line vty 0 4

login

!

end

验证

命令输出解释程序工具（仅限注册用户）支持某些 show 命令，使用此工具可以查看对 show 命令输出的分析。

要验证CES电路两端是否都处于打开状态，请使用show ces interface命令。请参阅以下输出示例：

ls1010#show ces interface cbr 12/1/0

Interface: CBR12/1/0 Port-type:T1-DCU

IF Status: UP Admin Status: UP

Channels in use on this port: 1-24

LineType: ESF LineCoding: B8ZS LoopConfig: NoLoop

SignalMode: NoSignalling XmtClockSrc: network-derived

DataFormat: UnStructured AAL1 Clocking Mode: Synchronous LineLength: 0_110

LineState: NoAlarm

Errors in the Current Interval:

PCVs 514 LCVs 2 ESs 0 SESs 1 SEFSs 0

UASs 0 CSSs 0 LESs 0 BESs 0 DMs 0

Errors in the last 24Hrs:

PCVs 2057 LCVs 10 ESs 0 SESs 4 SEFSs 0

UASs 19 CSSs 0 LESs 0 BESs 0 DMs 0

Input Counters: 1054405 cells, 49557035 bytes

Output Counters: 1054405 cells, 49557035 bytes

使用show atm vc命令，以便在两台ATM交换机之间建立PVC。请参阅以下输出示例：

8540-MSR#show atm vc int ATM-P3/1/3

Interface   VPI   VCI   Type   X-Interface   X-VPI   X-VCI   Encap Status

ATM-P3/1/3    0    16 SoftVC      ATM3/0/0       0     100             UP

LS1010#show atm vc int ATM-P12/1/3

Interface   VPI   VCI   Type   X-Interface   X-VPI   X-VCI   Encap Status

ATM-P12/1/3   0    16 SoftVC     ATM12/0/0       0     100             UP

要验证是否没有时钟滑移，请使用show ces circuit cbr x/y/z 0命令并查看下溢或溢流是否在增加。保证使用在8540 MSR端的此指令。请参阅以下输出示例：

ls1010#show ces circuit cbr 12/1/0 0

Circuit: Name sil, Circuit-state ADMIN_UP / Interface CBR12/1/0,

Circuit_id 0, Port-Type T1, Port-State UP

Port Clocking network-derived, aal1 Clocking Method CESIWF_AAL1_CLOCK_SYNC

Channel in use on this port: 1-24

Channels used by this circuit: 1-24

Cell-Rate: 4107, Bit-Rate 1544000

cas OFF, cell_header 0x100 (vci = 16)

Configured CDV 2000 usecs, Measured CDV 373 usecs

De-jitter: UnderFlow 1, OverFlow 0

ErrTolerance 8, idleCircuitdetect OFF, onHookIdleCode 0x0

state: VcActive, maxQueueDepth 823, startDequeueDepth 435

Partial Fill: 47, Structured Data Transfer 0

Active SoftVC

Src: atm addr 47.0091.8100.0000.0090.92b8.6401.4000.0c86.1030.10 vpi 0, vci 16

Dst: atm addr 47.0091.8100.0000.0090.2144.8401.4000.0c81.9030.10

故障排除

目前没有针对此配置的故障排除信息。

相关信息

- 电路仿真服务 介绍

- ATM交换路由器命令参考

- ATM技术支持页

- 技术支持和文档 - Cisco Systems