Contents

Introduction

Prerequisites

Requirements

Componentes Utilizados

Qual é a diferença entre a ID da VLAN exibida no Ethanalyzer do NX-OS e a ID da VLAN em um switch Cisco Nexus 5000 Series?

Introduction

Este documento descreve a relação entre a ID da VLAN vista nos rastreamentos do Ethanalyzer e a ID da VLAN em um switch Cisco Nexus 5000 Series.

Prerequisites

Requirements

A Cisco recomenda que você tenha conhecimento destes tópicos:

- Conhecimento da CLI do Cisco NX-OS

- Conhecimento de Fibre Channel over Ethernet (FCoE)

Componentes Utilizados

As informações neste documento são baseadas nos Cisco Nexus 5000 e 5500 Series Switches.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Qual é a diferença entre a ID da VLAN exibida no Ethanalyzer do NX-OS e a ID da VLAN em um switch Cisco Nexus 5000 Series?

O Ethanalyzer não mostra o ID de VLAN FCoE real no campo VID do cabeçalho 802.1q. Esta seção mostra traços de duas conexões FCoE. O Qlogic CNA usa FCoE VLAN/VSAN 100 e o Cisco P81E (Monterey Park Adapter) usa FCoE VLAN/VSAN 30. O rastreamento mostra um VID de 13 e 14, respectivamente.

Keepalives FIP QLOGIC (configurados para FCoE VLAN/VSAN 100)

Solicitação de FIP do Monterey Park (P81e) (configurada para FCoE VLAN/VSAN 30)

O Ethanalyzer não mostrará o valor decimal de ID de VLAN real que você veria em um rastreamento em linha. O Ethanalyzer mostra o valor de N5K canonical VLAN ID (CVID) interno. Aqui está uma maneira de mapear:

N5K# show system internal fcfwd fwcvidmap cvid

Canonical VLAN-ID based FWCVIDMAP table-(all values in hex)

------------------------------------------------------------------------------

CVID   Type UCD  VID    Bcast_Index    Mcast_Index    MVR_Ctrl_Index

----   ---- ---- ---    -------------- -------------- --------------

0x0001 enet 0x01 0x0fc8 0100.0000.000b 0100.0000.000c 0100.0000.0004

0x0002 enet 0x01 0x0fc9 0100.0000.0000 0100.0000.0000 0100.0000.0000

0x0003 enet 0x01 0x0fcb 0100.0000.0000 0100.0000.0000 0100.0000.0000

0x0004 enet 0x01 0x0001 0100.0000.001d 0100.0000.001d 0100.0000.0004

0x0005 enet 0x01 0x0000 0100.0000.0000 0100.0000.0000 0100.0000.0000

0x0006 enet 0x02 0x0000 0100.0000.000a 0100.0000.000a 0100.0000.000a

0x0007 enet 0x02 0x0001 0100.0000.000a 0100.0000.000a 0100.0000.000a

0x000d enet 0x01 0x0064 0100.0000.001e 0100.0000.001e 0100.0000.0004 - vlan 100

0x000e enet 0x01 0x001e 0100.0000.0020 0100.0000.0020 0100.0000.0004 - vlan 30

0x0fff enet 0x01 0x0fca 0100.0000.0002 0100.0000.0002 0100.0000.0ffd

0x0000 fc   0x0e 0x0000 0100.0000.0000 0100.0000.0000 0100.0000.0000

0x0008 fc   0x0e 0x0ffe 0100.0000.0004 0100.0000.0004 0100.0000.0004

0x0009 fc   0x0e 0x0001 0100.0000.0004 0100.0000.0004 0100.0000.0004

0x000a fc   0x0e 0x0fef 0100.0000.0004 0100.0000.0004 0100.0000.0004

0x000c fc   0x0e 0x0005 0100.0000.0004 0100.0000.0004 0100.0000.0004

0x000d fc   0x0e 0x0064 0100.0000.0004 0100.0000.0004 0100.0000.0004 - vsan 100

0x000e fc   0x0e 0x001e 0100.0000.0004 0100.0000.0004 0100.0000.0004 - vsan 30

N5k# show flogi database

--------------------------------------------------------------------------------

INTERFACE    VSAN    FCID           PORT NAME               NODE NAME

--------------------------------------------------------------------------------

vfc1981      100   0xbc0000  21:00:00:c0:dd:15:d1:7d 20:00:00:c0:dd:15:d1:7d - Qlogic

vfc1982      30    0xb90000  20:00:e8:b7:48:4e:32:54 10:00:e8:b7:48:4e:32:54 - Monterey Park

Total number of flogi = 2.

N5K# sh vlan fcoe

Original VLAN ID        Translated VSAN ID      Association State

----------------        ------------------      -----------------

30                        30               Operational

100                       100              Operational

N5K# show platform fcfib vsan 30

(SD=S_ID/D_ID, SDO=S_ID/D_ID/OX_ID)

VSAN         CVSAN      State   LoadBal   IOD   IOD_State

30(0x001e)    14(0x000e)   active    SDO      N        none

N5K# show platform fcfib vsan 100

(SD=S_ID/D_ID, SDO=S_ID/D_ID/OX_ID)

VSAN         CVSAN      State   LoadBal   IOD   IOD_State

100(0x0064)    13(0x000d)  active    SDO      N        none

Canonical VLAN (CVID) 13 (0x000d) mapeia para FCoE VLAN 100 (0x0064), que mapeia para VSAN 100; e o CVID 14 (0x000e) mapeia para FCoE VLAN 30 (0x001e), que mapeia para VSAN 30.

O mesmo CVID (0x000e ? decimal 14) é usado para representar a VLAN e a VSAN FCoE externas, independentemente de usarem o mesmo número (recomendado) ou um número diferente. Por exemplo:

Altere a VLAN FCoE para o mapeamento de VSAN para FCoE VLAN 630 para VSAN 30, em vez de usar a VLAN 30 para VSAN 30.

N5K# show vlan fcoe

Original VLAN ID        Translated VSAN ID      Association State

----------------        ------------------      -----------------

100                       100              Operational

630                       30               Operational

Observe que o CVID (0x000e - decimal 14) é o mesmo número:

N5K# show system internal fcfwd fwcvidmap cvid

Canonical VLAN-ID based FWCVIDMAP table- (All values in hex)

------------------------------------------------------------------------------

CVID   Type UCD  VID    Bcast_Index    Mcast_Index    MVR_Ctrl_Index

----   ---- ---- ---    -------------- -------------- --------------

0x0001 enet 0x01 0x0fc8 0100.0000.000b 0100.0000.000c 0100.0000.0004

0x0002 enet 0x01 0x0fc9 0100.0000.0000 0100.0000.0000 0100.0000.0000

0x0003 enet 0x01 0x0fcb 0100.0000.0000 0100.0000.0000 0100.0000.0000

0x0004 enet 0x01 0x0001 0100.0000.001d 0100.0000.001d 0100.0000.0004

0x0005 enet 0x01 0x0000 0100.0000.0000 0100.0000.0000 0100.0000.0000

0x0006 enet 0x02 0x0000 0100.0000.000a 0100.0000.000a 0100.0000.000a

0x0007 enet 0x02 0x0001 0100.0000.000a 0100.0000.000a 0100.0000.000a

0x000d enet 0x01 0x0064 0100.0000.001e 0100.0000.001e 0100.0000.0004

0x000e enet 0x01 0x0276 0100.0000.0024 0100.0000.0024 0100.0000.0004 - VLAN 630

0x0fff enet 0x01 0x0fca 0100.0000.0002 0100.0000.0002 0100.0000.0ffd

0x0000 fc   0x0e 0x0000 0100.0000.0000 0100.0000.0000 0100.0000.0000

0x0008 fc   0x0e 0x0ffe 0100.0000.0004 0100.0000.0004 0100.0000.0004

0x0009 fc   0x0e 0x0001 0100.0000.0004 0100.0000.0004 0100.0000.0004

0x000a fc   0x0e 0x0fef 0100.0000.0004 0100.0000.0004 0100.0000.0004

0x000c fc   0x0e 0x0005 0100.0000.0004 0100.0000.0004 0100.0000.0004

0x000d fc   0x0e 0x0064 0100.0000.0004 0100.0000.0004 0100.0000.0004

0x000e fc   0x0e 0x001e 0100.0000.0004 0100.0000.0004 0100.0000.0004 - VSAN 30

Aqui está outra maneira de determinar o mapeamento interno da VLAN para o mapeamento externo da VLAN:

N5k# show platform afm info global

Gatos Hardware version 0

Hardware instance mapping

-------------------------

Hardware instance: 0 asic id: 0 slot num: 0

Hardware instance: 1 asic id: 1 slot num: 0

Hardware instance: 2 asic id: 2 slot num: 0

Hardware instance: 3 asic id: 3 slot num: 0

Hardware instance: 4 asic id: 4 slot num: 0

Hardware instance: 5 asic id: 5 slot num: 0

Hardware instance: 6 asic id: 6 slot num: 0

Hardware instance: 7 asic id: 0 slot num: 1

Hardware instance: 8 asic id: 1 slot num: 1

Hardware instance: 9 asic id: 0 slot num: 3

Hardware instance: 10 asic id: 1 slot num: 3

AFM Internal Status

-------------------

[unknown label ]: 324

[no free statistics counter ]: 2

[number of verify ]: 59

[number of commit ]: 59

[number of request ]: 6163

[tcam stats full ]: 2

Vlan mapping table

------------------

Ext-vlan: 1 - Int-vlan: 66

Ext-vlan: 2 - Int-vlan: 62

Ext-vlan: 101 - Int-vlan: 61

Ext-vlan: 102 - Int-vlan: 60

Ext-vlan: 103 - Int-vlan: 59

Ext-vlan: 104 - Int-vlan: 58

Ext-vlan: 105 - Int-vlan: 57

Ext-vlan: 106 - Int-vlan: 56

Ext-vlan: 107 - Int-vlan: 55

Ext-vlan: 108 - Int-vlan: 54

Ext-vlan: 109 - Int-vlan: 53

Ext-vlan: 110 - Int-vlan: 52

Ext-vlan: 111 - Int-vlan: 51

Ext-vlan: 112 - Int-vlan: 50