This document describes the features, issues, and deployment guidelines for Cisco Nexus Dashboard Orchestrator software.

Cisco Multi-Site is an architecture that allows you to interconnect separate Cisco APIC, Cloud Network Controller (formerly known as Cloud APIC), and NDFC (formerly known as DCNM) domains (fabrics) each representing a different region. This helps ensure multitenant Layer 2 and Layer 3 network connectivity across sites and extends the policy domain end-to-end across the entire system.

Cisco Nexus Dashboard Orchestrator is the intersite policy manager. It provides single-pane management that enables you to monitor the health of all the interconnected sites. It also allows you to centrally define the intersite configurations and policies that can then be pushed to the different Cisco APIC, Cloud Network Controller, or DCNM fabrics, which in term deploy them in those fabrics. This provides a high degree of control over when and where to deploy the configurations.

For more information, see the “Related Content” section of this document.

Note: The documentation set for this product strives to use bias-free language. For the purposes of this documentation set, bias-free is defined as language that does not imply discrimination based on age, disability, gender, racial identity, ethnic identity, sexual orientation, socioeconomic status, and intersectionality. Exceptions may be present in the documentation due to language that is hardcoded in the user interfaces of the product software, language used based on RFP documentation, or language that is used by a referenced third-party product.

Date

Description

May 10, 2024

Additional open issue CSCwi55341.

April 08, 2024

Release 4.2(3j) became available.

Additional open issues CSCwi49818, CSCwi65902, CSCwi81092, and CSCwi76522 in the 4.2(3e) release, which are resolved in 4.2(3j).

March 21, 2024

Additional open issue CSCwi65902.

March 13, 2024

Additional known issue CSCwi35916.

January 11, 2024

Release 4.2(3e) became available.

New Software Features

This release adds the following new features:

Product Impact

Feature

Description

Base functionality

ACI Multi-Site support for vzAny PBR and L3Out-to-L3Out PBR use cases

This release allows you to enable the following new use cases for policy-based redirect (PBR) with Multi-Site:

●  One-arm firewall insertion

●  One-arm load balancer insertion

New service chaining configuration workflows

This release adds support for the following additional workflows:

●  Two-node service graphs for Multi-Site templates

●  Five-node service graphs for Autonomous templates

New Hardware Features

There is no new hardware supported in this release.

The complete list of supported hardware is available in the “Deploying Nexus Dashboard Orchestrator” chapter of the Cisco Multi-Site Deployment Guide.

Changes in Behavior

●     For all new deployments, we recommend deploying Nexus Dashboard Orchestrator service in Nexus Dashboard 3.0(1) or later.

●     If you upgrade to this release from a release prior to 4.0(1) and have template versioning enabled, only the latest versions of the templates are preserved during the upgrade.

All other existing versions of templates, including older versions that are tagged Golden, will not be transferred during the upgrade.

●     If you upgrade to this release from a release prior to 4.0(1), existing schemas’ IDs may change.

If you are using any API automation that relies on static Schema IDs, we recommend dynamically obtaining the IDs before executing any action against the Schemas.

●     Downgrading from this release is not supported.

We recommend creating a full backup of the configuration before upgrading, so that if you ever want to downgrade, you can deploy a brand-new cluster using an earlier version and then restore your configuration in it.

●     Note that CloudSec encryption for intersite traffic will be deprecated in a future release.

We recommend not enabling (if currently disabled) or disabling (if currently enabled) this feature for your ACI Multi-Site deployments.

●     Beginning with Release 4.0(1), the “Application Profiles per Schema” scale limit has been removed.

For the full list of maximum verified scale limits, see the Nexus Dashboard Orchestrator Verified Scalability Guide.

●     Beginning with Release 4.0(1), if you have route leaking configured for a VRF, you must delete those configurations before you delete the VRF or undeploy the template containing that VRF.

●     Beginning with Release 4.0(1), if you are configuring EPG Preferred Group (PG), you must explicitly enable PG on the VRF.

In prior releases, enabling PG on an EPG automatically enabled the configuration on the associated VRF. For detailed information on configuring PG in Nexus Dashboard Orchestrator, see the “EPG Preferred Group” chapter of the Cisco Nexus Dashboard Orchestrator Configuration Guide for ACI Fabrics.

Open Issues

This section lists the open issues. Click the bug ID to access the Bug Search Tool and see additional information about the bug. The "Exists In" column of the table lists the specific releases in which the bug exists.

Bug ID

Description

Exists in

CSCwi49818

When using any 4.2.x APIC version combined with NDO 4.2.x you will see "Fabric Interconnect Not OK" at the Nexus Dashboard Orchestrator overview page.

BGP connectivity will also show as down on the Overview page, however in the spines we will see that L2vpn EVPN BGP is working, stable and exchanging routes correctly.

4.2(3e)

CSCwi55341

When configuring a site-specific subnet on a Non-Layer 2 stretched BD, only one subnet can be set to primary. An error occurs when attempting to deploy the template stating that only one preferred subnet per address family is allowed under the BD.

4.2(3e)

CSCwi65902

There is a false Config-Drift notification on the NDO about ALL Fabric Resource Policy objects.

Deploying the Fabric Resource Policy template will remove the Config-Drift notification. After two days, the Config-Drift notification reappears about the Fabric Resource Policy template even though nothing was changed on the APIC.

4.2(3e)

CSCwi81092

When redeploying configuration from NDO the "Pim check box" becomes disabled at the local site where the redeploy was initiated.

4.2(3e)

CSCwi76522

After migrating some object (such as a BD) from site local template to stretched template and then add a new object to that site local template, trying to deploy it may result in the following error:

Template deployment failed: this is a stretch object migration case. Please deploy the target template ZZZZ in schema XXXXX first.

4.2(3e)

CSCvo84218

When service graphs or devices are created on Cloud APIC by using the API and custom names are specified for AbsTermNodeProv and AbsTermNodeCons, a brownfield import to the Nexus Dashboard Orchestrator will fail.

4.2(3e) and later

CSCvo20029

Contract is not created between shadow EPG and on-premises EPG when shared service is configured between Tenants.

4.2(3e) and later

CSCvn98355

Inter-site shared service between VRF instances across different tenants will not work, unless the tenant is stretched explicitly to the cloud site with the correct provider credentials. That is, there will be no implicit tenant stretch by Nexus Dashboard Orchestrator.

4.2(3e) and later

CSCvt06351

Sometimes during deploy, you may see the following error:

invalid configuration CT_IPSEC_TUNNEL_POOL_NAME_NOT_DEFINED

4.2(3e) and later

CSCvt00663

Deployment window may not show all the cloud related config values that have been modified.

4.2(3e) and later

CSCvt41911

After brownfield import, the BD subnets are present in site local and not in the common template config

4.2(3e) and later

CSCvt44081

In shared services use case, if one VRF has preferred group enabled EPGs and another VRF has vzAny contracts, traffic drop is seen.

4.2(3e) and later

CSCvt02480

The REST API call "/api/v1/execute/schema/5e43523f1100007b012b0fcd/template/Template_11?undeploy=all" can fail if the template being deployed has a large object count

4.2(3e) and later

CSCvt15312

Shared service traffic drops from external EPG to EPG in case of EPG provider and L3Out vzAny consumer

4.2(3e) and later

CSCvw10432

Two cloud sites (with Private IP for CSRs) with the same InfraVNETPool on both sites can be added to NDO without any infraVNETPool validation.

4.2(3e) and later

CSCvy36810

Multiple Peering connections created for 2 set of cloud sites.

4.2(3e) and later

CSCvz77156

Route leak configuration for invalid Subnet may get accepted when Internal VRF is the hosted VRF. There would be fault raised in cAPIC.

4.2(3e) and later

CSCwa37204

Username and password is not set properly in proxy configuration so a component in the container cannot connect properly to any site.

In addition, external module pyaci is not handling the web socket configuration properly when user and password are provided for proxy configuration.

4.2(3e) and later

Resolved Issues

This section lists the resolved issues. Click the bug ID to access the Bug Search tool and see additional information about the issue. The "Fixed In" column of the table specifies whether the bug was resolved in the base release or a patch release.

Bug ID

Description

Fixed in

CSCwi49818

When using any 4.2.x APIC version combined with NDO 4.2.x you will see "Fabric Interconnect Not OK" at the Nexus Dashboard Orchestrator overview page.

BGP connectivity will also show as down on the Overview page, however in the spines we will see that L2vpn EVPN BGP is working, stable and exchanging routes correctly.

4.2(3j)

CSCwi65902

There is a false Config-Drift notification on the NDO about ALL Fabric Resource Policy objects.

Deploying the Fabric Resource Policy template will remove the Config-Drift notification. After two days, the Config-Drift notification reappears about the Fabric Resource Policy template even though nothing was changed on the APIC.

4.2(3j)

CSCwi81092

When redeploying configuration from NDO the "Pim check box" becomes disabled at the local site where the redeploy was initiated.

4.2(3j)

CSCwi76522

After migrating some object (such as a BD) from site local template to stretched template and then add a new object to that site local template, trying to deploy it may result in the following error:

Template deployment failed: this is a stretch object migration case. Please deploy the target template ZZZZ in schema XXXXX first.

4.2(3j)

Known Issues

This section lists known behaviors. Click the Bug ID to access the Bug Search Tool and see additional information about the issue.

Bug ID

Description

CSCvv67993

NDO will not update or delete VRF vzAny configuration which was directly created on APIC even though the VRF is managed by NDO.

CSCvo82001

Unable to download Nexus Dashboard Orchestrator report and debug logs when database and server logs are selected

CSCvn90706

For hybrid cloud deployments, no validation is available for shared services scenarios

CSCvi61260

If an infra L3Out that is being managed by Cisco Multi-Site is modified locally in a Cisco APIC, Cisco Multi-Site might delete the objects not managed by Cisco Multi-Site in the Infra L3Out.

CSCvq07769

"Phone Number" field is required in all releases prior to Release 2.2(1). Users with no phone number specified in Release 2.2(1) or later will not be able to log in to the GUI when Orchestrator is downgraded to an earlier release.

CSCvu71584

Routes are not programmed on CSR and the contract config is not pushed to the Cloud site.

CSCvw47022

Shadow of cloud VRF may be unexpectedly created or deleted on the on-premises site.

CSCvt47568

Let's say APIC has EPGs with some contract relationships. If this EPG and the relationships are imported into NDO and then the relationship was removed and deployed to APIC, NDO doesn't delete the contract relationship on the APIC.

CSCwa31774

When creating VRFs in infra tenant on a Google Cloud site, you may see them classified as internal VRF in NDO. If you then import these VRFs in NDO, the allowed routeleak configuration will be determined based on whether the VRF is used for external connectivity (external VRF) or not (internal VRF).

This is because on cAPIC, VRFs in infra tenant can fall into 3 categories: internal, external and un-decided.

NDO treats infra tenant VRFs as 2 categories for simplicity: internal and external.

There is no usecase impacted because of this.

CSCwa47934

Removing site connectivity or changing the protocol is not allowed between two sites.

CSCwa52287

Template goes to approved state when the number of approvals is fewer than the required number of approvers.

CSCvy31532

After a site is re-registered, NDO may have connectivity issues with APIC or CAPIC

CSCwc62636

If cloud sites have EVPN-based connectivity with another cloud or on-premises site, then contract-based routing must be enabled for intersite traffic to work.

CSCwc59208

When APIC-owned L3Outs are deleted manually on APIC by the user, stretched and shadow InstP belonging to the L3Outs get deleted as expected. However, when deploying the template from NDO, only the stretched InstPs detected in config drift will get deployed.

CSCvz07639

NSG rules on Cloud EPG are removed right after applying service graph between Cloud EPG and on-premises EPG, which breaks communication between Cloud and on-premises.

CSCwa26712

Existing IPSec tunnel state may be affected after update of connectivity configuration with external device.

CSCwa40878

User can not withdraw the hubnetwork from a region if intersite connectivity is deployed.

CSCwa17852

BGP sessions from Google Cloud site to AWS/Azure site may be down due to CSRs being configured with a wrong ASN number.

CSCwi19857

APIC has GOTO and GOTHROUGH options when configuring an L3 device, but in NDO the GOTHROGH option is not exposed intentionally. Only the GOTO option is supported.

CSCwi35916

After an upgrade to NDO 4.2.1 or later, the orchestrator raises configuration drifts that are not automatically reconciled, associated to the configuration objects for Service Devices and Service Graphs.

Compatibility

This release supports the hardware listed in the “Prerequisites” section of the Cisco Nexus Dashboard Orchestrator Deployment Guide.

This release supports Nexus Dashboard Orchestrator deployments in Cisco Nexus Dashboard only.

Cisco Nexus Dashboard Orchestrator can be cohosted with other services in the same cluster. For cluster sizing guidelines, see the Nexus Dashboard Cluster Sizing tool.

Cisco Nexus Dashboard Orchestrator can manage fabrics managed by a variety of controller versions. For fabric compatibility information see the Nexus Dashboard and Services Compatibility Matrix.

Scalability

For Nexus Dashboard Orchestrator verified scalability limits, see Cisco Nexus Dashboard Orchestrator Verified Scalability Guide.

For Cisco ACI fabrics verified scalability limits, see Cisco ACI Verified Scalability Guides.

For Cisco Cloud ACI fabrics releases 25.0(1) and later verified scalability limits, see Cisco Cloud Network Controller Verified Scalability Guides.

For Cisco NDFC (DCNM) fabrics verified scalability limits, see Cisco NDFC (DCNM) Verified Scalability Guides.

Related Content

For ACI fabrics, see the Cisco Application Policy Infrastructure Controller (APIC) documentation page. On that page, you can use the "Choose a topic" and "Choose a document type” fields to narrow down the displayed documentation list and find a specific document.

For Cloud Network Controller fabrics, see the Cisco Cloud Network Controller documentation page.

For NDFC (DCNM) fabrics, see the Cisco Nexus Dashboard Fabric Controller documentation page.

The following table describes the core Nexus Dashboard Orchestrator documentation.

Document

Description

Cisco Nexus Dashboard Orchestrator Release Notes

Provides release information for the Cisco Nexus Dashboard Orchestrator product.

Nexus Dashboard Capacity Planning

Provides cluster sizing guidelines based on the type and number of services you plan to run in your Nexus Dashboard as well as the target fabrics' sizes.

Nexus Dashboard and Services Compatibility Matrix

Provides Cisco Nexus Dashboard and Services compatibility information for specific Cisco Nexus Dashboard, services, and fabric versions.

Cisco Nexus Dashboard Orchestrator Deployment Guide

Describes how to install Cisco Nexus Dashboard Orchestrator and perform day-0 operations.

Cisco Nexus Dashboard Orchestrator Configuration Guide for ACI Fabrics

Describes Cisco Nexus Dashboard Orchestrator configuration options and procedures for fabrics managed by Cisco APIC.

Cisco Nexus Dashboard Orchestrator Use Cases for Cloud Network Controller

A series of documents that describe Cisco Nexus Dashboard Orchestrator configuration options and procedures for fabrics managed by Cisco Cloud Network Controller.

Cisco Nexus Dashboard Orchestrator Configuration Guide for NDFC (DCNM) Fabrics

Describes Cisco Nexus Dashboard Orchestrator configuration options and procedures for fabrics managed by Cisco DCNM.

Cisco Nexus Dashboard Orchestrator Verified Scalability Guide

Contains the maximum verified scalability limits for this release of Cisco Nexus Dashboard Orchestrator.

Cisco ACI Verified Scalability Guides

Contains the maximum verified scalability limits for Cisco ACI fabrics.

Cisco Cloud ACI Verified Scalability Guides

Contains the maximum verified scalability limits for Cisco Cloud ACI fabrics.

Cisco NDFC (DCNM) Verified Scalability Guides

Contains the maximum verified scalability limits for Cisco NDFC (DCNM) fabrics.

Cisco ACI YouTube channel

Contains videos that demonstrate how to perform specific tasks in the Cisco Nexus Dashboard Orchestrator.

Documentation Feedback

To provide technical feedback on this document, or to report an error or omission, send your comments to apic-docfeedback@cisco.com. We appreciate your feedback.

Legal Information

Cisco and the Cisco logo are trademarks or registered trademarks of Cisco and/or its affiliates in the U.S. and other countries. To view a list of Cisco trademarks, go to this URL: http://www.cisco.com/go/trademarks. Third-party trademarks mentioned are the property of their respective owners. The use of the word partner does not imply a partnership relationship between Cisco and any other company. (1110R)

Any Internet Protocol (IP) addresses and phone numbers used in this document are not intended to be actual addresses and phone numbers. Any examples, command display output, network topology diagrams, and other figures included in the document are shown for illustrative purposes only. Any use of actual IP addresses or phone numbers in illustrative content is unintentional and coincidental.

© 2023 Cisco Systems, Inc. All rights reserved.