Contents

Introduction

Prerequisites

Requirements

Componentes Utilizados

Conventions

Produtos Relacionados

Configurar

Diagrama de Rede

Configurações

Configuração de TLS ESMTP

Verificar

Troubleshoot

Informações Relacionadas

Introduction

Esta configuração de exemplo demonstra como configurar o PIX Firewall para acesso a um servidor de e-mail localizado na rede externa.

Consulte o PIX/ASA 7.x ou superior: Exemplo de Acesso ao Servidor de Correio na Configuração de Rede Interna para configurar o PIX/ASA Security Appliance para acesso a um servidor de correio/SMTP localizado na rede Interna.

Consulte Exemplo de Configuração de PIX/ASA 7.x com Acesso ao Servidor de Correio na Rede DMZ para configurar o PIX/ASA Security Appliance para acesso a um servidor de e-mail/SMTP localizado na rede DMZ.

Consulte o ASA 8.3 e posterior: Exemplo de Acesso ao Servidor de Email (SMTP) em Rede Externa para obter mais informações sobre a configuração idêntica no Cisco Adaptive Security Appliance (ASA) com versão 8.3 e posterior.

Consulte a documentação do Cisco Secure PIX Firewall para obter mais informações sobre como configurar o Microsoft Exchange. Escolha sua versão de software, vá para o guia de configuração e leia o capítulo sobre como configurar o para o Microsoft Exchange.

Prerequisites

Requirements

Não existem requisitos específicos para este documento.

Componentes Utilizados

As informações neste documento são baseadas nestas versões de software e hardware:

- PIX Firewall 535

- Software PIX Firewall versão 7.1(1)

- Cisco 2500 Routers

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Conventions

Consulte as Convenções de Dicas Técnicas da Cisco para obter mais informações sobre convenções de documentos.

Produtos Relacionados

Essa configuração também pode ser usada com um Adaptive Security Appliance (ASA) que executa a versão 7.x e posterior.

Configurar

Nesta seção, você encontrará informações para configurar os recursos descritos neste documento.

Observação: use o Cisco CLI Analyzer para obter mais informações sobre os comandos usados nesta seção.

Diagrama de Rede

Este documento utiliza a seguinte configuração de rede:

Configurações

Este documento utiliza as seguintes configurações:

- Firewall de PIX

- Router A

- Router B

Firewall de PIX

PIX Version 7.1(1)

!

hostname pixfirewall

enable password 8Ry2YjIyt7RRXU24 encrypted

names

!

interface Ethernet0

shutdown

no nameif

no security-level

no ip address

!

interface Ethernet1

shutdown

no nameif

no security-level

no ip address

!

interface Ethernet2

shutdown

no nameif

no security-level

no ip address

!

!--- Define the IP address for the inside interface.

interface Ethernet3

nameif inside

security-level 100

ip address 192.168.1.1 255.255.255.252

!

!--- Define the IP address for the outside interface.

interface Ethernet4

nameif outside

security-level 0

ip address 209.64.3.1 255.255.255.252

!

interface Ethernet5

shutdown

no nameif

no security-level

no ip address

!

passwd 2KFQnbNIdI.2KYOU encrypted

ftp mode passive

pager lines 24

mtu inside 1500

mtu outside 1500

no failover

no asdm history enable

arp timeout 14400

!--- This command defines the global for the Network Address Translation !--- (NAT) statement. In this case, the two commands state that any traffic !--- from the 192.168.2.x network that passes from the inside interface (Ethernet0) !--- to the outside interface (Ethernet 1) translates into an address !--- in the range of 209.64.3.129 through 209.64.3.253 and contains a subnet !--- mask of 255.255.255.128.

global (outside) 1 209.64.3.129-209.64.3.253 netmask 255.255.255.128

!--- This command reserves the last available address (209.64.3.254) for !--- for Port Address Translation (PAT). In the previous statement, !--- each address inside that requests a connection uses one !--- of the addresses specified. If all of these addresses are in use, !--- this statement provides a failsafe to allow additional inside stations !--- to establish connections.

global (outside) 1 209.64.3.254

!--- This command indicates that all addresses in the 192.168.2.x range !--- that pass from the inside (Ethernet0) to a corresponding global !--- designation are done with NAT. !--- As outbound traffic is permitted by default on the PIX, no !--- static commands are needed.

nat (inside) 1 192.168.2.0 255.255.255.0

!--- Creates a static route for the 192.168.2.x network with 192.168.1.2. !--- The PIX forwards packets with these addresses to the router !--- at 192.168.1.2.

route inside 192.168.2.0 255.255.255.0 192.168.1.2 1

!--- Sets the default route for the PIX Firewall at 209.64.3.2.

route outside 0.0.0.0 0.0.0.0 209.64.3.2 1

timeout xlate 3:00:00

timeout conn 1:00:00 half-closed 0:10:00 udp 0:02:00 icmp 0:00:02

timeout sunrpc 0:10:00 h323 0:05:00 h225 1:00:00 mgcp 0:05:00

timeout mgcp-pat 0:05:00 sip 0:30:00 sip_media 0:02:00

timeout uauth 0:05:00 absolute

no snmp-server location

no snmp-server contact

snmp-server enable traps snmp authentication linkup linkdown coldstart

telnet timeout 5

ssh timeout 5

console timeout 0

!

class-map inspection_default

match default-inspection-traffic

!

!

!--- SMTP/ESMTP is inspected since "inspect esmtp" is included in the map.

policy-map global_policy

class inspection_default

inspect dns maximum-length 512

inspect ftp

inspect h323 h225

inspect h323 ras

inspect rsh

inspect rtsp

inspect esmtp

inspect sqlnet

inspect skinny

inspect sunrpc

inspect xdmcp

inspect sip

inspect netbios

inspect tftp

!

service-policy global_policy global

Cryptochecksum:8a63de5ae2643c541a397c2de7901041

: end

Router A

Current configuration:

!

version 12.0

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname 2522-R4

!

enable secret 5 $1$N0F3$XE2aJhJlCbLWYloDwNvcV.

!

ip subnet-zero

!

!

!

!

!

interface Ethernet0

!--- Assigns an IP address to the inside Ethernet interface.

ip address 192.168.2.1 255.255.255.0

no ip directed-broadcast

!

interface Ethernet1

!--- Assigns an IP address to the PIX-facing interface.

ip address 192.168.1.2 255.255.255.252

no ip directed-broadcast

!

interface Serial0

no ip address

no ip directed-broadcast

shutdown

!

interface Serial1

no ip address

no ip directed-broadcast

shutdown

!

ip classless

!--- This route instructs the inside router to forward all !--- non-local packets to the PIX.

ip route 0.0.0.0 0.0.0.0 192.168.1.1

!

!

line con 0

transport input none

line aux 0

autoselect during-login

line vty 0 4

exec-timeout 5 0

password ww

login

!

end

Router B

Current configuration:

!

version 12.0

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname 2522-R4

!

enable secret 5 $1$N0F3$XE2aJhJlCbLWYloDwNvcV.

!

ip subnet-zero

!

!

!

!

interface Ethernet0

!--- Assigns an IP address to the PIX-facing Ethernet interface.

ip address 209.64.3.2 255.255.255.252

no ip directed-broadcast

!

interface Ethernet1

!--- Assigns an IP address to the server-facing Ethernet interface.

ip address 209.64.3.5 255.255.255.252

no ip directed-broadcast

!

interface Serial0

!--- Assigns an IP address to the Internet-facing interface.

ip address 209.64.3.9 255.255.255.252

no ip directed-broadcast

no ip mroute-cache

!

interface Serial1

no ip address

no ip directed-broadcast

!

ip classless

!--- All non-local packets are to be sent out serial 0. In this case, !--- the IP address on the other end of the serial interface is not known, !--- or you can specify it here.

ip route 0.0.0.0 0.0.0.0 serial 0

!

!--- This statement is required to direct traffic destined to the !--- 209.64.3.128 network (the PIX global pool) to the PIX to be translated !--- back to the inside addresses.

ip route 209.64.3.128 255.255.255.128 209.64.3.1

!

!

line con 0

transport input none

line aux 0

autoselect during-login

line vty 0 4

exec-timeout 5 0

password ww

login

!

end

Configuração de TLS ESMTP

Observação: se você usar a criptografia TLS (Transport Layer Security) para comunicação por e-mail, o recurso de inspeção ESMTP (ativado por padrão) no PIX descartará os pacotes. Para permitir os e-mails com TLS ativado, desative o recurso de inspeção ESMTP como mostrado nesta saída.

pix(config)#policy-map global_policy

pix(config-pmap)#class inspection_default

pix(config-pmap-c)#no inspect esmtp

pix(config-pmap-c)#exit

pix(config-pmap)#exit

Verificar

No momento, não há procedimento de verificação disponível para esta configuração.

Troubleshoot

O Cisco CLI Analyzer suporta determinados comandos show. Use o CLI Analyzer para exibir uma análise da saída do comando show.

Nota:Consulte Informações Importantes sobre Comandos de Depuração antes de usar comandos debug.

O comando logging console debugging direciona mensagens para o console PIX. Se a conectividade com o servidor de e-mail for um problema, examine as mensagens de depuração do console para localizar os endereços IP das estações de envio e de recebimento para determinar o problema.

Informações Relacionadas

- Estabelecendo conectividade através de firewalls do Cisco PIX

- Cisco PIX Firewall Software

- Referências do comando Cisco Secure PIX Firewall

- Firewalls Cisco ASA 5500-X Series

- Solicitações de Comentários (RFCs)

- Suporte Técnico e Documentação - Cisco Systems