内容

概要

問題

解決方法

関連情報

概要

このドキュメントでは、Hewlett-Packard（HP） Pass-Thru モジュールおよび Cisco Nexus 5000 シリーズ スイッチに見られる相互運用性の問題について説明し、問題の解決策も示します。

問題

2232(Woodside Fabric Extender(FEX))を搭載したNexus 5000をリリース5.2にアップグレードした後に問題が発生しました。2232インターフェイスが10Gb HP Pass-Thruモジュールに接続されると、フラップがし続し、次エラーがします。

NDCD29ACCSW1# show int brief | inc linkFlap

Eth152/1/1 2 eth trunk down linkFlapErrDisabled 10G(D) 1001

Eth152/1/2 2 eth trunk down linkFlapErrDisabled 10G(D) 1002

Eth152/1/3 2 eth trunk down linkFlapErrDisabled 10G(D) 1003

Eth152/1/4 2 eth trunk down linkFlapErrDisabled 10G(D) 1004

Eth152/1/5 2 eth trunk down linkFlapErrDisabled 10G(D) 1005

Eth152/1/9 2 eth trunk down linkFlapErrDisabled 10G(D) 1009

HPのWebサイトに記載されている既知のHP 10Gb Pass-Thruモジュールのリンクフラップの問題が あり、お客様はバージョン1.0.7.0へのアップグレードを推奨しています。

注：Pass-Thru モジュール ファームウェアは、HP Onboard Adminstrator（OBA）のバージョンとは無関係です。

Pass-Thru モジュール ファームウェアを特定するには、show interconnect info 11 コマンドを入力します。

1. Ethernet

Product Name: HP 10GbE Pass-Thru Module

Width: Single

URL to Management interface:

In-Band IPv4 Address: 0.0.0.0

User Assigned Name:

Part Number: 538113-B21

Spare Part Number: 504624-001

Serial Number: MY31104WWTTemperature Sensor: Present

JS2 Connector: Absent

Internal Ethernet Interface to OA: Absent

Internal Ethernet Route to OA: Enabled

Internal Serial Interface to OA: Present

Internal Serial Route to OA: Enabled

Serial Port Baud Rate: 9600

External Serial Port Interface: Present

External Ethernet Interface: Absent

Manufacturer: HP

次に、connect interconnect 1 コマンドを入力して、次の出力を表示します。

NOTICE: This pass-thru connection to the integrated I/O console

is provided for convenience and does not supply additional access

control.  For security reasons, use the password features of the

integrated switch.

Connecting to integrated switch 1 at 9600,N81...

Escape character is '<Ctrl>_' (Control + Shift + Underscore)

Enter を押して、スイッチ コンソールを表示します。

------------------------------------------------------------------------------

Command: D)isconnect, C)hange settings, send B)reak, E)xit command mode X)modem send > C

Change settings for: L)ocal Session, R)emote Port [I/O Bay 1], E)xit

Change settings for: L)ocal Session, R)emote Port [I/O Bay 1], E)xit R

Settings: B)audrate; flow control: N)one H)ardware S)oftware; E)xit > N

Connected to integrated switch 1 at 9600,N81.

Escape character is '<Ctrl>_' (Control + Shift + Underscore)

------------------------------------------------------------------------------

10GbE Pass-Thru# /system コマンドを入力して、HP Pass-Thru モジュールのバージョン番号を表示します。

[System Menu]

info     -  System Information Display

config   -  Set Active or Factory Default Config

dumpconfig -  Dump Saved Config

xmodem   -  Download new image using XMODEM

reset    -  Reset The Switch

System# info

System:                  HP 10Gbe Pass-Thru

Version: 1.0.1.6

Board: HP 10GbE Pass-Thru Module

Serial:                  MY31104WWT

System#

図に示すように、システムはHP Pass-Thruモジュールバージョン1.0.1.6を実行します。HPは、このバージョンは顧客に出荷されるものではなく、Webサイトに公開されるものではないと述べています。Pass-Thru モジュール ベンダーが、間違ってこのバージョンを搭載したモジュールをいくつか出荷しています。HP はリンク フラップ問題を検出した際に、この問題を解決するパッチをリリースしました。問題をさらにテストするために HP からバージョン 1.0.1.6 を要求されましたが、HP にこのバージョンはありません。

注：この問題が以前のリリースではなくリリース 5.2 でのみ明らかになっている理由は、以前の Nexus オペレーティング システムでは不適切な HP モジュールがより許容されていたためと考えられます。

解決方法

似たような症状でサービス要求をオープンする場合は、HP Pass-Thru モジュール ファームウェアを確認し、バージョン 1.0.7.0 にアップグレードしてください。

関連情報

- Pass-Thru モジュール バージョン 1.0.7.0 のダウンロード - HP

- アップグレード手順 - HP

- テクニカル サポートとドキュメント – Cisco Systems