Contenido

Introducción

Prerequisites

Requirements

Componentes Utilizados

¿Cuál es la diferencia entre el ID de VLAN que se muestra en el analizador etáreo NX-OS y el ID de VLAN en un switch Nexus de Cisco serie 5000?

Introducción

Este documento describe la relación entre el ID de VLAN visto en los seguimientos de Ethanalyzer y el ID de VLAN en un switch Nexus de Cisco serie 5000.

Prerequisites

Requirements

Cisco recomienda que tenga conocimiento sobre estos temas:

- Conocimiento de Cisco NX-OS CLI

- Conocimiento de Fibre Channel over Ethernet (FCoE)

Componentes Utilizados

La información de este documento se basa en los switches Nexus de Cisco serie 5000 y 5500.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

¿Cuál es la diferencia entre el ID de VLAN que se muestra en el analizador etáreo NX-OS y el ID de VLAN en un switch Nexus de Cisco serie 5000?

Ethanalyzer no muestra el ID de VLAN FCoE real en el campo VID del encabezado 802.1q. Esta sección muestra los seguimientos de dos conexiones FCoE. Qlogic CNA utiliza FCoE VLAN/VSAN 100 y Cisco P81E (Monterey Park Adapter) utiliza FCoE VLAN/VSAN 30. El seguimiento muestra un VID de 13 y 14 respectivamente.

Keepalives QLOGIC FIP (configurados para FCoE VLAN/VSAN 100)

Solicitud FIP de Monterey Park (P81e) (configurada para FCoE VLAN/VSAN 30)

Ethanalyzer no mostrará el valor de ID de VLAN decimal real que usted vería en un seguimiento en línea. Ethanalyzer muestra el valor N5K de ID de VLAN canónica interna (CVID). Esta es una manera de mapearlo:

N5K# show system internal fcfwd fwcvidmap cvid

Canonical VLAN-ID based FWCVIDMAP table-(all values in hex)

------------------------------------------------------------------------------

CVID   Type UCD  VID    Bcast_Index    Mcast_Index    MVR_Ctrl_Index

----   ---- ---- ---    -------------- -------------- --------------

0x0001 enet 0x01 0x0fc8 0100.0000.000b 0100.0000.000c 0100.0000.0004

0x0002 enet 0x01 0x0fc9 0100.0000.0000 0100.0000.0000 0100.0000.0000

0x0003 enet 0x01 0x0fcb 0100.0000.0000 0100.0000.0000 0100.0000.0000

0x0004 enet 0x01 0x0001 0100.0000.001d 0100.0000.001d 0100.0000.0004

0x0005 enet 0x01 0x0000 0100.0000.0000 0100.0000.0000 0100.0000.0000

0x0006 enet 0x02 0x0000 0100.0000.000a 0100.0000.000a 0100.0000.000a

0x0007 enet 0x02 0x0001 0100.0000.000a 0100.0000.000a 0100.0000.000a

0x000d enet 0x01 0x0064 0100.0000.001e 0100.0000.001e 0100.0000.0004 - vlan 100

0x000e enet 0x01 0x001e 0100.0000.0020 0100.0000.0020 0100.0000.0004 - vlan 30

0x0fff enet 0x01 0x0fca 0100.0000.0002 0100.0000.0002 0100.0000.0ffd

0x0000 fc   0x0e 0x0000 0100.0000.0000 0100.0000.0000 0100.0000.0000

0x0008 fc   0x0e 0x0ffe 0100.0000.0004 0100.0000.0004 0100.0000.0004

0x0009 fc   0x0e 0x0001 0100.0000.0004 0100.0000.0004 0100.0000.0004

0x000a fc   0x0e 0x0fef 0100.0000.0004 0100.0000.0004 0100.0000.0004

0x000c fc   0x0e 0x0005 0100.0000.0004 0100.0000.0004 0100.0000.0004

0x000d fc   0x0e 0x0064 0100.0000.0004 0100.0000.0004 0100.0000.0004 - vsan 100

0x000e fc   0x0e 0x001e 0100.0000.0004 0100.0000.0004 0100.0000.0004 - vsan 30

N5k# show flogi database

--------------------------------------------------------------------------------

INTERFACE    VSAN    FCID           PORT NAME               NODE NAME

--------------------------------------------------------------------------------

vfc1981      100   0xbc0000  21:00:00:c0:dd:15:d1:7d 20:00:00:c0:dd:15:d1:7d - Qlogic

vfc1982      30    0xb90000  20:00:e8:b7:48:4e:32:54 10:00:e8:b7:48:4e:32:54 - Monterey Park

Total number of flogi = 2.

N5K# sh vlan fcoe

Original VLAN ID        Translated VSAN ID      Association State

----------------        ------------------      -----------------

30                        30               Operational

100                       100              Operational

N5K# show platform fcfib vsan 30

(SD=S_ID/D_ID, SDO=S_ID/D_ID/OX_ID)

VSAN         CVSAN      State   LoadBal   IOD   IOD_State

30(0x001e)    14(0x000e)   active    SDO      N        none

N5K# show platform fcfib vsan 100

(SD=S_ID/D_ID, SDO=S_ID/D_ID/OX_ID)

VSAN         CVSAN      State   LoadBal   IOD   IOD_State

100(0x0064)    13(0x000d)  active    SDO      N        none

VLAN canónica (CVID) 13 (0x000d) se asigna a la VLAN 100 de FCoE (0x0064), que se asigna a VSAN 100; y CVID 14 (0x000e) se asigna a la VLAN 30 de FCoE (0x001e), que se asigna a la VSAN 30.

El mismo CVID (0x000e ? decimal 14) se utiliza para representar la VLAN y VSAN FCoE externas independientemente de si utilizan el mismo número (recomendado) o un número diferente. Por ejemplo:

Cambie la VLAN FCoE a la asignación de VSAN para que sea FCoE VLAN 630 a VSAN 30, en lugar de usar VLAN 30 a VSAN 30.

N5K# show vlan fcoe

Original VLAN ID        Translated VSAN ID      Association State

----------------        ------------------      -----------------

100                       100              Operational

630                       30               Operational

Observe que el CVID (0x000e - decimal 14) es el mismo número:

N5K# show system internal fcfwd fwcvidmap cvid

Canonical VLAN-ID based FWCVIDMAP table- (All values in hex)

------------------------------------------------------------------------------

CVID   Type UCD  VID    Bcast_Index    Mcast_Index    MVR_Ctrl_Index

----   ---- ---- ---    -------------- -------------- --------------

0x0001 enet 0x01 0x0fc8 0100.0000.000b 0100.0000.000c 0100.0000.0004

0x0002 enet 0x01 0x0fc9 0100.0000.0000 0100.0000.0000 0100.0000.0000

0x0003 enet 0x01 0x0fcb 0100.0000.0000 0100.0000.0000 0100.0000.0000

0x0004 enet 0x01 0x0001 0100.0000.001d 0100.0000.001d 0100.0000.0004

0x0005 enet 0x01 0x0000 0100.0000.0000 0100.0000.0000 0100.0000.0000

0x0006 enet 0x02 0x0000 0100.0000.000a 0100.0000.000a 0100.0000.000a

0x0007 enet 0x02 0x0001 0100.0000.000a 0100.0000.000a 0100.0000.000a

0x000d enet 0x01 0x0064 0100.0000.001e 0100.0000.001e 0100.0000.0004

0x000e enet 0x01 0x0276 0100.0000.0024 0100.0000.0024 0100.0000.0004 - VLAN 630

0x0fff enet 0x01 0x0fca 0100.0000.0002 0100.0000.0002 0100.0000.0ffd

0x0000 fc   0x0e 0x0000 0100.0000.0000 0100.0000.0000 0100.0000.0000

0x0008 fc   0x0e 0x0ffe 0100.0000.0004 0100.0000.0004 0100.0000.0004

0x0009 fc   0x0e 0x0001 0100.0000.0004 0100.0000.0004 0100.0000.0004

0x000a fc   0x0e 0x0fef 0100.0000.0004 0100.0000.0004 0100.0000.0004

0x000c fc   0x0e 0x0005 0100.0000.0004 0100.0000.0004 0100.0000.0004

0x000d fc   0x0e 0x0064 0100.0000.0004 0100.0000.0004 0100.0000.0004

0x000e fc   0x0e 0x001e 0100.0000.0004 0100.0000.0004 0100.0000.0004 - VSAN 30

Esta es otra manera de determinar el mapping de VLAN interna al mapping de VLAN externa:

N5k# show platform afm info global

Gatos Hardware version 0

Hardware instance mapping

-------------------------

Hardware instance: 0 asic id: 0 slot num: 0

Hardware instance: 1 asic id: 1 slot num: 0

Hardware instance: 2 asic id: 2 slot num: 0

Hardware instance: 3 asic id: 3 slot num: 0

Hardware instance: 4 asic id: 4 slot num: 0

Hardware instance: 5 asic id: 5 slot num: 0

Hardware instance: 6 asic id: 6 slot num: 0

Hardware instance: 7 asic id: 0 slot num: 1

Hardware instance: 8 asic id: 1 slot num: 1

Hardware instance: 9 asic id: 0 slot num: 3

Hardware instance: 10 asic id: 1 slot num: 3

AFM Internal Status

-------------------

[unknown label ]: 324

[no free statistics counter ]: 2

[number of verify ]: 59

[number of commit ]: 59

[number of request ]: 6163

[tcam stats full ]: 2

Vlan mapping table

------------------

Ext-vlan: 1 - Int-vlan: 66

Ext-vlan: 2 - Int-vlan: 62

Ext-vlan: 101 - Int-vlan: 61

Ext-vlan: 102 - Int-vlan: 60

Ext-vlan: 103 - Int-vlan: 59

Ext-vlan: 104 - Int-vlan: 58

Ext-vlan: 105 - Int-vlan: 57

Ext-vlan: 106 - Int-vlan: 56

Ext-vlan: 107 - Int-vlan: 55

Ext-vlan: 108 - Int-vlan: 54

Ext-vlan: 109 - Int-vlan: 53

Ext-vlan: 110 - Int-vlan: 52

Ext-vlan: 111 - Int-vlan: 51

Ext-vlan: 112 - Int-vlan: 50