内容

概要

前提条件

要件

使用するコンポーネント

背景説明

IS-IS エリア

IS-ISレベル1 （L1）ルータ

IS-ISレベル1-2 （L1/L2ルータ）

IS-ISレベル2 （L2）ルータ

IS-IS 隣接関係の状態

設定

ネットワーク図

設定

R1

R2

R3

R4

R5

R6

R7

確認

R1とR2の間の隣接関係

パケット キャプチャ

R2からR1に送信されるIS-IS Helloパケットのキャプチャ

R1からR2に送信IS-IS Helloのキャプチャ

パディング

ホールド タイマー

R2とR4の間の隣接関係

パケット キャプチャ

R4からR2へのL2のhelloパケット キャプチャ

R4からR2へのL1 helloパケットのキャプチャ

R2からR4へのL1 helloパケットのキャプチャ

R4とR5の間の隣接関係

R7とR5の間の隣接関係

L1ルータ プレフィクス。

L1/L2ルータのプレフィクス

L2ルータのプレフィクス

トラブルシュート

概要

このドキュメントでは、Intermediate System-to-Intermediate System （IS-IS）プロトコルおよび隣接エリア タイプに中間システムを示します。

前提条件

要件

- Intermediate-System to Intermediate-System(IS-IS)の基本的な知識

- OSPF(Open Shortest Path First)プロトコルの基礎知識

使用するコンポーネント

このドキュメントの内容は、特定のソフトウェアやハードウェアのバージョンに限定されるものではありません。

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、初期（デフォルト）設定の状態から起動しています。本稼働中のネットワークでは、各コマンドによって起こる可能性がある影響を十分確認してください。

背景説明

IS-ISプロトコルはインターネット サービス プロバイダー(ISP)環境でInterior Gateway Protocol （IGP ）として広く使用されます。このドキュメントの目的は、IS-ISエリアタイプ、設定、およびトラブルシューティングに関する情報を提供することです。ネットワークのサンプルシナリオとその設定、デバッグ、キャプチャ、および出力を示して、理解を深めます。

このドキュメントでは、IS-ISは「統合IS-IS」を意味します。  統合IS-ISが導入されている。つまり、IS-ISはインターネットプロトコル(IP)をルーティングしている。

IS-ISの真の力は、IS-ISを高度に拡張可能なプロトコルにするTLV(Type-Length-Value)の使用にあります。

新しい機能が追加されると、TLVを使用してプロトコルに追加できます。

IS-IS エリア

OSPFプロトコルでは、ルータのインターフェイスを特定のエリアに割り当てることができます。ただし、IS-ISのエリアの概念は異なります。次に、それぞれのルータがエリアに属しています。

この考え方は、アドレスがデバイス（ルータ）に属し、インターネットプロトコル(IP)ではアドレスが特定のインターフェイスに属する場合に、コネクションレス型ネットワークプロトコル(CLNP)をルーティングするIS-ISを最初に作成したことに由来しています。

IS-ISプロトコルには、レベル1とレベル2の2つのレベルまたは階層があります。

レベル1はOSPFエリア内ルーティングに対応し、レベル2はOSPFバックボーンエリア0ルーティングに対応します。

レベルのエリアは、バックボーン エリアのすべてのエリアに参加します。

すべてのCiscoルータは、デフォルトでレベル1-2(L1/L2)ルータとして提供されます。

レベル1ルータはレベル1およびレベル1-2 （L1/L2）ルータと隣接関係になることができます。

レベル2ルータはレベル2またはレベル1-2 （L1/L2）ルータと隣接関係になることができます。

L1およびL2 Onlyのみルータ間にアジャセンシー関係がありません。

IS-ISレベル1 （L1）ルータ

IS-ISレベル1ルータにすべてのエリアのトポロジ用のエリアのリンクステート情報があります。他のエリアにパケットをルーティングするには、最も近いレベル2対応(L1/L2)ルータを使用します。

レベル1エリアは、OSPFトータリースタブエリアと同様に動作します。L1は、L1 Helloを送信する唯一のルータです。

IS-ISレベル1-2 （L1/L2ルータ）

IS-IS L1/L2ルータは2つのリンクステート データベース情報を維持します。

1つはレベル1用で、もう1つはレベル2用です。

2つの異なるShortest Path First(SPF)計算が実行されます。1つはレベル1のリンクステートデータベースで、もう1つはレベル2のリンクステートデータベースです。

IS-ISレベル1-2ルータはOSPFエリア境界ルータ（ABR ）に緊密に動作します。L1/L2ルータはL1およびL2 helloの両方を送信します。

デフォルトでは、L1/L2ルータはL1エリアからL2エリアへのプレフィックスの一方向の通過を許可しますが、逆方向の通過は許可しません。

ただし、プレフィックスをL2エリアからL1エリアに移動する必要がある場合は、IS-IS設定でredistributeコマンドが必要です。

IS-ISレベル2 （L2）ルータ

IS-ISレベル2ルータには、エリア内、エリア間ルートのリンク ステート情報があります。

L2ルータの送信のL2 helloのみ。IS-ISレベルは、OSPFバックボーン エリア0と2つのエリア比較できます。

IS-IS 隣接関係表

ルータ タイプ

L1

L1/L2

L2

L1

L1隣接関係であれば他のエリアIDが一致アジャセンシー関係なし

L1隣接関係であれば他のエリアIDが一致アジャセンシー関係なし

アジャセンシー関係なし

L1/L2

L1隣接関係であれば他のエリアIDが一致アジャセンシー関係なし

L1およびL2の隣接エリアIDが一致していれば、他のL2隣接関係のみ

L2隣接関係、エリアIDは問題ではありません

L2

アジャセンシー関係なし

L2隣接関係、エリアIDは問題ではありません

L2隣接関係、エリアIDは問題ではありません

MTU

1つのルータがより高いMTUのISIS helloパケットを受信すると破棄されるhelloため、隣接関係が確立されない（インターフェイスで）をサポートできます。ベスト プラクティスMTUで両端で同じである必要があります。

回線タイプ

この属性はインターフェイス上で設定され、どのタイプのhello（L1またはL2）が特定のインターフェイス上で送信されるかを定義します。

L1/L2ルータは選択的に1つのインターフェイスでhello L1およびL2のみ別のインターフェイスでhelloのみ送信できます。

L1/L2ルータがL1専用ルータとのピア接続を試行し、L1/L2インターフェイスが「isis circuit-type level-2」で設定されている場合、L2 helloだけがインターフェイスに送信され、L1ルータとの隣接関係は確立されません。

ルータは互換性のあるタイプのhelloを送信する必要があります。

[Authentication]

IS-ISでは、helloとLink State Protocol Data Unit（LSP；リンクステートプロトコルデータユニット）を別々に認証できます。helloが正しく認証され、LSPの認証に失敗した場合（たとえば、LSPの認証が失敗した場合）、隣接関係は確立されますが、アップデートは交換されません。

IS-IS helloまたはPDU（プロトコルデータユニット）に対して認証が設定されている場合は、両端で一致している必要があります。

機能TLV

IS-ISルータが他のルータからの機能TLVをサポートするサイレントTLVを無視します。

ただし、一方のルータがINIT状態に達すると、機能の不一致によるイベントが発生します。もう一方のルータはパケットを廃棄し、隣接関係を形成しません。

一般的な推奨事項として、隣接関係の形成を成功させるには、機能TLVが一致している必要があります。機能TLVの詳細については、このドキュメントでは取り上げていません。

ネットワーク タイプ

IS-ISには、ブロードキャストとポイントツーポイントの2つのネットワークタイプがあります。ブロードキャストはデフォルトのネットワーク タイプです。

一方の端が「isis network point-to-point」で設定され、もう一方の端がデフォルトのネットワークタイプである場合、helloは破棄され、隣接関係は確立されません。

ネットワークタイプは両端で一致している必要があります。

hello

helloタイマーは隣接関係が表示できるように一致する必要はありません。

IS-IS 隣接関係の状態

IS-ISには3つの隣接状態があります。

ダウン：これは初期状態です。Helloパケットがネイバーから受信したことを意味します。

Initializing：この状態は、ローカルルータがネイバールータからhelloを正常に受信したことを意味しますが、ネイバールータも正常にローカルhelloを受信したかどうかは不明です。

Up:これで、ネイバールータがローカルルータのhelloを受信していることが確認されました。

設定

ネットワーク図

サブネットはタイプ192.168.X.0 Xの図にインターフェイス間で示されています。

ループバックはタイプ192.168.YY.YYルータR1がいつYが1のです。したがって、R1のループバックIPは192.168.11.11です。

L1およびL2、L1/L2は、レベル1、レベル1-2、レベル2ルータです。

設定

IS-ISプロトコルはインターフェイス レベルで、世界的に両方の設定が必要です。

R1

!

interface Loopback1

ip address 192.168.11.11 255.255.255.255

ip router isis 1

!

interface FastEthernet0/0

ip address 192.168.1.1 255.255.255.0

ip router isis 1

interface FastEthernet1/0

ip address 192.168.2.1 255.255.255.0

ip router isis 1

!

router isis 1

net 49.0000.0000.0001.00

is-type level-1

!

R2

!

interface Loopback1

ip address 192.168.22.22 255.255.255.255

ip router isis 1

!

interface FastEthernet0/0

ip address 192.168.1.2 255.255.255.0

ip router isis 1

interface FastEthernet1/0

ip address 192.168.3.2 255.255.255.0

ip router isis 1

!

router isis 1

net 49.0000.0000.0002.00

is-type level-1

!

R3

!

interface Loopback1

ip address 192.168.33.33 255.255.255.255

ip router isis 1

!

interface FastEthernet0/0

ip address 192.168.2.3 255.255.255.0

ip router isis 1

interface FastEthernet1/0

ip address 192.168.4.3 255.255.255.0

ip router isis 1

!

router isis 1

net 49.0000.0000.0003.00

is-type level-1

!

R4

!

interface Loopback1

ip address 192.168.44.44  255.255.255.255

ip router isis 1

!

interface FastEthernet0/0

ip address 192.168.3.4 255.255.255.0

ip router isis 1

!

interface FastEthernet1/0

ip address 192.168.4.4 255.255.255.0

ip router isis 1

!

interface FastEthernet1/1

ip address 192.168.5.4 255.255.255.0

ip router isis 1

!

interface FastEthernet2/0

ip address 192.168.6.4 255.255.255.0

ip router isis 1

!

router isis 1

net 49.0000.0000.0004.00

!

R5

!

interface Loopback1

ip address 192.168.55.55 255.255.255.255

ip router isis 1

!

interface FastEthernet0/0

ip address 192.168.5.5 255.255.255.0

ip router isis 1

!

interface FastEthernet1/0

ip address 192.168.7.5 255.255.255.0

ip router isis 1

!

router isis 1

net 50.0000.0000.0005.00

is-type level-2-only

!

R6

!

interface Loopback1

ip address 192.168.66.66 255.255.255.255

ip router isis 1

!

interface FastEthernet0/0

ip address 192.168.6.6 255.255.255.0

ip router isis 1

!

interface FastEthernet1/0

ip address 192.168.8.6 255.255.255.0

ip router isis 1

!

router isis 1

net 50.0000.0000.0006.00

is-type level-2-only

!

R7

!

interface Loopback1

ip address 192.168.77.77 255.255.255.255

ip router isis 1

!

interface FastEthernet0/0

ip address 192.168.7.7 255.255.255.0

ip router isis 1

!

interface FastEthernet1/0

ip address 192.168.8.7 255.255.255.0

ip router isis 1

!

router isis 1

net 50.0000.0000.0007.00

is-type level-2-only

!

確認

R1とR2の間の隣接関係

エリアIDはR1とR2で同じです。いずれもレベル 1 ルータです。  L1隣接関係が両者の間に存在します。

R1#show isis neighbors

Tag 1:

System Id      Type Interface   IP Address      State Holdtime Circuit Id

R2                     L1    Fa0/0        192.168.1.2      UP       7                   R2.01

R1とR2は両方ともL1ルータであり、同じエリアに属しているため、R1とR2の間のLANセグメントではL1タイプのIS-IS helloだけが送信されます。

R1#debug isis adj-packets fastEthernet 0/0

*Nov 25 19:25:53.995: ISIS-Adj: Sending L1 LAN IIH on FastEthernet0/0, length 1497

*Nov 25 19:25:54.071: ISIS-Adj: Rec L1 IIH from ca02.1c80.0000 (FastEthernet0/0), cir type L1, cir id 0000.0000.0002.01, length 1497

-- The highlighted portion shows the Mac Address and the circuit id of R2, it also shows that L1 IS-IS hello packet was received from R2 --

*Nov 25 19:25:54.075: ISIS-Adj: New adjacency, level 1 for ca02.1c80.0000

-- The above line shows that R1 has discovered a new neighbour capable of L1 adjacency, having the mac address ca02.1c80.0000 R2 --

*Nov 25 19:25:54.991: ISIS-Adj: Sending L1 LAN IIH on FastEthernet0/0, length 1497

*Nov 25 19:25:55.047: ISIS-Adj: Rec L1 IIH from ca02.1c80.0000 (FastEthernet0/0), cir type L1, cir id 0000.0000.0002.01, length 1497

*Nov 25 19:25:55.051: ISIS-Adj: L1 adj count 1

*Nov 25 19:25:55.055: ISIS-Adj: L1 adjacency state goes to Up

-- Once both the routers mutually agree on interface settings and other global parameters (e.g. authentication, circuit-type, mtu etc.) the L1 adjacency finally comes up --

パケット キャプチャ

R2からR1に送信されるIS-IS Helloパケットのキャプチャ

ISIS HELLO

.... ..01 = Circuit type: Level 1 only (0x01) >>>            Circuit type is Level 1

0000 00.. = Reserved: 0x00

SystemID {Sender of PDU}: 0000.0000.0002     >>>            Identification of R2

Holding timer: 10                             >>>            Hold timer for hellos

PDU length: 1497                              >>>            Entire PDU in bytes

.100 0000 = Priority: 64                      >>>            Default Priority for DR election

0... .... = Reserved: 0

SystemID {Designated IS}: 0000.0000.0002.01   >>>            SystemID + Pseudonode ID

Protocols Supported (1)

NLPID(s): IP (0xcc)                       >>>            IS-IS is routing IP

Area address(es) (2)

Area address (1): 49                      >>>            Area id of R2

IP Interface address(es) (4)

IPv4 interface address: 192.168.1.2 (192.168.1.2) >>>    IP of R2’s fa0/0

Restart Signaling (3)

Restart Signaling Flags: 0x00

.... .0.. = Suppress Adjacency: False

.... ..0. = Restart Acknowledgment: False

.... ...0 = Restart Request: False

IS Neighbor(s) (6)

IS Neighbor: ca:01:1d:a4:00:00 (ca:01:1d:a4:00:00) >>>   Mac of R2 ( fa0/0 )

Padding (255)

Padding (255)

Padding (255)

Padding (255)

Padding (255)

Padding (157)

R1からR2に送信IS-IS Helloのキャプチャ

ISIS HELLO

.... ..01 = Circuit type: Level 1 only (0x01)  >>>           Circuit type is Level 1

0000 00.. = Reserved: 0x00

SystemID {Sender of PDU}: 0000.0000.0001       >>>           Identification of R1

Holding timer: 30                              >>>           Hold time for hellos

PDU length: 1497                               >>>           Entire PDU in bytes

.100 0000 = Priority: 64                       >>>           Default Priority for DR election

0... .... = Reserved: 0

SystemID {Designated IS}: 0000.0000.0001.01    >>>           SystemID + Pseudonode Id

Protocols Supported (1)

NLPID(s): IP (0xcc)                        >>>           IS-IS is routing IP

Area address(es) (2)

Area address (1): 49                       >>>           Area id of R1

IP Interface address(es) (4)

IPv4 interface address: 192.168.1.1 (192.168.1.1) >>>    IP of R1 fa0/0  interface

Restart Signaling (3)

Restart Signaling Flags: 0x00

.... .0.. = Suppress Adjacency: False

.... ..0. = Restart Acknowledgment: False

.... ...0 = Restart Request: False

IS Neighbor(s) (6)

IS Neighbor: ca:02:1c:80:00:00 (ca:02:1c:80:00:00)>>>    Mac of R1 fa0/0 interface

Padding (255)

Padding (255)

Padding (255)

Padding (255)

Padding (255)

Padding (157)

パディング

Cisco IOS®は、隣接関係が確立される前にインターフェイスのMTUを検出するメカニズムを実装しています。

隣接関係が確立された後は、MTUの問題が原因でパケットドロップが発生しないため、データベースの破損が防止されます。

IS-IS helloパケットをパディングすると、インターフェイスのMTUまでサイズが増加し、相手側がこのMTUでhelloパケットを受け入れることができるかどうかが確認されます。

もう一方の端で、より低いMTUが終了すると、その端ではhelloがドロップされるため、隣接関係は確立されません。

ホールド タイマー

IS-ISでは、ブロードキャストLANセグメントのDRは常に、通常のhelloタイムの3分の1（10秒）のhelloを送信します。

DRから見ると、helloタイムは3.33秒、ホールドタイムは10秒です。前述のキャプチャ例では、R2がDRです。これは、次の出力でも確認できます。

R2#sh clns interface fastEthernet 0/0

FastEthernet0/0 is up, line protocol is up

Checksums enabled, MTU 1497, Encapsulation SAP

ERPDUs enabled, min. interval 10 msec.

CLNS fast switching enabled

CLNS SSE switching disabled

DEC compatibility mode OFF for this interface

Next ESH/ISH in 31 seconds

Routing Protocol: IS-IS

Circuit Type: level-1-2

Interface number 0x1, local circuit ID 0x1

Level-1 Metric: 10, Priority: 64, Circuit ID: R2.01

DR ID: R2.01

Level-1 IPv6 Metric: 10

Number of active level-1 adjacencies: 1

Next IS-IS LAN Level-1 Hello in 1 seconds

R2とR4の間の隣接関係

エリアIDはR2とR4で同じです。R2はレベル1、R4はレベル1-2です。

R4はL1/L2ルータであるため、前述のようにL1とL2の両方のhelloを送信します。

R2はL1専用ルータで、エリアIDは同じであるため、L1隣接関係が形成されます。

R2#show isis neighbors

Tag 1:

System Id Type Interface IP Address State Holdtime Circuit Id

R4 L1 Fa1/0 192.168.3.4 UP 8 R4.01

*Nov 26 03:56:25.299: ISIS-Adj: Sending L1 LAN IIH on FastEthernet1/0, length 1497

*Nov 26 03:56:25.355: ISIS-Adj: Rec L1 IIH from ca04.0cf4.0000 (FastEthernet1/0), cir type L1L2, cir id 0000.0000.0004.01, length 1497

*Nov 26 03:56:25.355: ISIS-Adj: New adjacency, level 1 for ca04.0cf4.0000

*Nov 26 03:56:26.299: ISIS-Adj: Sending L1 LAN IIH on FastEthernet1/0, length 1497

*Nov 26 03:56:26.339: ISIS-Adj: Rec L1 IIH from ca04.0cf4.0000 (FastEthernet1/0), cir type L1L2, cir id 0000.0000.0004.01, length 1497

*Nov 26 03:56:26.343: ISIS-Adj: L1 adj count 1

*Nov 26 03:56:26.343: ISIS-Adj: L1 adjacency state goes to Up

*Nov 26 03:56:26.347: ISIS-Adj: Run level-1 DR election for FastEthernet1/0

*Nov 26 03:56:26.351: ISIS-Adj: New level-1 DR 0000.0000.0004 on FastEthernet1/0

*Nov 26 03:56:26.467: ISIS-Adj: Rec L2 IIH from ca04.0cf4.0000 (FastEthernet1/0), cir type L1L2, cir id 0000.0000.0004.01, length 1497

*Nov 26 03:56:26.471: ISIS-Adj: is-type mismatch

-- The above line in output is due to the fact that R2 is L1 only and hence does not understand the L2 hellos from the L1/L2 Router R2 --

パケット キャプチャ

R4からR2へのL2のhelloパケット キャプチャ

ISO 10589 ISIS InTRA Domain Routeing Information Exchange Protocol

Intra Domain Routing Protocol Discriminator: ISIS (0x83)

PDU Header Length: 27

Version: 1

System ID Length: 0

...1 0000 = PDU Type: L2 HELLO (16)

000. ... = Reserved: 0x00

Version2 (==1): 1

Reserved (==0): 0

Max.AREAs: (0==3): 0

ISIS HELLO

.... ..11 = Circuit type: Level 1 and 2 (0x03)

0000 00.. = Reserved: 0x00

SystemID {Sender of PDU}: 0000.0000.0004

Holding timer: 30

PDU length: 1497

.100 0000 = Priority: 64

0... .... = Reserved: 0

SystemID {Designated IS}: 0000.0000.0004.01

Protocols Supported (1)

NLPID(s): IP (0xcc)

Area address(es) (2)

Area address (1): 49

IP Interface address(es) (4)

IPv4 interface address: 192.168.3.4 (192.168.3.4)

Restart Signaling (3)

Restart Signaling Flags: 0x00

.... .0.. = Suppress Adjacency: False

.... ..0. = Restart Acknowledgment: False

.... ...0 = Restart Request: False

Padding (255)

Padding (255)

Padding (255)

Padding (255)

Padding (255)

Padding (165)

R4からR2へのL1 helloパケットのキャプチャ

ISO 10589 ISIS InTRA Domain Routeing Information Exchange Protocol

Intra Domain Routing Protocol Discriminator: ISIS (0x83)

PDU Header Length: 27

Version: 1

System ID Length: 0

...0 1111 = PDU Type: L1 HELLO (15)

000. .... = Reserved: 0x00

Version2 (==1): 1

Reserved (==0): 0

Max.AREAs: (0==3): 0

ISIS HELLO

.... ..11 = Circuit type: Level 1 and 2 (0x03)

0000 00.. = Reserved: 0x00

SystemID {Sender of PDU}: 0000.0000.0004

Holding timer: 30

PDU length: 1497

.100 0000 = Priority: 64

0... .... = Reserved: 0

SystemID {Designated IS}: 0000.0000.0004.01

Protocols Supported (1)

NLPID(s): IP (0xcc)

Area address(es) (2)

Area address (1): 49

IP Interface address(es) (4)

IPv4 interface address: 192.168.3.4 (192.168.3.4)

Restart Signaling (3)

Restart Signaling Flags: 0x00

.... .0.. = Suppress Adjacency: False

.... ..0. = Restart Acknowledgment: False

.... ...0 = Restart Request: False

IS Neighbor(s) (6)

Padding (255)

Padding (255)

Padding (255)

Padding (255)

Padding (255)

Padding (157)

R2からR4へのL1 helloパケットのキャプチャ

ISO 10589 ISIS InTRA Domain Routeing Information Exchange Protocol

Intra Domain Routing Protocol Discriminator: ISIS (0x83)

PDU Header Length: 27

Version: 1

System ID Length: 0

...0 1111 = PDU Type: L1 HELLO (15)

000. .... = Reserved: 0x00

Version2 (==1): 1

Reserved (==0): 0

Max.AREAs: (0==3): 0

ISIS HELLO

.... ..01 = Circuit type: Level 1 only (0x01)

0000 00.. = Reserved: 0x00

SystemID {Sender of PDU}: 0000.0000.0002

Holding timer: 30

PDU length: 1497

.100 0000 = Priority: 64

0... .... = Reserved: 0

SystemID {Designated IS}: 0000.0000.0002.02

Protocols Supported (1)

NLPID(s): IP (0xcc)

Area address(es) (2)

Area address (1): 49

IP Interface address(es) (4)

IPv4 interface address: 192.168.3.2 (192.168.3.2)

Restart Signaling (3)

Restart Signaling Flags: 0x00

.... .0.. = Suppress Adjacency: False

.... ..0. = Restart Acknowledgment: False

.... ...0 = Restart Request: False

IS Neighbor(s) (6)

Padding (255)

Padding (255)

Padding (255)

Padding (255)

Padding (255)

Padding (157)

R4とR5の間の隣接関係

エリアIDはR4とR5で異なります。R4はレベル1-2であり、R5はレベル2です。.L2隣接関係が形成されます。

R4#show isis neighbors

Tag 1:

System Id            Type Interface   IP Address         State   Holdtime   Circuit Id

R2                    L1   Fa0/0       192.168.3.2        UP      19           R4.01

R5                    L2   Fa1/1       192.168.5.5        UP       4           R5.01

R7とR5の間の隣接関係

エリアIDはR5とR7で同じです。R5はレベル2、R7はレベル2です。.L2隣接関係が形成されます。

R5#show isis neighbors

Tag 1:

System Id            Type Interface   IP Address         State   Holdtime   Circuit Id

R4                    L2   Fa0/0       192.168.5.4        UP      29            R5.01

R7                    L2   Fa1/0       192.168.7.7        UP      4             R7.01

L1ルータ プレフィクス。

前述のL1ルータとして内部エリアLSAがあり、ネットワークの他の部分に到達するために最も近いL1/L2ルータを使用します。

L1エリアはOSPFトータリースタブエリアとして動作します。L1/L2ルータR4によって生成されたデフォルトルートがルーティングテーブルに表示されます。このデフォルトルートを使用すると、外部の宛先に到達できます。

R1#sh ip route

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route, H - NHRP, l - LISP

+ - replicated route, % - next hop override

Gateway of last resort is 192.168.2.3 to network 0.0.0.0

i*L1  0.0.0.0/0 [115/20] via 192.168.2.3, 00:25:31, FastEthernet1/0

[115/20] via 192.168.1.2, 00:25:31, FastEthernet0/0

192.168.1.0/24 is variably subnetted, 2 subnets, 2 masks

C        192.168.1.0/24 is directly connected, FastEthernet0/0

L        192.168.1.1/32 is directly connected, FastEthernet0/0

192.168.2.0/24 is variably subnetted, 2 subnets, 2 masks

C        192.168.2.0/24 is directly connected, FastEthernet1/0

L        192.168.2.1/32 is directly connected, FastEthernet1/0

i L1  192.168.3.0/24 [115/20] via 192.168.1.2, 00:25:31, FastEthernet0/0

i L1  192.168.4.0/24 [115/20] via 192.168.2.3, 03:17:05, FastEthernet1/0

i L1  192.168.5.0/24 [115/30] via 192.168.2.3, 00:25:31, FastEthernet1/0

-----------Output Omitted -----------

L1/L2ルータのプレフィクス

L1/L2ルータは、L1エリア用とL2エリア用の2つのリンクステートデータベースを維持します。そのため、2つの異なるSPF計算が必要になります。

L1/L2ルータはL1ルータはネットワークの他の部分に接続するために、L1エリアにデフォルト ルートを送信します。ここでは、L1とL2の両方のルートが観察されます。

R4#sh ip route

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route, H - NHRP, l - LISP

+ - replicated route, % - next hop override

Gateway of last resort is not set

i L1  192.168.1.0/24 [115/20] via 192.168.3.2, 00:30:18, FastEthernet0/0

i L1  192.168.2.0/24 [115/20] via 192.168.4.3, 03:21:58, FastEthernet1/0

192.168.3.0/24 is variably subnetted, 2 subnets, 2 masks

C        192.168.3.0/24 is directly connected, FastEthernet0/0

L        192.168.3.4/32 is directly connected, FastEthernet0/0

192.168.4.0/24 is variably subnetted, 2 subnets, 2 masks

C        192.168.4.0/24 is directly connected, FastEthernet1/0

L        192.168.4.4/32 is directly connected, FastEthernet1/0

192.168.5.0/24 is variably subnetted, 2 subnets, 2 masks

C        192.168.5.0/24 is directly connected, FastEthernet1/1

L        192.168.5.4/32 is directly connected, FastEthernet1/1

192.168.6.0/24 is variably subnetted, 2 subnets, 2 masks

C        192.168.6.0/24 is directly connected, FastEthernet2/0

L        192.168.6.4/32 is directly connected, FastEthernet2/0

i L2  192.168.7.0/24 [115/20] via 192.168.5.5, 00:00:57, FastEthernet1/1

i L2  192.168.8.0/24 [115/20] via 192.168.6.6, 00:00:32, FastEthernet2/0

-----------Output Omitted -----------

L2ルータのプレフィクス

L2ルータは、OSPFバックボーン ルータと同様です。すべての情報はL2ルータです。L1エリアからのループバックは、L2ルータのルーティングテーブルにL2ルートとして存在します。

R7#sh ip route

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route, H - NHRP, l - LISP

+ - replicated route, % - next hop override

Gateway of last resort is not set

i L2  192.168.1.0/24 [115/40] via 192.168.8.6, 00:31:54, FastEthernet1/0

[115/40] via 192.168.7.5, 00:31:54, FastEthernet0/0

i L2  192.168.2.0/24 [115/40] via 192.168.8.6, 03:23:23, FastEthernet1/0

[115/40] via 192.168.7.5, 03:23:23, FastEthernet0/0

i L2  192.168.3.0/24 [115/30] via 192.168.8.6, 03:23:23, FastEthernet1/0

[115/30] via 192.168.7.5, 03:23:23, FastEthernet0/0

i L2  192.168.4.0/24 [115/30] via 192.168.8.6, 03:23:23, FastEthernet1/0

[115/30] via 192.168.7.5, 03:23:23, FastEthernet0/0

i L2  192.168.5.0/24 [115/20] via 192.168.7.5, 00:02:35, FastEthernet0/0

i L2  192.168.6.0/24 [115/20] via 192.168.8.6, 00:02:10, FastEthernet1/0

192.168.7.0/24 is variably subnetted, 2 subnets, 2 masks

C        192.168.7.0/24 is directly connected, FastEthernet0/0

L        192.168.7.7/32 is directly connected, FastEthernet0/0

192.168.8.0/24 is variably subnetted, 2 subnets, 2 masks

C        192.168.8.0/24 is directly connected, FastEthernet1/0

L        192.168.8.7/32 is directly connected, FastEthernet1/0

192.168.11.0/32 is subnetted, 1 subnets

i L2     192.168.11.11 [115/50] via 192.168.8.6, 03:23:23, FastEthernet1/0

[115/50] via 192.168.7.5, 03:23:23, FastEthernet0/0

192.168.22.0/32 is subnetted, 1 subnets

i L2     192.168.22.22 [115/40] via 192.168.8.6, 00:31:54, FastEthernet1/0

[115/40] via 192.168.7.5, 00:31:54, FastEthernet0/0

-----------Output Omitted -----------

トラブルシュート

現在、この設定に関する特定のトラブルシューティング情報はありません。