内容

.

パートナー

APIタイプ

ステータス

ISEバージョン（最小）

パートナーバージョン

(最小)

RTCタイプ

RTCアクション(pxGrid)

ISE認証ポリシー(EPS、ANC)

pxGridのトピック/属性

42ギア

MDM

Testing

2.4

✅

なし

❌

-

-

絶対

MDM

✅

1.2

-

なし

❌

-

-

アカルビオ

pxGrid v2

✅

2.4

4.0

pxGrid

ポリシーによる自動化

ANC

-

Alef Nula - AleFIT Office Locator

その他

✅

0

-

なし

-

-

-

アレフ・ヌラ – AleFTI MAB Keeper

その他

✅

0

-

なし

-

-

-

ArcSight

SIEM

✅

1.2

-

EPSレスト

-

-

-

アーミス

pxGrid v2

✅

2.4(pxGrid 2.0)

-

pxGrid

GUIによる手動

ANC

トピックの購読：ANC

asimilly

pxGrid v2

✅

2.4

なし

-

-

-

Attivo Networks

pxGrid v1

✅

2.1

ATV Botsink 4.0

pxGrid

GUIによる手動

EPS

トピックの購読：

EndpointProtectionサービス

Bayshore Networks

pxGrid v1

✅

1.3

6.x

Yes

-

-

トピックの購読：

SessionDirectory、TrustsecMetaData

属性:

SGT、IPアドレス

Blackberry - BES

MDM

✅

1.4

-

なし

-

-

-

Blackberry:Good Secure EMM

MDM

✅

1.2

-

なし

-

-

-

ブラックリッジ

pxGrid v2

✅

2.4(pxGrid 2.0)

TACゲートウェイ4.1.4

なし

-

-

トピックの購読：

SessionDirectory

属性:

ユーザ名、IPアドレス

BluSapphire

pxGrid v2

Testing

2.6

-

-

-

-

-

チェックポイント

pxGrid v1

✅

1.3

R77.20

なし

-

-

トピックの購読：

SessionDirectory、TrustSecMetadata

属性:

SGT、ユーザ名、IPアドレス

Cisco AMP

TC-NAC

✅

2.1

-

TC-NAC:ISE認証の動作条件規則（ANCポリシーへの手動割り当て）

-

-

-

Cisco CTA

TC-NAC

✅

2.2

-

TC-NAC:ISE認証の動作条件規則（ANCポリシーへの手動割り当て）

-

-

-

Cisco Cyber Vision

pxGrid v2

✅

2.4+（2.7以降で検証済み）

3.1.0

コンテキストイン（カスタム属性）

Cisco Digital Network Architecture Center

pxGrid v2

✅

2.3

-

なし

-

-

-

Cisco Firepower

pxGrid v2

✅

2.0

6.0

pxGrid

ポリシーによる自動化

EPS

加入者：

- SessionDirectory

- TrustSecMetaData

- エンドポイントプロファイル

属性:

- ユーザ名

- IPアドレス

- EndpointDevice

- SGT

- 場所

Cisco Industrial Network Director

pxGrid v2

✅

2.4(pxGrid 2.0)

1.3

なし

-

-

トピックの公開：

EndpointAsset

属性:

assetDeviceType、assetDeviceId、assetIPAddress、assetName、assetPortName、assetConnectedLinks.assetDeviceType、assetGroup、assetId、assetIPAddress、assetMacAddress、assetName、assetProductId、assetProtocol Number、assetVendor、カスタマイズされた属性

Cisco Meraki Systems Manager

MDM

✅

1.4

-

なし

-

-

-

Cisco StealthWatch

pxGrid v1

✅

1.4

6.7.1

pxGrid

GUIによる手動

EPS

加入者：

EndpointProtectionサービス

Cisco StealthWatch

pxGrid v1

✅

2.0

6.9

pxGrid

GUIによる手動

EPS

トピックの購読：

EndpointProtectionService、SessionDirectory

属性:

ユーザ名、IPAddress、MACAddress、SGT、エンドポイントデバイス

Cisco StealthWatch

pxGrid v2

✅

2.2

7.0

pxGrid

GUIによる手動

ANC

トピックの購読：

EndpointProtectionService、TrustSecMetadata、EndpointProfile、SessionDirectory、AdaptiveNetworkControl

属性:

ユーザ名、IPAdddress、MACAdddress、SGT、エンドポイントデバイス、TrustSecサブジェクト名、Trustsecピア名、TrustsecピアID

Cisco WSA

pxGrid v1

✅

1.3

9.0.0.324

なし

-

-

トピックの購読：

TrustSecMetadata、SessionDirectory

属性:

ユーザ名、SGT-IPマッピング

Cisco WSA

pxGrid v2

✅

2.4(pxGrid 2.0;ISE-PICおよびISE ERS API)

11.7

なし

-

-

トピックの購読：

Trustsec、SessionDirectory

属性:

ユーザ名、SGT-IPマッピング、MS ADグループ

Citrix Xenmobile

MDM

✅

1.2

-

なし

-

-

-

クラロティ

pxGrid v2

✅

2.4(pxGrid 2.0)

-

pxGrid:pxGrid-Context-In

ISE認可ポリシー

-

トピックの公開：

EndpointAsset

属性:

AssetID、assetIPアドレス、AssetMACaddress、assetname、assetproductID、assetprotocol、資産シリアル番号および資産ベンダー情報、CTD_Critical、CTD_CVE

クリンダ

pxGrid v2

Testing

2.4

-

-

-

-

-

CyberMDX

pxGrid v2

✅

2.4(pxGrid 2.0)

Mdefect 8.3以上

pxGrid

GUIによる手動

ANC

トピックの公開：

EndpointAsset、Subscribers:ANC

属性:

CMDX_Link、CMDX_Vendor、CMDX_Type、CMDX_PHI

CyberXラボ

pxGrid v2

✅

2.4(pxGrid 2.0?)

なし

-

-

-

シレラ

pxGrid v2

✅

2.4(pxGrid 2.0?)

なし

-

-

-

シネリオ

pxGrid v2

✅

2.4(pxGrid 2.0)

-

なし

-

-

トピックの公開：

EndpointAsset

属性:

assetDeviceType、assetIpAddress、assetMacAddress、assetName、assetProductId、assetvendor

デジタル防御

pxGrid v2

✅

2.4(pxGrid 2.0?)

-

Yes

-

-

-

E8セキュリティ

pxGrid v1

Testing

2.0

2.0

pxGrid

GUIによる手動

EPS

トピックの購読：

SessionDirectory、EndpointProtectionService

属性:

IPアドレス、MACアドレス、ユーザ名

Elastica(Symantec)

pxGrid v1

✅

2.0

-

pxGrid

GUIによる手動

EPS

加入者：

EndpointProtectionサービス

エンドース

pxGrid v1

✅

1.3

エンドレス2.3以上

なし

加入者：

SessionDirectory

属性:

ユーザ名、デバイスプロファイル

使節制

ISEゲスト

✅

2.2

-

なし

-

-

-

エクサベーム

pxGrid v1

✅

2.2

-

pxGrid

GUIによる手動

ANC

加入者：

EndpointProtectionサービス

FortScale(RSA)

pxGrid v1

✅

2.0

-

pxGrid

GUIによる手動

EPS

-

グローボ

MDM

✅

1.4

-

なし

-

-

-

緑のライト

pxGrid v1

✅

2.2

0

pxGrid

GUIによる手動

ANC

加入者：

適応型ネットワーク制御

HanSight SIEM

pxGrid v1

Testing

-

-

なし

-

-

-

HanSight UEBA

pxGrid v1

Testing

-

-

なし

-

-

-

Huntsmanセキュリティ

pxGrid v1

✅

2.0

5.97.001

pxGrid

GUIによる手動

EPS

加入者：

EndpointProtectionサービス

IBM - MaaS360

MDM

✅

1.2

-

なし

-

-

-

IBM QRadar

SIEM(Syslog)

✅

1.2

-

なし

-

-

-

IBM QRadar RTCアプリ

pxGrid v2

✅

2.4(pxGrid 2.0)

7.3.1パッチ9 +

pxGrid

GUIによる手動

ANC

加入者：

SessionDirectory、MDM、ANC設定ステータス、Radius障害

属性:

すべての属性

不正ネットワーク

pxGrid v1

✅

2.2

pxGrid

GUIによる手動

EPS

トピックの購読：

EndpointProtectionサービス

Infoblox DNS FW

pxGrid v1、v2

✅

2.0

2.4+

7.3.3

8.5

（2.0および1.0下位互換性をサポート）

pxGrid

GUIによる手動

EPS

トピックの購読：

SessionDirectory、EndpointProtectionService、IPAMとDHCPを公開

属性:

監査セッションID、ステータス、NAS IPアドレス、MACアドレス、IPアドレス、NASポートID、アカウントセッションID

Infoblox IPAM

pxGrid v1、v2

✅

2.0

2.4+

7.3.3

8.5（2.0および1.0の下位互換性をサポート）

pxGrid

-

EPS、ANC

トピックの購読：

SessionDirectory、EndpointProtectionService、IPAMとDHCPを公開

属性:

監査セッションID、ステータス、NAS IPアドレス、MACアドレス、IPアドレス、NASポートID、アカウントセッションID

JAMFカスパスイート

MDM

✅

1.4

-

なし

-

-

-

LiveAction

pxGrid v2

✅

2.1

-

なし

-

-

-

LogRism

pxGrid v1、v2

✅

2.0

-

EPSレスト

GUIによる手動

-

-

LogZilla

SIEM

✅

2.4

-

なし

-

-

-

ルメタ(Firemon)

pxGrid v1

✅

2.2

Specter 3.2

Yes

-

-

トピックの購読：

SessionDirectory、EndpointProtectionService

トピック：

すべての属性

DXL経由のMcAfee ePO

pxGrid v1

✅

2.1

ePO 5.9

DXL Broker 4.0

pxGrid

ポリシーによる自動化

ANC

加入者：

AdaptiveNetworkControl

メディアゲート

pxGrid v2

✅

2.4(pxGrid 2.0)

-

pxGrid

GUIによる手動

ANC

発行：

EndpointAsset、Subscribers:ANC

属性:

assetDeviceType、assetDeviceId、assetIPAddress、assetName、assetPortName、assetConnectedLinks.assetDeviceType、assetGroup、assetId、assetIPAddress、assetMacAddress、assetName、assetProductId、assetProtocol Number、assetVendor、カスタマイズされた属性

Microsoft inTune

MDM

✅

1.4

-

なし

-

-

-

MobileIron

MDM

✅

1.2

-

なし

-

-

-

モシル

MDM

✅

2.3

-

なし

-

-

-

NetIQ Sentinel

pxGrid v1

✅

1.3

7.2

pxGrid

-

EPS

加入者：

SessionDirectory、EndpointProtectionService

トピック：

ユーザ名、IP、Macアドレス、エンドポイントデバイス情報

望実

pxGrid v2

✅

2.4

-

Yes

-

-

-

ノヴォス・アポロ

その他

✅

2.3

-

なし

-

-

-

ニャンサ・ボイランス

pxGrid v2

✅

2.4(pxGrid 2.0)

-

Yes

-

-

-

オードル

pxGrid v2

✅

2.4(pxGrid 2.0)

-

pxGrid

GUIによる手動

ANC

発行：

EndpointAsset

トピック：

assetDeviceType、assetDeviceId、assetIPAddress、assetName、assetPortName、assetConnectedLinks.assetDeviceType、assetGroup、assetId、assetIPAddress、assetMacAddress、assetName、assetProductId、assetProtocol Number、assetVendor、カスタマイズされた属性

パナセア

pxGrid v2

✅

2.4(pxGrid 2.0)

-

なし

-

-

-

ping ID（IoTコネクタ経由）

pxGrid v1

✅

1.3

-

なし

-

-

-

Qualys

TC-NAC

✅

2.1

-

TC-NAC:ISE Authz CVSSスコア

ANCポリシーへの手動割り当て

-

-

Rapid7:InsightIDR

pxGrid

Testing

-

-

なし

-

-

-

Rapid7:InsightVM

pxGrid

Testing

-

-

なし

-

-

-

Rapid7 Nexpose

pxGrid v1

✅

1.4

-

pxGrid

ポリシーによる自動化

EPS

加入者：

EndpointProtectionサービス

Rapid7 Nexpose

TC-NAC

✅

2.2

Nexpose 6.0

+

Insight VM

TC-NAC:ISE Authz CVSSスコア

ANCポリシーへの手動割り当て

-

-

RedShiftネットワーク

pxGrid v2

✅

2.4

RedShift CMS

pxGrid ANC

ポリシーによる自動化

-

-

RSA NetWitness

SIEM

✅

2.4

-

-

-

-

-

サン

pxGrid v1

✅

1.4

8.1.0

EPS

自動vuポリシー

-

加入者：

EndpointProtectionサービス

SAPアファリア

MDM

✅

1.2

-

なし

-

-

-

SecureAuth

pxGrid v1

✅

1.3

8.2

なし

-

-

加入者：

SessionDirectory

トピック：

監査セッションID、セッション状態、EPSStatus、発信局、セキュリティグループ、エンドポイントプロファイル、ユーザ名、ポスチャステータス、ADユーザDNSドメイン、ADホストDNSドメイン、ADユーザNetBIOS名、ADホストNetBIOS名

Securonix

pxGrid v2

✅

2.4

-

なし

-

-

-

Siemplify

pxGrid v2

Testing

-

-

なし

-

-

-

Skyhigh Networks(McAfee)

pxGrid v1

✅

2.0

なし

-

-

-

煙幕

pxGrid v2

✅

2.4(pxGrid 2.0)

-

Yes

-

-

-

Sophos

MDM

✅

1.4

-

なし

-

-

-

SOTI MobiControl

MDM

✅

2.0

-

なし

-

-

-

Splunk Addon for ISE(Splunk Enterprise)

SIEM、Syslog

✅

2.4+

4.0.0(splunk Enterprise 7+)

なし

-

-

-

Symantec

MDM

✅

1.2

-

なし

-

-

-

同調

pxGrid v2

✅

2.4

-

Yes

-

-

-

丹越

MDM

✅

1.4

-

なし

-

-

-

タニウム

pxGrid v1

✅

2.4

Tanium Docsを参照

pxGrid

GUIによる手動

ANC

加入者：

AdaptiveNetworkControl

Tenable Nessus（Tenableから使用不可）

EPSレスト

✖

1.3

6.1.x

EPSレスト

-

-

-

Tenable Security Center

TC-NAC

✔

2.2

5.5+

TC-NAC:ISE認証の動作条件規則

ANCポリシーへの手動割り当て

-

-

TIBCO(LogLogic)

SIEM

✅

1.2

-

なし

-

-

-

TrapXセキュリティ

pxGrid v1

✅

2.0

6

EPSレスト

pxGrid

GUIによる手動

EPS

加入者：

EndpointProtectionサービス

Vmware AirWatch

MDM

✅

1.2

-

なし

-

-

-

VUセキュリティ

pxGrid v2

✅

2.4

-

Yes

-

-

-

ZingBox

pxGrid v2

✅

2.4(pxGrid 2.0)

-

EPSレスト

pxGrid

GUIによる手動

ANC

トピックの公開：

EndpointAssets、Subscribers:ANC

属性:

assetDeviceType、assetDeviceId、assetIPAddress、assetName、assetPortName、assetConnectedLinks.assetDeviceType、assetGroup、assetId、assetIPAddress、assetMacAddress、assetName、assetProductId、assetProtocol Number、assetVendor、カスタマイズされた属性