Table of Contents

InterCloud Commands

Show Commands

Title page

Cisco Nexus 1000V InterCloud Commands

clear intercloud tunnel history

To clear the history of old tunnels from the Cisco Nexus 1000V InterCloud switch, use the clear intercloud tunnel history command.

clear intercloud tunnel history

Syntax Description

This command has no arguments or keywords.

Defaults

None

Command Modes

Any command mode

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.1)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the clear intercloud tunnel history command on the InterCloud Switch and the InterCloud Extender.

Related Commands

Command

Description

clear intercloud tunnel statistics

Clears the InterCloud tunnel statistics

clear intercloud tunnel statistics

To clear the InterCloud tunnel statistics from the Cisco Nexus 1000V InterCloud switch, use the clear intercloud tunnel statistics command.

clear intercloud tunnel statistics [tunnel-id] [remote vm] [remote uuid]

Syntax Description

None

Defaults

None

Command Modes

Any command mode

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.1)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the clear intercloud tunnel statistics command on the InterCloud Switch.

Related Commands

Command

Description

Clear intercloud tunnel history

Clears the InterCloud old tunnel history.

clear logging intercloud [vm name]

To clear InterCloud Agent logs for the VM, use the clear logging intercloud [vm name] command.

clear logging intercloud [vm name]

Syntax Description

This command has the following arguments or keywords:

vm name

Name of the virtual machine you want to the clear the InterCloud logs for.

Defaults

None

Command Modes

Any command mode

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.1)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the clear logging intercloud [vm name] command on the InterCloud Switch.

Related Commands:

Command

Description

clear intercloud tunnel history

Clears the history of old tunnels.

clear intercloud tunnel statistics [vm name] [tunnel-id] [uuid]

Clears the InterCloud tunnel statistics for a given VM, tunnel-ID, or the uuid from the Cisco Nexus 1000V InterCloud switch.

clear module service intercloud all

To clear all the InterCloud modules, use the clear module service intercloud all command.

clear module service intercloud all

Syntax Description

This command has no arguments or keywords.

Defaults

None

Command Modes

Any command mode

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.1)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the clear module service intercloud all command on the Cisco Nexus 1000V InterCloud VSM.

Related Commands:

Command

Description

clear module service intercloud module-id statistics

Clears the InterCloud module statistics for a given module ID.

clear module service intercloud module-id vm

Clears the InterCloud module for a given module ID for a VM.

clear module service intercloud module id statistics

To clear the statistics of an InterCloud module, based on a module ID, use the clear module service intercloud module id statistics command.

clear module service intercloud module id statistics

Syntax Description

This command has no arguments or keywords.

Defaults

None

Command Modes

Any command mode

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.1)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the clear module service intercloud module id statistics command on the InterCloud Switch.

Related Commands:

Command

Description

clear module service intercloud module-id vm

Clears the InterCloud module for a given module ID for a VM.

clear module service intercloud all

Clears all the InterCloud modules.

clear module service intercloud module-id vm

To clear the InterCloud module for a given module ID and a VM, use the clear module service intercloud module-id vm command.

clear module service intercloud module-id[module-id] vm [vm-uuid]

Syntax Description

This command has the following arguments or keywords.

module-id

ID of a configured module in the Cisco Nexus 1000V InterCloud.

vm-uuid

uuid of the InterCloud VM which you want to clear.

Defaults

None

Command Modes

Any command mode

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.1)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the clear module service intercloud module-id vm command on the InterCloud Switch.

Related Commands:

Command

Description

clear module service intercloud all

Clears all the InterCloud modules.

clear module service intercloud module-id statistics

Clears the InterCloud module statistics for a given module ID.

event-log redundancy-mgr

To configure the redundancy manager event-logs, use the event-log redundancy manager command.

event-log redundancy-mgr {trace | info| error} [terminal]

Syntax Description

This command has the following arguments or keywords.

info

Displays the informational event.

error

Displays the error event.

trace

Displays the debug/ trace event.

terminal

(Optional) Displays event logs in real time on the terminal.

Defaults

None

Command Modes

Global configuration and EXEC modes

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.1)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the event-log redundancy-mgr command on the InterCloud Switch or the InterCloud Extender.

Examples

The following example shows the output to the event-log redundancy-mgr [terminal] command:

switch# Thu Jun 27 14:37:25 2013 90000 usec hamgr_config_cg(394):Received configuration

from PA

Thu Jun 27 14:37:25 2013 90000 usec hamgr_config_cg(410):Received cgu_info configuration

Thu Jun 27 14:37:25 2013 90000 usec hamgr_cguinfo_to_nodeinfo(772):cgu_info: uuid

[AC5A0B56-51CF-397A-7529-CC0

920BC87A3], cluster_id [4], ha_role [1], opcode [1] , ip [10.193.73.174]

Thu Jun 27 14:37:25 2013 90000 usec hamgr_cginfo_process_action(538):Received action ADD

Thu Jun 27 14:37:25 2013 90000 usec hamgr_node_add(404):Using MGMT IP address from config

Thu Jun 27 14:37:25 2013 90000 usec hamgr_node_add(407):Local node configured successfully

Thu Jun 27 14:37:25 2013 90000 usec hamgr_pss_config_write(556):Writing pss config for info

type HAMGR_NODE_INFO_LOCAL

Thu Jun 27 14:37:25 2013 90000 usec hamgr_pss_config_write(585):node_config pss does not

exist, creating uri volatile:/dev/shm/hamgr_node_configs

Thu Jun 27 14:37:25 2013 90000 usec hamgr_sockets_update(230):Updating sockets if needed...

Thu Jun 27 14:37:25 2013 90000 usec hamgr_sockets_update(271):Sockets not enabled, tunnel

must be up

Thu Jun 27 14:37:25 2013 100000 usec hamgr_config_cg(394):Received configuration from PA

Thu Jun 27 14:37:25 2013 100000 usec hamgr_config_cg(436):Received peer_info configuration

Thu Jun 27 14:37:25 2013 100000 usec hamgr_peerinfo_to_nodeinfo(909):Printing peer_info

Thu Jun 27 14:37:25 2013 100000 usec hamgr_peerinfo_to_nodeinfo(911):peer_info : uuid :

A65AD6DC-D80F-0D5D-3341-58AEA0D0938C

Thu Jun 27 14:37:25 2013 100000 usec hamgr_peerinfo_to_nodeinfo(912):peer_info : ip_addr

(int) : 2873737482

Thu Jun 27 14:37:25 2013 100000 usec hamgr_peerinfo_to_nodeinfo(914):peer_info : ip_addr

(str) : 10.193.73.171

Thu Jun 27 14:37:25 2013 110000 usec hamgr_peerinfo_to_nodeinfo(915):peer_info : opcode :

1

Thu Jun 27 14:37:25 2013 110000 usec hamgr_cginfo_process_action(538):Received action ADD

Thu Jun 27 14:37:25 2013 110000 usec hamgr_node_list_add(744):Peer node added successfully

Thu Jun 27 14:37:25 2013 110000 usec hamgr_pss_config_write(556):Writing pss config for

info type HAMGR_NODE_INFO_PEER

Related Commands

Command

Description

show system internal event-log all

Displays internal event log information for all modules on the Cisco Nexus 1000V InterCloud.

event-log tunnel-mgr

To configure the tunnel manager event-logs, use the event-log tunnel-mgr command.

event-log tunnel-mgr {trace | info| error} [terminal]

Syntax Description

This command has the following arguments or keywords.

info

Displays the informational event.

error

Displays the error event.

trace

Displays the debug/ trace event.

terminal

(Optional) Displays event logs in real time on the terminal.

Defaults

None

Command Modes

Global configuration and EXEC modes

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.1)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the event-log tunnel-mgr command on the InterCloud Switch or the InterCloud Extender.

Related Commands

Command

Description

event-log redundancy-mgr

Displays redundancy manager event logs.

intercloud redundancy switchover

To initiate a switchover in a high availability deployment, use the intercloud redundancy switchover command.

intercloud redundancy switchover

Syntax Description

This command has no arguments or keywords.

Defaults

None

Command Modes

Global configuration and EXEC modes

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.1)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the intercloud redundancy switchover command on the InterCloud Extender.

Related Commands

Command

Description

show intercloud redundancy configuration

Displays the HA configuration and status of the local system and remote peers on the InterCloud Switch and Extender.

show intercloud redundancy statistics heartbeat

Displays the handshake and heartbeat related statistics between InterCloud Extenders in a high availability deployment.

intercloud test ics-reachability

To verify if the InterCloud Switch is reachable, use the intercloud test ics-reachability command.

intercloud test ics-reachability

Syntax Description

This command has no arguments or keywords.

Defaults

None

Command Modes

Any command mode

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.1)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the intercloud test reachability command on the InterCloud Extender.

Examples

The following example shows the output to the intercloud test reachability command:

switch# intercloud test ics-reachability

PORT STATE SERVICE REASON

6644/tcp open ctrl-channel success

6644/udp open data-tunnel success

22/tcp open ssh success

80/tcp filtered/ics-unreach http Connection timed out

443/tcp open

Related Commands

Command

Description

show intercloud redundancy configuration

Displays the HA configuration and status of the local system and remote peers on the InterCloud Switch and Extender.

show intercloud redundancy statistics heartbeat

Displays the handshake and heartbeat related statistics between InterCloud Extenders in a high availability deployment.

logging level intercloud

To set the logging level for all or a particular component of the InterCloud Agent on a VM, use the logging level intercloud command.

logging level intercloud [{all | clp | cncl | cncm | driver | hamgr | intfmgr | stm | subagent} ]

[{ emerg | alert | crit | err | warn | notice | inform | debug | disable}] [{all | vm name}]

Syntax Description

This command has the following arguments or keywords.

all

Sets up logging level for all components.

clp

Sets up logging level for the Cloud Logging Platform.

cncm

Sets up logging level for the Cloud Node Communication Library.

driver

Sets up logging level for Cisco secure tunnel driver.

hamgr

Sets up logging level for HA Manager.

intfmgr

Sets up logging level for Interface manager.

stm

Sets up logging level for secure tunnel module.

subagent

Sets up logging level for Cloud secure wrapper agent.

emerg

Sets up the logging level to Emergency: system in unusable condition.

alert

Sets up the logging level Alert: action needed immediately condition.

crit

Sets up the logging level to Critical condition.

err

Sets up the logging level to Error.

warn

Sets up the logging level to Warning.

notice

Sets up the logging level to Notice: normal, but significant.

inform

Sets up the logging level to Information.

debug

Sets up the logging level to Debug.

disable

Sets up the logging level to Diasable logging.

vmname

Name of the VM.

Defaults

None

Command Modes

Any command mode

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.1)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the logging level intercloud [component name] [level] [vm name] command on the InterCloud Switch.

Messages logged with an inferior level to the ones you set up for a component are ignored.

Examples

The following example shows the output to the logging level intercloud [component name] [level] [vm name] command:

switch# logging level intercloud intfmgr crit csr10

Sending command to csr10 VM...done

======== csr10 Logging Status ========

clp notice

cncm alert

cncl info

subagent info

stm info

intfmgr critical

hamgr info

driver info

nsc-policy-agent

To register a Cisco Nexus 1000V InterCloud VSM with the Cisco Prime Network Services Controller, use the nsc-policy-agent command.

nsc-policy-agent

Syntax Description

This command has no arguments or keywords.

Defaults

None

Command Modes

Global configuration mode

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.1)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the nsc-policy agent command on the Cisco Nexus 1000V InterCloud VSM.

Examples

The following example shows how to register the Cisco Nexus 1000V InterCloud VSM with the Cisco Prime Network Services Controller:

switch(config)# nsc-policy-agent

switch(config-nsc-policy-agent)# registration-ip 10.106.192.192

switch(config-nsc-policy-agent)# shared-secret Example_Secret123

switch(config-nsc-policy-agent)# policy-agent-image bootflash:/vsmcpa.<filename>.bin

switch(config)# copy running-config startup-config

switch(config)# exit

Related Commands

Command

Description

nsc-pa status

Verify the registration status of the Cisco Nexus 1000V InterCloud VSM.

Cisco Nexus 1000V InterCloud Show Commands

show intercloud clink status

To display the status of an InterCloud clink, use the show intercloud clink status command.

show intercloud clink status

Syntax Description

This command has no arguments or keywords.

Defaults

None

Command Modes

Any command mode

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.1)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the show intercloud clink status command on the InterCloud Extender and the InterCloud Switch.

Examples

The following is an example of the output to the show intercloud clink status command:

switch# show intercloud clink status

ICE:

--------------------------------------------------------------------------------

Name Peer Ip Config Control Tunnel Tunnel

State Connection Connection Id

--------------------------------------------------------------------------------

N1KV-IC-1-icx-1 128.107.239.233 OK Up Up 1

--------------------------------------------------------------------------------

Note The peer IP is the IP address that connects to the ICS end of the tunnel. In HTTPS mode, the peer IP is 127.0.0.1, because the tunnel connects through another local process that handles HTTPS port 443.

show intercloud ctrl-channel config

To display information about the control channel configuration of Cisco Nexus 1000V InterCloud, use the show intercloud ctrl-channel config command.

show intercloud ctrl-channel config

Syntax Description

This command has no arguments or keywords.

Defaults

None

Command Modes

Any command mode

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.1)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the show intercloud ctrl-chanel config command on the InterCloud Switch and the InterCloud Extender.

Examples

The following example shows the output to the show intercloud ctrl-channel config command executed on the InterCloud Switch:

switch# show intercloud ctrl-channel config

self vm-info:

type : InterCloud-Switch

name : N1KV-IC-1-ics-1

full-name : hcloud-root/vpc-vpc-1/icl-N1KV-IC-1/ics-ics/N1KV-IC-1-ics-1

uuid : CF53C341-1E2D-7A87-DA17-052DDBAC4385

ip : 23.20.90.202

HA state : ACTIVE

peer vm-info:

type : InterCloud-Extender

name : N1KV-IC-1-icx-1

uuid : 4E56C414-6E87-B64D-BA31-E1418DA54CA0

ip : 172.22.236.124

cloud VM (CSW) vm-info:

type : InterCloud-Agent

name : ic-vm-02

uuid : B25EEEB1-F210-5691-FAA8-4D7CA8955386

ip : 10.29.192.157

type : InterCloud-Agent

name : ic-vm-01

uuid : 8F5F7FB0-954E-95FA-79F1-4836DBBF8BB7

ip : 10.28.7.159

mgmt tunnel-info:

type : site2site

id : 1

key : configured

key-len : 16

reason : valid key received

type : access

id : 2

key : configured

key-len : 16

reason : valid key received

Examples

The following example shows the output to the show intercloud ctrl-channel config command executed on the InterCloud Extender:

switch# show intercloud ctrl-channel config

self vm-info:

type : InterCloud-Extender

name : CNE1-icx-1

full-name : hcloud-root/vpc-VPC1/icl-CNE1/icx-icx/CNE1-icx-1

uuid : CB5E791B-D5EC-D243-D45B-33C6413A40A5

ip : 10.37.6.92

HA state : ACTIVE

peer vm-info:

type : InterCloud-Switch

name : CNE1-ics-1

uuid : D2512BDD-D93F-5618-7E16-E0BFBD0671B0

ip : 75.101.174.199

mgmt tunnel-info:

type : site2site

id : 1

key : configured

key-len : 16

reason : valid key received

CNE1-icx-1#

Related Commands

Command

Description

show intercloud ctrl-channel connections

Displays information about the active VM connections on the Cisco Nexus 1000V InterCloud.

show intercloud ctrl-channel connection status

Displays the status of the active VM connections on the Cisco Nexus 1000V InterCloud.

show intercloud ctrl-channel connections

To display information about the active VM connections on the Cisco Nexus 1000V InterCloud, use the show intercloud ctrl-channel connections command.

show intercloud ctrl-channel connections

Syntax Description

This command has no arguments or keywords.

Defaults

None

Command Modes

Any command mode

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.1)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the show intercloud ctrl-channel connections command on the InterCloud Switch.

Examples

The following is an example of the output to the show intercloud ctrl-channel connections command executed on the InterCloud Switch:

switch# show intercloud ctrl-channel connections

vm-name type ip uuid

ic-vm-02 ica 10.29.192.157 B25EEEB1-F210-5691-FAA8-4D7CA8955386

ic-vm-01 ica 10.28.7.159 8F5F7FB0-954E-95FA-79F1-4836DBBF8BB7

N1KV-IC-1-icx-1 icx 172.22.236.124 4E56C414-6E87-B64D-BA31-E1418DA54CA0

N1KV-IC-1-ics-2 ics 54.227.56.190 01533CB8-FCD9-DA12-3CC6-D7B3167D1EBD

Examples

The following is an example of the output to the show intercloud ctrl-channel connections command executed on the InterCloud Extender:

switch# show intercloud ctrl-channel connections

vm-name type ip uuid

CNE1-ics-1 ics 75.101.174.199 D2512BDD-D93F-5618-7E16-E0BFBD0671B0

CNE1-icx-1#

Related Commands

Command

Description

show intercloud ctrl-channel config

Displays the status of the InterCloud clink.

show intercloud ctrl-channel connection status

Displays the connection status of the InterCloud ctrl-channel connections.

show intercloud ctrl-channel connection status

To display information about the status of active VM connections on the Cisco Nexus 1000V InterCloud, use the show intercloud ctrl-channel connection status command.

show intercloud ctrl-channel connection status

Syntax Description

This command has no arguments or keywords.

Defaults

None

Command Modes

Any command mode

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.1)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the show intercloud ctrl-channel connection status command on the InterCloud Switch and the InterCloud Extender.

Examples

The following is an example of the output to the show intercloud ctrl-channel connection status command:

switch# show intercloud ctrl-channel connection status

uuid vm-name type status conn-state failure-reason

B25EEEB1-F210-5691-FAA8-4D7CA8955386 ic-vm-02 ica ena conn none

8F5F7FB0-954E-95FA-79F1-4836DBBF8BB7 ic-vm-01 ica ena conn none

4E56C414-6E87-B64D-BA31-E1418DA54CA0 N1KV-IC-1-icx-1 icx ena conn none

01533CB8-FCD9-DA12-3CC6-D7B3167D1EBD N1KV-IC-1-ics-2 ics ena conn none

CF53C341-1E2D-7A87-DA17-052DDBAC4385 N1KV-IC-1-ics-1 ics ena conn Server up and running.

Related Commands

Command

Description

show intercloud ctrl-channel config

Displays information about the control channel configuration of the InterCloud clink.

show intercloud ctrl-channel connection

Displays information about the active VM connections on the Cisco Nexus 1000V InterCloud.

show intercloud port

To display the InterCloud port information, use the show intercloud port command.

show intercloud port

Syntax Description

This command has no arguments or keywords.

Defaults

None

Command Modes

Any command mode

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.1)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the show intercloud port command on the InterCloud Switch.

Examples

The following example shows the output to the show intercloud port command:

switch# show intercloud port

self port-info

uuid : 2453F644-A36C-8BDB-D130-C50C4C8B9687

type : InterCloud-Switch

name : Sahara-ics-2

mgmt-ip : 10.2.67.174

public-ip : 50.17.0.197

private-ip : 10.37.43.110

ha-peer-ip : 10.84.78.29

num-ports : 2

port : 1

name : veth1-0

type : ics_site_to_site

cm-index : 0

instance-id : 0

peer-status : up

mac-address : 00:0E:08:00:00:04

dv-port-id : 5

port-profile : N1K_Cloud_Default_Trunk

port : 2

name : eth1

type : ics_mgmt

cm-index : 1

instance-id : 1

mac-address : 3E:9F:E2:D3:40:36

dv-port-id : 24579

port-profile : access-kumo-mgmt-72

ip-mode : static

ip-address : 10.2.67.174

netmask : 255.255.0.0

gateway : 10.2.0.1

peer port-info

peer-vm : 1

uuid : 6F526A57-1496-1D1C-7AB6-553FEB1696A2

type : InterCloud-Extender

name : Sahara-icx-2

tunnel-id : 1

tunnel-ip : 172.22.236.32

ctrl channel : up

InterCloud-Agent port-info (total: 3)

InterCloud-Agent : 1

uuid : 055C130F-70D2-CF6C-E047-AC9C91E2ABBC

type : InterCloud-Agent

name : CVM-BB

tunnel-id : 2

private-ip : 10.119.2.67

ctrl channel : up

domain name :

dns1-ipaddr : ---

dns2-ipaddr : ---

num-ports : 4

port : 1

name : veth2-0

type : cvm_veth

cm-index : 0

instance-id : 0

peer-status : up

mac-address : 00:0E:08:00:00:0D

dv-port-id : 40962

--More--

Related Commands

Command

Description

show intercloud redundancy config

To display the high availability (HA) configuration and the status of the local system and remote peers, use the show intercloud redundancy configuration command.

show intercloud redundancy config

Syntax Description

This command has no arguments or keywords.

Defaults

None

Command Modes

Any command mode

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.1)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the show intercloud redundancy config command on the InterCloud Switch.

Examples

The following example shows the output to the show intercloud redundancy config command:

switch# show intercloud redundancy config

Redundancy Manager Information:

Cluster Node Count: 3

Local Node:

state : Active

HA mode : High Availability

uuid : 2453F644-A36C-8BDB-D130-C50C4C8B9687

version : 521111

cluster_id : 1

priority : Secondary

type : InterCloud Switch

ipaddr [public]: 50.17.0.197

Tunnel Peer:

state : Active

uuid : 6F526A57-1496-1D1C-7AB6-553FEB1696A2

type : InterCloud Extender

ipaddr [mgmt] : 10.2.67.172

HA Peer:

uuid : DB51A7CD-32A0-1806-9E5E-A63993B30DA9

type : InterCloud Switch

ipaddr [priv] : 10.84.78.29

Related Commands

Command

Description

show intercloud redundancy heartbeat statistics

Displays the handshake and heartbeat related statistics between InterCloud Extenders in a high availability deployment.

show intercloud redundancy statistics platform

Displays platform related statistics for a gateway.

show intercloud redundancy statistics heartbeat

To display the handshake and heartbeat related statistics between Cisco Nexus 1000V InterCloud Extenders (ICX) in a high availability deployment, use the show intercloud redundancy statistics heartbeat command.

show intercloud redundancy statistics hearbeat

Syntax Description

This command has no arguments or keywords.

Defaults

None

Command Modes

Any command mode

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.1)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the show intercloud redundancy statistics heartbeatcommand on the InterCloud Switch.

Examples

The following example shows the output to the show intercloud redundancy statistics heartbeat command:

HA Manager Heartbeat Stats:

Heartbeat Frequency (s) : 5

Heartbeat Timeout (s) : 30

rx_handshake_pkts : 2

tx_handshake_pkts : 4

rx_heartbeat_pkts : 143

tx_heartbeat_pkts : 143

rx_drops_invalid_src_addr : 0

rx_drops_wrong_cluster : 0

rx_drops_queue_full : 0

rx_drops_not_ready : 0

rx_drops_wrong_version : 0

rx_unknown_pkts : 0

WAN Timeout (s) : 300

WAN HB Count : 0

Related Commands

Command

Description

show intercloud redundancy configuration

Displays the HA configuration and status of the local system and remote peers on the InterCloud Switch and Extender.

show intercloud redundancy statistics platform

Displays platform related statistics for a gateway.

show intercloud redundancy statistics platform

To display the platform related statistics for a gateway in a high availability deployment, use the show intercloud redundancy statistics platform command.

show intercloud redundancy statistics platform

Syntax Description

This command has no arguments or keywords.

Defaults

None

Command Modes

Any command mode

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.1)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the show intercloud redundancy statistics platform command on the InterCloud Switch.

Examples

The following example shows the output to the show intercloud redundancy statistics platform command:

switch# show intercloud redundancy statistics platform

HA Manager Platform Stats:

rx_cncl : 2

rx_cncl_inval : 0

tx_cncl : 2

tx_cncl_err : 0

rx_cnc_state_push_req : 2

rx_cnc_state_push_req_inval : 1

rx_cnc_state_push_rsp : 0

rx_cnc_state_push_rsp_inval : 0

tx_cnc_state_push_req : 0

tx_cnc_state_push_req_err : 0

tx_cnc_state_push_rsp : 2

tx_cnc_state_push_rsp_err : 0

tx_cnc_state_push_req_timeouts: 0

rx_cnc_csw_clean_req : 0

rx_cnc_csw_clean_req_inval : 0

rx_cnc_csw_clean_rsp : 0

rx_cnc_csw_clean_rsp_inval : 0

tx_cnc_csw_clean_req : 0

tx_cnc_csw_clean_req_err : 0

tx_cnc_csw_clean_rsp : 0

tx_cnc_csw_clean_rsp_err : 0

tx_cnc_csw_clean_req_timeouts : 0

rx_cnc_reboot_req : 0

rx_cnc_reboot_req_inval : 0

tx_cnc_reboot_req : 0

tx_cnc_reboot_req_err : 0

rx_cnc_peer_alive_req : 0

rx_cnc_peer_alive_req_inval : 0

tx_cnc_peer_alive_req : 0

tx_cnc_peer_alive_req_err : 0

tx_cnc_peer_alive_req_timeouts: 0

rx_cnc_peer_alive_rsp : 0

rx_cnc_peer_alive_rsp_inval : 0

tx_cnc_peer_alive_rsp : 0

tx_cnc_peer_alive_rsp_err : 0

Related Commands

Command

Description

show intercloud redundancy configuration

Displays the HA configuration and status of the local system and remote peers on the InterCloud Switch and Extender.

show intercloud redundancy statistics heartbeat

Displays the handshake and heartbeat related statistics between Cisco Nexus 1000V InterCloud Extenders (ICX) in a high availability deployment.

show intercloud tunnel brief

To display a summary of the secure tunnels on the Cisco Nexus 1000V InterCloud, use the show intercloud tunnel brief command.

show intercloud tunnel brief

Syntax Description

This command has no arguments or keywords.

Defaults

None

Command Modes

Any command mode

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.1)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the show intercloud tunnel brief command on the InterCloud Switch and the InterCloud Extender.

Examples

The following example shows the output to the show intercloud tunnel brief command.

switch # show intercloud tunnel brief

--------------------------------------------------------------------------------

Tunnel Tunnel Tunnel Control Peer

ID Type Status Status Name

--------------------------------------------------------------------------------

1 Site-to-Site Up UP N1KV-IC-1-icx-1

2 Access Up UP ic-vm-01

3 Access Up UP ic-vm-02

--------------------------------------------------------------------------------

Related Commands

Command

Description

show intercloud tunnel configuration

Displays information about secure tunnel configuration of the Cisco Nexus 1000V InterCloud.

show intercloud tunnel statistics

Displays the secure tunnel statistics of the Cisco Nexus 1000V InterCloud.

show intercloud tunnel configuration

To display information about the secure tunnel configuration of the Cisco Nexus 1000V InterCloud, use the show intercloud tunnel configuration command.

show intercloud tunnel configuration

Syntax Description

This command has no arguments or keywords.

Defaults

None

Command Modes

Any command mode

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.1)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the show intercloud tunnel configuration command on the InterCloud Switch and the InterCloud Extender.

Examples

The following example shows the output to the show intercloud tunnel configuration command:

switch # show intercloud tunnel config

ICS-Profile:

uuid CF53C341-1E2D-7A87-DA17-052DDBAC4385

public-ip 23.20.90.202

local-ip 10.214.186.255

tunnel-port 6644

ICE-uuid 4E56C414-6E87-B64D-BA31-E1418DA54CA0

Site-to-Site-tunnel-profile:

Heartbeat-interval 1

Heartbeat-retries 120

Site-to-site-key-profile [Configured]

Encryption Algorithm AES-128-CBC

Hash Algorithm SHA1

Key-Profile-Checksum F3DCD32E-FF03ECF0-A4A8835C-0996E004-B651F206

ReKey-State Not-In-Progress

Epoch 0

Access-tunnel-profile:

Heartbeat-interval 1

Heartbeat-retries 120

Access-key-profile [Configured]

Encryption Algorithm AES-128-CBC

Hash Algorithm SHA1

Key-Profile-Checksum F3DCD32E-FF03ECF0-A4A8835C-0996E004-B651F206

ReKey-State Not-In-Progress

Epoch 0

cVM Information:

name ic-vm-01

uuid 8F5F7FB0-954E-95FA-79F1-4836DBBF8BB7

name ic-vm-02

uuid B25EEEB1-F210-5691-FAA8-4D7CA8955386

Related Commands

Command

Description

show intercloud tunnel statistics

Displays the secure tunnel statistics of the Cisco Nexus 1000V InterCloud.

show intercloud tunnel history

To display the history of secure tunnels on the Cisco Nexus 1000V InterCloud, use the show intercloud tunnel history command.

show intercloud tunnel history

Syntax Description

This command has no arguments or keywords.

Defaults

None

Command Modes

Any command mode

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.1)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the show intercloud tunnel history command on the InterCloud Switch and the InterCloud Extender.

Examples

The following example shows the output to the show intercloud tunnel history command executed from the InterCloud Switch:

switch# sh intercloud tunnel history

No Old Tunnels

CNE1-ics-1#

The following example shows the output to the show intercloud tunnel history command executed from the InterCloud Extender:

switch # show intercloud tunnel history

No Old Tunnels

CNE1-icx-1#

Related Commands

Command

Description

show intercloud tunnel configuration

Displays information about secure tunnel configuration of the Cisco Nexus 1000V InterCloud .

show intercloud tunnel statistics

To display the statistics for secure tunnels on the Cisco Nexus 1000V InterCloud, use the show intercloud tunnel statistics [ remote-uuid | remote-vm-name | tunnel-id] command.

show intercloud tunnel statistics { remote-uuid [uuid] | remote-vm-name [vm-name] | tunnel-id [tid] }

Syntax Description

This command has the following arguments or keywords:

remote-uuid

Displays secure tunnel statisitcs for a remote uuid.

remote-vm-name

Displays secure tunnel statistics for a remote VM.

tunnel-id

Displays secure tunnel statistics for a tunnel ID.

Defaults

None

Command Modes

Any command mode

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.1)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the show intercloud tunnel statistics [ remote-uuid | remote-vm-name | tunnel-id] command on the InterCloud Switch.

Examples

The following example shows the output to the show intercloud tunnel statistics [ remote-uuid | remote-vm-name | tunnel-id] command:

switch # show intercloud tunnel statistics

Total tunnels 3

Tunnel ID 1

Tunnel Type Site-To-Site

Remote UUID 4E56C414-6E87-B64D-BA31-E1418DA54CA0

Remote VM Name N1KV-IC-1-icx-1

Create Time Mon Jul 8 15:55:28 2013

Control Status UP

Tunnel Status UP

RX Packets 364048

TX Packets 196621

RX Drops 0

TX Drops 0

RX Heartbeats 175850

TX Heartbeats 175506

TX Heartbeat Errors 0

Rx Control Packets 0

Netlink Drops 0

Epoch Failures 0

Encryption Errors 0

Bad Sequence Drops 0

Invalid MAC Drops 0

Tunnel ID 2

Tunnel Type Access

Remote UUID 8F5F7FB0-954E-95FA-79F1-4836DBBF8BB7

Remote VM Name ic-vm-01

Create Time Mon Jul 8 16:01:44 2013

Control Status UP

Tunnel Status UP

RX Packets 79

TX Packets 6010

RX Drops 0

TX Drops 0

RX Heartbeats 175474

TX Heartbeats 175130

TX Heartbeat Errors 0

Rx Control Packets 0

Netlink Drops 0

Epoch Failures 0

Encryption Errors 0

Bad Sequence Drops 0

Invalid MAC Drops 0

Tunnel ID 3

Tunnel Type Access

Remote UUID B25EEEB1-F210-5691-FAA8-4D7CA8955386

Remote VM Name ic-vm-02

Create Time Mon Jul 8 16:22:02 2013

Control Status UP

Tunnel Status UP

RX Packets 64

TX Packets 5948

RX Drops 0

TX Drops 0

RX Heartbeats 174256

TX Heartbeats 173912

TX Heartbeat Errors 0

Rx Control Packets 0

Netlink Drops 0

Epoch Failures 0

Encryption Errors 0

Bad Sequence Drops 0

Invalid MAC Drops 0

Related Commands

Command

Description

show intercloud tunnel configuration

Displays information about secure tunnel configuration of the Cisco Nexus 1000V InterCloud.

show intercloud tunnel

Displays inforamtion about the secure tunnels on the Cisco Nexus 1000V InterCloud.

show intercloud vm kernel-log

To obtain the Cisco secure tunnel driver logs for an InterCloud VM, use the show intercloud vm kernel-log command.

show intercloud vm [vm-name] kernel-log

Syntax Description

This command has the following arguments or keywords:

vm-name

Name of the InterCloud VM for which you want to access the kernel log.

Defaults

None

Command Modes

Any command mode

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.1)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the show intercloud vm kernel-log command on the InterCloud Switch.

Examples

The following example shows the output to the show intercloud vm kernel-log command:

switch# show intercloud vm ic-vm-02 kernel-log

Sending command to ic-vm-02 VM...done

Collected data from ic-vm-02 VM is successfully written to /bootflash/log/clp_kerlog_ic-vm-02_2013-07-10-17-17-46

********* The last 40 lines of the file *********

c000 Mon Jul 8 15:59:13 2013: ifd_event: INTFD_VETH_ALLOC device eth6

c000 Mon Jul 8 15:59:13 2013: ifd_info: interface feature val 0x0

c000 Mon Jul 8 15:59:13 2013: ifd_event: INTFD_VETH_REGISTER device eth6

c000 Mon Jul 8 15:59:13 2013: ifd_info: tx disbaled on --- (0, 7)

c000 Mon Jul 8 15:59:13 2013: ifd_info: allocated eth7 at vmdb_idx 0 for intf_id 7

c000 Mon Jul 8 15:59:13 2013: ifd_event: INTFD_VETH_ALLOC device eth7

c000 Mon Jul 8 15:59:13 2013: ifd_info: interface feature val 0x0

c000 Mon Jul 8 15:59:13 2013: ifd_event: INTFD_VETH_REGISTER device eth7

c000 Mon Jul 8 15:59:13 2013: ifd_info: 8 interfaces created in CSW

c000 Mon Jul 8 15:59:13 2013: ctdrv: ctdrv_register():75 register ctdrv minor device 1

c000 Mon Jul 8 15:59:13 2013: ctdrv: ctdrv_register():75 register ctdrv minor device 0

c000 Mon Jul 8 15:59:13 2013: ctdrv-std-err: std_netlink_init(): std_netlink_init: Netlink initialization succssful

c000 Mon Jul 8 15:59:13 2013: ctdrv version 6 running on CSW

c000 Mon Jul 8 16:01:49 2013: ctdrv: ctdrv_open():59 ctdrv opened for minor device 0

c000 Mon Jul 8 16:01:49 2013: ctdrv: do_init_params_cfg():409 init_params: 1481 3 2

c000 Mon Jul 8 16:01:49 2013: ctdrv: ctdrv_open():59 ctdrv opened for minor device 1

c000 Mon Jul 8 16:01:49 2013: ifd_info: opening intfd

c000 Mon Jul 8 16:02:19 2013: ctdrv: do_tp_cfg():454 tp: 2 0

c000 Mon Jul 8 16:02:19 2013: ctdrv: do_kp_cfg():467 kp: 2 0 2 16 1 32

c000 Mon Jul 8 16:02:21 2013: ctdrv: do_dtls_cfg():421 dtlscfg: 0x9dc01d0a 23260

c000 Mon Jul 8 16:02:21 2013: ctdrv: do_tun_cfg():397 tuncfg: 2 1 1 0xffbad60a 62489

c000 Mon Jul 8 16:02:21 2013: ifd_info: process VM_CREATE ioctl for tunnel id 1, uuid CF53C341-1E2D-7A87-DA17-052DDBAC4385

c000 Mon Jul 8 16:02:21 2013: ifd_info: created new vmdb for tunnel id 1,

c000 Mon Jul 8 16:02:21 2013: ifd_info: uuid CF53C341-1E2D-7A87-DA17-052DDBAC4385

c000 Mon Jul 8 16:02:21 2013: ifd_info: enable rx for tunnel id 1, vmdb index 0

c000 Mon Jul 8 16:02:21 2013: ifd_info: process VETH_CREATE ioctl tunnel id 1, intf id 0, ifname eth0, mac 00:0E:08:00:00:07, uuid CF53C341-1E2D-7A87-DA17-052DDBAC4385

c000 Mon Jul 8 16:02:21 2013: ifd_info: tx disbaled on eth0 (1, 0)

c000 Mon Jul 8 16:02:21 2013: ifd_info: tx enabled on eth0 (1, 0)

c000 Mon Jul 8 16:21:58 2013: ifd_info: closing intfd

c000 Mon Jul 8 16:22:04 2013: ctdrv: ctdrv_open():59 ctdrv opened for minor device 0

c000 Mon Jul 8 16:22:04 2013: ctdrv: do_init_params_cfg():409 init_params: 4457 3 2

c000 Mon Jul 8 16:22:04 2013: ctdrv: ctdrv_open():59 ctdrv opened for minor device 1

c000 Mon Jul 8 16:22:04 2013: ifd_info: opening intfd

c000 Mon Jul 8 16:22:05 2013: ctdrv: do_tunnel_restart():619 restart_params: op [0] restart[1] tid[1]

c000 Mon Jul 8 16:22:05 2013: ctdrv: do_kp_cfg():467 kp: 2 1 2 16 1 32

c000 Mon Jul 8 16:22:05 2013: ctdrv: do_rks_cfg():433 rks: 2 3

c000 Mon Jul 8 16:22:05 2013: ctdrv: do_tunnel_restart():619 restart_params: op [0] restart[0] tid[1]

c000 Mon Jul 8 16:22:05 2013: ctdrv: do_dtls_cfg():421 dtlscfg: 0x9dc01d0a 20200

c000 Mon Jul 8 16:22:05 2013: ctdrv: do_tun_cfg():397 tuncfg: 2 1 5 0xffbad60a 62489

N1KV-IC-1-ics-1# N1KV-IC-1-ics-1# show intercloud vm ic-vm-02 kernel-log

Related Commands

Command

Description

show intercloud vm log

Displays log records of a VM’s InterCloud Agent.

show intercloud vm log

To display log records of a VM’s InterCloud Agent, use the show intercloud vm log command.

show intercloud vm [vm-name] log

Syntax Description

This command has the following arguments or keywords:

vm-name

Name of the InterCloud VM for which you want to access the log.

Defaults

None

Command Modes

Any command mode

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.1)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the show intercloud vm log command on the InterCloud Switch.

Examples

The following example shows the output to the show intercloud vm log command:

switch# show intercloud vm ic-vm-02 log

Sending command to ic-vm-02 VM...done

Collected data from ic-vm-02 VM is successfully written to /bootflash/log/clp_xoslog_ic-vm-02_2013-07-10-17-21-44

********* The last 40 lines of the file *********

[07/10/13 17:23:39.325 PDT 297 4457] cncl:6: Timer start for TID:0xc603ea, tobj = 0x251faa0

[07/10/13 17:23:39.325 PDT 298 4457] subagent:6: sent 252 bytes

[07/10/13 17:23:39.325 PDT 299 4457] cncl:7: RNSS:{TID-0xc603ea;EID(S-6,D-6);MSZ-12}:remote node send success

[07/10/13 17:23:39.325 PDT 29a 4457] cncl:7: RPMS:{TID-0xc603ea;EID(S-6,D-6);MSZ-12}:sent msg (retval=0)

[07/10/13 17:23:39.325 PDT 29b 4457] subagent:6: sent 243 bytes

[07/10/13 17:23:39.325 PDT 29c 4457] cncl:7: RNSS:{TID-0xc603ea;EID(S-6,D-6);MSZ-3}:remote node send success

[07/10/13 17:23:39.325 PDT 29d 4457] cncl:7: AKMS:{TID-0xc603ea;EID(S-6,D-6);MSZ-3}:sent msg (retval = 0)

[07/10/13 17:23:39.325 PDT 29e 4457] cncl:6: AKSS:{TID-0xc603ea;EID(S-6,D-6);MSZ-28}:ack send success

[07/10/13 17:23:39.340 PDT 29f 4457] subagent:6: read 243 bytes by fd 0x15

[07/10/13 17:23:39.340 PDT 2a0 4457] subagent:6: received 243 bytes

[07/10/13 17:23:39.340 PDT 2a1 4457] cncl:6: AKMR:{TID-0xa603ee;EID(S-6,D-6);MSZ-3}:ack msg recvd

[07/10/13 17:23:39.340 PDT 2a2 4457] cncl:6: timer object removed for tid 0xa603ee

[07/10/13 17:23:39.381 PDT 2a3 4457] subagent:6: read 243 bytes by fd 0x15

[07/10/13 17:23:39.381 PDT 2a4 4457] subagent:6: received 243 bytes

[07/10/13 17:23:39.381 PDT 2a5 4457] cncl:6: AKMR:{TID-0xa603ef;EID(S-6,D-6);MSZ-3}:ack msg recvd

[07/10/13 17:23:39.381 PDT 2a6 4457] cncl:6: timer object removed for tid 0xa603ef

[07/10/13 17:23:39.381 PDT 2a7 4457] subagent:6: read 243 bytes by fd 0x15

[07/10/13 17:23:39.381 PDT 2a8 4457] subagent:6: received 243 bytes

[07/10/13 17:23:39.381 PDT 2a9 4457] cncl:6: AKMR:{TID-0xa603f0;EID(S-6,D-6);MSZ-3}:ack msg recvd

[07/10/13 17:23:39.381 PDT 2aa 4457] cncl:6: timer object removed for tid 0xa603f0

[07/10/13 17:23:39.381 PDT 2ab 4457] subagent:6: read 243 bytes by fd 0x15

[07/10/13 17:23:39.381 PDT 2ac 4457] subagent:6: received 243 bytes

[07/10/13 17:23:39.381 PDT 2ad 4457] cncl:6: AKMR:{TID-0xc603ea;EID(S-6,D-6);MSZ-3}:ack msg recvd

[07/10/13 17:23:39.381 PDT 2ae 4457] cncl:6: timer object removed for tid 0xc603ea

[07/10/13 17:27:38.663 PDT 2af 4457] subagent:6: read 268 bytes by fd 0x15

[07/10/13 17:27:38.663 PDT 2b0 4457] subagent:6: received 268 bytes

[07/10/13 17:27:38.663 PDT 2b1 4457] cncl:6: MR:{TID-0xc603eb;EID(S-6,D-6);MSZ-28}:msg recvd

[07/10/13 17:27:38.663 PDT 2b2 4457] clp:7: clp_lib_cncl_recv_handler: cncl message received. source EID: 6 opcode 0

[07/10/13 17:27:38.663 PDT 2b3 4457] clp:6: received cnc command message. len: 28

[07/10/13 17:27:38.663 PDT 2b4 4457] clp:7: received send log command. series_id: 4

Related Commands

Command

Description

show intercloud vm kernel-log

Displays the Cisco secure tunnel driver logs for an InterCloud VM.

show intercloud vm logging-status

To verify the InterCloud VM logging status, use the show intercloud vm logging-status command.

show intercloud vm [vm-name] logging-status

Syntax Description

This command has the following arguments or keywords:

vm-name

Name of the InterCloud VM for which you want to access logging status.

Defaults

None

Command Modes

Any command mode

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.1)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the show intercloud vm logging-status command on the InterCloud Switch.

Examples

The following example shows the output to the show intercloud vm logging-status command:

switch# show intercloud vm ic-vm-02 logging-status

Sending command to ic-vm-02 VM...done

======== ic-vm-02 Logging Status ========

clp debug

cncm debug

cncl debug

subagent debug

stm debug

intfmgr debug

hamgr debug

driver debug

Related Commands

Command

Description

show intercloud vm kernel-log

Displays Cisco secure tunnel driver logs for a VM in the cloud.

show intercloud vm log

Displays log records of a VM’s InterCloud Agent.

show intercloud vm-names

To display information about names of the VM names on the cloud, use the show intercloud vm-names command.

show intercloud vm-names

Syntax Description

This command has no arguments or keywords.

Defaults

None

Command Modes

Any command mode

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.1)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the show intercloud vm-names command on the InterCloud Switch.

Examples

The following is an example of the output to the show intercloud vm-names command:

switch# show intercloud vm-names

ic-vm-02 10.29.192.157 B25EEEB1-F210-5691-FAA8-4D7CA8955386

ic-vm-01 10.28.7.159 8F5F7FB0-954E-95FA-79F1-4836DBBF8BB7

Related Commands

Command

Description

show intercloud VM statistics

Displays information about secure tunnel configuration of the Cisco Nexus 1000V InterCloud .

show intercloud tunnel statistics

Displays the secure tunnel statistics of the Cisco Nexus 1000V InterCloud.

show intercloud vm-stats

To display the statistics for the VMs on the cloud, use the show intercloud vm-stats command.

show intercloud vm-stats [vm-name]

Syntax Description

This command has the following arguments or keywords:

vm-name

Name of the InterCloud VM for which you want to obtain the statistics.

Defaults

None

Command Modes

Any command mode

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.1)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the show intercloud vm-stats command on the InterCloud Switch.

Examples

The following example shows the output to the show intercloud vm-stats command:

switch# show intercloud vm-stats CVM-BB

This might take a while...Pl Wait

======== VM Statistics ========

---------------------------------------------------

Uptime: 8 days 0 hours 13 mins

Total Memory: 1671 MB

Free Memory: 881 MB

Number of Processes: 107

load 1min: 0.00 5min: 0.00 15min: 0.00

Number of cpus: 1

cpu0 0 %sy 0 %us 0 %wa 0 %total

======== Process Information ========

---------------------------------------------------

Pid Process %CPU

22375 top 0

Related Commands

Command

Description

show intercloud vm-names

Displays information about the names of the VMs in the cloud on the Cisco Nexus 1000V InterCloud .

show intercloud vm system-info

To display the system info for an InterCloud VM, use the show intercloud vm system-info command.

show intercloud vm [vm-name] system-info

Syntax Description

This command has the following arguments or keywords:

vm-name

Name of the InterCloud VM for which you want to access the system-info.

Defaults

None

Command Modes

Any command mode

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.1)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the show intercloud vm system-info command on the InterCloud Switch.

Examples

The following example shows that the output to the show intercloud vm system-info command is stored on the bootflash, from where you can obtain the system information for the InterCloud VM.

switch# show intercloud vm RH60-64b-VMXNET system-info

Sending command to RH60-64b-VMXNET VM...done

Collected data from RH60-64b-VMXNET VM is successfully written to /bootflash/log/clp_sysinfo_RH60-64b-VMXNET_2013-07-22-16-24-27

********* The content of the received file***************

Related Commands

Command

Description

show intercloud vm log

Displays log records of a VM’s InterCloud Agent.

show intercloud vm kernel-log

Displays Cisco secure tunnel driver logs for a VM in the cloud.

show module service-module

To display information about the service modules for the Cisco Nexus 1000V InterCloud, use the show module service-module command.

show module service-module

Syntax Description

This command has no arguments or keywords.

Defaults

None

Command Modes

Any command mode

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.1)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the show module service-module command on the Cisco Nexus 1000V InterCloud VSM.

Examples

The following example shows the output to the show module service-module command:

switch(config)# show module service-module

Mod Cluster-id Role HA Mode Status

--- ---------- --------- ---------- -------

3 2 Secondary HA Standby

4 2 Primary HA Active

5 2 Primary HA Active

6 0 Standalone Standalone No Peer

Related Commands

Command

Description

show processes

Displays the state and start count of all processes on the Cisco Nexus 1000V InterCloud modules.

show module service intercloud

To display information about the Cisco Nexus 1000V InterCloud service modules, use the show module service intercloud command.

show module service intercloud

Syntax Description

This command has no arguments or keywords.

Defaults

None

Command Modes

Any command mode

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.1)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the show module service intercloud command on the Cisco Nexus 1000V InterCloud VSM.

Examples

The following example shows the output to the show module service intercloud command:

switch# show module service intercloud

Mod Type Name Peer Tunnel IP

--- ----------------- ----------------------- --- ------- ---------------

3 IC Extender ic-11-1-icx-1 5 Up 10.2.0.84

4 IC Extender ic-11-1-icx-2 6 Up 10.2.0.85

5 IC Switch ic-11-1-ics-1 3 Up 192.168.231.3

6 IC Switch ic-11-1-ics-2 4 Up 192.168.231.4

Related Commands:

Command

Description

show module service intercloud detail

Lists details of the InterCloud modules.

show module service intercloud module-id

Displays details of a given InterCloud module.

show module service intercloud detail

To show details of the Cisco Nexus 1000V InterCloud module services, use the show module service intercloud detail command.

show module service intercloud detail

Syntax Description

This command has no arguments or keywords.

Defaults

None

Command Modes

Any command mode

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.1)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the show module service intercloud detail command on the Cisco Nexus 1000V InterCloud VSM.

Examples

The following example shows the output to the show module service intercloud detail command:

switch# show module service intercloud detail

Mod UUID IP Tunnel VM Name

--- ----------------------------------- --------------- ------ ----------

3 795FC3E1-850C-920A-1FBE-9CADDCBDB0B8 10.2.0.84 Up ic-11-1-ic

5 735795B5-A3F1-28AE-EAA5-71F5EBE62EAE 192.168.231.3 Up ic-11-1-ic

-- a556d074-7bc3-221b-1e3a-29b226ed4c92 --------------- Up ic-11-1-vm

-- 5359cf2e-990d-3079-144f-91af7fa67a94 --------------- Up ic-11-1-vm

4 CB52A8D5-80B3-9D79-44B7-8495374E2AB4 10.2.0.85 Up ic-11-1-ic

6 015E91A6-3FDB-D70E-5304-562E17D9A481 192.168.231.4 Up ic-11-1-ic

Related Commands

Command

Description

show module service intercloud

Displays information about the Cisco Nexus 1000V InterCloud service modules.

show module service intercloud module-id

Displays details of a given InterCloud module.

show module service intercloud module-id

To display information about a particular module ID on the Cisco Nexus 1000V InterCloud , use the show module service intercloud module-id command.

show module service intercloud module-id [module-id]

Syntax Description

This command has the following arguments or keywords:

module-id

The InterCloud service module ID for which you want to obtain the information.

Defaults

None

Command Modes

Any command mode

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.1)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the show module service intercloud module-id command on the Cisco Nexus 1000V InterCloud VSM.

Examples

The following example shows the output to the show module service intercloud module-id command:

switch# show module service intercloud module-id 3

IC Extender

------------------------------------------------------------------------------

Module ID : 3

CG Name : ic-11-1-icx-1

CG UUID : 795FC3E1-850C-920A-1FBE-9CADDCBDB0B8

CNE Name : hcloud-root/vpc-vpc-1/icl-ic-11-1/icx-icx/ic-11-1-icx-1

IP Address : 10.2.0.84

Remote Module ID : 5

CG Name : ic-11-1-ics-1

CG UUID : 735795B5-A3F1-28AE-EAA5-71F5EBE62EAE

CNE Name : hcloud-root/vpc-vpc-1/icl-ic-11-1/ics-ics/ic-11-1-ics-1

IP Address : 192.168.231.3

Tunnel State : Up

Tunnel Type : Site to site

------------------------------------------------------------------------------

Related Commands:

Command

Description

show module service intercloud

Displays information about the Cisco Nexus 1000V InterCloud service modules.

show module service intercloud detail

Displays details of the Cisco Nexus 1000V InterCloud module services.

show module service intercloud module-id statistics

To display statistics for a module ID on the Cisco Nexus 1000V InterCloud , use the show module service intercloud module-id statistics command.

show module service intercloud module-id [module-id] statistics

Syntax Description

This command has the following arguments or keywords:

module-id

The InterCloud service module ID for which you want to view the information.

Defaults

None

Command Modes

Any command mode

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.1)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the show module service intercloud module-id statistics command on the Cisco Nexus 1000V InterCloud VSM.

Examples

The following example shows the output to the show module service intercloud module-id statistics command:

switch# show module service intercloud module-id 3 statistics

IC Extender

------------------------------------------------------------------------------

Module ID : 3

CG Name : ic-11-1-icx-1

CG UUID : 795FC3E1-850C-920A-1FBE-9CADDCBDB0B8

CNE Name : hcloud-root/vpc-vpc-1/icl-ic-11-1/icx-icx/ic-11-1-icx-1

IP Address : 10.2.0.84

Remote Module ID : 5

CG Name : ic-11-1-ics-1

CG UUID : 735795B5-A3F1-28AE-EAA5-71F5EBE62EAE

CNE Name : hcloud-root/vpc-vpc-1/icl-ic-11-1/ics-ics/ic-11-1-ics-1

IP Address : 192.168.231.3

Tunnel State : Up

Tunnel Statistics

------------------------

Tunnel Type : Site to site

Rx Heartbeats 69891 Tx Heartbeats 70068

Rx Heartbeat Seq. No. 4359 Tx Heartbeat Seq. No. 4531

Rx Packets 78498 Tx Packets 145144

Rx Drops 0 Tx Drops 0

------------------------------------------------------------------------------

Related Commandss:

Command

Description

show module service intercloud

Displays information about the Cisco Nexus 1000V InterCloud service modules.

show module service intercloud detail

Displays details of the Cisco Nexus 1000V InterCloud module services.

show module service intercloud module-id vm

To display information about a VM with a given module ID on the Cisco Nexus 1000V InterCloud , use the show module service intercloud module-id vm command.

show module service intercloud module-id [module-id] vm [vm-uuid]

Syntax Description

This command has the following arguments or keywords:

vm-uuid

The InterCloud VM ID for which you want to obtain information

module-id

The InterCloud service module ID for which you want to obtain information.

Defaults

None

Command Modes

Any command mode

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.1)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the show module service intercloud module-id vm command on the Cisco Nexus 1000V InterCloud VSM.

Examples

The following example shows the output to the show module service intercloud module-id vm command:

cVSM-360# show module service intercloud module-id 4 vm B05AFA5C-C580-25F3-96BC-A008722568BB

B05AFA5C-C580-25F3-96BC-A008722568BB

------------------------------------------------------------------------------

Module ID : 4

CG Name : b360-CNE1-ics-1

CG UUID : 5B5A0B96-5A1E-6AF5-CA11-C0619FAA61B0

CNE Name : hcloud-root/vpc-VPC-east/icl-b360-CNE1/ics-ics/b360-CNE1-ics-1

IP Address : 10.2.68.85

CSW tunnel statistics

-------------------------

Tunnel State : Up

UUID : B05AFA5C-C580-25F3-96BC-A008722568BB

Tunnel Type : Access

Rx Heartbeats 846483 Tx Heartbeats 844506

Rx Heartbeat Seq. No. 60051 Tx Heartbeat Seq. No. 58073

Rx Packets 90745 Tx Packets 145554688

Rx Drops 0 Tx Drops 0

------------------------------------------------------------------------------

Related Commands:

Command

Description

show module service intercloud

Displays information about the Cisco Nexus 1000V InterCloud service modules.

show module service intercloud detail

Displays details of the Cisco Nexus 1000V InterCloud module services.

show nsc-pa status

To verify the registration status of the Cisco Nexus 1000V InterCloud VSM with Cisco Prime Network Services Controller, use the show nsc-pa status command.

show nsc-pa status

Syntax Description

This command has no arguments or keywords.

Defaults

None

Command Modes

Any command mode

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.1)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the show nsc-pa status command on the Cisco Nexus 1000V InterCloud VSM.

Examples

The following example shows the output to the show nsc-pa status command:

switch# show nsc-pa status

NSC Policy-Agent status is - Installed Successfully. Version 3.0(0.33)-vsmc

Related Commands

Command

Description

nsc-policy-agent

Registers a Cisco Nexus 1000V InterCloud VSM with the Cisco Prime Network Services Controller.

show nsc-pa tech-support

Collects policy (PA) logs, creates a tar.gz file, and places in the bootflash directory for troubleshooting purposes.

show nsc-pa tech-support

To collect the policy agent (PA) tech-support logs, use the show nsc-pa tech-support command. This command collects the logs and creates a tar.gz file and places it in the bootflash directory.

show nsc-pa tech-support

Syntax Description

This command has no arguments or keywords.

Defaults

None

Command Modes

Any command mode

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.2)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the show nsc-pa tech-support command on the InterCloud Extender and InterCloud Switch.

Examples

The following example shows the output to the show nsc-pa tech-support command:

switch# show nsc-pa tech-support

The tech-support is at /bootflash/20130911063400-NF-ACL-UT-43-icx-1-techsupport.tgz

Related Commands

Command

Description

nsc-policy-agent

Registers a Cisco Nexus 1000V InterCloud VSM with the Cisco Prime Network Services Controller.

show nsc-pa status

Verifies the registration status of the Cisco Nexus 1000V InterCloud VSM with Cisco Prime Network Services Controller.

show processes

To display the state and start count of all processes on the Cisco Nexus 1000V InterCloud modules, use the show processes command.

show processes {cpu | log | memory | vdc }

Syntax Description

This command has the following arguments or keywords:

cpu

Displays CPU information for the processes.

log

Shows process logs information.

memory

Shows memory information for the processes.

vdc

Shows processes in VDC.

Defaults

None

Command Modes

Any command mode

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.1)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the show processes command on the InterCloud Switch.

Examples

The following example shows the output to the show processes command:

switch# show processes

PID State PC Start_cnt TTY Process

----- ----- -------- ----------- ---- -------------

1 S 41520eb8 1 - init

2 S 0 1 - kthreadd

3 S 0 1 - migration/0

4 S 0 1 - ksoftirqd/0

5 S 0 1 - watchdog/0

6 S 0 1 - migration/1

7 S 0 1 - ksoftirqd/1

8 S 0 1 - watchdog/1

9 S 0 1 - events/0

10 S 0 1 - events/1

11 S 0 1 - khelper

12 S 0 1 - xenwatch

13 S 0 1 - xenbus

14 S 0 1 - kblockd/0

15 S 0 1 - kblockd/1

16 S 0 1 - kseriod

17 S 0 1 - ata/0

18 S 0 1 - ata/1

19 S 0 1 - ata_aux

20 S 0 1 - ksuspend_usbd

21 S 0 1 - khubd

22 S 0 1 - pdflush

23 S 0 1 - pdflush

24 S 0 1 - kswapd0

25 S 0 1 - aio/0

26 S 0 1 - aio/1

27 S 0 1 - nfsiod

28 S 0 1 - khvcd

29 S 0 1 - rpciod/0

30 S 0 1 - rpciod/1

31 S 0 1 - kirqd

32 S 0 1 - kjournald

332 S 414f265e 1 - ovsdb-server

333 S 4151e5b6 1 - ovsdb-server

335 S 414f265e 1 - ovs-vswitchd

336 S 4151e5b6 1 - ovs-vswitchd

363 S 0 1 - ktrace_control_

364 S 0 1 - ktrace_control_

365 S 0 1 - kctdrv_thr_0

366 S 0 1 - kctdrv_thr_1

455 S b7fb1eb8 1 - dhclient

1169 S 4151e5b6 1 - portmap

1178 S 41520eb8 1 - rpc.statd

1193 S 0 1 - lockd

1194 S 0 1 - nfsd

1195 S 0 1 - nfsd

1196 S 0 1 - nfsd

1197 S 0 1 - nfsd

1198 S 0 1 - nfsd

1199 S 0 1 - nfsd

1200 S 0 1 - nfsd

1201 S 0 1 - nfsd

1206 S 41520eb8 1 - rpc.mountd

1229 S 41520eb8 1 - sysmgr

1766 S 0 1 - mping-thread

1767 S 0 1 - mping-thread

1796 S 0 1 - stun_kthread

1797 S 0 1 - stun_arp_mts_kt

1798 S 0 1 - stun_packets_re

1799 S 0 1 - stun_send_packe

1854 S 0 1 - redun_kthread

1855 S 0 1 - redun_timer_kth

2163 S 0 1 - sf_rdn_kthread

2164 S 41520eb8 1 - xinetd

2165 S 41520eb8 1 - tftpd

2166 S 4151e5ed 1 - syslogd

2167 S 41520eb8 1 - sdwrapd

2168 S 41520eb8 1 - platform

2177 S 0 1 - ls-notify-mts-t

Related Commands

Command

Description

show system internal event-log all

To display event log information for all modules on the Cisco Nexus 1000V InterCloud Switch, use the show system internal event-log all command.

show system internal event-log all

Syntax Description

This command has no arguments or keywords.

Defaults

None

Command Modes

Any command mode

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.1)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the show system internal event-log all command on the InterCloud Switch or the InterCloud Extender.

Examples

The following example shows the output to the show system internal event-log all command:

switch# show system internal event-log all

`show system internal event-log vns-agent`

1) Event:E_MTS_RX, length:60, at 650000 usecs after Mon Jul 29 20:56:53 2013

[REQ] Opc:MTS_OPC_SDWRAP_DEBUG_DUMP(1530), Id:0X0222ADDA, Ret:SUCCESS

Src:0x00000101/19339, Dst:0x00000101/753, Flags:None

HA_SEQNO:0X00000000, RRtoken:0x0222ADDA, Sync:UNKNOWN, Payloadsize:216

Payload:

0x0000: 01 00 2f 74 6d 70 2f 64 62 67 64 75 6d 70 33 32

2) Event:E_MTS_RX, length:60, at 280000 usecs after Mon Jul 29 20:56:02 2013

[REQ] Opc:MTS_OPC_SDWRAP_DEBUG_DUMP(1530), Id:0X02229849, Ret:SUCCESS

Src:0x00000101/19331, Dst:0x00000101/753, Flags:None

HA_SEQNO:0X00000000, RRtoken:0x02229849, Sync:UNKNOWN, Payloadsize:216

Payload:

0x0000: 01 00 2f 74 6d 70 2f 64 62 67 64 75 6d 70 33 31

7/29/2013 20:39:25:810000 INFO LIC: vns_agent_lic_lc_online:541 Not LC mod=5, do

ne.

4) Event:E_MTS_RX, length:60, at 810000 usecs after Mon Jul 29 20:39:25 2013

[NOT] Opc:MTS_OPC_LC_ONLINE(1084), Id:0X0221207A, Ret:SUCCESS

Src:0x00000101/744, Dst:0x00000101/0, Flags:None

HA_SEQNO:0X00000000, RRtoken:0x00000000, Sync:UNKNOWN, Payloadsize:212

Payload:

0x0000: 05 0c 00 06 00 00 00 00 00 00 06 02 06 02 00 00

7/29/2013 20:39:2:600000 INFO LIC: vns_agent_lic_lc_offline:582 Not LC mod=5, done.

6) Event:E_MTS_RX, length:60, at 600000 usecs after Mon Jul 29 20:39:02 2013

[NOT] Opc:MTS_OPC_LC_OFFLINE(1051), Id:0X0221181A, Ret:SUCCESS

Src:0x00000101/744, Dst:0x00000101/0, Flags:None

HA_SEQNO:0X00000000, RRtoken:0x00000000, Sync:UNKNOWN, Payloadsize:30

Payload:

0x0000: 05 0c 00 06 06 02 00 00 06 02 00 00 00 00 00 00

7) Event:E_MTS_RX, length:60, at 920000 usecs after Mon Jul 29 20:09:19 2013

[REQ] Opc:MTS_OPC_SDWRAP_DEBUG_DUMP(1530), Id:0X021E7835, Ret:SUCCESS

Src:0x00000101/19170, Dst:0x00000101/753, Flags:None

HA_SEQNO:0X00000000, RRtoken:0x021E7835, Sync:UNKNOWN, Payloadsize:216

Payload:

0x0000: 01 00 2f 74 6d 70 2f 64 62 67 64 75 6d 70 32 33

Related Commands:

Command

Description

show system internal event-log cmd-agent

Displays CGA module event log information.

show system internal event-log ctrl-channel-mgr

Displays cloud node communicator event log information.

show system internal event-log interface-mgr

Displays interface-mgr event log information.

show system internal event-log cmd-agent

To display CGA module event-log information for the Cisco Nexus 1000V InterCloud Switch, use the show system internal event-log cmd-agent command.

show system internal event-log cmd-agent

Syntax Description

This command has no arguments or keywords.

Defaults

None

Command Modes

Any command mode

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.1)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the show system internal event-log cmd-agent command on the InterCloud Switch or the InterCloud Extender.

Examples

The following example shows the output to the show system internal event-log cmd-agent command:

switch# show system internal event-log cmd-agent

1) Event:E_MTS_RX, length:60, at 181259 usecs after Mon Jul 29 14:44:16 2013

[REQ] Opc:MTS_OPC_SDWRAP_DEBUG_DUMP(1530), Id:0X00032A85, Ret:SUCCESS

Src:0x00000101/28013, Dst:0x00000101/1236, Flags:None

HA_SEQNO:0X00000000, RRtoken:0x00032A85, Sync:UNKNOWN, Payloadsize:216

Payload:

0x0000: 01 00 2f 74 6d 70 2f 64 62 67 64 75 6d 70 32 38

Mon Jul 29 14:21:02 2013 461259 usec Sent MTS_OPC_STM_TUNNEL_EVENT[52] to CSA

Mon Jul 29 14:21:02 2013 461259 usec Header [mts_opcode=0x3bc05, nodeid=0, size=

52]

Mon Jul 29 14:21:02 2013 461259 usec Send message to DPA [size=52]

5) Event:E_MTS_RX, length:60, at 461259 usecs after Mon Jul 29 14:21:02 2013

[NOT] Opc:MTS_OPC_STM_TUNNEL_EVENT(244741), Id:0X00032588, Ret:SUCCESS

Src:0x00000101/1234, Dst:0x00000101/0, Flags:None

HA_SEQNO:0X00000000, RRtoken:0x00000000, Sync:UNKNOWN, Payloadsize:32

Payload:

0x0000: 10 10 10 10 00 00 00 00 00 00 00 00 00 00 00 00

Related Commands:

Command

Description

show system internal event-log all

Displays event-log information for all modules.

show system internal event-log ctrl-channel-mgr

Displays cloud node communicator event-log information.

show system internal event-log interface-mgr

Displays interface-mgr event-log information.

show system internal event-log ctrl-channel-mgr

To display cloud node communicator event-log information for the Cisco Nexus 1000V InterCloud Switch, use the show system internal event-log ctrl-channel-mgr command.

show system internal event-log ctrl-channel-mgr

Syntax Description

This command has no arguments or keywords.

Defaults

None

Command Modes

Any command mode

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.1)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the show system internal event-log ctrl-channel-mgr command on the InterCloud Switch or the InterCloud Extender.

Examples

The following example shows the output to the show system internal event-log ctrl-channel-mgr command:

switch# show system internal event-log ctrl-channel-mgr

Mon Jul 29 14:46:23 2013 651259 usec Connect(1) to 10.196.62.175 on port 6644 failed with err:Connection timed out

Mon Jul 29 14:46:23 2013 641259 usec Connect(1) to 10.144.5.162 on port 6644 failed with err:Connection timed out

Mon Jul 29 14:46:23 2013 641259 usec Connect(1) to 10.39.103.238 on port 6644 failed with err:Connection timed out

Mon Jul 29 14:46:18 2013 631259 usec trying to connect to server 10.164.12.250:6644 (04040404-0000-0000-0000-000000000000:csr04:3)...

Mon Jul 29 14:46:18 2013 631259 usec trying to connect to server 10.144.78.75:6644 (06060606-0000-0000-0000-000000000000:csr06:3)...

Mon Jul 29 14:46:18 2013 631259 usec trying to connect to server 10.164.86.90:6644 (05050505-0000-0000-0000-000000000000:csr05:3)...

Mon Jul 29 14:45:46 2013 641259 usec Connect(1) to 10.144.78.75 on port 6644 failed with err:Connection timed out

Mon Jul 29 14:45:46 2013 641259 usec Connect(1) to 10.164.12.250 on port 6644 failed with err:Connection timed out

Mon Jul 29 14:45:46 2013 641259 usec Connect(1) to 10.164.86.90 on port 6644 failed with err:Connection timed out

Mon Jul 29 14:45:41 2013 631259 usec trying to connect to server 10.147.194.27:6644 (02020202-0000-0000-0000-000000000000:csr02:3)...

Mon Jul 29 14:45:41 2013 631259 usec trying to connect to server 10.196.62.175:6644 (08080808-0000-0000-0000-000000000000:csr08:3)...

Mon Jul 29 14:45:41 2013 631259 usec trying to connect to server 10.154.141.230:6644 (03030303-0000-0000-0000-000000000000:csr03:3)...

Related Commands:

Command

Description

show system internal event-log interface-mgr

Displays interface-mgr event-log information.

show system internal event-log all

Displays event-log information for all modules.

show system internal event-log cmd-agent

Displays CGA module event-log information.

show system internal event-log interface-mgr

To display interface manager event-log information for the Cisco Nexus 1000V InterCloud Switch, use the show system internal event-log interface-mgr command.

show system internal event-log interface-mgr

Syntax Description

This command has no arguments or keywords.

Defaults

None

Command Modes

Any command mode

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.1)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the show system internal event-log interface-mgr command on the InterCloud Switch or the InterCloud Extender.

Examples

The following example shows the output to the show system internal event-log interface-mgr command:

switch# show system internal event-log interface-mgr

Mon Jul 29 14:21:02 2013 631259 usec receive success

Mon Jul 29 14:21:02 2013 631259 usec AKSS:{TID-0xa503ef;EID(S-5,D-5);UUID(S-10101010-0000-0000-0000-000000000000,D-7D5E4DBB-8A3F-39A4-7799-9A7A58EB50A9);MSZ-143}:ack send success

Mon Jul 29 14:21:02 2013 631259 usec AKMS:{TID-0xa503ef;EID(S-5,D-5);UUID(S-7D5E4DBB-8A3F-39A4-7799-9A7A58EB50A9,D-10101010-0000-0000-0000-000000000000);MSZ-3}:sent msg (retval = 0)

Mon Jul 29 14:21:02 2013 631259 usec mts msg sent to SAP 1247 successfully

7/29/2013 14:21:2:631259 Debug: INTFMGR_MSG_PORT_STATUS, index: 1, instance-id: 1, status: 1

7/29/2013 14:21:2:631259 Debug: INTFMGR_MSG_PORT_STATUS, index: 0, instance-id: 0, status: 1

7/29/2013 14:21:2:631259 Info : received INTFMGR_MSG_PORT_STATUS msg, from: 10101010-0000-0000-0000-000000000000 cmd: 8, vm_type: 3, num_ports: 2

7/29/2013 14:21:2:631259 Info : processing [InterCloud-Switch] specific action for INTFMGR_MSG_PORT_STATUS

7/29/2013 14:21:2:631259 Debug: uuid 10101010-0000-0000-0000-000000000000 found in csw-list at index 9

7/29/2013 14:21:2:631259 Info : === processing INTFMGR_MSG_PORT_STATUS start ===

Mon Jul 29 14:21:02 2013 631259 usec MR:{TID-0xa503ef;EID(S-5,D-5);UUID(S-10101010-0000-0000-0000-000000000000,D-7D5E4DBB-8A3F-39A4-7799-9A7A58EB50A9);MSZ-143}:msg recvd

7/29/2013 14:21:2:581259 Info : Add virtual port cmd: /opt/ovs/bin/ovs-vsctl -t 2 -v --log-file -- --may-exist add-port n1kvdvs veth2-1 -- set Interface veth2-1 external_ids:iface-id="31313131-3200

-0000-0000-000000000000" -- set Interface veth2-1 external_ids:port-profile="PP_VETH1" -- set Interface veth2-1 external_ids:port-type="virtual" -- set Interface veth2-1 external_ids:vm-uuid="10101

010-0000-0000-0000-000000000000" -- set Interface veth2-1 external_ids:attached-mac="00:A0:22:44:44:22" -- set Interface veth2-1 external_ids:vm-name="csr10"

7/29/2013 14:21:2:531259 Info : running command "/sbin/ifconfig veth2-1 up "

7/29/2013 14:21:2:531259 Debug: add veth name ---, MAC 02:02:17:00:02:01 intf-id 1

7/29/2013 14:21:2:531259 Debug: db_uuid 10101010-0000-0000-0000-000000000000 tunnel_id=2 MAC 00:A0:22:44:44:22

7/29/2013 14:21:2:531259 Debug: veth_add peer uuid 10101010-0000-0000-0000-000000000000

7/29/2013 14:21:2:531259 Debug: adding port [2/2] for tunnel-id 2

7/29/2013 14:21:2:491259 Info : Add virtual port cmd: /opt/ovs/bin/ovs-vsctl -t 2 -v --log-file -- --may-exist add-port n1kvdvs veth2-0 -- set Interface veth2-0 external_ids:iface-id="31313131-3100

-0000-0000-000000000000" -- set Interface veth2-0 external_ids:port-profile="PP_VETH1" -- set Interface veth2-0 external_ids:port-type="virtual" -- set Interface veth2-0 external_ids:vm-uuid="10101

010-0000-0000-0000-000000000000" -- set Interface veth2-0 external_ids:attached-mac="00:A0:F8:44:44:11" -- set Interface veth2-0 external_ids:vm-name="csr10"

Related Commands:

Command

Description

show system internal event-log all

Displays event-log information for all modules.

show system internal event-log cmd-agent

Displays CGA module event-log information.

show system internal event-log ctrl-channel-mgr

Displays cloud node communicator event-log information.

show system internal event-log ktracem

To display secure ktrace module event-log information for the Cisco Nexus 1000V InterCloud Switch, use the show system internal event-log ktracem command.

show system internal event-log ktracem

Syntax Description

This command has no arguments or keywords.

Defaults

None

Command Modes

Any command mode

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.1)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the show system internal event-log ktracem command on the InterCloud Switch or the InterCloud Extender.

Related Commands:

Command

Description

show system internal event-log all

Displays event-log information for all modules.

show system internal event-log cmd-agent

Displays CGA module event-log information.

show system internal event-log ctrl-channel-mgr

Displays cloud node communicator event-log information.

show system internal event-log log-mgr

To display InterCloud log manager event-log information for the Cisco Nexus 1000V InterCloud Switch, use the show system internal event-log log-mgr command.

show system internal event-log log-mgr

Syntax Description

This command has no arguments or keywords.

Defaults

None

Command Modes

Any command mode

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.1)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the show system internal event-log log-mgr command on the InterCloud Switch or the InterCloud Extender.

Examples

The following example shows the output to the show system internal event-log log-mgr command:

switch # show system internal event-log log-mgr

1) Event:E_MTS_RX, length:60, at 941259 usecs after Mon Jul 29 14:54:01 2013

[REQ] Opc:MTS_OPC_SDWRAP_DEBUG_DUMP(1530), Id:0X00032B56, Ret:SUCCESS

Src:0x00000101/28047, Dst:0x00000101/1254, Flags:None

HA_SEQNO:0X00000000, RRtoken:0x00032B56, Sync:UNKNOWN, Payloadsize:216

Payload:

0x0000: 01 00 2f 74 6d 70 2f 64 62 67 64 75 6d 70 33 31

2) Event:E_MTS_RX, length:60, at 771259 usecs after Mon Jul 29 14:39:48 2013

[REQ] Opc:MTS_OPC_VSH_CMD_TLV(7679), Id:0X000329B6, Ret:SUCCESS

Src:0x00000101/7289, Dst:0x00000101/1254, Flags:None

HA_SEQNO:0X00000000, RRtoken:0x000329B6, Sync:UNKNOWN, Payloadsize:280

Payload:

0x0000: 04 03 02 01 18 01 00 00 00 00 00 00 00 00 00 00

Mon Jul 29 14:39:48 2013 771259 usec receive success

Mon Jul 29 14:39:48 2013 771259 usec timer object removed for tid 0xc60461

Mon Jul 29 14:39:48 2013 771259 usec AKMR:{TID-0xc60461;EID(S-6,D-6);UUID(S-10101010-0000-0000-0000-000000000000,D-7D5E4DBB-8A3F-39A4-7799-9A7A58EB50A9);MSZ-3}:ack msg recvd

Mon Jul 29 14:39:48 2013 771259 usec receive success

Mon Jul 29 14:39:48 2013 771259 usec AKSS:{TID-0xc60461;EID(S-6,D-6);UUID(S-10101010-0000-0000-0000-000000000000,D-7D5E4DBB-8A3F-39A4-7799-9A7A58EB50A9);MSZ-12}:ack send success

Mon Jul 29 14:39:48 2013 771259 usec AKMS:{TID-0xc60461;EID(S-6,D-6);UUID(S-7D5E4DBB-8A3F-39A4-7799-9A7A58EB50A9,D-10101010-0000-0000-0000-000000000000);MSZ-3}:sent msg (retval = 0)

Mon Jul 29 14:39:48 2013 771259 usec mts msg sent to SAP 1247 successfully

Mon Jul 29 14:39:48 2013 771259 usec MR:{TID-0xc60461;EID(S-6,D-6);UUID(S-10101010-0000-0000-0000-000000000000,D-7D5E4DBB-8A3F-39A4-7799-9A7A58EB50A9);MSZ-12}:msg recvd

Related Commands:

Command

Description

show system internal event-log interface-mgr

Displays interface-mgr event-log information.

show system internal event-log all

Displays event-log information for all modules.

show system internal event-log cmd-agent

Displays CGA module event-log information.

show system internal event-log redundancy-mgr

To display HA Manager event-log information for the Cisco Nexus 1000V InterCloud Switch, use the show system internal event-log redundancy-mgr command.

show system internal event-log redundancy-mgr

Syntax Description

This command has the following arguments or keywords:

name

Name of the InterCloud tunnel profile for which you want to obtain information.

Defaults

None

Command Modes

Any command mode

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.1)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the show system internal event-log redundancy-mgr command on the InterCloud Switch or the InterCloud Extender.

Examples

The following example shows the output to the show system internal event-log redundancy-mgr command:

switch# show system internal event-log redundancy-mgr

1) Event:E_MTS_RX, length:60, at 761259 usecs after Mon Jul 29 14:52:26 2013

[REQ] Opc:MTS_OPC_SDWRAP_DEBUG_DUMP(1530), Id:0X00032B35, Ret:SUCCESS

Src:0x00000101/28041, Dst:0x00000101/1240, Flags:None

HA_SEQNO:0X00000000, RRtoken:0x00032B35, Sync:UNKNOWN, Payloadsize:216

Payload:

0x0000: 01 00 2f 74 6d 70 2f 64 62 67 64 75 6d 70 33 30

2) Event:E_MTS_RX, length:60, at 821259 usecs after Mon Jul 29 14:52:05 2013

[REQ] Opc:MTS_OPC_SDWRAP_DEBUG_DUMP(1530), Id:0X00032B2C, Ret:SUCCESS

Src:0x00000101/28039, Dst:0x00000101/1240, Flags:None

HA_SEQNO:0X00000000, RRtoken:0x00032B2C, Sync:UNKNOWN, Payloadsize:216

Payload:

0x0000: 01 00 2f 74 6d 70 2f 64 62 67 64 75 6d 70 33 30

Mon Jul 29 14:21:02 2013 (461259 usec) :: hamgr_tunnel_event(955):Not standalone cgu/cgp and not HA cgu, dropping event

Mon Jul 29 14:21:02 2013 (461259 usec) :: hamgr_tunnel_event(938):Received STM tunnel event

5) Event:E_MTS_RX, length:60, at 461259 usecs after Mon Jul 29 14:21:02 2013

[NOT] Opc:MTS_OPC_STM_TUNNEL_EVENT(244741), Id:0X00032588, Ret:SUCCESS

Src:0x00000101/1234, Dst:0x00000101/0, Flags:None

HA_SEQNO:0X00000000, RRtoken:0x00000000, Sync:UNKNOWN, Payloadsize:32

Payload:

0x0000: 10 10 10 10 00 00 00 00 00 00 00 00 00 00 00 00

Mon Jul 29 14:21:01 2013 (621259 usec) :: hamgr_cncm_conn_event(1105):Not a CGu, dropping cncm connection update

Mon Jul 29 14:21:01 2013 (621259 usec) :: hamgr_cncm_conn_event(1094):Received CNCM Connection Event

8) Event:E_MTS_RX, length:60, at 621259 usecs after Mon Jul 29 14:21:01 2013

[NOT] Opc:MTS_OPC_CNCM_CONNECTION_EVENT(244754), Id:0X00032583, Ret:SUCCESS

Src:0x00000101/1247, Dst:0x00000101/0, Flags:None

HA_SEQNO:0X00000000, RRtoken:0x00000000, Sync:UNKNOWN, Payloadsize:48

Payload:

0x0000: 10 10 10 10 00 00 00 00 00 00 00 00 00 00 00 00

9) Event:E_MTS_RX, length:48, at 801259 usecs after Mon Jul 29 13:41:57 2013

[REQ] Opc:MTS_OPC_SYSMGR_PSS_SHRINK(2558), Id:0X00032262, Ret:SUCCESS

Src:0x00000101/3, Dst:0x00000101/1240, Flags:None

HA_SEQNO:0X00000000, RRtoken:0x00032262, Sync:UNKNOWN, Payloadsize:4

Payload:

0x0000: 00 01 86 a0

Related Commands:

Command

Description

show system internal event-log interface-mgr

Displays interface-mgr event-log information.

show system internal event-log all

Displays event-log information for all modules.

show system internal event-log cmd-agent

Displays CGA module event-log information.

show system internal event-log tunnel-mgr

To display secure tunnel module event-log information for the Cisco Nexus 1000V InterCloud Switch, use the show system internal event-log tunnel-mgr command.

show system internal event-log tunnel-mgr

Syntax Description

This command has no arguments or keywords.

Defaults

None

Command Modes

Any command mode

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.1)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the show system internal event-log tunnel-mgr command on the InterCloud Switch.

Examples

The following example shows the output to the show system internal event-log tunnel-mgr command:

switch# show system internal event-log tunnel-mgr

Mon Jul 29 14:21:02 2013 461259 usec Publishing tunnel up event for tunnel-id [2]

Mon Jul 29 14:21:02 2013 461259 usec Configuring tunnel information in cisco tunnel driver, tunnel-op [1], tunnel_id [2], version [1], profile_id[2], remote_ip[10.164.53.242] remote_port [39163]

Mon Jul 29 14:21:02 2013 461259 usec

Thread b2d16b90: DTLS server accepted connection from 10.164.53.242:39163 uuid 10101010-0000-0000-0000-000000000000

Mon Jul 29 14:21:02 2013 451259 usec psk_server_cb: psk_len = 16 max_psk_len = 32 enc_algo 2 hash_algo 1

Mon Jul 29 14:21:02 2013 451259 usec Received dtls client connection from 10.164.53.242:39163

Mon Jul 29 14:21:01 2013 641259 usec receive success

Mon Jul 29 14:21:01 2013 641259 usec timer object removed for tid 0xc403f1

Mon Jul 29 14:21:01 2013 641259 usec AKMR:{TID-0xc403f1;EID(S-4,D-4);UUID(S-10101010-0000-0000-0000-000000000000,D-7D5E4DBB-8A3F-39A4-7799-9A7A58EB50A9);MSZ-3}:ack msg recvd

Mon Jul 29 14:21:01 2013 631259 usec OWMS:{TID-0xc403f1;EID(S-4,D-4);UUID(S-7D5E4DBB-8A3F-39A4-7799-9A7A58EB50A9,D-10101010-0000-0000-0000-000000000000);MSZ-981}:sent msg (retval=0)

Mon Jul 29 14:21:01 2013 631259 usec mts msg sent to SAP 1247 successfully

Mon Jul 29 14:21:01 2013 631259 usec Timer start for TID:0xc403f1, tobj = 0x891322c

Mon Jul 29 14:21:01 2013 621259 usec sending vm configuration to csw with uuid = 10101010-0000-0000-0000-000000000000 epoch 0

Mon Jul 29 14:21:01 2013 621259 usec received control connection status [1] for vm with uuid = 10101010-0000-0000-0000-000000000000 , local_reason 1, remote_reason 1

Mon Jul 29 14:19:46 2013 601259 usec creating vm with uuid 10101010-0000-0000-0000-000000000000in the stm shared memory

Mon Jul 29 14:19:46 2013 601259 usec stm: unable to find vm with uuid 10101010-0000-0000-0000-000000000000 in the vm_info table

Mon Jul 29 14:19:46 2013 601259 usec Received VM config with name [csr10], uuid 10101010-0000-0000-0000-000000000000, ipaddress=10.164.53.242, opcode [1]

17) Event:E_MTS_RX, length:48, at 801259 usecs after Mon Jul 29 13:41:57 2013

[REQ] Opc:MTS_OPC_SYSMGR_PSS_SHRINK(2558), Id:0X00032236, Ret:SUCCESS

Src:0x00000101/3, Dst:0x00000101/1234, Flags:None

HA_SEQNO:0X00000000, RRtoken:0x00032236, Sync:UNKNOWN, Payloadsize:4

Payload:

0x0000: 00 01 86 a0

Related Commands

Command

Description

show system internal event-log interface-mgr

Displays interface-mgr event-log information.

show system internal event-log all

Displays event-log information for all modules.

show system internal intercloud interface-mgr event-statistics

To display statistics for the InterCloud interface manager events, use the show system internal intercloud interface-mgr event-statistics command.

show system internal intercloud interface-mgr event-statistics

Syntax Description

This command has no arguments or keywords.

Defaults

None

Command Modes

Any command mode

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.1)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the show system internal intercloud interface-mgr event-statistics command on the Cisco Nexus 1000V InterCloud VSM.

Examples

The following example shows the output to the show system internal intercloud interface-mgr event-statistics command:

switch# show system internal intercloud interface-mgr event-statistics

INTFMGR_MSG_OPAQUE_DATA

rx error : 0

rx total : 1

tx error : 0

tx total : 0

INTFMGR_MSG_CGU_INFO

rx error : 0

rx total : 1

tx error : 0

tx total : 0

INTFMGR_MSG_CGP_INFO

rx error : 0

rx total : 1

tx error : 0

tx total : 0

INTFMGR_MSG_CG_HAPEER_INFO

rx error : 0

rx total : 1

tx error : 0

tx total : 0

INTFMGR_MSG_VM_PORTS_INFO

rx error : 0

rx total : 4

tx error : 0

tx total : 0

INTFMGR_MSG_STUN_EVENT

rx error : 0

rx total : 4

tx error : 0

tx total : 0

INTFMGR_MSG_CSW_INFO

rx error : 0

rx total : 3

tx error : 0

tx total : 0

INTFMGR_MSG_VM_PORT_CONFIG

rx error : 0

rx total : 0

tx error : 0

tx total : 0

INTFMGR_MSG_PORT_STATUS

rx error : 0

rx total : 4

tx error : 0

tx total : 0

INTFMGR_MSG_PORT_ERROR

rx error : 0

rx total : 0

tx error : 0

tx total : 0

INTFMGR_MSG_CNCM_CONN_EVENT

rx error : 0

rx total : 5

tx error : 0

tx total : 0

INTFMGR_MSG_PA_SVR_CFG

rx error : 0

rx total : 1

tx error : 0

tx total : 0

INTFMGR_MSG_DEBUG_CMD

rx error : 0

rx total : 0

tx error : 0

tx total : 0

Related Commands

Command

Description

show system internal event-log interface-mgr

Displays interface-mgr event-log information.

show system internal event-log all

Displays event-log information for all modules.

show tunnel-profile

To display information of a specific tunnel profile on the Cisco Nexus 1000V InterCloud Switch, use the show tunnel-profile command.

show tunnel-profile [name]

Syntax Description

This command has the following arguments or keywords:.

name

Name of the InterCloud tunnel profile for which you want to obtain information.

Defaults

None

Command Modes

Any command mode

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.1)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the show tunnel-profile command on the InterCloud Switch.

Examples

The following example shows the output to the show tunnel-profile command:

switch# sh tunnel-profile TP1

Tunnel Profile : TP1

Tunnel Type : Site to Site

Key Profile : KP1

Encryp Algo : AES 128(CBC)

Encryp Key Len : 16

Hash Algo : SHA 1

Hash Key Len : 32

Rekey Period : 300

HB Timeout : 120

HB Interval : 1

Related Commands:

Command

Description

show tunnel-profile all

Lists all the tunnel profiles configured on the InterCloud Switch.

show tunnel-profile all

To list all the tunnel profiles configured on the InterCloud Switch, use the show tunnel-profile all command.

intercloud tunnel-profile all

Syntax Description

This command has no arguments or keywords.

Defaults

None

Command Modes

Any command mode

Supported User Roles

network-admin

network-operator

Command History

Release

Modification

5.2(1)IC1(1.1)

This command was first introduced.

Usage Guidelines

The source of the InterCloud CLI commands can vary depending on the devices you can execute the commands from. You can execute the show tunnel-profile all show tunnel-profile all command on the Cisco Nexus 1000V InterCloud VSM.

Examples

The following example shows the output to the show tunnel-profile all command:

switch# show tunnel-profile all

Tunnel Profile : default

Tunnel Type : Site to Site

Key Profile : default

Encryp Algo : AES 128(CBC)

Encryp Key Len : 16

Hash Algo : SHA 1

Hash Key Len : 32

Rekey Period : 0

HB Timeout : 120

HB Interval : 1

--------------------------------------------------------------------------------

Tunnel Profile : TP2

Tunnel Type : Site to Site

Key Profile : KP2

Encryp Algo : AES 256(CBC)

Encryp Key Len : 32

Hash Algo : SHA 256

Hash Key Len : 32

Rekey Period : 301

HB Timeout : 120

HB Interval : 2

--------------------------------------------------------------------------------

Tunnel Profile : TP1

Tunnel Type : Site to Site

Key Profile : KP1

Encryp Algo : AES 128(CBC)

Encryp Key Len : 16

Hash Algo : SHA 1

Hash Key Len : 32

Rekey Period : 300

HB Timeout : 120

HB Interval : 1

--------------------------------------------------------------------------------

Related Commands:

Command

Description

show tunnel-profile

Displays the tunnel profile for a given tunnel profile name.

Cisco Nexus 1000V InterCloud Command Reference

First Published: October 11, 2013

Last Updated: May 22, 2015

THE SPECIFICATIONS AND INFORMATION REGARDING THE PRODUCTS IN THIS MANUAL ARE SUBJECT TO CHANGE WITHOUT NOTICE. ALL STATEMENTS, INFORMATION, AND RECOMMENDATIONS IN THIS MANUAL ARE BELIEVED TO BE ACCURATE BUT ARE PRESENTED WITHOUT WARRANTY OF ANY KIND, EXPRESS OR IMPLIED. USERS MUST TAKE FULL RESPONSIBILITY FOR THEIR APPLICATION OF ANY PRODUCTS.

THE SOFTWARE LICENSE AND LIMITED WARRANTY FOR THE ACCOMPANYING PRODUCT ARE SET FORTH IN THE INFORMATION PACKET THAT SHIPPED WITH THE PRODUCT AND ARE INCORPORATED HEREIN BY THIS REFERENCE. IF YOU ARE UNABLE TO LOCATE THE SOFTWARE LICENSE OR LIMITED WARRANTY, CONTACT YOUR CISCO REPRESENTATIVE FOR A COPY.

The Cisco implementation of TCP header compression is an adaptation of a program developed by the University of California, Berkeley (UCB) as part of UCB’s public domain version of the UNIX operating system. All rights reserved. Copyright © 1981, Regents of the University of California.

NOTWITHSTANDING ANY OTHER WARRANTY HEREIN, ALL DOCUMENT FILES AND SOFTWARE OF THESE SUPPLIERS ARE PROVIDED “AS IS” WITH ALL FAULTS. CISCO AND THE ABOVE-NAMED SUPPLIERS DISCLAIM ALL WARRANTIES, EXPRESSED OR IMPLIED, INCLUDING, WITHOUT LIMITATION, THOSE OF MERCHANTABILITY, FITNESS FOR A PARTICULAR PURPOSE AND NONINFRINGEMENT OR ARISING FROM A COURSE OF DEALING, USAGE, OR TRADE PRACTICE.

IN NO EVENT SHALL CISCO OR ITS SUPPLIERS BE LIABLE FOR ANY INDIRECT, SPECIAL, CONSEQUENTIAL, OR INCIDENTAL DAMAGES, INCLUDING, WITHOUT LIMITATION, LOST PROFITS OR LOSS OR DAMAGE TO DATA ARISING OUT OF THE USE OR INABILITY TO USE THIS MANUAL, EVEN IF CISCO OR ITS SUPPLIERS HAVE BEEN ADVISED OF THE POSSIBILITY OF SUCH DAMAGES.

Cisco and the Cisco logo are trademarks or registered trademarks of Cisco and/or its affiliates in the U.S. and other countries. To view a list of Cisco trademarks, go to this URL: www.cisco.com/go/trademarks . Third-party trademarks mentioned are the property of their respective owners. The use of the word partner does not imply a partnership relationship between Cisco and any other company. (1110R)

Any Internet Protocol (IP) addresses and phone numbers used in this document are not intended to be actual addresses and phone numbers. Any examples, command display output, network topology diagrams, and other figures included in the document are shown for illustrative purposes only. Any use of actual IP addresses or phone numbers in illustrative content is unintentional and coincidental.

Cisco Nexus 1000V InterCloud Command Reference

© 2013–2015 Cisco Systems, Inc. All rights reserved.