目次

はじめに

前提条件

要件

使用するコンポーネント

設定

GUI による設定

認証サーバの定義

ACS の設定

SSID の設定

CLI による設定

確認

トラブルシューティング

debug dot11 aaa authenticator state-machine

debug radius authentication

debug aaa authentication

概要

このドキュメントでは、Extensible Authentication Protocol（EAP; 拡張可能認証プロトコル）を使用して、RADIUS サーバからアクセスされるデータベースに照合して無線ユーザを認証するために Cisco IOS® のソフトウェア ベースのアクセス ポイント（AP）を設定する例について説明しています。

AP は、クライアントからの無線パケットを認証サーバ宛ての有線パケットにブリッジ（またはその逆）します。 AP は EAP でこのような受動的な役割を果たすため、この設定がほぼすべての EAP 方式で使用されます。 これらの方式には、Light EAP（LEAP）、Protected EAP（PEAP）-Microsoft Challenge Handshake Authentication Protocol（MSCHAP）バージョン 2、PEAP-Generic Token Card（GTC）、EAP-Flexible Authentication via Secure Tunneling（FAST）、EAP-Transport Layer Security（TLS）、EAP-Tunneled TLS（TTLS）などがありますが、これらだけに限られません。 このような EAP 方式ごとに認証サーバを適切に設定する必要があります。

このドキュメントでは、AP および RADIUS サーバ（この設定例では Cisco Secure Access Control Server（ACS）5.3）を設定する方法について説明します。

前提条件

要件

次の項目に関する知識が推奨されます。

- Cisco IOS ソフトウェアの GUI またはコマンドライン インターフェイス（CLI）

- EAP 認証の概念

使用するコンポーネント

このドキュメントの情報は、次のソフトウェアとハードウェアのバージョンに基づくものです。

- Cisco IOS ソフトウェア リリース 15.2(2)JB が稼働する Cisco Aironet 3602 アクセス ポイント

- Cisco Secure Access Control Server 5.3

この設定例では、ネットワークに VLAN が 1 つしか存在していないと想定しています。

本書の情報は、特定のラボ環境にあるデバイスに基づいて作成されたものです。 このドキュメントで使用するすべてのデバイスは、初期（デフォルト）設定の状態から起動しています。 稼働中のネットワークで作業を行う場合、コマンドの影響について十分に理解したうえで作業してください。

設定

このドキュメントでは、GUI と CLI の両方で次の設定を使用しています。

- AP の IP アドレスは 10.105.136.11 です。

- RADIUS サーバ（ACS）の IP アドレスは 10.106.55.91 です。

GUI による設定

認証サーバの定義

この手順では、認証サーバを定義し、そのサーバとの関係を確立する方法について説明します。

1. AP の GUI で、[Security] > [Server Manager] に移動します。

2. [Corporate Servers] セクションで、[Server] フィールドに認証サーバの IP アドレス（10.106.55.91）を入力します。

3. [Shared Secret]、[Authentication Port]、および [Accounting Port] を指定します。 ポートは、1813 と 1814、または 1645 と 1646 を使用できます。

4. [Apply] をクリックして、定義を作成し、ドロップダウン リストにデータを設定します。

5. [Default Server Priorities] セクションで、[EAP Authentication Priority 1] フィールドをサーバの IP アドレス（10.106.55.91）に設定します。

6. [Apply] をクリックします。

ACS の設定

ユーザを外部 RADIUS サーバに送信する場合、AP はこの外部 RADIUS サーバに対して認証、認可、およびアカウンティング（AAA）クライアントである必要があります。 この手順では、ACS を設定する方法について説明します。

1. Cisco Secure ACS の GUI で、[Network Resources] をクリックします。 ACS 5.3 では、デバイスを場所別にグループ化できます。

2. 場所を作成します。 [Network Device Groups] の下で [Location] をクリックします。 [create new location] をクリックします。 [Name] フィールドに、場所の名前（IOS_lab）を入力します。 この場所の説明（IOS LAB）を入力します。 [Parent] の場所として全体的な [All Locations] を選択します。 [Submit] をクリックして検証します。

3. IOS AP のグループを 1 つ作成します。 [Device Type] をクリックします。 [Create] をクリックして新しいグループを作成します。 [Name] フィールドに、グループ名（IOS_APs）を入力します。 このグループの説明（IOS APs in the LAB）を入力します。 [Parent] で [All Device Types] を選択します。 [Submit] をクリックして検証します。

4. AP を追加します。 [Network Devices and AAA Clients] をクリックします。 [Name] フィールドに、IOS AP の名前（AP）を入力します。 その AP の説明（IOS AP）を入力します。

[Network Device Groups] の下の [Location] フィールドの横にある [Select] をクリックし、IOS_lab の横のボックスをオンにしてから、[OK] をクリックして検証します。 [IP Address] の下で、[Single IP Address] が有効になっていることを確認してから、AP の IP アドレス（10.105.136.11）を入力します。

[Authentication Options] の下で、[RADIUS] をオンにします。 [Shared Secret] フィールドで、秘密（Cisco）を入力します。 その他の値はデフォルトのままにします。 [Submit] をクリックして検証します。

5. 無線ユーザのクレデンシャル（資格情報）を追加します。 [Users and Identity Stores] > [Identity Groups] に移動します。 [Create] をクリックして新しいグループを作成します。 [Name] フィールドに、グループ名（EAP_Users）を入力します。 説明（Users for EAP wireless）を入力します。 [Submit] をクリックして検証します。

6. このグループにユーザを 1 つ作成します。 [Users] をクリックします。 [Create] をクリックして新しいユーザを作成します。 [Name] フィールドに、ユーザ名（radius）を入力します。 ユーザの [Status] が [Enabled] であることを確認します。 ユーザの説明（test radius）を入力します。 [Identity Group] フィールドの横にある [Select] をクリックし、EAP_Users の横のボックスをオンにしてから、[OK] をクリックして検証します。

[Password Information] の下の [Password] と [Confirm Password] に、<パスワード> を入力します。 このユーザはネットワークにアクセスする必要がありますが、管理のためにシスコ デバイスにアクセスする必要はないため、[Enable Password] を入力する必要はありません。

7. [Submit] をクリックして検証します。 新しいユーザがリストに表示されます。これで ACS の準備が完了しました。

8. [Policy Elements] > [Authorization and Permissions] > [Network Access] > [Authorization Profiles] に移動して、このユーザにアクセス権限が付与されたことを検証します。 PermitAccess プロファイルが表示されるはずです。 このプロファイルを受け取ったユーザは、ネットワークへのアクセスが付与されています。

9. [Access Policies] > [Access Services] > [Default Device Admin] に移動して、その認証を調べます。 [Identity]、[Group Mapping]、および [Authorization] がオンになっていることを確認します。

10. [Allowed Protocols] タブをクリックし、必要な EAP 方式のボックスをすべてオンにしてから、[Submit] をクリックして検証します。

SSID の設定

この手順では、AP 上でサービス セット識別子（SSID）を設定する方法について説明します。

1. Cisco Secure ACS の GUI で、[Security] > [SSID Manager] に移動します。 [New] をクリックし、SSID 名（radius）を入力し、両方の無線インターフェイスを有効にしてから、[Apply] をクリックします。

2. [Security] > [Encryption Manager] に移動して、[Cipher] に [AES CCMP] を選択し、[Apply-All] をクリックして、この暗号化を両方の無線に適用します。

3. [Security] > [SSID Manager] に移動して、[radius] SSID を選択します。 [Client Authentication Settings] セクションで、[Open Authentication] をオンにし、ドロップダウン リストから [with EAP] を選択してから、[Network EAP] をオンにします。

[Client Authenticated Key Management] セクションで、[Key Management] ドロップダウン リストから [Mandatory] を選択し、[Enable WPA] をオンにして、ドロップダウン リストから [WPAv2] を選択します。 [Apply] をクリックします。

4. この SSID を両方の無線でブロードキャストするには、同じページで [Guest Mode/Infrastructure SSID Settings] セクションを見つけます。 両方の無線で、[Beacon Mode] を [Single BSSID] に設定し、[Set Single Guest Mode SSID] ドロップダウン リストから SSID 名（radius）を選択します。 [Apply] をクリックします。

5. [Network] > [Network Interface] > [Radio0-802.11n 2G.Hz] > [Settings] > [Enable] に移動して、両方の無線インターフェイスを有効にします。

6. クライアント接続をテストします。

CLI による設定

注：

このセクションで使用されているコマンドの詳細を調べるには、Command Lookup Tool（登録ユーザ専用）を使用してください。

特定の show コマンドがアウトプット インタープリタ ツール（登録ユーザ専用）でサポートされています。 show コマンド出力の分析を表示するには、アウトプット インタープリタ ツールを使用します。

これは CLI 内で行う設定と同じです。

show run

Building configuration...

Current configuration : 2511 bytes

!

! Last configuration change at 01:17:48 UTC Mon Mar 1 1993

version 15.2

no service pad

service timestamps debug datetime msec

service timestamps log datetime msec

service password-encryption

!

hostname ap

!

!

logging rate-limit console 9

enable secret 5 $1$1u04$jr7DG0DC5KZ6bVaSYUhck0

!

aaa new-model

!

!

aaa group server radius rad_eap

server 10.106.55.91

!

aaa group server radius rad_mac

!

aaa group server radius rad_acct

!

aaa group server radius rad_admin

!

aaa group server tacacs+ tac_admin

!

aaa group server radius rad_pmip

!

aaa group server radius dummy

!

aaa authentication login eap_methods group rad_eap

aaa authentication login mac_methods local

aaa authorization exec default local

aaa accounting network acct_methods start-stop group rad_acct

!

!

!

!

!

aaa session-id common

ip cef

!

ip dhcp pool test

!

!

!

dot11 syslog

!

dot11 ssid radius

authentication open eap eap_methods

authentication network-eap eap_methods

authentication key-management wpa version 2

guest-mode

!

!

crypto pki token default removal timeout 0

!

!

username Cisco password 7 0802455D0A16

!

!

bridge irb

!

!

!

interface Dot11Radio0

no ip address

!

encryption mode ciphers aes-ccm

!

ssid radius

!

antenna gain 0

stbc

station-role root

bridge-group 1

bridge-group 1 subscriber-loop-control

bridge-group 1 spanning-disabled

bridge-group 1 block-unknown-source

no bridge-group 1 source-learning

no bridge-group 1 unicast-flooding

!

interface Dot11Radio1

no ip address

!

encryption mode ciphers aes-ccm

!

ssid radius

!

antenna gain 0

dfs band 3 block

stbc

channel dfs

station-role root

bridge-group 1

bridge-group 1 subscriber-loop-control

bridge-group 1 spanning-disabled

bridge-group 1 block-unknown-source

no bridge-group 1 source-learning

no bridge-group 1 unicast-flooding

!

interface GigabitEthernet0

no ip address

duplex auto

speed auto

bridge-group 1

bridge-group 1 spanning-disabled

no bridge-group 1 source-learning

!

interface BVI1

ip address 10.105.136.11 255.255.255.128

!

ip default-gateway 10.105.136.1

ip forward-protocol nd

ip http server

no ip http secure-server

ip http help-path http://www.cisco.com/warp/public/779/smbiz/prodconfig/help/eag

ip route 0.0.0.0 0.0.0.0 10.105.136.1

ip radius source-interface BVI1

!

radius-server attribute 32 include-in-access-req format %h

radius-server host 10.106.55.91 key 7 00271A1507545A545C606C

radius-server vsa send accounting

!

bridge 1 route ip

!

!

!

line con 0

line vty 0 4

transport input all

!

end

確認

ここでは、設定が正常に動作していることを確認します。

クライアントを接続します。 認証に成功すると、AP の GUI に次の設定の要約が表示されます。

注: 特定の show コマンドがアウトプット インタープリタ ツール（登録ユーザ専用）でサポートされています。 show コマンド出力の分析を表示するには、アウトプット インタープリタ ツールを使用します。

CLI で、show dot11 associations コマンドを入力して、設定を確認します。

ap#show dot11 associations

802.11 Client Stations on Dot11Radio0:

SSID [radius] :

MAC Address    IP address      Device        Name         Parent      State

f8db.7f75.7804 10.105.136.116  unknown       -            self        EAP-Assoc

また、show radius server-group all コマンドを入力して、AP 上のすべての設定済み RADIUS サーバ グループのリストを表示することもできます。

トラブルシューティング

この手順では、設定のトラブルシューティング方法について説明します。

1. クライアント設定で破損した部分がないことを確認するために、クライアント側のユーティリティまたはソフトウェアで、同じか、または類似のパラメータを使用して新規にプロファイルまたは接続を作成します。

2. 無線周波数（RF）に関する問題があると認証が成功しない可能性があります。 この可能性を排除するために、次のようにして認証を一時的に無効にします。

- CLI から、次のコマンドを入力します。

- no authentication open eap eap_methods

- no authentication network-eap eap_methods

- authentication open

- GUI からは、[SSID Manager] ページで、[Network-EAP] チェックボックスをオフにし、[Open] のチェックボックスをオンにし、ドロップダウン リストを [No Addition] に設定します。

クライアントが関連付けに成功する場合には、RF はアソシエーションの問題に関係しません。

3. 共有秘密パスワードが AP と認証サーバ間で同期していることを検証します。 同期していない場合、次のエラー メッセージが表示される場合があります。

Invalid message authenticator in EAP request

- CLI から、次の行を確認します。

radius-server host x.x.x.x auth-port x acct-port x key <shared_secret>

- GUI からは、[Server Manager] ページで、[Shared Secret] フィールドに対象となるサーバの共有秘密を再入力します。

RADIUS サーバ上の AP に対する共有秘密エントリには、同じ共有秘密パスワードが含まれている必要があります。

4. RADIUS サーバからすべてのユーザ グループを削除します。 RADIUS サーバで定義されたユーザ グループと、基になるドメインのユーザ グループ間で、不一致が発生する可能性があります。 RADIUS サーバのログで、失敗した試行がないかどうかを確認し、失敗の理由も確認します。

注: debug コマンドを使用する前に、『debug コマンドの重要な情報』を参照してください。

デバイス間のネゴシエーションを調査および表示するには、次の各 debug コマンドを使用します。

- debug dot11 aaa authenticator state-machine

- debug radius authentication

- debug aaa authentication

debug dot11 aaa authenticator state-machine

このコマンドでは、クライアントと認証サーバ間のネゴシエーションの主な部分（または状態）を表示します。 成功した認証からの出力例を次に示します。

ap#debug dot11 aaa authenticator state-machine

state machine debugging is on

ap#

*Mar  1 01:38:34.919: dot11_auth_dot1x_send_id_req_to_client: Sending identity

request to f8db.7f75.7804

*Mar  1 01:38:34.919: dot11_auth_dot1x_send_id_req_to_client: Client

f8db.7f75.7804 timer started for 30 seconds

*Mar  1 01:38:35.431: dot11_auth_dot1x_run_rfsm: Executing Action(CLIENT_WAIT,

CLIENT_REPLY) for f8db.7f75.7804

*Mar  1 01:38:35.431: dot11_auth_dot1x_send_response_to_server: Sending client

f8db.7f75.7804 data to server

*Mar  1 01:38:35.431: dot11_auth_dot1x_send_response_to_server: Started timer

server_timeout 60 seconds

*Mar  1 01:38:35.435: dot11_auth_dot1x_run_rfsm: Executing Action(SERVER_WAIT,

SERVER_REPLY) for f8db.7f75.7804

*Mar  1 01:38:35.435: dot11_auth_dot1x_send_response_to_client: Forwarding server

message to client f8db.7f75.7804

*Mar  1 01:38:35.435: dot11_auth_dot1x_send_response_to_client: Started timer

client_timeout 30 seconds

*Mar  1 01:38:35.443: dot11_auth_dot1x_run_rfsm: Executing Action(CLIENT_WAIT,

CLIENT_REPLY) for f8db.7f75.7804

*Mar  1 01:38:35.443: dot11_auth_dot1x_send_response_to_server: Sending client

f8db.7f75.7804 data to server

*Mar  1 01:38:35.443: dot11_auth_dot1x_send_response_to_server: Started timer

server_timeout 60 seconds

*Mar  1 01:38:35.447: dot11_auth_dot1x_run_rfsm: Executing Action(SERVER_WAIT,

SERVER_REPLY) for f8db.7f75.7804

*Mar  1 01:38:35.447: dot11_auth_dot1x_send_response_to_client: Forwarding server

message to client f8db.7f75.7804

*Mar  1 01:38:35.447: dot11_auth_dot1x_send_response_to_client: Started timer

client_timeout 30 seconds

-------------------Lines Omitted for simplicity-------------------

*Mar  1 01:38:36.663: dot11_auth_dot1x_run_rfsm: Executing Action(SERVER_WAIT,

SERVER_REPLY) for f8db.7f75.7804

*Mar  1 01:38:36.663: dot11_auth_dot1x_send_response_to_client: Forwarding server

message to client f8db.7f75.7804

*Mar  1 01:38:36.663: dot11_auth_dot1x_send_response_to_client: Started timer

client_timeout 30 seconds

*Mar  1 01:38:36.667: dot11_auth_dot1x_run_rfsm: Executing Action(CLIENT_WAIT,

CLIENT_REPLY) for f8db.7f75.7804

*Mar  1 01:38:36.667: dot11_auth_dot1x_send_response_to_server: Sending client

f8db.7f75.7804 data to server

*Mar  1 01:38:36.667: dot11_auth_dot1x_send_response_to_server: Started timer

server_timeout 60 seconds

*Mar  1 01:38:36.671: dot11_auth_dot1x_run_rfsm: Executing Action(SERVER_WAIT,

SERVER_PASS) for f8db.7f75.7804

*Mar  1 01:38:36.671: dot11_auth_dot1x_send_response_to_client: Forwarding server

message to client f8db.7f75.7804

*Mar  1 01:38:36.671: dot11_auth_dot1x_send_response_to_client: Started timer

client_timeout 30 seconds

*Mar  1 01:38:36.719: %DOT11-6-ASSOC: Interface Dot11Radio0, Station

f8db.7f75.7804 Associated KEY_MGMT[WPAv2]

debug radius authentication

このコマンドでは、サーバとクライアント間（両方とも AP でブリッジされている）の RADIUS ネゴシエーションを表示します。 成功した認証からの出力例を次に示します。

ap#debug radius authentication

*Mar  1 01:50:50.635: RADIUS/ENCODE(000001F6):Orig. component type = DOT11

*Mar  1 01:50:50.635: RADIUS:  AAA Unsupported Attr: ssid [347] 6

*Mar  1 01:50:50.635: RADIUS:   72 61 64 69 [ radi]

*Mar  1 01:50:50.635: RADIUS:  AAA Unsupported Attr: service-type [345] 4 1

*Mar  1 01:50:50.635: RADIUS:  AAA Unsupported Attr: interface [222] 3

*Mar  1 01:50:50.635: RADIUS:   32 [ 2]

*Mar  1 01:50:50.635: RADIUS(000001F6): Config NAS IP: 10.105.136.11

*Mar  1 01:50:50.635: RADIUS(000001F6): Config NAS IPv6:

*Mar  1 01:50:50.635: RADIUS/ENCODE(000001F6): acct_session_id: 491

*Mar  1 01:50:50.635: RADIUS(000001F6): Config NAS IP: 10.105.136.11

*Mar  1 01:50:50.635: RADIUS(000001F6): sending

*Mar  1 01:50:50.635: RADIUS(000001F6): Send Access-Request to 10.106.55.91:1645

id 1645/73, len 140

*Mar  1 01:50:50.635: RADIUS:  authenticator 0F 74 18 0E F3 08 ED 51 -

8B EA F7 31 AC C9 CA 6B

*Mar  1 01:50:50.635: RADIUS:  User-Name  [1]   8   "radius"

*Mar  1 01:50:50.635: RADIUS:  Framed-MTU  [12]  6   1400

*Mar  1 01:50:50.635: RADIUS:  Called-Station-Id   [30]  26  "1C-E6-C7-E1-D8-90:

radius"

*Mar  1 01:50:50.635: RADIUS:  Calling-Station-Id  [31]  16  "f8db.7f75.7804"

*Mar  1 01:50:50.635: RADIUS:  Service-Type [6]   6   Login  [1]

*Mar  1 01:50:50.635: RADIUS:  Message-Authenticato[80]  18

*Mar  1 01:50:50.635: RADIUS:   E3 E1 50 F8 2B 22 26 84 C1 F1 76 28 79 70 5F 78

[ P+"&v(yp_x]

*Mar  1 01:50:50.635: RADIUS:  EAP-Message [79]  13

*Mar  1 01:50:50.635: RADIUS:   02 01 00 0B 01 72 61 64 69 75 73

[ radius]

*Mar  1 01:50:50.635: RADIUS:  NAS-Port-Type       [61]  6   802.11 wireless

[19]

*Mar  1 01:50:50.635: RADIUS:  NAS-Port   [5]   6   282

*Mar  1 01:50:50.635: RADIUS:  NAS-Port-Id  [87]  5   "282"

*Mar  1 01:50:50.635: RADIUS:  NAS-IP-Address [4]   6   10.105.136.11

*Mar  1 01:50:50.635: RADIUS:  Nas-Identifier  [32]  4   "ap"

*Mar  1 01:50:50.635: RADIUS(000001F6): Sending a IPv4 Radius Packet

*Mar  1 01:50:50.635: RADIUS(000001F6): Started 5 sec timeout

*Mar  1 01:50:50.639: RADIUS: Received from id 1645/73 10.106.55.91:1645, Access

-Challenge, len 94

*Mar  1 01:50:50.639: RADIUS:  authenticator 5E A4 A7 B9 01 CC F4 20 -

2E D0 2A 1A A4 58 05 9E

*Mar  1 01:50:50.639: RADIUS:  State               [24]  32

*Mar  1 01:50:50.639: RADIUS:   32 37 53 65 73 73 69 6F 6E 49 44 3D 61 63 73 35

[27SessionID=acs5]

*Mar  1 01:50:50.639: RADIUS:   31 2F 31 36 35 34 38 39 35 31 31 2F 39 3B    [ 1

/165489511/9;]

*Mar  1 01:50:50.639: RADIUS:  EAP-Message         [79]  24

*Mar  1 01:50:50.639: RADIUS:   01 DC 00 16 11 01 00 08 00 CB 2A 0A 74 B3 77 AF

72 61 64 69 75 73         [ *twradius]

*Mar  1 01:50:50.639: RADIUS:  Message-Authenticato[80]  18

*Mar  1 01:50:50.643: RADIUS:   CC 44 D5 FE FC 86 BC 2D B0 89 61 69 4F 34 D1 FF

[ D-aiO4]

*Mar  1 01:50:50.643: RADIUS(000001F6): Received from id 1645/73

*Mar  1 01:50:50.643: RADIUS/DECODE: EAP-Message fragments, 22, total 22 bytes

*Mar  1 01:50:50.647: RADIUS/ENCODE(000001F6):Orig. component type = DOT11

*Mar  1 01:50:50.647: RADIUS:  AAA Unsupported Attr: ssid              [347] 6

*Mar  1 01:50:50.647: RADIUS:   72 61 64 69              [ radi]

*Mar  1 01:50:50.647: RADIUS:  AAA Unsupported Attr: service-type      [345] 4

1

*Mar  1 01:50:50.647: RADIUS:  AAA Unsupported Attr: interface         [222] 3

*Mar  1 01:50:50.647: RADIUS:   32                 [ 2]

*Mar  1 01:50:50.647: RADIUS(000001F6): Config NAS IP: 10.105.136.11

*Mar  1 01:50:50.647: RADIUS(000001F6): Config NAS IPv6:

*Mar  1 01:50:50.647: RADIUS/ENCODE(000001F6): acct_session_id: 491

*Mar  1 01:50:50.647: RADIUS(000001F6): Config NAS IP: 10.105.136.11

*Mar  1 01:50:50.647: RADIUS(000001F6): sending

*Mar  1 01:50:50.647: RADIUS(000001F6): Send Access-Request to 10.106.55.91:1645

id 1645/74, len 167

*Mar  1 01:50:50.647: RADIUS:  authenticator C6 54 54 B8 58 7E ED 60 - F8 E0 2E

05 B0 87 3B 76

*Mar  1 01:50:50.647: RADIUS:  User-Name           [1]   8   "radius"

*Mar  1 01:50:50.647: RADIUS:  Framed-MTU          [12]  6   1400

*Mar  1 01:50:50.647: RADIUS:  Called-Station-Id   [30]  26  "1C-E6-C7-E1-D8-90:

radius"

*Mar  1 01:50:50.647: RADIUS:  Calling-Station-Id  [31]  16  "f8db.7f75.7804"

*Mar  1 01:50:50.647: RADIUS:  Service-Type        [6]   6   Login

[1]

*Mar  1 01:50:50.647: RADIUS:  Message-Authenticato[80]  18

*Mar  1 01:50:50.647: RADIUS:   FE 15 7B DB 49 FE 27 C5 BC E2 FE 83 B9 25 8C 1F

[ {I'?]

*Mar  1 01:50:50.647: RADIUS:  EAP-Message         [79]  8

*Mar  1 01:50:50.647: RADIUS:   02 DC 00 06 03 19

*Mar  1 01:50:50.647: RADIUS:  NAS-Port-Type       [61]  6   802.11 wireless

[19]

*Mar  1 01:50:50.647: RADIUS:  NAS-Port            [5]   6   282

*Mar  1 01:50:50.647: RADIUS:  NAS-Port-Id         [87]  5   "282"

*Mar  1 01:50:50.647: RADIUS:  State               [24]  32

*Mar  1 01:50:50.647: RADIUS:   32 37 53 65 73 73 69 6F 6E 49 44 3D 61 63 73 35

[27SessionID=acs5]

*Mar  1 01:50:50.647: RADIUS:   31 2F 31 36 35 34 38 39 35 31 31 2F 39 3B    [ 1

/165489511/9;]

*Mar  1 01:50:50.647: RADIUS:  NAS-IP-Address      [4]   6   10.105.136.11

*Mar  1 01:50:50.647: RADIUS:  Nas-Identifier      [32]  4   "ap"

*Mar  1 01:50:50.647: RADIUS(000001F6): Sending a IPv4 Radius Packet

*Mar  1 01:50:50.647: RADIUS(000001F6): Started 5 sec timeout

*Mar  1 01:50:50.647: RADIUS: Received from id 1645/74 10.106.55.91:1645, Access

-Challenge, len 78

*Mar  1 01:50:50.647: RADIUS:  authenticator 0E 81 99 9E EE 39 50 FB - 6E 6D 93

8C 8E 29 94 EC

*Mar  1 01:50:50.647: RADIUS:  State               [24]  32

*Mar  1 01:50:50.651: RADIUS:   32 37 53 65 73 73 69 6F 6E 49 44 3D 61 63 73 35

[27SessionID=acs5]

*Mar  1 01:50:50.651: RADIUS:   31 2F 31 36 35 34 38 39 35 31 31 2F 39 3B    [ 1

/165489511/9;]

*Mar  1 01:50:50.651: RADIUS:  EAP-Message         [79]  8

*Mar  1 01:50:50.651: RADIUS:   01 DD 00 06 19 21                 [ !]

*Mar  1 01:50:50.651: RADIUS:  Message-Authenticato[80]  18

*Mar  1 01:50:50.651: RADIUS:   A8 54 00 89 1F 2A 01 52 FE FA D2 58 2F E5 F2 86

[ T*RX/]

*Mar  1 01:50:50.651: RADIUS(000001F6): Received from id 1645/74

*Mar  1 01:50:50.651: RADIUS/DECODE: EAP-Message fragments, 6, total 6 bytes

*Mar  1 01:50:50.655: RADIUS/ENCODE(000001F6):Orig. component type = DOT11

*Mar  1 01:50:50.655: RADIUS:  AAA Unsupported Attr: ssid              [347] 6

*Mar  1 01:50:50.655: RADIUS:   72 61 64 69              [ radi]

*Mar  1 01:50:50.655: RADIUS:  AAA Unsupported Attr: service-type      [345] 4

1

*Mar  1 01:50:50.655: RADIUS:  AAA Unsupported Attr: interface         [222] 3

-------------------Lines Omitted for simplicity-------------------

11        [ l2^w$qM{60]

*Mar  1 01:50:51.115: RADIUS:  NAS-Port-Type       [61]  6   802.11 wireless

[19]

*Mar  1 01:50:51.115: RADIUS:  NAS-Port            [5]   6   282

*Mar  1 01:50:51.115: RADIUS:  NAS-Port-Id         [87]  5   "282"

*Mar  1 01:50:51.115: RADIUS:  State               [24]  32

*Mar  1 01:50:51.115: RADIUS:   32 37 53 65 73 73 69 6F 6E 49 44 3D 61 63 73 35

[27SessionID=acs5]

*Mar  1 01:50:51.115: RADIUS:   31 2F 31 36 35 34 38 39 35 31 31 2F 39 3B    [ 1

/165489511/9;]

*Mar  1 01:50:51.115: RADIUS:  NAS-IP-Address      [4]   6   10.105.136.11

*Mar  1 01:50:51.115: RADIUS:  Nas-Identifier      [32]  4   "ap"

*Mar  1 01:50:51.115: RADIUS(000001F6): Sending a IPv4 Radius Packet

*Mar  1 01:50:51.115: RADIUS(000001F6): Started 5 sec timeout

*Mar  1 01:50:51.115: RADIUS: Received from id 1645/80 10.106.55.91:1645, Access

-Challenge, len 115

*Mar  1 01:50:51.115: RADIUS:  authenticator 74 CF 0F 34 1F 1B C1 CF -

E9 27 79 D5 F8 9C 5C 50

*Mar  1 01:50:51.467: %DOT11-6-ASSOC: Interface Dot11Radio0, Station

f8db.7f75.7804 Associated KEY_MGMT[WPAv2]

debug aaa authentication

このコマンドでは、クライアント デバイスと認証サーバ間の認証の AAA ネゴシエーションを表示します。

ap#debug aaa authentication

AAA Authentication debugging is on

ap#term mon

ap#

*Mar  1 01:55:52.335: AAA/BIND(000001F9): Bind i/f

*Mar  1 01:55:52.859: AAA/AUTHEN/PPP (000001F9): Pick method list 'eap_methods'

*Mar  1 01:55:52.867: AAA/AUTHEN/PPP (000001F9): Pick method list 'eap_methods'

*Mar  1 01:55:52.875: AAA/AUTHEN/PPP (000001F9): Pick method list 'eap_methods'

*Mar  1 01:55:52.895: AAA/AUTHEN/PPP (000001F9): Pick method list 'eap_methods'

*Mar  1 01:55:53.219: AAA/AUTHEN/PPP (000001F9): Pick method list 'eap_methods'

*Mar  1 01:55:53.379: AAA/AUTHEN/PPP (000001F9): Pick method list 'eap_methods'

*Mar  1 01:55:53.395: AAA/AUTHEN/PPP (000001F9): Pick method list 'eap_methods'

*Mar  1 01:55:53.807: AAA/AUTHEN/PPP (000001F9): Pick method list 'eap_methods'

*Mar  1 01:55:53.879: AAA/AUTHEN/PPP (000001F9): Pick method list 'eap_methods'

*Mar  1 01:55:53.939: %DOT11-6-ASSOC: Interface Dot11Radio0, Station

f8db.7f75.7804 Associated KEY_MGMT[WPAv2]