Contents

Introduction

Prerequisites

Requirements

Components Used

Configure

Verify

Troubleshoot

Introduction

This document describes how to connect to Prime Collaboration Assurance (PCA) database (DB) with DB Visualizer. It is frequently used by TAC at the time of troubleshooting sessions.

Prerequisites

Requirements

There are no specific requirements for this document.

Components Used

The information in this document is based on these software and hardware versions:

- PCA 11.6

- DB Visualizer

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Configure

1. Install the DB Visualizer Application and create a new connection as shown in the image.

2.  Select the DB Driver as shown in the image.

3. Enter the details to connect to the DB as shown in the image.

4. Enable the port for DB connection via the PCA CLI.

You need to login as admin user and then switch to root user and then execute this command.

/sbin/iptables -A INPUT -p tcp --dport 5433 -j ACCEPT

/etc/init.d/iptables save

Verify

There is currently no verification procedure available for this configuration.

Troubleshoot

There is currently no specific troubleshooting information available for this configuration.